The Project Gutenberg eBook of Transactions of the American Society of Civil Engineers, vol. LXX, Dec. 1910

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Transactions of the American Society of Civil Engineers, vol. LXX, Dec. 1910

Author: W. B. Gregory

Release date: February 16, 2006 [eBook #17776]

Language: English

Credits: Produced by Juliet Sutherland, Sigal Alon and the Online
Distributed Proofreading Team at http://www.pgdp.net

*** START OF THE PROJECT GUTENBERG EBOOK TRANSACTIONS OF THE AMERICAN SOCIETY OF CIVIL ENGINEERS, VOL. LXX, DEC. 1910 ***

AMERICAN SOCIETY OF CIVIL ENGINEERS

INSTITUTED 1852

TRANSACTIONS

Paper No. 1168

TESTS OF CREOSOTED TIMBER.

By W. B. Gregory, M. Am. Soc. C. E.

During the last few years a quantity of literature has appeared in which the treatment of timber by preservatives has been discussed. The properties of timber, both treated and untreated, have been determined by the Forest Service, United States Department of Agriculture, and through its researches valuable knowledge has come to engineers who have to deal with the design of wooden structures. There is very little information, however, regarding the effect of time on creosoted timber, and for this reason the results given herewith may prove of interest.

The material tested consisted of southern pine stringers having a cross-section approximately 6 by 16 in. and a length of 30 ft. For the purpose of testing, each beam was cut into two parts, each about 15 ft. long. This material had been in use in a trestle of a railroad near New Orleans for 26 years. The stringers were chosen at random to determine the general condition of the trestle. The timber had been exposed to the weather and subjected to heavy train service from the time it was treated until it was tested. The annual rainfall at New Orleans is about 60 in., and the humidity of the air is high. In spite of these conditions, there was no appearance of decay on any of the specimens tested. The specifications under which the timber was treated were as follows:

Timber.

The timber for creosoting shall be long-leafed or southern pine. Sap surfaces on two or more sides are preferred.

Piles.—The piles shall be of long-leafed or southern pine, not less than 14 in. at the butt. They shall be free from defects impairing their strength, and shall be reasonably straight.

The piles shall be cleanly peeled, no inner skin being left on them. The oil used shall be so-called creosote oil, from London, England, and shall be of a heavy quality.

The treatment will vary according to the dimensions of the timbers and length of time they have been cut. Timbers of large and small dimensions shall not be treated in the same charge, neither shall timbers of differing stages of air seasoning, or the close-grained, be treated in the same charge with coarse or open-grained timbers.

The timbers shall be subjected first to live steam superheated to from 250 to 275° Fahr., and under a 30 to 40-lb. pressure. The live steam shall be admitted into the cylinders through perforated steam pipes, and the temperature shall be obtained by using superheated steam in closed pipes in the cylinders.

The length of time this steaming shall last will depend on the size of the timbers and the length of time they have been cut. In piles and large timbers freshly cut, as long a time as 12 hours may be required. After the steaming is accomplished, the live steam shall be shut off and the superheated steam shall be maintained at a temperature of 160° or more and a vacuum of from 20 to 25 in. shall be held for 4 hours or longer, if the discharge from the pumps indicates the necessity.

Oil Treatment.—The temperature being maintained at 160° Fahr., the cylinders shall be promptly filled with creosote oil at a temperature as high as practicable (about 100° Fahr.). The oil shall be maintained at a pressure ranging from 100 to 120 lb., as experience and measurements must determine the length of time the oil treatment shall continue, so that the required amount of oil may be injected.

After the required amount of oil is injected, the superheated steam shall be shut off, the oil let out, the cylinders promptly opened at each end, and the timber immediately removed from the cylinder.

In the erection of timbers the sap side must be turned up, and framing or cutting of timbers shall not be permitted, if avoidable. All cut surfaces of timbers shall be saturated with hot asphaltum, thinned with creosote oil. The heads of piles when cut shall be promptly coated with the hot asphaltum and oil, even though the cut-off be temporary.

Method of Testing.

The tests were made on a Riehlé 100,000-lb. machine in the Experimental Engineering Laboratory of Tulane University of Louisiana. The machine is provided with a cast-iron beam for cross-bending tests. The distance between supports was 12 ft. The method of support was as follows: Each end of the beam was provided with a steel roller which rested on the cast-iron beam of the testing machine, while above the roller, and, directly under the beam tested, there was a steel plate 6 by 8 in. in area and 1 in. thick. The area was sufficiently great to distribute the load and prevent the shearing of the fibers of the wood. The head of the Riehlé machine is 10 in. wide. A plate, 3/8 in. thick, 6 in. wide and 18 in. long, was placed between the head of the machine and the beam tested.

Fig. 1.—DEFLECTON CURVES BEAM I Fig. 1.—DEFLECTON CURVES BEAM I

Fig. 2.—DEFLECTON CURVES BEAM II Fig. 2.—DEFLECTON CURVES BEAM II

TABLE 1.—Summary of Results of Transverse Tests of Beams at Tulane University, February 10th to March 2d, 1909.

Number of beam. | Top or butt of log. | b | h | I | Loads: | S = Plc/4I | d, Inches. | E | Weight, in pounds per cubic foot. | Remarks.
Width, in inches. | Height, in inches. | I = bh³/12 | Actual at elastic limit. | Maximum. | At elastic limit. | Maximum. | At elastic limit. | E = Pl³/48dI
I | B | 6.28 | 15.94 | 2,120 | 22,000 | 45,900 | 2,975 | 6,200 | 0.41 | 1,575,000 | 50.2 | Close-grained pine, long-leaf.
I | T | 6.00 | 15.69 | 1,934 | 20,000 | 38,000 | 2,915 | 5,540 | 0.465 | 1,383,000 | 47.5
II[A] | T | 6.37 | 15.81 | 2,098 | 20,000 | 43,450 | 2,722 | 5,918 | 0.380 | 1,562,000 | 40.5 | Coarse loblolly, large knots.
II | B | 6.41 | 16.41 | 2,360 | 16,000 | 25,040 | 1,999 | 3,130 | 0.430 | 979,000 | 42.2
III | T | 5.88 | 15.68 | 1,871 | 24,000 | 45,130 | 3,608 | 6,785 | 0.535 | 1,489,000 | 40.4 | Close-grained, long-leaf no knots.
III | B | 5.88 | 15.90 | 1,965 | 21,000 | 35,190 | 3,054 | 5,120 | 0.515 | 1,288,000 | 44.2
IV | T | 6.00 | 15.43 | 1,835 | 22,000 | 38,425 | 3,320 | 5,810 | 0.465 | 1,601,000 | 40.8 | Loblolly, with knots.
IV | B | 6.12 | 15.87 | 2,032 | 22,000 | 35,500 | 3,090 | 4,983 | 0.660 | 1,017,000 | 41.5
V | B | 6.00 | 16.00 | 2,048 | 22,000 | 47,000 | 3,090 | 6,610 | 0.400 | 1,670,000 | 47.2 | Long-leaf yellow pine.
V[A] | T | 6.00 | 15.87 | 1,999 | 14,000 | 22,050 | 1,998 | 3,145 | 0.315 | 1,382,000 | 42.1
VI[A] | B | 5.50 | 15.75 | 1,790 | 22,000 | 51,330 | 3,484 | 8,925 | 0.450 | 1,695,000 | 50.2 | Long-leaf yellow pine.
VI[A] | T | 5.87 | 15.62 | 1,865 | 20,000 | 44,000 | 3,013 | 6,627 | 0.410 | 1,625,000 | 45.2
VII | B | 6.56 | 15.62 | 2,083 | 34,000 | 51,900 | 4,580 | 6,985 | 0.620 | 1,637,000 | 43.7 | Long-leaf yellow pine.
VII[A] | T | 6.22 | 15.62 | 1,975 | 20,000 | 49,000 | 2,845 | 6,970 | 0.380 | 1,658,000 | 40.2

[A] Failed in longitudinal shear.

The deflection was measured on both sides of each beam by using silk threads stretched on each side from nails driven about 2 in. above the bottom of the beam and directly over the rollers which formed the supports. From a small piece of wood, tacked to the bottom of the beam at its center and projecting at the sides, the distance to these threads was measured. These measurements were taken to the nearest hundredth of an inch. The mean of the deflections was taken as the true deflection for any load.

Fig. 3.—DEFLECTON CURVES BEAM III Fig. 3.—DEFLECTON CURVES BEAM III

Fig. 4.—DEFLECTON CURVES BEAM IV Fig. 4.—DEFLECTON CURVES BEAM IV

In computing the various quantities shown in Table 1, the summary of results, the load has been assumed as concentrated at the center of the beam. While it is true that the load was spread over a length of about 12 in., due to the width of the head of the machine and the plate between it and the beam tested, it is also true that there were irregularities, such as bolt-holes and, in some cases, abrasions due to wear, that could not well be taken into account. Hence, it was deemed sufficiently accurate to consider the load as concentrated. Besides the horizontal bolt-holes, shown in the photographs, there were vertical bolt-holes, at intervals in all the beams. The latter were 7/8 in. in diameter, and in every case they were sufficiently removed from the center of the length of the beam to allow the maximum moment at the reduced section to be relatively less than that at the center of the beam. For this reason, no correction was made for these holes. The broken beams often showed that rupture started at, or was influenced by, some of the holes, especially the horizontal ones.

While some of the heavy oils of a tarry consistency remained, they were only to be found in the sappy portions of the long-leaf pine and in the loblolly (Specimens II and IV). Exposure in a semi-tropical climate for 26 years had resulted in the removal of the more volatile portions of the creosote oil. The penetration of the oil into the sap wood seemed to be perfect, while in the loblolly it varied from a fraction of an inch to 1-1/2 in. In the heart wood there was very little penetration across the grain. The timber had been framed and the holes bored before treatment. The penetration of the creosote along the grain from the holes was often from 4 to 6 in.

Circular 39 of the Forest Service, U. S. Department of Agriculture, entitled "Experiments on the Strength of Treated Timber," gives the results of a great many tests of creosoted ties, principally loblolly pine, from which the following conclusions are quoted:

"(1) A high degree of steaming is injurious to wood. The degree of steaming at which pronounced harm results will depend upon the quality of the wood and its degree of seasoning, and upon the pressure (temperature) of steam and the duration of its application. For loblolly pine the limit of safety is certainly 30 pounds for 4 hours, or 20 pounds for 6 hours." [Tables 3, 6, and 7.]

"(2) The presence of zinc chlorid will not weaken wood under static loading, although the indications are that the wood becomes brittle under impact." [Tables 3 and 4.]

Fig. 5.—DEFLECTON CURVES BEAM V Fig. 5.—DEFLECTON CURVES BEAM V

Fig. 6.—DEFLECTON CURVES BEAM VI Fig. 6.—DEFLECTON CURVES BEAM VI

"(3) The presence of creosote will not weaken wood of itself. Since apparently it is present only in the openings of the cells, and does not get into the cell walls, its action can only be to retard the seasoning of the wood." [Tables 3, 4, 5, and 6.]

Fig. 7.—DEFLECTON CURVES BEAM VII Fig. 7.—DEFLECTON CURVES BEAM VII

Comparisons.

A comparison of the results obtained with tests made on untreated timber is interesting, and to this end Tables 2 and 3, from Circular 115, Forest Service, U.S. Department of Agriculture, by W. Kendrick Hatt, Assoc. M. Am. Soc. C. E., are quoted. The tests made by the writer were from timber raised in Louisiana and Mississippi, while the tests quoted were from timber raised farther north. The number of tests was not sufficient to settle questions of average strength or other qualities. It will be seen, however, that the treated timber 26 years old compares favorably with the new untreated timber.

Plate I, Fig. 1.—Specimen in Testing Machine, Showing Method of Support. Plate I, Fig. 1.—Specimen in Testing Machine, Showing Method of Support.

Plate I, Fig. 2.—End Views of Tested Timbers. Plate I, Fig. 2.—End Views of Tested Timbers.

TABLE 2.—Bending Strength of Large Sticks.

Loblolly Pine.

Reference number.
Locality of Growth.
Dimensions.
Grade.
Condition of seasoning.

Number of tests.
Moisture, per cent.
Rings per inch.
Specific gravity, dry.
Weight per Cubic Foot, in Pounds.
Fiber stress at elastic limit, in pounds per square inch.
Modulus of rupture, in pounds per square inch.
Modulus of elasticity, in thousands of pounds per square inch.
Elastic resilience, in inch pounds per cubic inch.
Number failing by longi- tudinal shear.
Remarks.

Section, in inches.
Span, in feet
As tested.
Oven dry.

1
South Carolina.
 6 by  7
 6 by 10
 4 by 12
 6 by 16
 8 by 14
 8 by 16

10 to 15.5
Square edge
Green
Average
42
48.0
5.7
0.50
46.2
31.2
3,150
5,580
1,426
0.45
7
Moisture above saturation point in all cases.

Maximum
92.1
11.7
0.60
56.8
37.5
5,210
8,460
1,920
0.99

Minimum
30.2
2.3
0.40
35.6
25.0
1,675
3,120
905
0.07

2
South Carolina.
 6 by  7
 4 by 12
 6 by 10
 6 by 16
 8 by 16
10 by 16

10 to 16
Square edge
Partially air dry.
Average
18
27.7
5.0
0.50
40.0
31.2
3,380
5,650
1,435
0.45
0
Moisture from 25 to 30 per cent.

Maximum
29.2
8.2
0.55
43.7
34.4
4,610
8,090
1,880
0.76

Minimum
25.5
2.5
0.45
35.6
28.1
2,115
3,600
1,152
0.20

3
South Carolina.
 6 by  7
 4 by 12
 6 by 10
 6 by 16

10 to 15
Square edge
Partially air dry.
Average
19
21.0
5.6
0.50
37.5
31.2
2,970
5,690
1,340
0.39
2
Moisture less than 25 per cent.

Maximum
24.9
17.2
0.58
45.6
36.2
4,850
8,100
2,040
0.69

Minimum
15.0
2.7
0.41
31.2
25.6
1,730
2,910
906
0.10

4
Virginia.
 8 by  8
6 to 16
Square edge
Partially air dry.
Average
12
22.4
4.8
0.46
35.6
28.8
3,260
5,180
1,180
0.51
0

Maximum
27.7
8.8
0.58
43.1
36.2
5,300
8,950
1,728
1.05

Minimum
17.8
2.5
0.37
30.0
23.1
1,280
2,180
606
0.13

5
Virginia.
 8 by  8
6 to 15.5
Square edge
Green
Average
17
64.0
3.0
0.43
43.7
26.9
1,935
3,490
744
0.31
0
Very rapid growth; poor quality.

Maximum
100.5
4.0
0.51
51.9
31.9
3,185
4,720
1,193
0.78

Minimum
38.8
2.5
0.35
35.0
21.9
956
2,180
357
0.12

Long-Leaf Pine.

6
South Carolina.
 6 by  8
10 by 16
15
Merchantable
Partially air dry
Average

25.0
13.7
0.58
45.6
36.2
3,800
7,160
1,560
0.53
9

Maximum
22
40.3
25.4
0.76
60.0
47.5
4,970
10,020
2,010
0.78

Minimum

17.3
6.2
0.50
39.4
31.2
2,220
5,450
1,190
0.21

7
Georgia.
10 by 12
15
Merchantable
Partially air dry.
Average

27.3
18.0
0.69
54.7
42.9
5,581
8,384
1,820

6
Excellent merchantable grade.

Maximum
22
34.5
29.0
0.79

49.4
9,600
11,410
2,920

Minimum

20.0
11.0
0.50

31.4
3,547
4,836
1,167

TABLE 3.—Loblolly Pine.— Bending Tests on Beams Seasoned Under Different Conditions.
(8 by 16-in. section; 13-1/2 to 15-ft. span.)

Number of tests.
Fiber stress at elastic limit, in pounds per square inch.
Modulus of rupture, in pounds per square inch.
Longitudinal shear at maximum load, in pounds per square inch.
Modulus of elasticity, in thousands of pounds per square inch.
Percentage of moisture.
Rings per inch.
Weight per cubic foot, oven dry, in pounds.
Condition of seasoning.

Average
4
3,580
5,480
364₄
1,780
23.2
9.4
33.7
Air dry, 3-1/2 months in the open.

Maximum
4,070
6,600
440
1,987
24.3
11.5
34.5

Minimum
3,090
5,000
327
1,530
21.5
8.0
32.5

Average
5
4,512
5,060
338₃
1,685
20
7.7
33.9
Kiln dry, 6 days.

Maximum
5,840
7,320
488
1,790
22
10.2
38.0

Minimum
3,180
2,150
143
1,410
18
4.7
27.7

Average
12
4,331
6,721
493₉
1,688

7.7

Air dry, 21 months under shelter.

Maximum
4,990
8,560
620
2,002

9.5

Minimum
3,110
5,160
380
1,398

5.5

Note.—Figures written as subscripts to the figures for longitudinal shear indicate the number of sticks failing in that manner.

Plate II.—Side Views of Tested Timbers. Plate II.—Side Views of Tested Timbers.

TABLE 4.—Load and Deflection Log. Beam I.

Date: February 26th, 1909.
l = 12 ft.; b (mean) = 6-9/32 in.;
h (mean) = 15-15/16 in.;
c = 7.97 in. Time = 1 hour.
Date: February 24th, 1909.
l = 12 ft.; b (mean) = 6 in.;
h (mean) = 15.69 in.;
c = 7.84 in.

No.
P
Deflection, in Inches.
P
Deflection, in Inches.

Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.
Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.

1
0
1.86
0
1.88
0
0
0
1.83
0
1.86
0
0

2
2,000
1.92
0.05
1.90
0.02
0.035
2,000
1.87
0.04
1.90
0.04
0.04

3
4,000
1.96
0.10
1.94
0.06
0.080
4,000
1.91
0.08
1.96
0.10
0.090

4
6,000
1.99
0.13
1.98
0.10
0.115
6,000
1.96
0.13
2.00
0.14
0.135

5
8,000
2.03
0.17
2.02
0.14
0.155
8,000
2.00
0.17
2.04
0.18
0.175

6
10,000
2.05
0.19
2.06
0.18
0.185
10,000
2.04
0.21
2.08
0.22
0.215

7
12,000
2.10
0.24
2.09
0.21
0.225
12,000
2.09
0.26
2.13
0.27
0.265

8
14,000
2.13
0.27
2.13
0.25
0.260
14,000
2.14
0.31
2.18
0.32
0.315

9
16,000
2.17
0.31
2.16
0.28
0.295
16,000
2.19
0.36
2.23
0.37
0.365

10
18,000
2.20
0.34
2.20
0.32
0.330
18,000
2.24
0.41
2.28
0.42
0.415

11
20,000
2.24
0.36
2.25
0.37
0.365
20,000
2.29
0.46
2.33
0.47
0.465

12
22,000
2.28
0.42
2.28
0.40
0.410
22,000
2.34
0.51
2.39
0.53
0.520

13
24,000
2.32
0.46
2.32
0.44
0.450
24,000
2.39
0.56
2.43
0.57
0.565

14
26,000
2.36
0.50
2.36
0.48
0.490
26,000
2.44
0.61
2.48
0.62
0.615

15
28,000
2.40
0.54
2.39
0.51
0.525
28,000
2.49
0.66
2.53
0.67
0.685

16
30,000
2.43
0.57
2.44
0.56
0.565
30,000
2.55
0.72
2.58
0.72
0.720

17
32,000
2.48
0.62
2.48
0.60
0.610
32,000
2.61
0.78
2.65
0.79
0.785

18
34,000
2.52
0.68
2.53
0.65
0.655
34,000[B]
2.68
0.85
2.70
0.84
0.845

19
36,000
2.56
0.70
2.56
0.68
0.690
36,000
2.74
0.91
2.78
0.92
0.915

20
38,000
2.61
0.75
2.62
0.74
0.745
38,000
Broke.

21
40,000
2.65
0.79
2.67
0.79
0.790

22
42,000
2.70
0.84
2.73
0.85
0.845

23
44,000
2.75
0.89
2.77
0.89
0.890

37,500 lb., First Crack; 45,900 lb., Failed.

At Elastic Limit: Load, 22,000 lb.; deflection, 0.41 in.; S, 2,975 lb.
At Elastic Limit: Load, 20,000 lb.; deflection, 0.465 in.; S, 2,975 lb.

Maximum: Load, 45,900 lb.; deflection,.....; S, 6,209 lb.
Maximum: Load, 38,000 lb.; deflection,.....; S, 5,540 lb.

E = 1,575,000 lb.
E = 1,383,000 lb.

[B] First crack.

TABLE 4.—(Continued.)—Load and Deflection Log. Beam II.

Date: February 20th, 1909.
l = 12 ft.; b (mean) = 6.38 in.;
h (mean) = 15.81 in.;
c = 7.91 in. Time = 47.5 min
Date: —
l = 12 ft.; b (mean) = 6.41 in.;
h (mean) = 16.41 in.;
c = 8.20 in.

No.
P
Deflection, in Inches.
P
Deflection, in Inches.

Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.
Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.

1
0
1.65
0
1.68
0
0
0
1.86
0
1.87
0
0

2
2,000
1.69
0.04
1.72
0.04
0.040
2,000
1.91
0.05
1.92
0.05
0.05

3
4,000
1.73
0.08
1.77
0.09
0.085
4,000
1.98
0.12
1.98
0.11
0.115

4
6,000
1.76
0.11
1.80
0.12
0.115
6,000
2.05
0.19
2.02
0.15
0.170

5
8,000
1.80
0.15
1.83
0.15
0.150
8,000
2.07
0.21
2.08
0.21
0.210

6
10,000
1.83
0.18
1.86
0.18
0.180
10,000
2.13
0.27
2.13
0.26
0.265

7
12,000
1.87
0.22
1.90
0.22
0.220
12,000
2.18
0.32
2.18
0.31
0.315

8
14,000
1.91
0.26
1.94
0.26
0.260
14,000
2.25
0.39
2.24
0.37
0.380

9
16,000
1.95
0.30
1.98
0.30
0.300
16,000
2.30
0.44
2.29
0.42
0.430

10
18,000
1.98
0.33
2.02
0.34
0.335
18,000[C]
2.35
0.49
2.35
0.48
0.485

11
20,000
2.03
0.38
2.06
0.38
0.380
20,000
2.44
0.58
2.42
0.55
0.565

12
22,000
2.07
0.42
2.10
0.42
0.420
22,000
2.54
0.68
2.54
0.67
0.675

13
24,000
2.11
0.46
2.14
0.46
0.460
25,040
Failed

14
26,000
2.15
0.50
2.18
0.50
0.500

15
28,000
2.18
0.53
2.22
0.54
0.535

16
30,000
2.23
0.58
2.26
0.58
0.580

17
32,000
2.27
0.62
2.30
0.62
0.620

18
34,000
2.32
0.67
2.35
0.67
0.670

19
36,000
2.37
0.72
2.40
0.72
0.720

20
38,000
2.42
0.77
2.45
0.77
0.770

21
40,000
2.48
0.83
2.50
0.82
0.825

22
42,000
2.53
0.88
2.56
0.88
0.880

23
43,450
Fracture.

24
45,710
Failed.

At Elastic Limit: Load, 20,000 lb.; deflection, 0.38 in.; S, 2,722 lb.
At Elastic Limit: Load, 16,000 lb.; deflection, 0.43 in.; S, 1,999 lb.

Maximum: Load, 43,450 lb.; deflection,.....; S, 5,918 lb.
Maximum: Load, 25,040 lb.; deflection,.....; S, 3,130 lb.

E = 1,562,000 lb.
E = 979,000 lb.

[C] First crack.

TABLE 4.—(Continued.)—Load and Deflection Log. Beam III.

Date: February 13th, 1909.
l = 12 ft.; b (mean) = 5.88 in.;
h (mean) = 15.63 in.;
c = 7.82 in.
Date: —
l = 12 ft.; b (mean) = 5.88 in.;
h (mean) = 15.9 in.;
c = 7.95 in. Time = 45 min.

No.
P
Deflection, in Inches.
P
Deflection, in Inches.

Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.
Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.

1
0
1.23
0
1.06
0
0
0
1.67
0
1.63
0
0

2
2,000
1.27
.04
1.10
0.04
0.040
2,000
1.70
0.03
1.68
0.05
0.040

3
4,000
1.32
0.09
1.13
0.07
0.080
4,000
1.72
0.05
1.72
0.09
0.070

4
6,000
1.37
0.14
1.17
0.11
0.125
6,000
1.82
0.15
1.78
0.15
0.150

5
8,000
1.42
0.19
1.22
0.16
0.175
8,000
1.86
0.19
1.82
0.19
0.190

6
10,000
1.47
0.24
1.26
0.20
0.220
10,000
1.90
0.23
1.87
0.24
0.235

7
12,000
1.51
0.28
1.31
0.25
0.265
12,000
1.97
0.30
1.92
0.29
0.295

8
14,000
1.55
0.32
1.35
0.29
0.305
14,000
2.00
0.33
1.98
0.35
0.340

9
16,000
1.60
0.37
1.40
0.34
0.355
16,000
2.03
0.36
2.04
0.41
0.385

10
18,000
1.64
0.41
1.44
0.38
0.395
18,000
2.10
0.43
2.09
0.46
0.445

11
20,000
1.68
0.45
1.49
0.43
0.440
20,000
2.13
0.46
2.14
0.51
0.485

12
22,000
1.72
0.49
1.54
0.48
0.485
22,000
2.20
0.53
2.20
0.57
0.550

13
24,000
1.78
0.55
1.58
0.52
0.535
24,000
2.26
0.59
2.26
0.63
0.610

14
26,000
1.82
0.59
1.64
0.58
0.585
26,000
2.31
0.64
2.32
0.69
0.665

15
28,000
1.88
0.65
1.68
0.62
0.635
28,000
2.38
0.71
2.40
0.77
0.740

16
30,000
1.92
0.69
1.73
0.67
0.680
30,000
2.42
0.75
2.47
0.84
0.795

17
32,000
1.97
0.74
1.79
0.73
0.735
32,000
2.49
0.82
2.55
0.92
0.870

18
34,000
2.02
0.79
1.85
0.79
0.790
34,000
2.58
0.91
2.62
0.99
0.950

19
36,000
2.07
0.84
1.90
0.84
0.840

20
38,000
2.13
0.90
1.97
0.91
0.915

21
40,000
2.20
0.97
2.03
0.97
0.970

22
42,000
2.27
1.04
2.11
1.05
1.045

23
44,000
2.37
1.14
2.21
1.15
1.145

39,100 lb. First Crack; 45,130 lb. Failed.
22,000 lb. First Crack; 35,190 lb. Failed.

At Elastic Limit: Load, 24,000 lb.; deflection, 0.535 in.; S 3,608 lb.
At Elastic Limit: Load, 21,000 lb.; deflection, 0.515 in.; S, 3,054 lb.

Maximum: Load, 45,130 lb.; deflection,.....; S 6,785 lb.
Maximum: Load, 35,190 lb.; deflection,.....; S 5,120 lb.

E = 1,489,000 lb.
E = 1,288,000 lb.

TABLE 4.—(Continued.)—Load and Deflection Log. Beam IV.

Date: February 16th, 1909.
l = 12 ft.; b (mean) = 6.0 in.;
h (mean) = 15.43 in.;
c = 7.71 in.
Date: February 10th, 1909.
l = 12 ft.; b (mean) = 6.12 in.;
h (mean) = 15.87 in.;
c = 7.93 in. Time = 30 min.

No.
P
Deflection, in Inches.
P
Deflection, in Inches.

Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.
Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.

1
0
2.28
0
2.05
0
0
0
1.44
0
1.58
0
0

2
2,000
2.31
0.03
2.10
0.05
0.040
2,000
1.50
0.06
1.64
0.06
0.06

3
4,000
2,34
0.06
2.14
0.09
0.075
4,000
1.55
0.11
1.70
0.12
0.115

4
6,000
2.40
0.12
2.19
0.14
0.130
6,000
1.62
0.18
1.76
0.18
0.180

5
8,000
2.43
0.15
2.23
0.18
0.165
8,000
1.68
0.24
1.82
0.24
0.240

6
10,000
2.47
0.19
2.28
0.23
0.210
10,000
1.72
0.28
1.89
0.31
0.295

7
12,000
2.51
0.23
2.32
0.27
0.250
12,000
1.80
0.36
1.94
0.36
0.360

8
14,000
2.54
0.26
2.37
0.32
0.290
14,000
1.85
0.41
2.00
0.42
0.415

9
16,000
2.59
0.31
2.41
0.36
0.335
16,000
1.90
0.46
2.06
0.48
0.470

10
18,000
2.62
0.34
2.45
0.40
0.370
18,000
1.98
0.54
2.13
0.55
0.545

11
20,000
2.68
0.40
2.50
0.45
0.425
20,000
2.03
0.59
2.19
0.61
0.600

12
22,000
2.72
0.44
2.54
0.49
0.465
22,000
2.09
0.65
2.25
0.67
0.660

13
24,000
2.78
0.50
2.60
0.55
0.525
24,000
2.15
0.71
2.33
0.75
0.730

14
26,000
2.82
0.54
2.65
0.60
0.570
26,000
2.23
0.79
2.42
0.84
0.815

15
28,000
2.87
0.59
2.69
0.64
0.615
28,000
2.32
0.88
2.49
0.91
0.895

16
30,000
2.91
0.63
2.74
0.69
0.660
30,000
2.42
0.98
2.62
1.04
1.010

17
32,000
2.97
0.69
2.78
0.73
0.710
32,000
2.56
1.12
2.74
1.16
1.140

18
34,000
3.01
0.73
2.85
0.80
0.765
34,000
2.67
1.23
2.87
1.29
1.265

19
36,000
3.07
0.79
2.90
0.85
0.820

20
38,000
3.14
0.86
2.98
0.93
0.895

34,000 lb. First Crack; 38,425 lb. Failed.
28,360 lb. Cracked; 35,500 lb, Failed.

At Elastic Limit: Load, 22,000 lb.; deflection, 0.465 in.; S 3,320 lb.
At Elastic Limit: Load, 22,000 lb.; deflection, 0.66 in.; S, 3,090 lb.

Maximum: Load, 38,425 lb.; deflection,.....; S 5,810 lb.
Maximum: Load, 35,500 lb.; deflection,.....; S 4,983 lb.

E = 1,601,000 lb.
E = 1,017,000 lb.

TABLE 4.—(Continued.)—Load and Deflection Log. Beam V.

Date: —
l = 12 ft.; b (mean) = 6 in.;
h (mean) = 16 in.;
c = 8 in. Time = 40 min.
Date: February 27th, 1909.
l = 12 ft.; b (mean) = 6 in.;
h (mean) = 15.87 in.;
c = 7.94 in.

No.
P
Deflection, in Inches.
P
Deflection, in Inches.

Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.
Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.

1
0
1.97
0
1.37
0
0
0
1.31
0
1.25
0
0

2
2,000
2.01
0.04
1.40
0.03
0.035
2,000
1.37
0.06
1.31
0.06
0.06

3
4,000
2.06
0.09
1.43
0.06
0.075
4,000
1.41
0.10
0.36
0.11
0.105

4
6,000
2.08
0.11
1.47
0.10
0.105
6,000
1.46
0.15
0.40
0.15
0.150

5
8,000
2.11
0.14
1.50
0.13
0.135
8,000
1.49
0.18
0.45
0.20
0.190

6
10,000
2.16
0.19
1.54
0.17
0.180
10,000
1.54
0.23
1.49
0.24
0.235

7
12,000
2.19
0.22
1.57
0.20
0.210
12,000
1.58
0.27
1.53
0.28
0.275

8
14,000
2.22
0.25
1.61
0.24
0.245
14,000
1.62
0.31
1.57
0.32
0.315

9
16,000
2.25
0.28
1.65
0.28
0.280
16,000
1.68
0.37
1.65
0.40
0.385

10
18,000
2.29
0.32
1,69
0.32
0.320
18,000
1.78
0.41
1.71
0.46
0.435

11
20,000
2.32
0.35
1.73
0.36
0.355
20,000
1.99
0.68
1.97
0.72
0.700

12
22,000
2.36
0.39
1.78
0.41
0.400

13
24,000
2.39
0.42
1.83
0.46
0.440

14
26,000
2.42
0.45
1.85
0.48
0.465

15
28,000
2.47
0.50
1.90
0.53
0.515

16
30,000
2.50
0.53
1.95
0.58
0.565

17
32,000
2.54
0.57
1.99
0.62
0.595

18
34,000
2.59
0.62
2.04
0.67
0.645

19
36,000
2.63
0.66
2.09
0.72
0.690

20
38,000
2.68
0.71
2.17
0.80
0.755

21
40,000
2.73
0.76
2.21
0.84
0.800

22
42,000
2.80
0.83
2.30
0.93
0.880

23
44,000
2.90
0.93
2.40
1.03
0.980

25,000 lb. Slight Crack; 47,000 lb. Failed.
20,000 lb. First Crack; 22,050 lb. Failed.

At Elastic Limit: Load, 22,000 lb.; deflection, 0.40 in.; S, 3,090 lb.
At Elastic Limit: Load, 14,000 lb.; deflection, 0.315 in.; S, 1,998 lb.

Maximum: Load, 47,000 lb.; deflection,.......; S, 6,610 lb.
Maximum: Load, 22,050 lb.; deflection,.......; S, 3,145 lb.

E = 1,670,000 lb.
E = 1,382,000 lb.

TABLE 4.—(Continued.)—Load and Deflection Log. Beam VI.

Date: February 12th, 1909.
l = 12 ft.; b (mean) = 5.5 in.;
h (mean) = 15.75 in.;
c = 7.88 in. Time = 40 min.
Date: February 13th, 1909.
l = 12 ft.; b (mean) = 5.87 in.;
h (mean) = 15.62 in.;
c = 7.81 in.

No.
P
Deflection, in Inches.
P
Deflection, in Inches.

Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.
Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.

1
0
1.22
0
1.30
0
0
0
1.28
0
1.30
0
0

2
2,000
1.26
0.04
1.34
0.04
0.04
2,000
1.30
0.02
1.35
0.05
0.035

3
4,000
1.29
0.07
1.38
0.08
0.075
4,000
1.36
0.08
1.39
0.09
0.085

4
6,000
1.33
0.11
1.42
0.12
0.115
6,000
1.40
0.12
1.44
0.14
0.130

5
8,000
1.37
0.15
1.47
0.17
0.160
8,000
1.43
0.15
1.47
0.17
0.160

6
10,000
1.42
0.20
1.51
0.21
0.205
10,000
1.47
0.19
1.51
0.21
0.200

7
12,000
1.45
0.23
1.55
0.25
0.240
12,000
1.51
0.23
1.56
0.26
0.245

8
14,000
1.50
0.28
1.59
0.29
0.285
14,000
1.55
0.27
1.60
0.30
0.285

9
16,000
1.54
0.32
1.63
0.33
0.325
16,000
1.59
0.31
1.64
0.34
0.325

10
18,000
1.58
0.36
1.68
0.38
0.370
18,000
1.62
0.34
1.69
0.39
0.365

11
20,000
1.61
0.39
1.72
0.42
0.405
20,000
1.66
0.38
1.74
0.44
0.410

12
22,000
1.66
0.44
1.76
0.46
0.450
22,000
1.71
0.43
1.80
0.50
0.465

13
24,000
1.81
0.59
1.81
0.51
0.550
24,000
1.77
0.49
1.84
0.54
0.515

14
26,000
1.86
0.64
1.86
0.56
0.600
26,000
1.83
0.55
1.90
0.60
0.575

15
28,000
1.91
0.69
1.91
0.61
0.650
28,000
1.90
0.62
1.97
0.67
0.645

16
30,000
1.96
0.74
1.96
0.66
0.700
30,000
1.97
0.69
2.02
0.72
0.705

17
32,000
2.00
0.78
2.02
0.72
0.750
32,000
2.12
0.84
2.10
0.80
0.820

18
34,000
2.04
0.82
2.11
0.81
0.815
34,000
2.20
0.92
2.16
0.86
0.885

19
36,000
2.10
0.88
2.20
0.90
0.890
36,000
2.29
1.01
2.24
0.94
0.975

20
38,000
2.16
0.94
2.25
0.95
0.945
38,000
2.39
1.11
2.32
1.02
1.065

21
40,000
2.28
1.06
2.38
1.08
1.070

22
42,000
2.38
1.16
2.42
1.12
1.140

23
44,000
2.44
1.22
2.52
1.22
1.220

24
46,000
2.53
1.31
2.60
1.30
1.305

25
48,000
2.66
1.44
2.71
1.41
1.425

26
50,000
2.78
1.56
2.87
1.57
1.565

33,000 lb., First Crack; 51,330 lb., Failed.
24,000 lb., First Crack; 44,000 lb., Failed.

At Elastic Limit: Load, 22,000 lb.; deflection, 0.45 in.; S, 3,484 lb.
At Elastic Limit: Load, 20,000 lb.; deflection, 0.41 in.; S, 3,018 lb.

Maximum: Load, 51,330 lb.; deflection,.....; S, 8,925 lb.
Maximum: Load, 44,000 lb.; deflection,.....; S, 6,627 lb.

E = 1,695,000 lb.
E = 1,625,000 lb.

TABLE 4.—(Continued.)—Load and Deflection Log. Beam VII.

Date: March 2d, 1909.
l = 12 ft.; b (mean) = 6.56 in.;
h (mean) = 15.62 in.;
c = 7.81 in. Time = 1 hr.
Date: February 20th, 1909.
l = 12 ft.; b (mean) = 6.22 in.;
h (mean) = 15.62 in.;
c = 7.81 in. Time = 33 min.

No.
P
Deflection, in Inches.
P
Deflection, in Inches.

Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.
Load, in pounds.
Reading.
Total deflection.
Reading.
Total deflection.
Mean total deflection.

1
0
1.84
0
1.71
0
0
0
1.69
0
1.73
0
0

2
2,000
1.88
0.04
1.74
0.03
0.035
2,000
1.72
0.03
1.77
0.04
0.035

3
4,000
1.92
0.08
1.79
0.08
0.080
4,000
1.76
0.07
1.80
0.07
0.070

4
6,000
1.96
0.12
1.81
0.10
0.110
6,000
1.80
0.11
1.84
0.11
0.110

5
8,000
2.00
0.16
1.85
0.14
0.150
8,000
1.84
0.15
1.87
0.14
0.145

6
10,000
2.03
0.19
1.89
0.18
0.185
10,000
1.88
0.19
1.92
0.19
0.190

7
12,000
2.06
0.22
1.93
0.22
0.220
12,000
1.91
0.22
1.95
0.22
0.220

8
14,000
2.11
0.27
1.95
0.24
0.255
14,000
1.95
0.26
2.00
0.27
0.265

9
16,000
2.14
0.30
1.99
0.28
0.290
16,000
1.99
0.30
2.03
0.30
0.300

10
18,000
2.18
0.34
2.03
0.32
0.330
18,000
2.03
0.34
2.06
0.33
0.335

11
20,000
2.22
0.38
2.05
0.34
0.360
20,000
2.07
0.38
2.11
0.38
0.380

12
22,000
2.25
0.41
2.10
0.39
0.400
22,000
2.11
0.42
2.16
0.43
0.425

13
24,000
2.29
0.45
2.13
0.42
0.435
24,000
2.15
0.46
2.20
0.47
0.465

14
26,000
2.32
0.48
2.17
0.46
0.470
26,000
2.19
0.50
2.24
0.51
0.505

15
28,000
2.36
0.52
2.21
0.50
0.510
28,000
2.23
0.54
2.28
0.55
0.545

16
30,000
2.40
0.56
2.25
0.54
0.550
30,000
2.27
0.58
2.33
0.60
0.590

17
32,000
2.43
0.59
2.29
0.58
0.585
32,000
2.32
0.63
2.37
0.64
0.635

18
34,000
2.47
0.63
2.32
0.61
0.620
34,000
2.36
0.67
2.42
0.69
0.680

19
36,000
2.51
0.67
2.37
0.66
0.665
36,000

20
38,000
2.56
0.72
2.41
0.70
0.710

27,000 lb., First Crack; 51,900 lb., Failed.
28,000 lb., First Crack; 49,000 lb., Failed.

At Elastic Limit: Load, 34,000 lb.; deflection, 0.62 in.; S, 4,580 lb.
At Elastic Limit: Load, 20,000 lb.; deflection, 0.38 in.; S, 2,845 lb.

Maximum: Load, 51,900 lb.; deflection,.....; S, 6,985 lb.
Maximum: Load, 49,000 lb.; deflection,.....; S, 6,970 lb.

E = 1,637,000 lb.
E = 1,658,000 lb.

*** END OF THE PROJECT GUTENBERG EBOOK TRANSACTIONS OF THE AMERICAN SOCIETY OF CIVIL ENGINEERS, VOL. LXX, DEC. 1910 ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

• You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

• You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

• You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

• You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.