The Project Gutenberg eBook of Instructions on Modern American Bridge Building

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: Instructions on Modern American Bridge Building

Author: G. B. N. Tower

Release date: February 2, 2005 [eBook #14873]
Most recently updated: December 19, 2020

Language: English

Credits: Produced by Curtis Weyant, Ronald Holder and the PG Online Distributed
Proofreading Team.

*** START OF THE PROJECT GUTENBERG EBOOK INSTRUCTIONS ON MODERN AMERICAN BRIDGE BUILDING ***

INSTRUCTIONS

ON

MODERN AMERICAN

BRIDGE BUILDING.

WITH

PRACTICAL APPLICATIONS AND EXAMPLES,

ESTIMATES OF QUANTITIES, AND
VALUABLE TABLES.

Illustrated by four Plates and Thirty figures.

BY G.B.N. TOWER,

CIVIL AND MECHANICAL ENGINEER,

Formerly Chief Engineer U.S. Navy, and late Chandler Instructor in Civil
Engineering at Dartmouth College.

BOSTON:

A. WILLIAMS & COMPANY,

135 WASHINGTON STREET.

1874.

Entered according to act of Congress, in the year 1874, by

A. WILLIAMS & CO.,

in the office of the Librarian of Congress, at Washington, D.C.

PREFACE.

This little treatise was written for the purpose of supplying a want felt by the author while giving instruction upon the subject. It was intended for an aid to the young Engineer, and is not to be considered as a complete substitute for the more elaborate works on the subject.

The first portion of this work mentions the various strains to which beams are subjected, and gives the formulæ used in determining the amount of those strains, together with a few examples to illustrate their application, and also the method of calculating a simple truss.

The second portion names and explains the various members of a Bridge Truss, and, by means of examples, shows the method of calculating the strains upon the various timbers, bolts, etc., as well as their proper dimensions; and gives, in addition, several useful tables.

The explanatory plates, which are referred to freely throughout the work, are believed to be amply sufficient for the purpose intended.

So much has been written on this subject that it is next to impossible to be wholly original, and no claim of that nature is preferred. It is simply an arrangement of ideas, gleaned from the various works of standard authorities, and modified by the author's practice, embodied in book form.

To give a correct list of all the books consulted would be simply impossible;—but it is well to state that the Hand-book of Railroad Construction, by Prof. G.L. Vose, under whom the author served as an Engineer, has been used as authority in many cases where there has been a difference of opinions among other authors. Some parts have been quoted entirely; but due credit has been given, it is believed, wherever such is the case.

It is not claimed that this little work covers the whole ground, but it is intended to describe, and explain thoroughly, three or four of the more prominent styles of Truss, leaving the other forms of Wooden Bridges to a subsequent volume.

Abutments and Piers, as well as Box and Arch Culverts, belonging more properly to masonry, will be treated of hereafter under that head.

Iron Bridges form a distinct class, and may be mentioned separately at some future period.

If this small volume should lead the student of Engineering to examine carefully the best Bridges of modern practice, and study the larger scientific works on this art, the author will feel satisfied that his efforts have not been entirely in vain.

Cambridge, February 23, 1874.

TOWER'S

Modern American Bridge Building.

BRIDGE BUILDING.

The simplest bridge that can be built, is a single beam, or stick of timber, spanning the opening between the abutments—but this is only of very limited application—(only for spans of 20 feet and less) owing to the rapid increase in sectional dimensions which is required as the span becomes greater.

Next comes the single beam supported by an inclined piece from each abutment meeting each other at the middle point of the under side of the beam—or, another arrangement, of two braces footing securely on the beam and meeting at a point above the middle point of the beam, which is suspended from the apex of the triangle formed by them, by means of an iron rod—These arrangements may be used up to 50 feet. For any span beyond 50 feet, modifications of this arrangement are used which will be described hereafter. Now let us investigate shortly the different strains that the various parts of a bridge have to bear—and the strength of the materials used. The theory of strains in bridge trusses is merely that of the Composition and Resolution of Forces. The various strains, to which the materials of a bridge are subjected—are compression, extension and detrusion.

Wood and Iron are the materials more generally employed in bridge construction—and in this pamphlet we shall take the following as the working strength of the materials—per square inch of section.

| Tension. | Compression. | Detrusion.
Wood, | 2000   | 1000   | 150  
Wro't Iron, | 15000   | 11000   |
Cast Iron, | 4500   | 25000   |

Tension. If a weight of 2000 lbs. were hung to the lowest end of a vertical beam, so that the line of action of the weight and axis of the beam formed one and the same straight line—the tension on the beam would be 2000 lbs. But, if the beam were inclined, and the force acted in a vertical direction, then the strain would be increased in the ratio of the increase of the diagonal of inclination over the vertical;—suppose the beam is 20 ft. long and inclined at an angle of 45°—and let 2000 lbs., as before, be suspended from its lower end. Now the diagonal being 20,—the vertical will be 14.014 ft.—and the strain will be found as follows,—

14.014 : 20 :: 2000 : 2854—lbs.

The greater the angle of inclination from the horizontal, the less the strain from a given load—and when the beam is vertical the weight causes the least strain.

Compression. If we load a vertical post with a weight of 2000 lbs., the strain of compression exerted upon the post will be 2000 lbs. Now, if we incline the post—the strain will be increased, as we have shown above under the head of tension, and in like manner, dependent upon the inclination.

But when wood, iron, or any other material is used for a pillar or strut, it has not only to resist a crushing force, but also a force tending to bend or bulge it laterally.

A post of circular section with a length of 7 or 8 diameters will not bulge with any force applied longitudinally, but will split. But if the length exceeds this limit—it will be destroyed by an action similar to that of a transverse strain.

A cast iron column of thirty diameters in length, is fractured by bending; when the length is less than this ratio—by bending and splitting off of wedge shaped pieces. But by casting the column hollow, and swelling it in the middle, its strength is greatly increased.

Barlow's formula for finding the weight that can be sustained by any beam, acting as a pillar or strut, before bending, is:—

Equation: WL^2/80E = bd^3, whence Equation: W=bd^3 x 80E/L^2

now, having the weight given, and assuming the dimensions of the cross-section—we shall have

Equation: d=(cube root of)(WL^2/80 EB) and Equation: b=WL^2/80 Ed^3

in the above formulæ,

W = weight in pounds.
L = length in feet.
E = a constant.
b = breadth in inches.
d = depth in inches.

Transverse Strains. The strain caused by any weight, applied transversely, to a beam supported at both ends, is directly as the breadth, and square of the depth, and inversely as the length. It causes the beam to be depressed towards the middle of its length, forming a curve, concave to the horizontal and below it. In assuming this form—the fibres of the upper part of the beam are compressed, and those of the lower part are extended—consequently there must be some line situated between the upper and lower surfaces of the beam where the fibers are subjected to neither of these two forces, this line is called the neutral axis.

These two strains of compression and extension must be equal in amount—and upon the relative strength of the material to resist these strains, as well as its form and position, the situation of this axis depends. If wood resists a compression of 1000 lbs. per square inch of section, and a tension of 2000 lbs. the axis will be twice as far from the top as from the bottom in a rectangular beam.

The following table by Mr. G.L. Vose gives, with sufficient accuracy for practice, the relative resisting powers of wood, wrought, and cast iron, with the corresponding positions of the axis.

Material.
Resistance to
Extension.
Resistance to
Compression.
Ratio.
Dist. of axis from top
in frac's of the depth.

Wrought Iron,
90
66
90 / 66
90 / 156, or 0.58

Cast Iron,
20
111
20 / 111
20 / 131, or 0.15.

Wood,
2
1
2 / 1
2 / 3, or 0.66.

Thus we see that the resistance of a beam to a cross strain, as well as to tension and compression, is affected by the incompressibility and inextensibility of the material.

The formula for the dimensions of any beam to support a strain transversely is

Equation; S=4bd^2/l

S = the ultimate strength in lbs.
b = the breadth in inches.
d = the depth in inches.
l = the length in inches.

Detrusion. Detrusion is the crushing against some fixed point, such as obtains where a brace abuts against a chord, or where a bridge rests on a bolster; and the shearing of pins, bolts and rivets, also comes under this head.

General Abstract. The resistance to the above mentioned strains varies as the the area of the cross section; so that by doubling the area we double the strength. Any material will bear a much greater strain for a short time than for a long one. The working strength of materials, or the weight which does not injure them enough to render them unsafe, is a mooted point, and varies, according to the authority, from 1-3 to 1-10 of the ultimate strength. The ratio of the ultimate strength to the working strength is called the factor of safety.

The following is a table of ultimate and working strengths of materials, and factors of safety:

Weight | Materials. | Ult. Ext. | Ult. Comp. | Working Strengths. | Factor of Safety.
in lbs. |  |  |  | Exten. | Comp. | Tension | Comp.
30 | Wood. | 14,000 | 7,000 | 2,000 | 1,000 | 7 | 7
480 | Wro't Iron. | 60,000 | 64,000 | 15,000 | 12,000 | 4 | 5.33
450 | Cast Iron. | 18,000 | 100,000 | 4,500 | 25,000 | 4 | 4

Lateral Adhesion. Lateral adhesion is the resistance offered by the fibres to sliding past each other in the direction of the grain, as when a brace is notched into a chord, or tie beam, at its foot, it is prevented by the lateral adhesion of the fibres from crowding off the piece, to the depth of the notch, against which it toes. Barlow's experiments give the lateral adhesion of fir as 600 lbs. per square inch, and the factor of safety employed varies in practice from 4 to 6, giving a working strength of from 150 to 100 lbs. per square inch.

TABLE OF COMPRESSIVE RESISTANCE OF TIMBER.

Length given
in Diameters.
Safety Weig't
in Pounds.
Length given
in Diameters.
Safety Weig't
in Pounds.
Length given
in Diameters.
Safety Weig't
in Pounds.

6
1000
24
440
42
203

8
960
26
394
44
185

10
910
28
358
46
169

12
860
30
328
48
155

14
810
32
299
50
143

16
760
34
276
52
132

18
710
36
258
54
122

20
660
38
239
56
114

22
570
40
224
58
106

60
99

In tensional strains, the length of the beam does not affect the strength; but in the beams submitted to compression, the length is a most important element, and in the table given above, the safety strains to which beams may be subjected, without crushing or bending, has been given for lengths, varying from 6 to 60 diameters.

PRACTICAL RULES.

Tensional Strain.

Let T = whole tensional strain.
  "   S = strength per square inch.
  "   a = sectional area in inches.
Then we have T = Sa.

Now to find the necessary sectional area for resisting any strain, we have the following general formula:

a = T ÷ S

or, by substituting the working strenths for the various materials in the formula, we have for wood,

a = T ÷ 2000

Wrought Iron,

a = T ÷ 1500

Cast Iron,

a = T ÷ 4500

But, in practice, cast iron is seldom used except to resist compression.

Strains of Compression. Allowing the same letters to denote the same things as above, we have for

Wood,

a = T ÷1000

Wrought Iron,

a = T ÷ 12000

Cast Iron,

a = T ÷ 25000

As this pamphlet has to do with wooden bridges only, nothing will be said of the proper relative dimensions of cast-iron columns to sustain the strains to which they may be subjected, but a table of the strength of columns will be found further on.

Transverse Strains.

Let W = breaking weight in lbs.
  "   s = constant in table.
  "   b = breadth in inches.
  "   d = depth in inches.
  "   L = length in inches.

Then, for the power of a beam to resist a transverse strain, we shall have,

Equation: W = 4sbd^2/L

This formula has been derived from experiments made by the most reliable authorities.

The constant, 1250, adopted for wood in the following formula, is an average constant, derived from the table, of those woods more commonly used.

Now to reduce the formula to the most convenient shape for use, we substitute the value of s, and we have

Equation: W = 4 x 1250bd^2/L

or

Equation: W = 5000bd^2/L

But, to reduce the load to the proper working strain, we must divide this equivalent by 4, the factor of safety, and we shall have

Equation: W = 5000 bd^2/4L .

Let us apply the formula—

Case I. Given a span of 14 feet,
a breadth of 8 inches,
a depth of 14 inches.

Required the safe load.

The formula Equation: W = 5000 bd^2/4L becomes, by substitution,

Equation: W = 5000 x 8 x 196 / 4 x 168 = 11,666 lbs.

Case II. Given the safety load 18000 lbs.,
the breadth 9 inches,
the length 14 feet.

Required the depth.

From the above formula we have

Equation: d = (sqrt)(w x 4L / 5000 b)

substituting

Equation: d = (sqrt)(18000 x 168 x 4 / 5000 x 9) = (sqrt)268.8 = 16 inches nearly.

Case III. Given the safety load 22,400 lbs.,
the depth 18 inches,
the length 14 feet.

Required the breadth.

Deriving b from the foregoing, we have,

Equation: B = w x 4L / 5000 x d^2

substituting

Equation: B = 22400 x 4 x 168 / 5000 x 324 = 9.3 inches nearly.

For a cast iron beam or girder—Mr. Hodgkinson from numerous carefully conducted experiments that, by arranging the material in the form of an inverted T—thus creating a small top flange as well as the larger bottom one, the resistance was increased, per unit of section, over that of a rectangular beam, in the ratio of 40 to 23.

In this beam the areas of the top and bottom flanges are inversely proportional to the power of the iron to resist compression and extension. Mr. Hodgkinson's formula for the dimensions of his girder, is

Equation: W = 26 ad / L

The factor of safety being 6 for cast iron beams—the formula for the working load will be,

Equation: W = 26 ad / 6 L

and, to find area of lower flange, we shall have

Equation: a= 6 WL / 26 d

The general proportions of his girders are as follows:

Length, 16
Height, 1
Area Top Flange, 1.0
Area Bottom Flange, 6.1
In the above formula for cast iron beams,
  W = weight in tons.
  a = area in square inches of bottom flange.
  d = depth in inches.
  h = length in inches.

The web uniting the two flanges must be made solid—as any opening, by causing irregularity in cooling, would seriously affect the strength of the beam.

Example.—Required the dimensions of a Hodgkinson girder—for a span of 60 feet—with a load of 10 tons in the centre.

Equation: a = 6 x 10 x 60 x 12 / (26 x (60 x 12) / 16) = 37 inches nearly.

and the area of the top flange will be,

37 ÷ 6 = 6.16 inches—

so that our dimensions will be as follows:

Length, 30 feet.
Depth, 45 inches.
Area Top Flange, 6.16 inches.
Area Bottom Flange, 37 inches.

Plate 1

The thickness of web is usually a little greater at the bottom than at the top, and varies from 1/14 to 1/24 of the depth of the girder. The bottom rib is usually made from six to eight times as wide as it is thick, and the top rib from three to six times as wide as thick, so that, in the example above given, we could have as dimensions for the parts

Top Flange, 4¼ X 1½ inches nearly.
Bottom Flange, 6 X 2½ inches nearly.
Web, 1½ inches thick.

The simplest bridge, consisting of a single stick, to span openings of 20 feet and under, is calculated according to the formula

Equation: d = (sqrt)4 WL / 5000 b

Example.—The depth of a beam, of 12 feet span and 12 feet wide, to support a load of 22400 lbs. will be

Equation: d = (sqrt)4 WL / 5000 b = (sqrt) 4 x 22400 x 12 / 500 x 12 = (sqrt)215.04 = 15 in. nearly.

The following Table was calculated by the above rule—and the dimensions altered according to the actual practice of the writer.

Span. | Breadth. | Depth.
4 | 10 | 12
6 | 10 | 12
8 | 12 | 12
10 | 12 | 13
12 | 12 | 15
16 | 12 | 18
18 | 12 | 20
20 | 12 | 22

These dimensions will give ample strength and stiffness. Fig. 1, Plate I. gives an illustration of this kind of bridge—in which a, a, are the bolsters or wall plates, shown in section, to which the bridge beams are notched and bolted. Fig. 1, A, Plate I, shows the method of diagonally bracing these beams by planks, dimensions of which in general use are 6 to 8 by 2 to 3 inches. The track should rest on ties, about 6 inches by 8 or 10 inches—the same bolt confining the ends of the ties and diagonal braces when practicable. These ties should be notched on the string pieces 2 or 3 inches—without cutting the stringers. Below is a table giving general dimensions, in inches, of the several parts of a bridge of this description.

Span. | Bolsters. | Ties. | Ties. | Braces. | Diameter of Bolts.
4 | 12 x 12 | 10 x 12 | 6 x 8 | 2 x 8 | 1 inch.
10 | 12 x 12 | 12 x 13 | 6 x 8 | 2 x 8 | 1  "
16 | 14 x 14 | 12 x 18 | 6 x 8 | 2 x 8 | 1  "
20 | 14 x 14 | 12 x 22 | 6 x 8 | 2 x 8 | 1  "

Each bolt must have a washer under the head, and also under the nut. For a span of from 15 to 30 feet, we can use the combination shown in Plate II, Fig. 3. The piece A F must have the same dimensions as a simple string piece of a length A B—so that it may not yield between B and either of the points A or D. The two braces DF and EF must be stiff enough to support the load coming upon them. Suppose the weight on a pair of drivers of a Locomotive to be 10 tons, then each side must bear 5 tons, and each brace 2½ tons = 2½ x 2240 = 5600 lbs.

Now, to allow for sudden or extra strains, call 8000 lbs. the strain to be supported by each brace, and, accordingly, 8 square inches of sectional area would be sufficient for compression only; but, as the brace is inclined, the strain is increased. Let the vertical distance from A to D be 10 ft., and, calling the span 30 ft.—A B will be 15 ft.—from whence D F must be 18 ft., then we shall have the proportion

10:18::8000:14400 lbs.

which would require an area of about 15 square inches of section to resist compression, or a piece 3x5 inches. Now, as this stick is more than 6 or 8 diameters in length, it will yield by bending—and consequently its area must be increased. The load, which a piece of wood acting as a post or strut will safely sustain, is found by the formula already given.

Equation: W = 2240 bd^3 / L^2

Now substituting 3 for b, and 5 for d, we have

Equation: W = 2240 x 3 x 125 / 324 = 840000 / 324 = 2592 lbs.

which is not enough. Using 6 for b and 8 for d, we have

Equation: W = 2240 x 6 x 512 / 324 = 21238 lbs.

which is something larger than is actually required, but it is no harm to have an excess of strength. Now in many cases this arrangement would be objectionable, as not affording sufficient head room on account of the braces—and we can as well use the form of structure given in Pl. I. Fig. 3, since it is evidently immaterial whether the point B be supported on F or suspended from it, provided we can prevent motion in the feet of the braces, which is done by notching them into the stringer at that point. This of course creates a tensional strain along the stringer, which is found as follows:—Representing the applied weight by FB, Pl. II, Fig. 2, draw BD parallel to FC, also DH parallel to AC—DH is the tension. This is the graphical construction, and is near enough for practice. Geometrically we have the two similar triangles AFB and DFH, whence

AF: DF:: AB: DH

and Equation: DH = DF x AB / AF

This style of structure may be used up to 50 feet, but it is not employed for spans exceeding 30 feet in length. It is very customary to make the braces in pairs so as to use smaller scantling, and gain in lateral stiffness—the two pieces forming one brace by being properly blocked and bolted together. Below is given a table of dimensions for the various parts of this style of structure:

Span. | Rise. | Bolster. | Stringer. | Braces. | Rod.
|  |  |  | No. | Size. |
15 | 6 | 12 x 12 | 12 x 12 | 2 | 5 x 6 | 1⅛
20 | 7 | 14 x 14 | 12 x 13 | 2 | 5 x 8 | 1⅜
25 | 8 | 14 x 14 | 12 x 15 | 2 | 6 x 8 | 1½
30 | 10 | 14 x 14 | 12 x 18 | 2 | 6 x 9 | 1⅝

Single Beams under each rail firmly braced laterally, and trussed by an iron rod, (or preferably by two iron rods,) and a post on the under side of the beam. The deflection of the rod is usually taken at 1/8 of the span. Pl. II., Fig. 1, represents this style of trussing a beam—which is generally used for spans of from 15 to 30 ft. Below is a table of dimensions for this truss with single and double rods; if double rods are used only half the given section will be necessary for each one of the pair.

Span.
Feet.
Rise.
In Feet.
Stringer.

Post.

Rod.
(single.)
Rods.
(double.)

15
1⅞
12 x 12
6 x 8
2⅛ diam.
or 1½ diam.

20
2½
12 x 14
7 x 8
2½  "
1¾  "

25
3⅛
12 x 16
8 x 8
2¾  "
2    "

30
3¾
13 x 18
9 x 9
3    "
2⅛  "

It is as well to tenon the post into the beam, and also strap it firmly with iron plates—and the end should be shod with iron to form a saddle for the rods to bear upon.

Now if we should make a bridge, on the plan of Fig. 3, Pl. I., 75 or 100 feet, or perhaps more, in length, the braces AF and FC, would not only be very long but very large and heavy, and one chief requisite in a good bridge is, to have all the beams so proportioned that they will resist all the strains acting upon them, without being unnecessarily large. It now becomes necessary to have a different arrangement of the parts of the truss in order to obtain increased length of span.

Suppose we have a span, of 40 feet, as represented in Fig 2, Pl. I. Now instead of running the braces from AC until they meet in a point, as before we stop them at a, and c, and place the straining beam, ac, between them to prevent those points from approaching, suspend the points B and D from them, and start the braces Bb and Db—and, if the truss were longer, would continue on in the same manner as far as needful.

To prevent the truss from altering its form, as shown by the dotted lines A'bC', and AEC, by any passing load, we insert the counter braces marked R.

The braces Aa and Cc, must support all of tho weight of the bridge and its load within the parallelogram BacD—and the next set of braces, Bb and Db, sustain that part of the load which comes over the centre of the bridge. Consequently the braces must increase in size from the centre towards the abutments. The rods resist the same pressure in amount as their braces—but being vertical, do not need the increase, given to the braces on account of their inclination—but increase simply with the strain upon them, from the centre to the ends of the truss.

There are many forms of small bridges differing from those enumerated, in various minor details, but sufficient has been said to give the reader a fair idea of the strains upon the different parts, and how to arrange and proportion the materials to resist them.

PRACTICAL RULES AND EXAMPLES IN WOODEN BRIDGE BUILDING.

In any case that may arise, we must determine approximately the gross weight of the bridge and its load—as a basis, and then we can proceed as follows—in case of a Howe, Pratt, or Arch Brace Truss.

To find the dimensions of the Lower Chord.

The tension at the centre of the Lower Chord is found by dividing the product of the weight of the whole bridge and load by the span, by eight times the height—or letting T=tension in lbs., W=weight of bridge and load in lbs., S=span in feet, and h=rise or height—we have Equation: T = W x S / 8h—. In this case we have taken the rise at ⅛ of the span, which is evidently the best ratio between those dimensions, as it equalizes the vertical and horizontal forces. As to the proportions of the bays or panels, (or that portion of the truss bounded by two adjacent verticals, as struts or ties, and the chords,) the ratio of the rise (or the vertical distance between the centre lines of the two chords,) and the length on the chord should be such, that the diagonal truss members may make an angle of about 50° with the chords; as the size of the timbers is increased by decreasing the angle, and, if the angle is increased, there are more timbers required.

Mr. G.L. Vose, in his admirable work on R.R. Construction, observes very truly that "The braces, at the end of a long span, may be nearer the vertical than those near the centre, as they have more work to do. If the end panel be made twice as high as long, and the centre panel square, the intermediates varying as their distance from the end, a good architectural effect is produced."

Now it is necessary for us to have some data from which to determine the approximate weight of the bridge, and also its load. These can be found by comparing weights of bridges in common use, as obtained from reports. In a small bridge of short span, the weight of the structure itself may be entirely neglected, because of the very small proportion the strains caused by it bear to those due to the load;—but, in long spans, the weight becomes a very important element in the calculations for strength and safety—inasmuch as it may exceed the weight of the load.

In all Bridges of 120 ft. span, about ⅓ of a ton, per foot run, will be the weight of each truss for a single track, including floor timbers—transverse bracing, &c. If the bridge were loaded with Locomotives only, the greatest load would be, on the whole bridge—160 tons = 1.33 tons per ft. run of the bridge or .666 tons per ft. run of each truss. Now if we make the rise of the bridge 15 ft., and divide the span into 12 panels of 10 ft. each, we shall have for total weight of bridge and load 240 tons, or for a single truss 10 tons to each panel.

Lower Chords. Now to find the tension on the Lower Chords, Equation: T = W x S / 8h and supplying values, we have Equation: T = 240 x 120 / 8 x 15 = 240 tons, or 537600 lbs., for the two Lower Chords, and ½ of this, or 268800 lbs. for one chord. The Tensional Strength of timber for safety may be taken at 2000 lbs. per square inch of section, and hence the area of timber required to sustain the above strain will be 268800 ÷ 2000 = 134.4 sq. inches. But this chord has also to sustain the transverse strains arising from the weights passing over it, and, as in the case of a Locomotive, the weight of 20 tons on 2 pair of drivers, (or 10 tons for one truss,) may be concentrated on the middle point of a panel—the chord must be so proportioned as to safely bear, as a horizontal beam, this weight. Suppose we take three sticks of 8" x 12", to form the chord (the greater dimension being the depth,) we shall have 3 x 8" x 12" = 288 square inches area of section, and

allowing | for | splicing | 72 | square | inches,
" | " | foot blocks, | 24 | " | "
" | " | bolts, | 24 | " | "
" | " | washers, | 8 | " | "

we shall have after deducting allowances (288-128) 160 square inches area, giving an excess over 134.4, the area demanded, sufficient to cover allowances for any accidental strain.

Upper Chords. The upper chords are compressed as forcibly as the lower ones suffer tension—owing to the action and reaction of the diagonals. In this case the compression is 268800 lbs., and as 1 square inch of section will safely bear 1000 lbs., we have for the area required, 268800 ÷ 1000 = 268.8 square inches,—three pieces 8" x 11" will give 264 square inches and this area will require no reduction, as the whole chord presses together when properly framed and is not weakened by splicing. So far, the calculations made would apply to either of the three Bridges mentioned, as well as to a Warren Truss. But now, to obtain the dimensions of the web members, so called, of the Truss, it is necessary to decide upon the specific variety. The form of Bridge in more general use in the United States is called the Howe Truss, from its inventor, and in spans of 150 feet, and under, is very reliable; for spans exceeding 150 ft. it should be strengthened either by Arch Braces or by the addition of Arches, as the heavy strains from the weight of bridge and load bearing on the feet of the braces near the abutments, tend to cripple and distort the truss by sagging, although the Baltimore Bridge Co. have built a Wooden Howe Bridge of two Trusses of 300 ft. span, 30 ft. rise, and 26 ft. wide, without any arch, but it has a wrought iron lower chord, and is only proportioned for a moving load of 1000 lbs. per ft. run. [Vide Vose on R.R. construction.]

In order to ensure uniformity in strength in the chords—but one joint should be allowed in a panel—and that should come at the centre of the panel length—but in long spans this cannot always be done.

Web Members. We will now proceed to calculate the web members of a Howe Truss of the foregoing dimensions, when subjected to the strains above mentioned.

Braces. The end braces must evidently support the whole weight of the bridge and load, which for one end of one truss will be 134400 lbs., and as these braces are in pairs,—67200 lbs. will be the strain vertically on the stick—but as this stick is a diagonal—whose vertical is 15 ft., and horizontal 10 ft., we shall have for its length 18 ft. in round numbers, whence the strain along the diagonal will be found from the proportion 15 : 18 :: 67200 : 80640 lbs., whence we have an area of 80 inches required for compression, or a stick of 8" x 10". Now, to ascertain if this is stiff enough for flexure, we will substitute these values in the equation Equation: W = 2240 bd^3 / L^2 , and we have Equation: W = 2240 x 8 x 1000 / 324 , or reducing, W = 55308 lbs. Now, these proportions will give ample strength for both flexure and compression, for if we block the two sticks composing the end brace together, and firmly connect them by bolts, we shall have a built beam of 24" x 10"—whence Equation: W = 2240 x 24 x 1000 / 324 = 165925 lbs., and as 134400 lbs. was all that the conditions demand, we really have an excess of strength. The next set of braces supports the weight of the rectangle included between the upper ends of the braces and the two chords, and the dimensions of the sticks are calculated in the same manner. We find, as we approach the centre of the bridge, that the strains on the braces become less, and consequently their scantling should be reduced, but in ordinary practice this is seldom done.

Rods. The next thing is to ascertain the dimensions of the various tie rods. It is evident that the same weight comes upon the first set of rods, as on the first set of braces—which will give for the rods at one end of one truss, 134400 lbs.; and as there are two of these rods, each will sustain a strain of 67200 lbs.—and, at 15,000 lbs. per square inch, will have an area of 4.48 sq. inches, and, by Vose's Tables, must have a diameter of 2½ inches. The sizes of the rods in each set will decrease towards the centre of the bridge as the weight becomes less.

Plate II

Counterbraces. Now, as to the necessity of Counterbracing, there are various opinions. The object of it is to stiffen the truss and check vibrations. If a load be placed over any panel point, it causes that portion of the truss to sink, and produces an elevation of the corresponding panel point at the other end of the truss—thus producing a distortion, which change of form is resisted by proper counterbraces. The strain to which this timber is subjected is caused by the moving load on one panel only—and requires only scantling of the size of the middle braces. These counterbraces should not be pinned or bolted to the braces where the cross—as their action is thereby entirely altered—but it is well to so confine them as to prevent vertical or lateral motion.

Shoes. Formerly it was the custom to foot the braces and counters on hard wood blocks on one side of the chord, the vertical rods passing through and screwing against a block on the other side—thus the whole strain tended to crush the chord across its fibres. This is now remedied by the use of cast iron blocks, bearing on one side of the chord, but having tubes extending through to the other side, where the washer plate for the bolts fits firmly on their ends, forming a complete protection, as all the crushing strain is received on the block itself.

Width. It now becomes necessary to determine upon the width between the two trusses. For a single track bridge for a railroad, 14 ft. is the usual width adopted, and for a highway bridge, from 12 to 16 ft. When a double track is required, three trusses are usually employed, with a width for each roadway of 14 ft. for railroads.

Bolsters. Large timbers 12 x 12, or thereabouts, are laid on the bridge seats of the abutments to support the ends of the trusses, one of these should be directly under each of the extreme panel points. A panel point is the intersection of the centre line of a brace produced, with the centre line of a chord. The rise of a truss is the vertical distance between the centre lines of the upper and lower chords.

Camber. Were a bridge to be framed with its chords perfectly horizontal, it would be found to fall below the horizontal line on being placed in its proper position, owing to the closing up of the joints in the upper parts of the structure, and opening of joints in the lower parts, as well as to the compression of the parts. To obviate this defect, it is usual to curve the chords slightly in a vertical direction, by elongating the upper chord, so that the bays or panels are no longer rectangular but of a trapezoidal form—and, as a consequence, the inclined web members are slightly lengthened, and the verticals become radii of the curve. The amount of deviation from a horizontal line is called the Camber.

A table of Cambers for different spans will be found further on, as also a table of multipliers, by which to multiply the camber in order to find the elongation of the upper chord. Part of the Camber table is taken from Trautwine's Engineer's Pocket-Book, (which should be the inseparable companion of every engineer,) and part was calculated for this pamphlet, according to Trautwine's rules. The table of multipliers is Trautwine's.

Diagonal Bracing. In order to stiffen a bridge, it should have the two Trusses braced together at the Lower Chords always, at the Upper Chords when practicable—and in case of a deck bridge, where the roadway is supported on the upper chords, it is as well to have rods for vertical diagonal braces, their planes being perpendicular to the axis of the bridge. The more usual form is similar to the web members of the Howe Truss—the rods from ¾" to 1" in diameter, and the braces of 6" x 7" scantling, footed on wooden blocks, usually. It is more usual to have the tie rods of the horizontal diagonal bracing, and the braces themselves, meet in a point about midway of a Truss panel on the centre line, nearly, of the chord. This will generally give a half panel of diagonal bracing near each end of the truss—and it is very usual to have the diagonals foot at their intersection there against a cross timber interposed between the trusses, while the tie rod prevents any spreading.

Floor Timbers. The general dimensions of the transverse floor beams, when about 3 feet apart, from centre to centre, are 8" x 14", the largest dimension being the depth. The stringers should be notched to the floor beams about 1" or 2", and should be about 10" or 12" x 14". The cross ties should be 18" to 24" apart, from centre to centre, and be 3½" x 6".

Large, heavy bridges require no fastening to connect them with their seats, but light bridges should be fastened, as the spring on the sudden removal of a load, (as when the last car of a train has passed,) may move it from its proper position.

Splices. As the upper and lower chords have to be made in several lengths, securely fastened to each other, and, in order to weaken the built beam as little as possible, it is necessary to adopt some form of splicing whereby the greatest amount of tensional strength may be retained in the chord with the least amount of cutting, and yet have a secure joint. Such a splice is shown in Pl. II, Fig. 4, and below is a table from Vose's Hand-book, giving reliable dimensions.

Span.
Feet.
AC
Feet.
BB
Inches.
CD
Feet.

50
1.00
1½
1.50

100
1.25
2
2.00

150
1.75
2½
2.25

200
2.00
3
2.75

This manner of splicing requires the back of the splice block to be let into the chord stick, against which it lies, about ¾ of an inch. To show how the various Engineers differ, as to their estimates of the sizes of the several parts of bridges, I subjoin two Tables—one by Prof. G.L. Vose, a well known Engineer, and one by Jno. C. Trautwine, an Engineer of note also—and I would premise that a bridge built according to either would be amply strong.

TABLE FOR DIMENSIONING A HOWE TRUSS BRIDGE.
G.L. VOSE.

Span.
Rise.
Panel.
Chords.
End
Braces.
Centre
Braces.
End
Rods.
Centre
Rods.

50
10
7
2—8 x 10
7 x 7
5 x 5
1—1⅛
2—1

75
12
9
2—8 x 10
8 x 8
5 x 5
2—1½
2—1

100
15
11
2—8 x 10
8 x 9
6 x 6
2—1¾
2—1

150
20
13
4—8 x 12
10 x 10
6 x 7
3—2
3—1

200
25
15
4—8 x 16
12 x 12
7 x 7
5—2
5—1

TABLE FOR DIMENSIONING A HOWE TRUSS BRIDGE.
JNO. C. TRAUTWINE, C.E.

| An Upper Chord. | A Lower Chord. | An End Brace. | A Centre Brace. | Counter. | End Rod. | Centre Rod.
Clear Span in feet. | Rise in feet. | No. of panels. | No. pieces. | Size. | No. pieces. | Size. | No. pieces. | Size. | No. pieces. | Size. | No. pieces. | Size. | No. rods. | Size. | No. rods. | Size.
25 | 6 | 8 | 3 | 4 x 5 | 3 | 4 x 10 | 2 | 4 x 6 | 2 | 5 x 5 | 1 | 4 x 5 | 2 | 1-5/16 | 2 | ⅞
50 | 9 | 9 | 3 | 6 x 7 | 3 | 6 x 10 | 2 | 6 x 7 | 2 | 5 x 6 | 1 | 5 x 6 | 2 | 1⅝ | 2 | 1-1/16
75 | 12 | 10 | 3 | 6 x 9 | 3 | 6 x 11 | 2 | 6 x 8 | 2 | 6 x 6 | 1 | 6 x 6 | 2 | 1⅞ | 2 | 1-3/16
100 | 15 | 11 | 3 | 6 x 10 | 3 | 6 x 12 | 2 | 8 x 9 | 2 | 6 x 8 | 1 | 6 x 8 | 2 | 2-3/16 | 2 | 1-5/16
125 | 18 | 12 | 4 | 6 x 10 | 4 | 6 x 13 | 2 | 8 x 10 | 2 | 6 x 9 | 1 | 6 x 9 | 2 | 2⅝ | 2 | 1⅜
150 | 21 | 13 | 4 | 8 x 10 | 4 | 8 x 14 | 3 | 9 x 10 | 3 | 6 x 9 | 2 | 6 x 9 | 3 | 2⅜ | 3 | 1-3/16
175 | 24 | 14 | 4 | 10 x 12 | 4 | 10 x 15 | 3 | 9 x 11 | 3 | 8 x 8 | 2 | 8 x 8 | 3 | 2⅝ | 3 | 1¼
200 | 27 | 15 | 4 | 12 x 12 | 4 | 12 x 16 | 3 | 9 x 12 | 3 | 8 x 10 | 2 | 8 x 10 | 3 | 2⅞ | 3 | 1⅜

Both of these tables were calculated for a single Railroad track, and would answer equally well for a double Highway Bridge. In the bridge according to Trautwine's Table, each lower chord is supposed to have a piece of plank, half as thick as one of the chord pieces, and as long as three panels, firmly bolted on each of its sides, in the middle of its length.

PRATT'S BRIDGE.

This is opposite in arrangement of parts to a Howe Bridge, as the diagonals are rods, and sustain tension, and the verticals are posts, and suffer compression:

Example.— | Span | = 100 feet.
| Rise | = 12   "
| Panel | = 10   "
| Weight per lineal ft. | = 3000 lbs.

The tension on the lower, or compression on the upper chord, will be 300000 X 100 / 96 = 333333 lbs. The dimensions of the chord and splicing would be found in the same manner as for a Howe Truss.

Suspension Rods. Fig. 1, Pl. III., represents an elevation of a Pratt Bridge. Now, it is evident that the first sets of rods must support the weight of the whole bridge and its load, which we have found to be 300000 lbs. Each truss will have to sustain 150,000 lbs., and each end set of rods 75,000 lbs. Now, if there are two rods in each set,—each rod will have to bear a strain of 37500 lbs., and this will have an increase due to its inclination, so that the strain on it must be found by the following proportion:

Height : diagonal :: W : W' or
12 : 15.8 :: 37500 : 49375 lbs.

Referring to the Table for bolts, we find that 2⅛ gives a strength a little in excess, and will be the proper size. The next set of rods bear the weight of the whole load, less that due to the two end panels, and so on. Fig. 2, Pl. III, shows the manner of applying the rods. The bevel block should be so fitted to the chord that it will not have a crushing action.

Counters. Top and bottom chords are always used in this bridge, and consequently the counter rods have only to sustain the movable load on one panel. The weight of the moving load cannot be more than 2000 lbs. per lineal foot which, for a panel of 10 ft., gives 20000 lbs., or 10,000 lbs. for each set, and if we have two rods in a set, the strain on each rod will be 5000 lbs., increasing this for inclination, we shall have,

12 : 15.8 :: 5000 : 6585 lbs.,

requiring a rod of ¾ of an inch diameter. The posts in this bridge correspond to the braces of the Howe Truss, but being vertical, are not so large.

Subjoined are two Tables, one by Prof. G.L. Vose, and one by Mr. Trautwine, giving principal dimensions for bridges of different spans of the Pratt type of Truss.

TABLE OF DIMENSIONS OF A PRATT TRUSS.
PROF. G. L. VOSE.

Span.
Rise.
Chords.
End
Post.
Centre
Post.
End
Rod.
Centre
Rod.
Counter
Rod.

50
10
2—8 x 10
5 x 5
4 x 4
2—1⅜
2—1
1—1½

75
12
2—8 x 10
6 x 6
5 x 5
2—1⅝
2—1
1—1½

100
15
3—8 x 10
7 x 7
6 x 6
2—1¾
2—1
2—1⅛

125
18
3—8 x 10
8 x 8
6 x 6
3—1⅞
3—1
2—1⅜

150
21
4—8 x 12
9 x 9
6 x 6
3—2⅛
3—1
3—1⅛

200
24
4—8 x 16
10 x 10
6 x 6
5—1⅞
5—1
3—1⅛

TABLE OF DIMENSIONS OF A PRATT'S TRUSS.

Clear Span in feet. | 25 | 50 | 75 | 100 | 125 | 150 | 175 | 200
Rise in feet | 6 | 9 | 12 | 15 | 18 | 21 | 24 | 27
No. of Panels. | 8 | 9 | 10 | 11 | 12 | 13 | 14 | 15
Upper Chord.
  No. Pieces. | 3 | 3 | 3 | 3 | 4 | 4 | 4 | 4
  Size. | 4 x 5 | 6 x 7 | 6 x 9 | 6 x 10 | 6 x 10 | 8 x 10 | 10 x 12 | 12 x 12
Lower Chord.
  No. of Pieces. | 3 | 3 | 3 | 3 | 4 | 4 | 4 | 4
  Size. | 4 x 10 | 6 x 10 | 6 x 11 | 6 x 12 | 6 x 13 | 8 x 14 | 10 x 15 | 12 x 16
Main Brace Rods. |
  No. Ctr. | 2 | 2 | 2 | 2 | 2 | 3 | 3 | 3
  Size. Ctr. | 1 | 1-3/16 | 1-5/16 | 1-7/16 | 1½ | 1-5/16 | 1⅜ | 1½
  No. End. | 2 | 2 | 2 | 2 | 2 | 3 | 3 | 3
  Size. End. | 1⅜ | 1⅞ | 2⅛ | 2½ | 2⅞ | 2½ | 2¾ | 3⅛
Counter Rods.
  Number. | 1 | 1 | 1 | 1 | 1 | 2 | 2 | 2
  Size. | 1-7/16 | 1⅝ | 1⅞ | 2 | 2⅛ | 1⅝ | 1-11/16 | 1-13/16
Posts.
  No. End. | 3 | 3 | 3 | 3 | 4 | 4 | 4 | 4
  Size. End. | 4 x 5 | 6 x 6 | 6 x 7 | 6 x 9 | 6 x 9 | 8 x 8 | 10 x 10 | 12 x 10
  No. Ctr. | 3 | 3 | 3 | 3 | 4 | 4 | 4 | 4
  Size. Ctr. | 4 x 4 | 6 x 5 | 6 x 5 | 6 x 7 | 6 x 7 | 8 x 7 | 10 x 8 | 10 x 8

This table is partly given in Trautwine's Engineer's Pocket Book, and partly made up from directions therein given.

TABLE OF DIMENSIONS FOR SMALL SINGLE TRACK PRATT TRUSSES.

Clear
Span,
Ft.
Chords each,
Ins.
Centre
Post,
Ins.
End Posts,
Ins.
At centre
of truss,
Diam. of
Rods.
At end
of truss,
Diam. of
Rods.
Centre
Counter,
Diameter,
Ins.
End Counter,
Diameter,
Ins.

30
9 x 11
4 x 9
7 x 9
1
1⅝
1⅜
1

40
10 x 12
4 x 10
8 x 10
1⅛
1⅞
1⅝
1

50
10 x 14
5 x 10
9 x 10
1¼
2⅛
1¾
1

60
12 x 15
5 x 12
9 x 12
1⅜
2⅜
2
1

70
12 x 17
6 x 12
11 x 12
1½
2½
2⅛
1

This bridge possesses an advantage over the Howe Truss, for the panel diagonals can be tightened up by screws, so that every part of the truss can be forced to perform its work. In Howe's bridge the adjustments must be made by wedging the braces and counters.

Below are given the dimensions of a Howe bridge on the Vermont Central R.R., at South Royalton, (single track, deck.)

Span. | 150
Rise. | 20
No. of Panels. | 12
Upper Chord. | 4—6½ x 13
Lower Chord. | 4—6½ x 13
Braces. | 2—8 x 9
Counters. | 1—8 x 9
Rods. | 3—1¼"
Transverse Bracing. |
   Braces. | 6 x 8
   Rods. | ⅞

The bridge over the White River, on the Passumpsic R.R., is a Howe Truss, strengthened by an arch. The verticals are of wood, and the diagonals foot on steps formed by enlarging the ends of the verticals. The counters are in two lengths, and are adjusted by wedges at the points where they intersect the braces. The bridge is in two spans, and has a double track, and consequently three trusses. There are two timber arches to each truss, and the truss is supported on them by connecting them to the verticals by short cross pieces notched into the posts, and resting on the upper surface of the arches. It is a very stiff bridge, and similar to the one at Bellows Falls, both having their axis oblique to the channel of the stream they cross. The timbers could hardly be procured now, except at great expense.

Span.
No. of
Panels.
Rods.
Upper Chord.
Lower Chord.
Braces.
Counters.
Uprights.
Arches.

182
14
21
2—8 x 16,
1—5 x 16
2—8 x 17,
2—4 x 17,
1—5 x 17
1—21 x 8
1—8 x 10
21 x 11
2—8 x 9

Diagonals 6 x 8, Rods ⅞. Floor timbers suspended both from arches and truss, 9 x 13; stringers 10 x 14.

In the Cheshire Bridge, the braces are only 20 x 8, and the span is only 175 feet, the number of Panels being 14, as in the W.R. Bridge—the other dimensions are the same. Below are given the dimensions of a Howe Truss of 108 ft. span, weight to be borne on upper chord.

Rise
Ft.
Camber
Ins.
No. of
Panels.
Upper Chord
Ins.
Lower Chord
Ins.
Braces
Ins.
Counters
Ins.
E Rods
Ins.
Floor Timbers
Ins.

13½
3
12
8—3 x 12
8—3x12
2—8 x 10
1—7 x 10
2—2⅛
9 x 16

As plank is used for the chords, the pieces must be bolted thoroughly with ⅝ bolts.

Plate III

A form of bridge that has been used to some extent on the Baltimore and Ohio Railroad, by Mr. Latrobe, is the Arch Brace Truss. In this form of Truss the braces lead directly from the abutments to the head of each vertical; thus the load is transferred at once to the abutments, without passing through a series of web members. The counterbracing is effected by means of a light lattice,—and is applied to both sides of the chords, and the intersections of the diagonals are fastened while the bridge is strained by a load—thus preventing recoil—so that the effect of a moving load is to lighten the strain on the lattice—without otherwise affecting the Truss. There are two models of this style of bridge, to my knowledge; one built by Prof. G.L. Vose, on a scale of ½ an inch to the foot, and representing a span of 150 feet, which supported 2,500 lbs. at the centre, and a movable load of 150 lbs., proving itself to be strong and rigid enough for any thing. The other, on a scale of 1 inch to the foot, and representing a span of 76 feet, was built by the Class of '73, of the Thayer Engineering School, under the writer's direction, and though bearing very heavy weights, has never been thoroughly tested—it has, however, been subjected to the sudden shock of 1040 lbs. falling 20 inches, without injury, several times. Subjoined are the dimensions of the models mentioned.

DIMENSIONS OF A MODEL OF AN ARCH BRACE TRUSS.
G.L. VOSE.

Length,     | 7 feet.
Height, | 1 foot.
Width, | 1 foot.
Chords, | 4—¼ x ½ inch.
Braces | 4—¼ x 1/3  "
Lattice, | ¼ x 1/16     "

This represented a span of 150 ft, a rise of 20 feet, and a panel of 15 ft. Weight, per running foot of bridge and load, was taken at 3000 lbs.

The method of calculating the dimensions of this truss, from the foregoing data, is as follows. The half number of panels is 5, and the lengths of the corresponding diagonals (neglecting fractions) are

Formula = {sqrt)(15^2 + 30^2) = 25 feet.

Formula = {sqrt)(15^2 + 45^2) = 37   "  

Formula = {sqrt)(15^2 + 60^2) = 49   "  

Formula = {sqrt)(15^2 + 60^2) = 64   "  

Formula = {sqrt)(15^2 + 60^2) = 78   "  

The weight upon each set of braces is that due to one panel, or 3000 x 15 = 45000 lbs., half of this, or 22500 lbs., is the weight for one truss only—and, as there is a brace under each of the 4 chord sticks, we divide by 4, and have 5625 lbs. per stick of the brace;—now, correcting for inclination, we shall have

20 : 25 :: 5625 :   7031 lbs.
20 : 37 :: 5625 : 10406 lbs.
20 : 49 :: 5625 : 13781 lbs.
20 : 64 :: 5625 : 18000 lbs.
20 : 78 :: 5625 : 21937 lbs.

The weights fouud show the compressional strains on the several braces;—and, were the pieces to be proportioned for compression only, their scantling would be quite small—but on account of their elasticity, they require larger dimensions.

These braces should not be fastened to the verticals,—but should be confined both laterally and vertically, where they pass them. The length of beam, for which we have to guard agains flexure, is the length between verticals in any panel.

In panel No. 1, it will be 25 feet,
      "    "     2,    "   "   18   "
      "    "     3,    "   "   17   "
      "    "     4,    "   "   16   "
      "    "     5,    "   "   16   "

Now, using the formula

Equation: 2240 bd^3 / L^2 = W

we shall have, in round numbers, the following dimensions:

For the 1st panel, 25 feet long, 8 x 10
      "     2d     "   37   "     "     8 x 10
      "     3d     "   49   "     "     8 x 10
      "     4th    "   64   "     "     8 x 10
      "     5th    "   78   "     "     8 x 10

For the lattice work, a double course on each side of each truss, in long spans; and a single course, in shorter spans, of 3 x 6, or 2 x 9 plank, bolted at intersections, is sufficient.

GENERAL TABLE OF DIMENSIONS FOR ARCH
BRACE TRUSS. G.L. VOSE.

Span. | Rise. | Chords. | Ties. | Braces. | Lattice.
50 | 10 | 2—8 x 10 | 1—8 x 10 | 2—6 x 6 |
75 | 12 | 2—8 x 10 | 1—8 x 10 | 2—6 x 6 | 2 x 9
100 | 15 | 3—8 x 10 | 2—8 x 10 | 3—6 x 6 | or
150 | 20 | 4—8 x l2 | 3—8 x 10 | 4—6 x 8 | 3 x 6
200 | 25 | 4—8 x 16 | 3—8 x 10 | 4—6 x 9 |

The arch braces must all foot on an iron thrust block, of which a view is given in Fig. 4, Pl. III; and the centre of pressure of the braces must be directly over a bolster, to prevent crippling.

The several sticks forming a brace must be blocked together at intervals, and when they are spliced,—a butt joint should be used—and it should come in the centre of a panel. Below are given the dimensions of the Thayer Engineering School model.

Height Ins.  | 12
No. Panels | 8
Chords Ins.  | 2—1 x ½
Posts Ins. | 1—2/3 x 5/6
Braces Ins.  | 2—½ x ½
Lattice Ins.  | ¼ x ½
Width Ins. | 13

There are several other forms of Bridge, the most notable among which are the Whipple, McCallum's, Post's, Towne's, Haupt's, and Burr's. But enough has been said to give the student an idea of the general arrangement of the different parts of a Truss, arid to enable him to determine the strains to which the various members are subjected. Nothing will be said in regard to Wooden Arches, as our space is too limited.

Pile Bridging. A bridge of this description is useful in crossing marshes, or in shallow water. Fig. 5, Pl. III, gives a good example of this kind of bridge, under 20 feet in height. If on a curve, there must be extra bracing on the convex side.

Trestle Work. This is a combination of posts, caps, and braces; and is used for both temporary and permanent works. Plate IV, Figs. 1, 2, 3 and 4, give some of the best varieties in use. Figs. 1 and 2, may be used up to 15 feet in height; Fig. 4, up to 20 feet; and Fig. 3, to 30 ft. The distance apart of the various bents should not exceed 10 or 12 ft., unless bracing is introduced between them, and the bents should always be raised above the ground a few feet on a solid masonry foundation. Want of space forbids any mention of abutments and piers, which really come more properly under the head of masonry.

Iron Bridging is gradually working its way into favor, and will probably eventually supersede wooden trusses;—but in many cases wood is the only material at hand—and therefore some knowledge of Wooden Bridging is desirable. It is intended to follow this pamphlet with a portfolio of sheets containing working drawings of several kinds of Wooden Bridges, taken from actual measurements of some of the best specimens of the different styles of Truss in use.

PRACTICAL NOTES.

When putting a truss together in its proper position, on the abutments, 'false works' must first be erected to support the parts until they are so joined together as to forma complete self-sustaining truss. The bottom chords are first laid as level as possible on the false works, then the top chords are raised on temporary supports, sustained by those of the lower chord, and are placed a few inches higher at first than their proper position, in order that the web members may be slipped into place. When this is done the top chords are gradually lowered into place. The screws are then gradually tightened, (beginning at the centre and working towards both ends,) to bring the surfaces of the joints into proper contact, and by this method, the camber forms itself, and lifts the lower chords clear of the false works, leaving the truss resting only upon its proper supports. The subjoined Table will be found useful in estimating the strains on a truss when proportioning a bridge for any moving load.

Table of weights per running foot of a bridge, (either of wood or iron,) including weights of floor, lateral bracing, &c., complete, for a single track.

Clear
Span.
Weight of Bridge.
Clear
Span.
Weight of Bridge.
Clear
Span.
Weight of Bridge.
Clear
Span.
Weight of Bridge.

Tons.
lbs.

Tons.
lbs.

Tons.
lbs.

Tons.
lbs.

25
.266
596
70
.404
905
140
.614
1375
200
.792
1774

30
.281
629
80
.434
972
150
.643
1440
225
.867
1942

40
.313
701
90
.464
1039
160
.673
1507
250
.940
2105

50
.343
768
100
.494
1106
170
.703
1575
275
1.013
2269

60
.374
838
120
.554
1241
180
.733
1642
300
1.087
2435

The weight of a single track railway bridge may be taken as equal to that of a double track highway bridge,—and the trusses that will be large enough for one will be large enough for the other.

The greatest load that a highway bridge can be subjected to is 120 lbs. to the square foot of surface.

TABLE OF CAMBERS FOR BRIDGE TRUSSES.

Span.
feet.
Camber.
Inches.
Span.
Feet.
Camber.
Inches.
Span.
Feet.
Camber.
Inches.
Span.
Feet.
Camber.
Inches.

25
0.8
75
2.5
175
5.8
275
9.2

30
1.0
100
3.3
200
6.7
300
10.0

50
1.7
120
4.0
225
7.5
325
10.8

60
2.0
150
5.0
250
8.3
350
11.7

TRAUTWINE'S TABLE FOR FINDING INCREASE IN LENGTH OF UPPER CHORD BEYOND THE LOWER CHORD ON ACCOUNT OF THE CAMBER.

Depth of Truss. | Multiply Camber by | Depth of Truss. | Multiply Camber by
1-4 span | 2.00 | 1-12 span | .666
1-5   " | 1.60 | 1-13   " | .614
1-6   " | 1.33 | 1-14   " | .571
1-7   " | 1.15 | 1-15   " | .533
1-8   " | 1.00 | 1-16   " | .500
1-9   " | .888 | 1-17   " | .470
1-10   " | .800 | 1-18   " | .444
1-11   " | .727 | 1-20   " | .400

TABLE OF AMERICAN WOODS.

Kind.
Weight per
cubic foot
Resistance in lbs.
per square inch.
Value of s.

in pounds.
Extension
Compression.

White Pine.
26
12,000
6000
1229

Yellow Pine.
31
12,000
6000
1185

Pitch Pine.
46
12,000
6000
1727

Red Pine.
35
12,000
6000
1527

Virginia Pine.
37
12,000
6000
1456

Spruce.
48
12,000
6000
1036

Tamarack.
26
12,000
6000
907

Canada Balsam.
34
12,000
6000
1123

White Oak.
48
15,000
7500
1743

Red Oak.
41
15,000
7600
1687

Birch.
44
15,000
7000
1928

Ash.
38
16,000
8100
1795

Hickory.
51
15,000
7200
2129

Elm.
45
16,000
8011
1970

The above table is compiled from a much fuller one in Vose's Treatise on R.R. Construction.

TABLE OF BOLTS AND NUTS CALCULATED FOR A WORKING STRAIN OF 15,000 LBS. PER SQUARE INCH OF SECTION.

Diameter.
Inches.
Area. Sq.
inches.
Strength in
Pounds
Weight
per Foot.
Square
nut.
Thick's
of nut.
No. thr's.
per inch.

½
.19635
2940
0.66
1¼ in
¾ in
12

⅝
.30680
4602
1.03
1⅜
¾
10

¾
.44179
6630
1.49
1½
⅞
10

⅞
.60132
9019
2.03
1¾
1
9

1
.78540
11775
2.65
2
1
8

1⅛
.99402
14910
3.36
2
1⅛
7

1¼
1.2272
18405
4.17
2¼
1¼
7

1⅜
1.4849
22260
5.02
2½
1⅜
6

1½
1.7671
25505
5.97
2¾
1½
6

1⅝
2.0739
31095
7.01
2⅞
1⅝
5

1¾
2.4053
36075
8.13
3
1¾
5

1⅞
2.7612
41415
9.33
3¼
1⅞
4½

2
3.1416
47130
10.62
3½
2
4½

2⅛
3.5166
53190
12.00
3¾
2⅛
4

2¼
3.9761
59640
13.40
4
2¼
4

2⅜
4.4301
66450
15.00
4⅛
2⅜
4

2½
4.9087
73620
16.70
4¼
2½
3½

2⅝
5.4119
81178
18.20
4½
2⅝
3½

2¾
5.9396
89094
20.00
4¾
2¾
3½

2⅞
6.4918
97377
21.90
5
2⅞
3

3
7.0686
106029
23.80
5¼
3
3

3¼
8.2958
124437
27.90
5¾
3¼
3

3½
9.6211
144316
32.40
6
3½
2½

TABLE OF SAFE WORKING LOAD IN LBS., FOR HOLLOW CAST-IRON COLUMNS.

[G.L. Vose.]

Outside Diameter | Length or height in Feet | Metal Thickness
in inches. | 6 | 8 | 10 | 12 | 15 | 18 | 20 | in inches.
3 | 16000 | 14000 | 13000 | 11000 | 9000 | 7000 | 6000 | ⅜
4 | 30000 | 29000 | 26000 | 24000 | 22000 | 18000 | 16000 | ½
5 | 50000 | 37000 | 45000 | 42000 | 39000 | 37000 | 31000 | ⅝
6 | 59000 | 57000 | 55000 | 52000 | 49000 | 44000 | 41000 | ¾
7 | 101000 | 99000 | 96000 | 92000 | 88000 | 81000 | 76000 | 13/16
8 | 131000 | 129000 | 126000 | 122000 | 118000 | 109000 | 105000 | ⅞
9 | 169000 | 167000 | 164000 | 160000 | 156000 | 146000 | 141000 | 1
10 | 210000 | 200000 | 200000 | 200000 | 190000 | 180000 | 180000 | 1⅛
11 | 250000 | 250000 | 240000 | 240000 | 240000 | 230000 | 220000 | 1¼
12 | 300000 | 300000 | 290000 | 290000 | 290000 | 270000 | 270000 | 1½
14 | 450000 | 430000 | 410000 | 380000 | 370000 | 350000 | 330000 | 1¾
16 | 520000 | 500000 | 480000 | 460000 | 440000 | 420000 | 400000 | 2
18 | 650000 | 630000 | 610000 | 590000 | 560000 | 520000 | 470000 | 2½
20 | 800000 | 760000 | 740000 | 690009 | 650000 | 590000 | 540000 | 3

Plate IV

TRANSCRIBER'S NOTES:

DISCLAIMER: This document should NOT be used to engineer any bridge projects!
It is possible that there are further errors in the information that were not caught.

The page numbers listed below are project page numbers.
(The original book used Roman numerals to number the pages.)

Note that the book uses the "long" ton equal to 2,240 pounds.

CORRECTIONS MADE:
1. Page 8 - the formula for "d" must use a cube root, which is how it is shown here,
     but the '3' to indicate a cube root is not found in the original document.
2. Page 8 - typo in word 'sectien' - changed to 'section'.
3. Page 10 - Value for working comp. strength of cast iron in the table had a typo (25,v00).
     Since other values use round numbers, it is assumed the value should be 25,000.
4. Page 10 - Two other typos. Changed 'the the' to 'the', and in table heading, original
     word was 'detrution', changed to correct spelling of 'detrusion'.
5. Page 12 - changed 'woooden' to 'wooden'.
6. Page 13 - Example II - In the calculations, the intermediate value in the book was
     printed as the square root of 67.2. The left part is correct, but reduces to the square root
     of 268.8, and that is ~16.395. So I have corrected the intermediate value.
7. Page 13 - Because the original page scan cut off the text on the right edge, I have
     made assumptions on what text was missing. Because the scans came from an
     outside source, I could not get the missing information, which was the words at the
     end of Example II, and words in the last paragraph of the page.
8. Page 14 - Three typos found: 'dimensiens' for 'dimensions', 'betng' for 'being',
     and 'ars' for 'are'.
9. Page 17 - a value in a formula was printed as 6000, but in the context of the other
     information, particularly the example immediately following, the value was believed
     to be incorrect, and was changed to 5000.
10. Page 23 - The value of 388 sq. inches at the top of the page in the book is incorrect;
     3 x 8 x 12 = 288, so has been corrected.
11. Page 24 - Rods section, numerical value appeared to be 15.000 in book, but from
     context, must be 15,000 instead.
12. Page 28 - Typos: changed 'Trautwine's Edgineer's Pocket-Bood' to Trautwine's
     Engineer's Pocket-Book'; corrected  'af' to 'as', 'bracas' to 'braces'.
13. Page 30 - Apparent typo in the table at the bottom of page.  Value for Center Brace
     size for 200' span was shown as '8 x 1', believed from context of table to be '8 x 10'.
14. Page 33 - table of dimensions of a Pratt Truss, last column, row starting with 150,
     the original says 8--1-1/8, this is believed to be, and has been changed to, 3--1-1/8.
15. Page 37 - The five formulas with square roots were incorrectly printed in the book,
     multiplying the terms inside the square root instead of adding them, which is obviously
     incorrect per the Pythagorean theorem of right triangles.
16. Page 38: The fifth ratio in the group of five near the top of the page must start with 20,
     not 10 as in the book
17. Page 38 - The equation for W as printed on this page is not consistent with that
     found on pages 18 to 24, so has been corrected from 'bd^2' to 'bd^3'.
18. Page 39 - arch brace truss table heading typo - changed 'FOE' to 'FOR'.

*** END OF THE PROJECT GUTENBERG EBOOK INSTRUCTIONS ON MODERN AMERICAN BRIDGE BUILDING ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

• You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

• You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

• You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

• You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.