The Project Gutenberg eBook of U.S. Copyright Renewals, 1958 July - December

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: U.S. Copyright Renewals, 1958 July - December

Author: Library of Congress. Copyright Office

Release date: March 1, 2004 [eBook #11818]
Most recently updated: October 28, 2024

Language: English

Credits: Produced by Michael Dyck, Charles Franks, and the Online Distributed Proofreading team, using page images supplied by the Universal Library Project at Carnegie Mellon University

*** START OF THE PROJECT GUTENBERG EBOOK U.S. COPYRIGHT RENEWALS, 1958 JULY - DECEMBER ***

<pb id='205.png' n='1958_h2/A/1597' />

RENEWAL REGISTRATIONS

A list of books, pamphlets, serials, and contributions to periodicals for which renewal registrations were made during the period covered by this issue. Arrangement is alphabetical under the name of the author or issuing body or, in the case of serials and certain other works, by title. Information relating to both the original and the renewal registration is included in each entry. References from the names of renewal claimants, joint authors, editors, etc. and from variant forms of names are interfiled.

ABBOT, ANTHONY, pseud. SEE
  Oursler, Fulton.

ABBOTT, AUSTIN.

Forms of pleading in actions for legal or equitable relief. Completed for publication … by Carlos C. Alden. Vol.1-3. 3d ed., by Joseph Walker Magrauth. © 18Nov31; A44873. Willard Martin (PWH); 19Nov58; R225353.

Trial evidence. Vol.1-3. 4th ed. by Edmund Glueck. © 26Jun31; A40219. Willard Martin (PWH); 23Sep58; R221660.

ABBOTT, JANE.

  Bouquet Hill. Illustrated by
    Josephine Reiniger. © 1Oct31;
    A44758. Jane Abbott (A); 10Oct58;
    R222852.

ABBOTT NEW YORK DIGEST. Consolidated ed. Apr., July 1930. Cumulative quarterly pamphlet. © 29Apr30, A22775; 29Jul30, A26666. West Pub. Co. & Lawyers Cooperative Pub. Co. (PWH); 28Apr58, R213724; 21Jul58, R218225.

ABBOTT NEW YORK DIGEST. Consolidated ed. 1930 cumulative pocket parts for v.1-40. © 14Feb31; A35804. West Pub. Co. & Lawyers Co-operative Pub. Co. (PWH); 6Oct58; R222447.

ABBOTT NEW YORK DIGEST. Consolidated ed. Oct 1930, Apr., July 1931. Cumulative quarterly pamphlet. © 17Oct30, A30521; 15Apr31, A38413; 25Jul31, A41833. West Pub. Co. & Lawyers Co-operative Pub. Co. (PWH); 6Oct58; R222454, 222448-222449.

ABEL, MARIETTA BITTER.

  A history of Europe. SEE Schevill,
    Ferdinand.

ABINGDON, ALEXANDER, pseud., comp.

Bonners; being a collection of schoolboy wisdom or knowledge as it is sometimes written, compiled from classrooms and examination papers. Illustrated by Dr. Seuss. © 7Feb31; A34362. Viking Press, Inc. (PWH); 19Nov58; R225015.

ABOUT, EDMOND.

Le roi des montagnes; notes, exercises and vocabulary by Elliott M. Grant and Louise Bourgoin. Illustrated by Kurt Wiese. (Heath's modern language series) © on pref., introd., notes, exercises & vocabulary; 15Oct30; A30290. Elliott M. Grant (A); 1Oct58; R222111.

ABRAHAMS, ROBERT D.

  Handbook of collection practice, by
    Robert D. Abrahams and Milford J.
    Meyer. © 6Aug31; A40680. Soney
    & Sage Co. (PWH); 6Oct58; R222438.

<pb id='206.png' /> ACHELIS, ELISABETH.

  The world calendar. © on foreword
    & new matter; 5Mar31; AA65733.
    Elisabeth Achelis (A); 29Oct58;
    R223564.

ADAMIC, LOUIS.

  Too many breadlines. (In The Commonweal,
    Oct. 28, 1931)
    © 24Oct31; B131908. Stella
    Adamic (W); 26Nov58; R225470.

  Tragic towns of New England. (In
    Harper's magazine, May 1931)
    © 18Apr31; B111424. Stella Adamic
    (W); 26Nov58; R225461.

ADAMIC, STELLA.

  Too many breadlines. SEE Adamic,
    Louis.

  Tragic towns of New England. SEE
    Adamic, Louis.

ADAMS, EUSTACE L.

Wild wind. SEE Bailey, Temple.

Wings of adventure. © 11May31; A38120. Eustace L. Adams (A); 29Dec58; R226959.

ADAMS, FRANK R.

  Fame. (In Redbook, June 1931)
    © 5May31; B113657. Frank R.
    Adams (A); 6Aug58; R218859.

  Gangway. Installment 1-3. (In Redbook,
    July-Sept. 1931) © 5Jun31,
    B116662; 3Jul31, B120332; 5Aug31,
    B123745. Frank R. Adams (A);
    6Aug58; R218860-218862.

  Gangway. Installment 5-7. (In
    Redbook, Nov. 1931-Jan. 1932)
    © 2Oct31, B129616; 5Nov31,
    B132860; 4Dec31, B136482.
    Frank R. Adams (A); 31Dec58;
    R227793-227795.

ADAMS, HARRIET S.

  For works written in collaboration
    with Edna C. Squier SEE
    Appleton, Victor, pseud.
    Dawson, Elmer A., pseud.
    Dixon, Franklin W., pseud.
    Hope, Laura Lee, pseud.
    Keene, Carolyn, pseud.
    Rockwood, Roy, pseud.

ADAMS, HENRY.

  Letters of Henry Adams, 1858-1891,
    edited by Worthington Chauncey
    Ford. © 17Sep30; A27654.
    Emily E. F. Lowes (C of W. C.
    Ford); 15Sep58; R221353.

ADAMS, HERBERT.

  Paulton plot. © 11Aug31; A43201.
    Herbert Adams (A); 9Sep58;
    R221087.

<pb id='207.png' />
  Queen's mate. © 26Feb31; A37387.
    Herbert Adams (A); 29Aug58;
    R220643.

ADAMS, HESTER H.

  Week-end girl. SEE Adams, Samuel
    Hopkins.

ADAMS, SAMUEL HOPKINS.

  Gransden House. Pt.1: The seven
    curses. (In Illustrated detective
    magazine, Nov. 1931) © 29Sep31;
    B132045. Samuel Hopkins Adams (A);
    30Sep58; R222185.

  Gransden House. Pt.2: The menage.
    (In Illustrated detective magazine.
    Dec. 1931) © 24Oct31;
    B132400. Samuel Hopkins Adams
    (A); 27Oct58; R224585.

Week-end girl. Pt.1. (In Illustrated love magazine, Nov. 1931) © 29Sep31; B132046. Samuel Hopkins Adams (A); 30Sep58; R222186.

  Week-end girl, by Warner Fabian,
    pseud. Pt.2. (In Illustrated
    love magazine, Dec. 1931)
    © 25Oct31; B132401. Samuel Hopkins
    Adams (A); 27Oct58; R224586.

  Week-end girl. Pt.3. (In Illustrated
    love magazine, Jan. 1932)
    © 21Nov31; B135714. Hester H.
    Adams & Katherine A. Adell (C);
    26Nov58; R225398.

ADDAMS, JANE.

  The second twenty years at Hullhouse,
    September 1909 to
    September 1929. © 18Nov30;
    A30732. John A. Brittain (NK);
    17Sep58; R221299.

ADELL, KATHERINE A.

  Week-end girl. SEE Adams,
    Samuel Hopkins.

AITCHISON, ALISON E.

Across seven seas to seven continents, by Alison E. Aitchison and Marguerite Uttley. © on chap. 13 & revisions; 10Jul31; A39481. Alison E. Aitchison & Marguerite Uttley (A); 21Nov58; R225021.

  North America by plane and train,
    by Alison E. Aitchison & Marguerite
    Uttley. © 10Jul31; A39480.
    Alison E. Aitchison & Marguerite
    Uttley (A); 21Nov58; R225020.

AITKEN, H. F., illus.

  Handbook of anatomy. SEE Warren,
    John.

AKELEY, CARL.

Adventures in the African jungle, by Carl and Mary L. Jobe Akeley. © 5Dec30; A31481. Mary L. Jobe Akeley (A); 26Sep58; R221872.

AKELEY, MARY L. JOBE, joint author.

  Adventures in the African jungle.
    SEE Akeley, Carl.

<pb id='208.png' n='1958_h2/A/1598' /> ALABAMA.

  Report of cases argued and determined
    in the Supreme Court of
    Alabama. SEE Alabama. Supreme
    Court.

ALABAMA. SUPREME COURT.

Report of cases argued and determined in the Supreme Court of Alabama. Vol.222, October term, 1930-1931. By Noble H. Seay, reporter of decisions. © 14Jul31; A40810. State of Alabama (PWH); 6Oct58; R222435.

ALABAMA AND SOUTHERN REPORTER DIGEST.
  May 1931 cumulative pamphlet.
  © 23May31; A37850. West Pub. Co.
  (PWH); 3Jul58; R217510.

ALABAMA AND SOUTHERN REPORTER DIGEST.
  July 1931 cumulative pamphlet.
  © 14Jul31; A41827. West Pub. Co.
  (PWH); 6Oct58; R222472.

ALDEN, BARBARA.

  Memories of yesterdays. SEE
    Aldan, Isabella M.

ALDEN, CARLOS C.

Forms of pleading in actions for legal or equitable relief. SEE Abbott, Austin.

ALDEN, ISABELLA M.

  Memories of yesterdays. Edited by
    Grace Livingston Hill.
    © 3Oct31; A45146. Barbara Alden
    (E); 21Oct58; R223411.

ALDINGTON, RICHARD.

  The colonel's daughter. © 30Apr31,
    AI-15240; 3Sep31, A42231.
    Richard Aldington (A); 11Sep58;
    R221218.

ALDIS, DOROTHY.

7 to 7. Pictures by Margaret Freeman. © 20Apr31; A35964. Dorothy Aldis (A); 22Oct58; R223838.

ALDRICH, BESS STREETER.

  A white bird flying. © 3Aug31;
    A40646. James Whitson Aldrich,
    Mary Aldrich Beechner, Robert S.
    Aldrich & Charles S. Aldrich (C);
    13Nov58; R225329.

ALDRICH, CHARLES S.

  A white bird flying. SEE Aldrich,
    Bess Streeter.

ALDRICH, JAMES WHITSON.

  A white bird flying. SEE Aldrich,
    Bess Streeter.

ALDRICH, ROBERT S.

  A white bird flying. SEE Aldrich,
    Bess Streeter.

ALEXANDER, RUTH.

  Glory for sale, by Kathryn Kimball,
    pseud. © 15Sep31; AA91824.
    Wetmore Declamation Bureau (PWH);
    20Nov58; R225357.

  Taking Joy home, by Kathryn Kimball,
    pseud. © 1Feb31; AA91826.
    Wetmore Declamation Bureau (PWH);
    20Nov58; R225358.

ALLARD, JULIE. SEE
  Daudet, Julie Allard.

ALLEE, MARJORIE HILL.

  Jane's island. © 29Apr31; A37092.
    Barbara Allee Angell (C); 2Jan59;
    R227602.

ALLEN, JOHN R.

Heating and ventilation, by John R. Allen and James Herbert Walker. With a chapter on Hot water heating systems by F. E. Giesecke. 3d ed. © 12Mar31; A34946. Gertrude M. Walker (W); 6Aug58; R219158.

ALLEN, ROBERT S., joint author.

  Washington Merry-go-round. SEE
    Pearson, Drew.

<pb id='209.png' /> ALLING, KATHRYN. SEE Ordman, Kathryn Alling.

ALMERAS, HENRI D'.

Au bon vieux temps des diligences. © 12Oct31; AF14758. L. Eyrier (E); 3Nov58; R224103.

ALPERN, HYMEN.

  La novela de un novelista. SEE
    Palacio Valdes, Armando.

AMERICAN FEDERAL TAX REPORTS. Vol.9.
  © 17Sep31; A44028. West Pub. Co.
  (PWH); 6Oct58; R222475.

AMERICAN LAW BOOK CO. SEE

Corpus juris.

Cyclopedia of law and procedure.

AMERICAN SECURITY & TRUST CO., WASHINGTON,
  D. C.

  George Washington's country. SEE
    Andrews, Marietta Minnigerode.

AMES, VAN METER.

Introduction to beauty. © 17Aug31; A41096. Van Meter Ames (A); 17Dec58; R226985.

AMMERS-KÜLLER, JO VAN.

  No surrender. Translated by W. D.
    Robson-Scott. © on translation;
    1Apr31; A36670. E. P. Dutton &
    Co., Inc. (PWH); 25Nov58; R225086.

ANDERSEN, ARTHUR OLAF.

  Strict and free counterpoint.
    © 11Aug51; A41325. Mrs. Arthur
    Olaf Andersen (W); 12Nov58;
    R225177.

ANDERSEN, MRS. ARTHUR OLAF.

  Strict and free counterpoint. SEE
    Andersen, Arthur Olaf.

ANDERSON, ELEANOR.

  Perhaps women. SEE Anderson,
    Sherwood.

ANDERSON, ELEANOR COPENHAVER.

  The cry in the night. SEE Anderson,
    Sherwood.

ANDERSON, JOHN E., joint author.

  Child care and training. SEE
    Faegre, Marion L.

  The young child and his parents.
    SEE Foster, Josephine C.

ANDERSON, L. DEWEY, joint author.

  Minnesota mechanical ability tests.
    SEE Paterson, Donald G.

ANDERSON, MARY G.

  For freedom and for Gaul. SEE
    Anderson, Paul L.

ANDERSON, PAUL L.

For freedom and for Gaul. Illustrated, by M. Painter Duhring. © 18Sep31; A41729. Mary G. Anderson (W); 13Nov58; R225331.

ANDERSON, SHERWOOD.

  The cry in the night. (In Vanity
    fair, Sept. 1931) © 25Aug31;
    B125806. Eleanor Copenhaver
    Anderson (W); 2Sep58; R220551.

  Perhaps women. © 15Sep31; A42666.
    Eleanor Anderson (W); 22Oct58;
    R223244.

ANDRE, JEANNE MARIE. SEE
  Postif, Jeanne Marie Andre.

ANDREWS, CHARLES M.

The colonial background of the American Revolution; four essays in American colonial history. Rev. ed. © 4Sep31; A41680. Mrs. Charles M. Andrews (W); 3Nov58; R223786.

ANDREWS, MRS. CHARLES M.

  The colonial background of the
    American Revolution. SEE
    Andrews, Charles M.

ANDREWS, MARIETTA MINNIGERODE.

George Washington's country. With an introd. by George W. Ochs Oakes. © 16Sep30; A27705. American Security & Trust Co. (E); 7Aug58; R219121.

<pb id='210.png' /> ANDREWS, ROBERT D.

  Windfall. © 13Aug31; A40882.
    Robert Andrews (A); 26Sep58;
    R221867.

ANDREWS, ROBERT D.

The stolen husband. © 4Feb31, A33572. Robert D. Andrews (A); 29Dec58; R226938.

ANDRIEU, MARIE.

  Les aventures de Mickey. SEE
    Disney, Walt.

ANGELL, BARBARA ALLEE.

  Jane's island. SEE Allee, Marjorie
    Hill.

ANGER, JOSEPH.

The doctrine of the mystical body of Christ according to the principles of the theology of St. Thomas. Translated from the French by John J. Burke. © 30Oct31; A44911. Wm. A. Michell (E of J. J. Burke); 7Nov58; R224774.

ANNUAL SUPPLEMENT TO MASSACHUSETTS CUMULATIVE STATUTES, containing all general laws of 1931 with full annotations. Under the editorial supervision of Thomas Johnson Michie, assisted by A. Hewson Michie. © 8Sep31; A41527. Michie Co. (PWH); 12Nov58; R224638.

ANTHONY, EDWARD, joint author.

  Bring 'em back alive. SEE Buck,
    Frank.

APPLETON, VICTOR, pseud.

Tom Swift and his sky train; or, Overland through the clouds, by Victor Appleton, pseud, of Harriet S. Adams and Edna C. Squier. © 12Jan31; A33229. Harriet S. Adams & Edna C. Squier (A); 29Dec58; R226934.

APPLETON-CENTURY-CROFTS, INC.

Florence Nightingale: the angel of the Crimea. SEE Richards, Laura E.

APPLETON-CENTURY-CROFTS, INC. SEE

  The New Century dictionary of the
    English language.

ARANT, HERSCHEL W.

Handbook of the law of suretyship and guaranty. (Hornbook series) © 12Sep31; A44025. West Pub. Co. (PWH); 6Oct58; R222463.

AREY, LESLIE BRAINERD.

  Developmental anatomy. 2d ed.
    © 29Sep30; A29098. Leslie
    Brainerd Arey (A); 11Jul58;
    R217746.

ARKANSAS DECISIONS REPORTED IN SOUTH WESTERN REPORTER ANNOTATED, second series. Vol. 32-36, Dec. 1930-May 1931. © 8Jul71; A40800. West Pub. Co. (PWH); 6Oct58; R222471.

ARMITAGE, M. TERESA.

  Concert songs for girls. Students
    ed. © 14Oct31; A44600. Mrs.
    William Beach (E); 12Nov58;
    R225178.

ARMSTRONG, APRIL OURSLER.

  About the murder of the night club
    lady. SEE Oursler, Fulton.

  Ex-mistress. SEE Oursler, Grace
    Perkins.

  Illustrated magic. SEE Fischer,
    Ottokar.

  Speakeasy girl. SEE Meredith,
    Bobbie.

ARMSTRONG, MARTIN DONISTHORPE.

  Blind man's mark. (Pub. abroad as
    Adrian Glynde) © 13Oct30,
    AI-14545; 5Feb31, A33800. Martin
    Donisthorpe Armstrong (A); 16Sep58;
    R221345.

<pb id='211.png' n='1958_h2/A/1599' /> ARNO, PETER.

  Hullabaloo. © 26Nov30; A32020.
    Peter Arno (A); 28Nov58; R225270.

ARNOUX, ALEXANDRE.

  Carnet de route du Juif Errant.
    © 16Jul31; AF14321. Alexandre
    Arnoux (A); 18Aug58; R219683.

ARROWSMITH, LEWIS G., pseud. SEE
  Gold, Louis.

ART PUBLICATION SOCIETY.

  Air a la bourree. SEE Handel,
    George Frederick.

  Gavotte in D major. SEE Bach,
    Johann Sebastian.

  Military march in D. SEE Schubert,
    Franz Peter.

ASBURY, HERBERT.

Ye olde fire laddies. © 24Oct30; A30197. Herbert Asbury (A); 12Aug58; R219139.

ASHMUN, MARGARET.

  Susie Sugarbeet. With illus. by
    Maginel Wright Barney. © 24Oct30;
    A30171. Mary Ashmun Roberts
    (NK); 2Oct58; R221961.

ASHTON, WINIFRED.

Broome stages, by Clemence Dane, pseud. © 20Jul31, AI-15476; 22Oct31, A44650. Winifred Ashtor. (A); 24Oct58; R223396.

ASQUITH, CYNTHIA MARY EVELYN CHARTERIS, LADY.

  The entrancing life. SEE Barrie,
    Sir James Matthew, Bart.

  Works. SEE Barrie, Sir James Matthew,
    Bart.

ATHERTON, ANZONETTA.

  Woman in purple pajamas. SEE
    Collison, Wilson.

ATHERTON, ANZONETTA COLLISON.

Blonde baby. SEE Collison, Wilson.

  Expensive women. SEE Collison,
    Wilson.

ATKINSON, HANNAH WALLER, tr.

  Letters of Hans von Bulow. SEE
    Bulow, Hans Guido von.

THE ATLANTIC REPORTER. Permanent ed.
  (National Reporter System. State
  series) © West Pub. Co. (PWH) v.

  153. Feb. 21-April 11, 1931.
    © 25May31; A37865. 3Jul58;
    R217507.

  154, Apr. 18-June 20, 1931.
    © 31Aug31; A41821. 6Oct58;
    R222474.

ATLANTIC REPORTER DIGEST; covering all cases reported in Atlantic reporter. Key number system. Vol. 26-29. © 29Aug31, A41812; 30Sep31, A44034-44036. West Pub. Co. (PWH); 6Oct58; R222363-222366.

ATLANTIC REPORTER DIGEST, covering all cases reported in Atlantic reporter. Vol. 15-23. © 13May31, A37885; 14May31, A37886-37887; 8Jun31, A39438-39440; 30Jun31, A39441-39443. West Pub. Co. (PWH); 3Jul58; R217493-217501.

ATLANTIC REPORTER DIGEST, covering all cases reported in Atlantic reporter. Vol. 24-25. © 29Aug31; A41810-41811. West Pub. Co. (PWH); 6Oct58; R222476-222477.

ATLANTIC REPORTER DIGEST. May 1931
  cumulative pamphlet. © 23May31;
  A37856. West Pub. Co. (PWH);
  3Jul58; R217502.

ATLANTIC REPORTER DIGEST. July 1931
  cumulative pamphlet. © 31Jul31;
  A40790. West Pub. Co. (PWH);
  6Oct58; R222473.

ATTWATER, DONALD, ed. SEE
  The Catholic encyclopaedic dictionary.

<pb id='212.png' /> ATWATER, ADELINE. SEE Pynchon, Adeline Atwater.

ATWELL, ELBERT L.

The fiducial plan. © 21Oct30; AA54134. Elbert L. Atwell (PWH); 10Oct58; R222723.

AUBRY, JEANNE DOLLE.

  L'Imperatrice Eugenie. SEE Aubry,
    Octave.

AUBRY, OCTAVE.

  L'Imperatrice Eugenie. © 25Jun31;
    AF13470. Mme Octave Aubry, nee
    Jeanne Dolle (W); 18Aug58; R219670.

AUBRY, MME OCTAVE. SEE Aubry, Jeanne
  Dolle.

AULAIRE, EDGAR PARIN D'.

Kari. SEE Scott, Gabriel.

  The magic rug. SEE Aulaire, Ingri
    Parin d'.

AULAIRE, INGRI PARIN D'.

  The magic rug, by Ingri and Edgar
    Parin d'Aulaire. © 22Jun31;
    A39*62.
    [* probably either A39862 or A39662 *]
    Ingri Parin d'Aulaire &
    Edgar Parin d'Aulaire (A); 8Jul58;
    R217587.

AUSTIN, MARY.

  Zuni folk tales. SEE Cushing,
    Frank Hamilton, comp & tr.

AVELINE, CLAUDE.

  La fin de Madame Maillart.
    © 30Oct30; AF15845. Claude
    Aveline (A); 11Aug58; R219109.

  Madame Maillart. © 30Oct30;
    AF15844. Claude Aveline (A);
    11Aug58; R219108.

AXTELL, LUELLA E.

Grow thin on good food. © 6Sep30; A27498. Luella E. Axtell (A); 19Aug58; R219599.

AYER, JEAN Y., joint author.

  Third grade manual. SEE Gates,
    Arthur I.

AYRES, RUBY M. SEE
  Pocock, Ruby M. Ayres.

BABB, JAMES T.

A bibliography of the writings of William McFee. With an introd. and notes by William McFee. © 5Dec31; A45616. James T. Babb & William McPee (A); 9Dec58; R226650.

BABCOCK, BERNIE.

  Lighthorse Harry's boy. Illus. by
    Walter Pyle. © 9Sep31; A44359.
    Bernie Babcock (A); 15Sep58;
    R222006.

BACCANTE, LEONORA.

  Johnny Bogan. © 26Feb31; A34821.
    Leonora Baccante (A); 5Dec58;
    R225978.

BACH, JOHANN SEBASTIAN.

Gavotte in D major; piano. Transcription: William Mason. Text matter: Arthur Edward Johnstone. (Composition catalog no.564) © on transcription & text matter; 15Jan31; AA60292. Art Publication Society (PWH); 29Dec58; R227726.

BACHMANN, FRIEDA, tr.

  New German fairy tales. SEE
    Lebermann, Norbert.

BAILEY, ETHEL ZOE, joint comp.

Hortus. SEE Bailey, L. H., comp.

BAILEY, L. H., comp.

Hortus; a concise dictionary of gardening, general horticulture and cultivated plants in North America, compiled by L. H. Bailey and Ethel Zoe Bailey. © 9Dec30; A32091. Ethel Zoe Bailey (A); 17Sep58; R221300.

<pb id='213.png' /> BAILEY, TEMPLE.

  Wild wind. © 15Aug30, A28188.
    Eustace L. Adams & G. Bowdoin
    Craifhill (E); 11Aug58, R219186.

BAINVILLE, JACQUES.

  Napoleon. © 15Oct31; AF15240.
    Mme Jacques Bainville, nee Jeanne
    Niobey (W); 3Nov58; R224104.

BAINVILLE, JEANNE NIOBEY.

Napoleon. SEE Bainville, Jacques.

BAKER, EARL L., joint author.

  Adventures in music. SEE Giddings,
    Thaddeus P.

BAKER, JESSIE B.

  Adventures in solitude. SEE
    Baker, Ray Stannard.

  Life and letters of Woodrow Wilson.
    SEE Baker, Ray Stannard.

  Woodrow Wilson. SEE Baker, Ray
    Stannard.

BAKER, RAY STANNARD.

  Adventures in solitude, by David
    Grayson, pseud. Illustrated by
    David Hendrickson. © 5Nov31,
    A44977. Jessie B. Baker (W);
    19Nov58, R225057.

  Adventures in solitude, by David
    Grayson, pseud. (In American
    Magazine, Sept.-Oct 1931)
    © 30Jul31, B122807, 27Aug31,
    B127108. Jessie B. Baker (W);
    11Sep58, R221211, 221215.

  Life and letters of Woodrow Wilson.
    (In New York herald tribune,
    Nov. 8-Dec. 12, 1931) © 8Nov-12Dec31;
    A5-36756. Jessie B.
    Baker (W); 15Dec58; R226868.

  Woodrow Wilson: life and letters.
    Vol.3-4. © 14Dec31; A45617.
    Jessie B. Baker (W); 17Dec58;
    R226919.

BAKER, VOORHIS & CO., INC.

  Lawyers' manual. SEE Bradbury,
    Harry B.

  Parson's practice manual of the
    state of New York.

BALABER, HELEN OURSLEP.

  About the murder of the night club
    lady. SEE Oursler, Fulton.

  Illustrated magic. SEE Fischer,
    Ottokar.

  Speakeasy girl. SEE Meredith,
    Bobbie.

BALDWIN, FAITH.

  Skyscraper. © 25Sep31; A41932.
    Faith Baldwin (A); 26Sep58,
    R221881.

  Skyscraper. (In Hearst's
    international-cosmopolitan magazine,
    Aug. 1931) © 10Jul31, B120753.
    Faith Baldwin (A); 15Jul58,
    R217834.

  Skyscraper. (In Hearst's
    international-cosmopolitan magazine,
    Sept. 1931) © 6Aug31, B123929.
    Faith Baldwin (A); 13Aug58,
    R219454.

Skyscraper. (In Hearst's international-cosmopolltan, Oct. 1931) © 10Sep31, B126584. Faith Baldwin (A); 19Sep58; R221585.

Skyscraper. (In Hearst's international-cosmopolitan magazine, Nov 1931) © 8Oct31; B130438. Faith Baldwin (A); 14Oct58, R222862.

BALDWIN, FAITH. SEE ALSO Cuthrell,
  Faith Baldwin.

BALDWIN, RALPH L., joint author.

  Adventures in music. SEE Giddings,
    Thaddeus P.

BAMBRIDGE, ELSIE.

  Address at the annual banquet of the
    France Grande Bretagne Association.
    SEE Kipling, Rudyard.

  A naval mutiny. SEE Kipling,
    Rudyard.

<pb id='214.png' n='1958_h2/A/1600' /> BANCROFT, CLARA.

  Christian theology. SEE Bancroft,
    Emery H.

BANCROFT, EMERY H.

  Christian theology, systematic and
    Biblical. © on new matter;
    29Oct30; A31465. Clara Bancroft
    (W); 29Oct58; R223792.

BANCROFT, FREDERIC.

  Slave trading In the Old South.
    © 3Jan31; A33193. National
    Metropolitan Bank of Washington
    (E); 11Sep58; R221116.

BANCROFT-WHITNEY CO.

  Reports of cases determined in the
    District Courts of Appeal of the
    State of California. SEE
    California. District Courts of
    Appeal.

  Reports of cases determined in the
    Supreme Court of the State of
    California. SEE California.
    Supreme Court.

BANCROFT-WHITNEY CO. SEE
  California jurisprudence.

BANNING, MARGARET CULKIN.

  Blossom without leaves. (In
    McCall's, Dec. 1931) © 10Nov31;
    B134184. Margaret Culkin Banning
    (A); 12Nov58; R225402.

  Marry for money. Pt. 1. (In College
    humor, Sept. 1931) © 31Jul31;
    B122749. Margaret Culkin Banning
    (A); 1Aug58; R219**3.
    [* possibly R219663 *]

  Marry for money. (In College humor.
    Oct. 1931) © 1Sep31; B127456.
    Margaret Culkin Banning (A);
    3Sep58; R220893.

  Out of a big job. (In Woman's
    home companion, Nov. 1931)
    © 24Sep31; B128487. Margaret
    Culkin Banning (A); 25Sep58;
    R221996.

  Presents for the rich. (In Ladies'
    home journal, Dec. 1931)
    © 13Nov31; B133870. Margaret
    Culkin Banning (A); 14Nov58;
    R225025.

  Strange bridge fellows. (In
    Delineator, Nov. 1931) © 28Sep31;
    B129517. Margaret Culkin Banning
    (A); 30Sep58; R222184.

BARBER, EDITH M., joint author.

Nutrition in health and disease for nurses. SEE Cooper, Lenna Frances.

BARCLAY'S BANK, LTD., LONDON.

  The entrancing life. SEE Barrie,
    Sir James Matthew, Bart.

  Works. SEE Barrie, Sir James
    Matthew, Bart.

BARNABY, RALPH STANTON.

  Gliders and gliding. © 11Nov30;
    A30616. Ralph Stanton Barnaby
    (A); 4Nov58; R224303.

BARNUM, HILMA L.

  Angus and the cat. SEE Larsson,
    Marjorie Flack.

BARR, CAROLYN.

Six plays for six grades. © 31Oct30; A31012. Carolyn Barr (A); 11Aug58; R219189.

BARR, JOHN MARTIN.

  Mechanics of the calculus,
    p. 287-354 inclusive. © 2Aug30;
    A27032. Madlyn S. Barr (W);
    23Jun58; R213687.

  The mechanics of the calculus.
    Pt. 1-3. © 2Aug30; A27029-27031.
    Madlyn S. Barr (W); 23Jun58;
    R216850-216852.

BARR, MADLYN S.

  Mechanics of the calculus. SEE
    Barr, John Martin.

<pb id='215.png' /> BARRETT, JAMES W., ed.

The end of the world. © 15Apr31; A36541. James W. Barrett (A); 7Jul58; R217597.

BARRIE, J. M.

  Theatre Street. SEE Bruce, Tamara
    Karsavina.

BARRIE, SIR JAMES MATTHEW, BART.

  The entrancing life; address
    delivered on installation as
    Chancellor of Edinburgh University
    © 20Nov30, AI-14558; 13Dec30,
    A32384. Lady Cynthia Asquith,
    Peter Llewlyn Davies & Barclay's
    Bank, Ltd. (E); 23Oct58; R223548.

  The littlest ones, Peter Pan &
    Wendy. Retold for the nursery
    by May Byron. Illustrated by
    Kathleen Atkins. © 13Nov30,
    AI-14580; 23Jan31, A34044.
    Charles Scribner's Sons (PWH);
    23Oct58; R223549.

  Works. Peter Pan ed. © on revisions
    & front.; Lady Cynthia
    Asquith, Peter Llewlyn Davies &
    Barclay's Bank, Ltd. (Co-executor).
    Vol.

    11. The admirable Crichton, and
      other plays. © 25Oct30; A30611.
      21Oct58; R223191.

    12. What every woman knows, and
      other plays. © 25Oct30; A30612.
      21Oct58; R223190.

BARRINGTON, E., pseud. SEE
  Beck, L. Adams.

BARRINGTON, E., pseud. SEE Beck,
  Lily Moresby Adams.

BARRON, CLARENCE W.

More they told Barron; the notes of the late Clarence W. Barron, edited and arranged by Arthur Pound and Samuel Taylor Moore. © 1Oct31; A43052. Arthur Pound & Samuel Taylor Moore (A); 24Oct58; R223320.

BARRON, GRACE M.

  Elements of epistemology. SEE
    Barron, Joseph Thomas.

BARRON, JOSEPH THOMAS.

Elements of epistemology. © 13Jan31; A33136. Grace M. Barron (NK); 23Dec58; R227389.

BARRON, LEONARD.

  The American home book of gardening.
    Edited by Reginald T.
    Townsend. (The American home
    library) © 22Oct31; A43720.
    Reginald T. Townsend (A); 24Oct58;
    R223387.

BARROWS, MARJORIE, comp.

  One hundred best poems for boys and
    girls. Illustrator: Paula Rees
    Good. © 1Oct30; A31199. Whitman
    Pub. Co. (PWH); 29Sep58; R222246.

BARRY, EMILY FANNING, ed.

  The adventures of Huckleberry Finn.
    SEE Twain, Mark.

  The prince and the pauper. SEE
    Twain, Mark.

BARSTAD, ANVOR, tr.

Kari. SEE Scott, Gabriel.

BARTH, PIUS.

  Compendium sacrae liturgiae. SEE
    Bruegge, Aurelius.

BARTLETT, BOB. SEE
  The Boy scout's book of true adventure.

BARTLETT, FLOY LITTLE.

The busy book, by Floy Little Bartlett and Alida Conover. © 17Sep31; A42967. Alida Conover (A); 18Sep58; R221548.

<pb id='216.png' /> BARTON, JOHN M. T.

  The Holy Ghost. Introd. by George
    Johnson. (The Treasury of the
    faith series, 5) © 17Oct30,
    AI-14534; 31Mar31, A36214. John
    M. T. Barton (A); 1Oct58; R222028.

BARTON, SALLY PARKER.

  Rook, the game of games. SEE
    Parker, George S.

BARUCH, DOROTHY WALTER.

  I like automobiles. Illustrated by
    Gyo Fujikawa. © 29Oct31;
    A45086. Dorothy Walter Baruch
    (A); 4Dec58; R225747.

BASH, MAHLON E.

  The probate law and practice of the
    State of Indiana. SEE Henry,
    George A.

BASIL, DON.

  Cat and feather. © 31Aug31;
    A41394. Don Basil (A); 3Sep58;
    R220924.

BASKIN, NORTON.

  Jacob's ladder. SEE Rawlings,
    Marjorie Kinnan.

BATTAGLIA, OTTO FORST DE. SEE
  Porst-Battaglla, Otto.

BAUER, HAROLD.

Bauer-Diller-Quaile course, a piano method for class and individual instruction. Book 1-2. By Harold Bauer, Angela Diller and Elizabeth Quaile. Illustrated by A. P. Foye. © 22Jul31, 29Jul31; AA75682-75685. Wynne Bauer (W), Angela Diller (A) & Paula F. Tyler (E of E. Quaile); 11Aug58; R219517-219518.

BAUER, WYNNE.

  Bauer-Diller-Quaile course. SEE
    Bauer, Harold.

BAUM, VICKI.

  Grand hotel. Translated by Basil
    Creighton. © 25Sep30, AI-14693;
    30Jan31, A34171. Doubleday &
    Co., Inc. (PWH); 16Sep58; R222221.

BAUMER, MARIE.

  Town. (In Clark, Barrett H., ed.
    The American scene) © 29Aug30;
    A28004. Marie Baumer (A);
    30Jul58; R218474.

BAXTER, GEORGE OWEN, pseud. SEE
  Faust, Frederick.

BEACH, REX.

A plea for bad golf. (In Elks magazine, Dec. 1930) © 1Dec30; A5-26339. William L. Canady (E); 28Nov58; R225552.

BEACH, MRS. WILLIAM.

  Concert songs for girls. SEE
    Armitage, M. Teresa.

BEALS, CARLETON.

  Mexican maze. Illus. by Diego
    Rlvera. © 19May31; A39502.
    Carleton Beals (A); 2Sep58;
    R220931.

BEARD, MARY RITTER.

  On understanding women. © 18Nov31;
    A46097. William Beard &
    Miriam Beard Vagts (C); 25Nov58;
    R225227.

BEARD, WILLIAM.

  On understanding women. SEE
    Beard, Mary Ritter.

BEARDSLEY, WILFRED A., ed.

  El gran Galeoto. SEE Echegaray,
    Jose.

BEARDWOOD, J. T., JR.

Simplified diabetic management, by J. T. Beardwood, Jr. and H. T. Kelly. Diets prepared with the collaboration of Elsie M. Watt. © 19Sep31; A43592. J. T. Beardwood, Jr. & H. T. Kelly (A); 10Oct58; R222859.

<pb id='217.png' n='1958_h2/A/1601' /> BECHDOLT, FREDERICK R.

Riders of the San Pedro. © 22Oct31; A43766. LaVon E. Gottfried (E); 24Oct58; R223391.

Youth rides victorious. (In Blue book magazine, June-Aug. 1931) © 1May31, B113503; 29May31, B117120; 1Jul31, B120099. LaVon E. Gottfried (E); 9Jul58; R217816-217818.

BECK, J. F. ADAMS.

  The openers of the gate. SEE Beck,
    Lily Moresby Adams.

BECK, L. ADAMS.

The Irish beauties, by E. Barrington, pseud. © 30Jul31; A39824. Doubleday & Co., Inc. (PPW); 1Aug58; R219196.

BECK, LILY MORESBY ADAMS.

The openers of the gate; stories of the occult, by E. Barrington, pseud. © 14Aug30; A28286. J. F. Adams Beck (E); 7Jul58; R218891.

BECKER, BERIL.

Paul Gauguin: the calm madman. © 20Mar31; A36004. Beril Becker (A); 7Jan59; R227731.

BECKER, MAY LAMBERTON, ed.

Golden tales of the Old South. © 7Nov30; A31025. Beatrice Warde (C); 2Jul58; R217201.

BEEBE, ELSWYTH THANE.

Bound to happen, by Elswyth Thane. © 17Oct30; A29797. Elswyth. Thane (Mrs. William Beebe) (A); 30Jul58; R219303.

BEEBE, MRS. WILLIAM. SEE
  Beebe, Elswyth Thane.

BEECHNER, MARY ALDRICH.

  A white bird flying. SEE Aldrich,
    Bess Streeter.

BEEDING, FRANCIS, pseud.

The three fishers, by Francis Beeding, pseud, of John Leslie Palmer and Hilary Aidan St. George Saunders. © 17Jul31; A40417. Joan W. St. George Saunders (W) & Anthony Palmer (C); 6Nov58; R224062.

BELLAH, JAMES WARNER.

She eagle. (In Saturday evening post, June 13, 1931) © 11Jun31; B117777. James Warner Bellah (A); 18Jul58; R218185.

BELLOC, ELIZABETH.

  A conversation with a cat. SEE
    Belloc, Hilaire.

BELLOC, HILAIRE.

A conversation with a cat, and others. © 9Apr31, AI-15126; 26Sep31, A43667. Eleanor Jebb, Elizabeth Belloc & Hilary Belloc (C); 17Dec58; R226994.

Cranmer, Archbishop of Canterbury. © 1Oct31; A43971. Eleanore Jebb (C); 10Oct58; R222851.

The man who made gold. With seventeen drawings by O. K. Chesterton. © 9Oct30, AI-14496; 21Jan31; A33293. Dorothy Edith Collins (Adm. c.t.a. of G. K. Chesterton); 18Jun58; R217160.

BELLOC, HILARY.

  A conversation with a cat. SEE
    Belloc, Hilaire.

BENCHLEY, ROBERT.

  The fourth New Yorker album. SEE
    The New Yorker.

BENDER (MATTHEW) & CO., INC.

  Encyclopedia of automobile law.
    SEE Huddy, Xenophon P.

<pb id='218.png' />
  Encyclopedia of automobile law.
    SEE Huddy, Xenophon Pearce.

BENDER (MATTHEW) & CO., INC. SEE

Parson's practice manual of the state of New York.

BENET, LAURA.

  The church of dumb creatures. (In
    The New Yorker, Oct. 10, 1931)
    © 9Oct31; B130033. Laura Benet
    (A); 20Oct58; R223203.

BENET, ROSEMARY CARR.

  Custody of the child. SEE
    Benet, Stephen Vincent.

  Mystery. SEE Benet, Stephen
    Vincent.

BENET, STEPHEN VINCENT.

  Custody of the child. (In Harpers
    bazaar. Nov. 1931) © 28Oct31;
    B133094. Rosemary Carr Benet (W);
    29Oct58; R224590.

  Mystery. (In St. Nicholas, Dec.
    1931) © 20Nov31; B138405.
    Rosemary Carr Benet (W); 21Nov58;
    R225033.

BENEVOLENT & PROTECTIVE ORDER OF ELKS.
  SEE Elks, Benevolent & Protective
  Order of.

BENJAMIN, W. HOFFMAN.

  Chattering gods. SEE Crawley,
    Rayburn, pseud.

BENJAMINE, ELBERT.

  The doctrine of horary astrology.
    (Horary astrology, ser. no.89,
    course 8-D) © 1Oct31; AA266631.
    Maria M. Benjamine (W); 15Dec58;
    R226691.

  The doctrine of spiritual alchemy.
    (Spiritual alchemy, ser. no.49,
    course 3-A) © 1May31; AA266626.
    Maria M. Benjamine (W); 15Dec58;
    R226687.

  Higher consciousness. (Spiritual
    alchemy, ser. no.53, course 3-E)
    © 1Feb31; AA266630. Maria M.
    Benjamine (W); 15Dec58; R226690.

  Purifying the metals. (Spiritual
    alchemy, ser. no.51, course 3-C)
    © 1Apr31; AA266628. Maria M.
    Benjamine (W); 15Dec58; R226689.

  Questlons relating to the first six
    houses. (Horary astrology, ser.
    no.90, course 8-E) © 1Nov31;
    AA266632. Maria M. Benjamine (W);
    15Dec58; R226692.

  The seven spiritual mentals.
    (Spiritual alchemy, ser. no.50,
    course 3-B) © 1Jun31; AA266627.
    Maria M. Benjamine (W); 15Dec58;
    R226688.

BENJAMTNE, MARIA M.

  The doctrine of horary astrology.
    SEE Benjamine, Elbert.

  The doctrine of spiritual alchemy.
    SEE Benjamine, Elbert.

  Higher consciousness. SEE Benjamine,
    Elbert.

  Purifying the metals. SEE Benjamine,
    Elbert.

  Questions relating to the first six
    houses. SEE Benjamine, Elbert.

  The seven spiritual mentals. SEE
    Benjamine, Elbert.

BENNETT, AILEEN, joint author.

  Gamble's class method for strings.
    SEE Fischel, Max.

BENNETT, ARNOLD.

  The night visitor and other stories.
    © 15Oct31, AI-15608; 22Oct31;
    A43715. Doubleday & Co., Inc.
    (PPW); 24Oct58; R223384.

BENNETT, CHARLES MOON.

Tim Kane'a treasure. © 7Jul31; A39349. Charles Moon Bennett (A); 25Nov58; R225089.

BENSON, E. F.

  Mapp and Lucia. © 3Sep31,
    AI-15553; 22Oct31, A44975.
    Kenneth Stewart Patrick McDowall
    (NK); 24Oct58; R223401.

<pb id='219.png' /> BENSON, MILDRED A. WIRT.

  Ruth Darrow in Yucatan, by Mildred
    A. Wirt. Illustrated by John M.
    Foster. © 28Apr31; A38212.
    Mildred A. Wirt Benson (A);
    29Dec58; R226970.

BENZIQER BROS., INC.

  Let us go to Jesus. SEE
    Lasance, F. X., ed.

  The living voice. SEE
    Blundell, Agnes M.

  The New Testament. © on annotation,
    references & Index; 27Nov31;
    A46377. Benziger Bros., Inc.
    (PWH); 2Dec58; R225733.

Peggy Moran. SEE Low, Ruth Irma.

  Second year reading. SEE
    McLaughlin, Edith M.

  Silent reading tests for seatwork.
    SEE McLauchlin, Edith M.

  Third year reading teacher's
    manual accompanying book 3,
    American cardinal readers.
    SEE McLaughlin, Edith M.

BERDESHEVSK, NINA MELVILLE.

  American literature at the crossroads
    SEE Calverton, V. F.

  Woman's coming of age. SEE
    Calverton, V. F., ed.

BERG, GERTRUDE.

The rise of the Goldbergs. © 18Apr31; A35970. Gertrude Berg (A); 5Nov58; R224277.

The rise of the Goldbergs. with an introd. by Eddie Cantor. © 18Apr31, A35970. Sophia Civoru (A); 9Oct58, R223212.

BERGER, HELEN.

  Nobody's Joan. Illus. by Richard H.
    Rodgers. © 12Jun31; A44995.
    Helen Berger (A); 29Dec58;
    R226982.

BERKELEY, ANTHONY, pseud. SEE
  Cox, Anthony Berkeley.

BERNARD, L. L.

Social attitudes. SEE Young, Kimball, ed.

BERNEWITZ, M. W. VON.

Handbook for prospectors. 2d ed. © 5Mar31; A35204. Dorethea Harris (W); 6Aug58; R219160.

BERNIER, GEORGE X.

  Animal drive and the learning process
    SEE Holt, Edwin B.

BERNREUTER, ROBERT G.

The personality inventory. © 26Jan31; AA64859. Robert G. Bernreuter (A); 16Dec58; R226605.

BERRY, ERICK, illus.

  The doll's house. SEE Fyleman,
    Rose.

  Son of the whiteman. SEE Best,
    Herbert.

BERRY, ERICK, pseud. SEE ALSO
  Best, Allena C.

BERTRAND, JULIETTE, tr.

  Technique du coup d'etat. SEE
    Mamaparte, Curzio.

BEST, ALLENA C.

  Mom du Jos. Story and pictures by
    Erick Berry, pseud. © 20Aug31;
    A42187. Erick Berry (A); 26Aug58;
    R220630.

BEST, ALLENA C. SEE ALSO Berry, Erick.

BEST, HERBERT.

  Son of the whiteman. Illustrated
    by Erick Berry. © 22Jun31;
    A40970. Herbert Best & Erick
    Berry (A); 8Jul58; R217589.

THE BEST PLAYS OF 1929-1930, AND THE YEAR BOOK OF THE DRAMA IN AMERICA, edited by Burns Mantle. © 7Nov30; A31026. Lydia Burns Mantle (W); 2Jul58; R217202.

<pb id='220.png' n='1958_h2/A/1602' /> BETZ, ANNETTE, joint author.

  Essential language habits. SEE
    Cowan, Esther Marshall.

BETZ, LOUISE CORROY.

  La montagne magique. SEE Mann,
    Thomas.

BETZ, MAURICE, tr.

  La montagne magique. SEE Mann,
    Thomas.

BETZ, MME MAURICE. SEE
  Betz, Louise Corroy.

THE BHAGAVAD-GITA. The song of God.
  Translation by Dhan Gopal Mukerji.
  © 13Oct31; A43297. Mrs. Dhan Gopal
  Mukerji (W); 26Nov58; R225575.

BIBLE.

  The English Bible as literature.
    SEE Dinsmore, Charles A.

BIBLE. O. T.

  Old Testament narratives. SEE
    Dawson, Mary, ed.

BIBO, BOBETTE.

Mickey Mouse book. (Hello, everybody) Story and game originated by Bobette Bibo, drawings by Walt Disney Studios. © on story & game; 1Nov30; AA56005. Bobette Bibo (A); 29Oct58; R225749.

BIGELOW, HARRY AUGUSTUS.

Cases on the law of personal property; assisted by Francis W. Jacob. William Reynolds Vance, editor and author of new matter. 2d ed. (American casebook series) © 21May31; A37867. West Pub. Co. (PWH); 3Jul58; R217542.

BIGELOW, MAURICE A.

  Health for every day. SEE Broadhurst,
    Jean.

  Health in home and neighborhood, by
    Maurice A. Bigelow and Jean
    Broadhurst. Rev. ed. © 5Nov30;
    A31174. Jean Broadhurst (A);
    20Oct58; R222921.

BINDLOSS, HAROLD.

  The border trail. © 13Aug31;
    A40773. Midland Bank Executive &
    Trustee Co., Ltd. (E); 29Aug58;
    R220645.

  The prairie patrol. © 8Jan31;
    A32736. Midland Bank Executive
    & Trustee Co., Ltd. (E); 29Aug58;
    R220933.

BIRMINGHAM, GEORGE A., pseud. SEE
  Hannay, James Owen.

BIRNEY, HOFFMAN.

  The Pinto pony, a real horse.
    © 25Oct30; A29710. Hoffman
    Birney (A); 8Jul58; R217255.

  Roads of roam. Drawings by Charles
    Hargens. © 1Aug30; A26704.
    Hoffman Birney (A); 8Jul58;
    R217249.

BISEL (GEORGE T.) CO. SEE

Purdon'a Pennsylvania statutes, annotated.

BISHOP, CALVIN C.

  Electrical drafting and design.
    2d ed. © 9Apr31; A35765.
    Calvin C. Bishop (A); 6Aug58;
    R219164.

BITTER, FRANCIS T.

  A history of Europe. SEE Schevill,
    Ferdinand.

BITTER, JOHN.

  A history of Europe. SEE Schevill,
    Ferdinand.

BLACK, LEOTA HULSE.

Joey's friend. © 15Sep31; AA91858. Wetmore Declamation Bureau (PWH); 20Nov58; R225368.

  Let brotherly love continue.
    © 15Sep31; AA91841. Wetmore
    Declamation Bureau (PWH);
    20Nov58; R225361.

<pb id='221.png' />
  Ma by bus. © 15Sep31, AA91842.
    Wetmore Declamation Bureau (PWH);
    20Nov58, R225362.

  Ma's berth night. © 15Sep31,
    AA91847. Wetmore Declamation
    Bureau (PWH); 20Nov58, R225364.

  Ma's Sabbath mourn. © 15Sep31,
    AA91848. Wetmore Declamation
    Bureau (PWH); 20Nov58, R225365.

BLACKMORE, C. A., comp. SEE
  New Joy in service songs.

BLACKMORE, CARL, ed. SEE
  New joy in service songs.

BLANDING, DON.

Songs of the seven senses, including Farewell to vagabond's house With illus by the author © 18Sep31, A41895. Security-First National Bank of Los Angeles (E); 17Oct58, R223045.

BLANKENSHIP, RUSSELL.

American literature as an expression of the national mind. © 11May31, A37452. Russell Blankenship (A); 28Jul58, R218656.

BLASHFIELD, DE WITT CLINTON.

Cyclopedia of automobile law Vol.4. Permanent cumulative supplement. © on revisions & additions; 1Apr31, A38418. Vernon Law Book Co. (PWH); 3Jul58, R217539.

BLISS, ADAM, pseud. SEE
  Burkhardt, Robert F.

BLOCH, JEAN RICHARD.

A night in Kurdistan. Translated by Stephen Haden-Guest. © 22Jan31, A35481. Simon & Schuster, Inc. (PWH); 30Jul58, R218771.

BLOCH, LOUIS.

  Labor agreements in coal mines.
    © 20Jul31, A42093. Russell Sage
    Foundation (PWH); 10Nov58,
    R224880.

BLOCHMAN, LAWRENCE G.

  Almost a sahib. (In Adventure,
    Aug. 1, 1931) © 20Jul31,
    B122162. Lawrence G. Blochman
    (A); 11Aug58, R219118.

  Bad money. (In Adventure,
    Nov. 1, 1930) © 17Oct30,
    B89639. Lawrence G. Blochman
    (A); 11Aug58, R219114.

  A civilized meal. (In Adventure,
    Jan. 1, 1931) © 15Dec30,
    B98333. Lawrence G. Blochman (A);
    11Aug58, R219115.

  Flashlight. (In Adventure, Apr 15,
    1931) © 31Mar31, B109347.
    Lawrence G. Blochman (A); 11Aug58,
    R219117.

  An overt act. (In Adventure,
    Apr. 1, 1931) © 18Mar31,
    B108658. Lawrence G. Blochman
    (A); 11Aug58, R219116.

BLODGETT, RUTH R.

Wind from the sea. © 11Sep30, A28420. Ruth R. Blodgett (A); 25Aug58, R220287.

BLONDHEIM, D. S., ed.

  Carmen et autres nouvelles. SEE
    Merimee, Prosper.

BLOOM, MARGARET.

  Black Hawk's trail. Illustrated by
    Peggy Paver Beck. © 2Nov31,
    A45224. Margaret Bloom (A);
    3Nov58, R223542.

BLUNDELL, AGNES M.

  The living voice. © 22Sep31,
    A43840. Benziger Bros., Inc.
    (PWH); 7Nov58; R224769.

BOATMEN'S NATIONAL BANK OF ST. LOUIS.

Physics. SEE Stewart, Oscar M.

BOB. SEE Gardner, Robert.

<pb id='222.png' /> BOBBE, DOROTHIE.

  Fanny Kemble. © 25Sep31; A43090.
    Dorothie Bobbe (A); 28Nov58;
    R225625.

BOBBS-MERRILL CO.

  Oklahoma digest and statute service.
    SEE Crockett, Daniel W.

  Supplement to Oklahoma digest
    annotated. SEE Crockett, Daniel
    Woolsey.

BOBBS-MERRILL CO., INC.

  Cases and other materials on the
    law of insurance. SEE Goble,
    George W.

  Cases on the law of property. SEE
    Walsh, William F.

  Medical jurisprudence. SEE Herzog,
    Alfred W.

  The probate law and practice of the
    State of Indiana. SEE Henry,
    George A.

BOBBS-MERRILL CO., INC. SEE
  Indiana three in one service.

BOBO, BOBETTE.

  Mickey Mouse book. SEE Disney
    (Walt) Productions.

BODENHEIM, MAXWELL.

  Duke Herring. © 15Jul31; A40424.
    Solbert Bodenheim (C); 17Jul58;
    R218098.

BODENHEIM, SOLBERT.

Duke Herring. SEE Bodenheim, Maxwell.

BOERNER, DORIS.

  Approved laboratory technic. SEE
    Kolmer, John A.

BOERNER, FREDERICK, joint author.

  Approved laboratory technic. SEE
    Kolmer, John A.

BOERNER, FREDERICK, JR.

  Approved laboratory technic. SEE
    Kolmer, John A.

BOERNER, ROBERT REESE.

  Approved laboratory technic. SEE
    Kolmer, John A.

BOGARDUS, EMORY S.

Fundamentals of social psychology. 2d ed. (The Century social science series) © 21Oct31; A44827. Emory S. Bogardus (A); 31Oct58; R224029.

Social attitudes. SEE Young, Kimball, ed.

BOGERT, L. JEAN.

Nutrition and physical fitness. © 5Aug31; A40683. L. Jean Bogert (A); 10Dec58; R226590.

BOHM, EDWIN M.

  Lawyers' manual. SEE Bradbury,
    Harry B.

BOISSEVAIN, EDNA ST. VINCENT MILLAY.

  Fatal interview, by Edna St. Vincent
    Millay. © 15Apr31; A36537.
    Norma Millay Ellis (E); 20Oct58;
    R223291.

  Since of no creature living, by
    Edna St. Vincent Millay. (In The
    Delineator, Feb. 1931) © 30Dec30;
    B98981. Norma Millay Ellis (E);
    14Nov58; R224541.

  Since of no creature living, by
    Edna St. Vincent Millay. (In The
    Delineator, Feb. 1931) © 30Dec30;
    B98981. Norma Millay Ellis (NK);
    14Nov58; R224540.

  Sonnets; Being out of love, Strange
    thing, I dreamed I moved among
    the Elysian fields, and others, by
    Edna St. Vincent Millay. (In The
    Saturday evening post, Dec. 6,
    1930) © 4Dec30; B95424. Norma
    Millay Ellis (E); 14Nov58;
    R224536.

<pb id='223.png' n='1958_h2/A/1603' />
  Sonnets; Being out of love, Strange
    thing, I dreamed I moved among
    the Elysian fields, and others, by
    Edna St. Vincent Millay. (In The
    Saturday evening post, Dec. 6,
    1930) © 4Dec30; B95424. Norma
    Millay Ellis (NK); 14Nov58;
    R224535.

Sonnets; Being out of love, Strange thing, I dreamed I moved among the Elysian fields, and others, by Edna St. Vincent Millay. (In The Saturday evening post, Dec. 6, 1930) © 4Dec30; B95424. Norma Millay Ellis (PWH); 14Nov58; R224537.

  There is a well into whose bottomless
    eye, by Edna St. Vincent Millay.
    (In The Delineator, Jan.
    1931) © 1Dec30; B95317. Norma
    Millay Ellis (E); 14Nov58;
    R224537.

  There is a well into whose bottomless
    eye, by Edna St. Vincent Millay.
    (In The Delineator, Jan.
    1931) © 1Dec30; B95317. Norma
    Millay Ellis (E); 14Nov58;
    R224539.

BOISSIEU, R. P. DE.

Bethanie, Madeleines rehabilitees. © 3Jun31; AF13513. R. P. de Boissieu (A); 18Aug58; R219688.

BOLTON, SARAH K.

  Lives of girls who became famous.
    New natter by Inez N. McFee.
    Rev. & enl. ed. © 23Oct30;
    A29740. Thomas Y. Crowell Co.
    (PWH); 7Oct58; R222584.

BOND, ANNETTE D.

  Stock movements and speculation.
    SEE Bond, Frederic Drew.

BOND, FREDERIC DREW.

  Stock movements and speculation.
    2d ed. © 29Aug30; A26999.
    Annette D. Bond (W); 29Jul58;
    R218455.

THE BOOK OF KNOWLEDGE; the children's encyclopedia. Vol.1-20. Holland Thompson, editor-in-chief. © on revisions & additions in text & illus.; 28Jul31; A39919. Grolier Society, Inc. (PWH); 19Aug58; R219598.

BOOMER, JORGINE.

  Hotel management. SEE Boomer,
    Lucius M.

BOOMER, LUCIUS M.

  Hotel management. 2d ed., thoroughly
    rev. © 8Jul31; A39340.
    Jorgine Boomer (W); 3Dec58;
    R225714.

BORDEN, MARY, pseud. SEE
  Spears, Mary.

BORIE, LYSBETH BOYD.

More poems for Peter. Scissor-cuts by Lisl Hummel. © 14Oct31; A44803. Lysbeth Boyd Borie (A); 21Oct58; R223410.

BOSTWICK, ARTHUR ELMORE, ed. SEE
  Grolier encyclopedia.

BOSWELL, HELEN.

Stage guide for young Handel of Hanover, by Helen Boswell and Dorothy Park Clark. Dance arrangements by Carolyn L. Strubel. Sketches for costumes and stage sets by George D. Greathouse. © on dance arrangements and sketches; 12Nov31; AA83694. M. Witmark & Sons (PWH of C. Strubel & G. Greathouse); 13Nov58; R225516.

<pb id='224.png' /> BOSWELL, JAMES.

  Everybody's Boswell; being The life
    of Samuel Johnson abridged from
    James Boswell's complete text and
    from the Tour to the Hebrides,
    edited by F. V. Morley. Illus.
    by Ernest H. Shepard. © 4Nov30,
    AI-14512; 4Dec30, A31473. Frank
    V. Morley (A); 29Sep58; R222108.

  The journal of James Boswell, 1774-1777.
    Vol.10-12. Edited and prepared
    by Geoffrey Scott and Frederick
    A. Pottle. © 29May31;
    A39262-39264. Yale University
    (PPW of J. Boswell) & Yale University
    (PWH of G. Scott & F. A.
    Pottle); 6Aug58; R219455-219457.

Private papers of James Boswell from Malahide Castle. Vol.7-9. In the collection of Lt. Colonel Ralph Heyward Isham. Edited and prepared by Geoffrey Scott and Frederick A. Pottle. © 1Aug30; A31324. Yale University (PPW of J. Boswell) & Yale University (PWH of G. Scott & F. A. Pottle); 30Jul58; R219458.

BOTKIN, BENJAMIN ALBERT, ed.

  Folk-say; a regional miscellany:
    1931. © 5Nov31; A45478.
    Benjamin Albert Botkin (A);
    29Dec58; R227725.

  The Southwest scene; an anthology
    of regional verse. © 17Dec31;
    A49489. Benjamin Albert Botkin
    (A); 29Dec58; R227724.

BOTT, ALAN.

  This was England. (Pub. abroad as
    Our fathers) © 2Nov71, AI-15735;
    23Nov31, A44965. Josephine Bott
    (W); 26Nov58; R225567.

BOTT, JOSEPHINE.

This was England. SEE Bott, Alan.

BOULARAN, J.

Marie Galante, par Jacques Deval, pseud. © 21Sep31; AF14398. Jacques Deval (J. Boularan) (A); 3Nov58; R224099.

BOURGOIN, LOUISE.

  Le rol des montagnes. SEE About,
    Edmond

BOVARD, JOHN F.

Tests and measurements in physical education, by John F. Bovard and Frederick W. Cozens. © 26Nov30; A31346. John F. Bovard (A); 25Jul58; R218525.

BOWERS, WILMA E.

  Christ in the Gospels. SEE Easton,
    Burton Scott.

BOWLBY, HARRY L.

  Chattering gods. SEE Crawley,
    Rayburn, pseud.

BOWMAN, KARL M.

Personal problems for men and women. © 1Apr31; A35880. Karl M. Bowman (A); 5Dec58; R225987.

THE BOY SCOUT'S BOOK OF TRUE ADVENTURE, by Bob Bartlett, Frederick R. Burnnam and Richard E. Byrd. Foreword by Theodore Roosevelt. Biographical notes by James E. West. © 28Feb31; A35134. Mrs. Perry D. Crandall (W of J. E. West); 23Oct58; R223647.

BOYD, AUBREY.

  No man's woman. © 2Jan31;
    A32970. Peter Aubrey Carlisle
    Boyd (C); 24Nov58; R225072.

BOYD, JOHN W.

Hail Columbia. SEE Lawson, Marie.

BOYD, PETER AUBREY CARLISLE.

No man's woman. SEE Boyd, Aubrey.

BRACK, PAUL.

  Lettres a la comtesse de noailles.
    SEE Proust, Marcel.

<pb id='225.png' /> BRACKETT, CHARLES.

  All modern improvements. (In
    Saturday evening post, Jan. 31,
    1931) © 29Jan31; B102647.
    Charles Brackett (A); 13Oct58;
    R222774.

Riding high. (In Woman's home companion, Oct. 1931) © 25Aug31; B124929. Charles Brackett (A); 13Oct58; R222773.

The social secretary. (In Collier's national weekly, May 16-June 13, 1931) © 25Apr31, B113133; 2May31, B112884; 11May31, B115368; 18May31, B114692; 23May31, B115935. EMKA, Ltd. (PWH); 9Sep58; R221223-221222, 221225-221224, 221226.

BRADBURY, HARRY B.

  Lawyers' manual. 4th ed. rev. by
    Edwin M. Bohra. © 20Oct31;
    A43503. Baker, Voorhis & Co.,
    Inc. (PWH); 21Oct58; R223175.

BRADDY, NELLA, ed. SEE
  Grrolier encylopedia.

BRADFORD, GAMALIEL.

The quick and the dead. © 4Mar31; A36031. Sarah Bradford Ross (C); 17Dec58; R227003.

BRADFORD, MARY ROSE.

John Henry. SEE Bradford, Roark.

BRADFORD, ROARK.

  John Henry. Woodcuts by J. J.
    Lankes. © on illus.; 2Sep31;
    A41408. J. J. Lankes (A);
    17Dec58; R226986.

  John Henry. Woodcuts by J. J.
    Lankes. © 2Sep31; A41408.
    Mary Rose Bradford (W); 17Dec58;
    R226967.

BRADLEY, JOHN H., JR.

  The parade of the living.
    © 8Oct30; A30231. John H.
    Bradley, Jr. (A); 30Jul58;
    R218930.

BRADY, GEORGE S.

Materials handbook. 2d ed. © 26Mar31; A35520. George S. Brady (A); 6Aug58; R219162.

BRAGDON, CLAUDE.

The eternal Poles. © 6Feb31; A34266. Henry Bragdon (C); 12Nov58; R225121.

BRAGDON, HENRY.

  The eternal Poles. SEE Bragdon,
    Claude.

BRAGG, GERTRUDE C.

Syntax. SEE Curme, George O.

BRAINERD, J. L.

  The little green shutter.
    SEE Whitlock, Brand.

Narcissus. SEE Whitlock, Brand.

BRAND, MAX, pseud. SEE Faust,
  Frederick.

BRANDEIS, LOUIS DEMBITZ.

  The social and economic views of
    Mr. Justice Brandels, collected,
    with introductory notes, by Alfred
    Lief. © 16Oct30; A29616.
    Alfred Lief (A); 15Sep58;
    R221252.

BRANSBY, JOHN.

  At the rising of the moon. SEE
    Squier, Emma Llndsay.

  Going down the golden trail. SEE
    Squier, Emma Lindaay.

  Little queen of pearls. SEE Squier,
    Emma Lindsay.

  Something for nothing. SEE Squier,
    Emma Lindaay.

BRENTANO, FRANZ.

  Wahrheit und Eidenz, herausgegeben
    durch Oskar Kraus. © 10Dec30;
    AF1397. John Christian Michael
    Brentano (PPW); 8Dec58; R226202.

<pb id='226.png' n='1958_h2/A/1604' /> BRENTANO, JOHN CHRISTIAN MICHAEL.

  Wahrheit und Evidenz. SEE
    Brentano, Franz.

BREUER, BESSIE.

  Week-end. (In Harpers magazine,
    Sept. 1931) © 17Aug31; B124288.
    Bessie Breuer (A); 3Sep58;
    R220886.

BREWSTER, K. G., ed. SEE

  The New Century dictionary of the
    English language.

BRIDGES, EDWARD.

  The testament of beauty. SEE
    Bridges, Robert.

BRIDGES, ROBERT.

The testament of beauty; a poem in four books. © on revision; 15Dec30; A33355. Edward Bridges (C); 31Jul58; R218685.

BRIGHT, HARRY AARON, joint author.

  Chemical analysis of iron and steel.
    SEE Lundell, G. E. F.

BRIGHT, JOHN, joint author.

  The public enemy. SEE Glasmon,
    Kubec.

BRIGHTMAN, ALVIN C.

  Handbook of the Law of contracts.
    SEE Clark, Wm. L., Jr.

BRIGHTMAN, EDGAR SHEFFIELD.

The finding of God. © 1Aug31; A39940. Irma Fall Brightman (W); 19Sep58; R221442.

BRIGHTMAN, IRMA FALL.

  The find of God. SEE Brightman,
    Edgar Sheffield.

BRINKLEY, ROBERT C.

Responsible drinking; a discreet inquiry and a modest proposal. © 29Oct30; A100028. Robert C. Brinkley (A); 13Aug58; R219340.

BRION, BLANCHE.

  Notre maison, par Blanche Caramel,
    pseud. © 1Nov30; AF11464.
    Mme. Maurice Languereau, nee
    Yvonne Gallien (E); 27Oct58;
    R223966.

BRITTAIN, JOHN A.

  The seccnd twenty years at Hullhouse.
    SEE Addans, Jane.

BROADHURST, JEAN.

  Health for every day, by Jean Broadhurst
    and Maurice A. Bigelow.
    Rev. ed. © 5Nov30; A31175.
    Jean Broadhurst (A); 20Oct58;
    R222922.

  Health in home and neighborhood.
    SEE Bigelow, Maurice A.

BROCK, EMMA L.

The greedy goat. © 10Jul31; A40373. Emma L. Brook (A); 12Nov58; R225124.

BROKAW, CLARE BOOTH.

  Vanity Fair's backgammon to win.
    SEE Mabardi, Georges.

BROMFIELD, ANNE CHALMERS.

Tabloid news. SEE Bromfield, Louis.

  That which never returns. SEE
    Bromfield, Louis.

BROMFIELD, LOUIS.

  Tabloid news. © 27Dec30; A35393.
    Ellen Bromfield Geld, Anne
    Chalmers Bromfield & Hope Bromfield
    Stevens (C); 3Dec58;
    R225713.

  That which never returns. (In
    Hearst's international-cosmopolitan,
    Sept. 1931) © 6Aug31;
    B123929. Ellen Bromfield Geld,
    Anne Chalmers Bromfield & Hope
    Bromfield Stevens (C); 3Dec58;
    R225711.

<pb id='227.png' /> BRONAUOH, MINOR, ed.

The consolidated laws of New York annotated. Book 35A: Multiple dwelling law. Assisted by Ralph Straub. © 25Jul31; A40919. Edward Thompson Co. (PWH); 6Oct58; R222527.

BROOKMAN, LAURA LOU.

  Mad marriage. © 13Apr31; A36481.
    Laura Lou Brookman (A); 29Dec58;
    R226944.

BROOKS, WALTER R.

  More to and again. Kurt Wiese,
    illustrator. © 22Aug30; A27180.
    Walter R. Brooks (A); 12Aug58;
    R219129.

  New York: an Intimate guide.
    © 24Apr31; A36853. Walter R.
    Brooks (A); 23Jul58; R218359.

BROWN, BETH.

  For men only. © 25Nov30; A32000.
    Beth Brown (A); 11Sep58; R221121.

BROWN, CAROLYN PEIRCE.

  Experimental plant physiology. SEE
    Peirce, George James.

BROWN, FORREST E., SR.

Instantaneous insurance calculator. © 10Feb31; AA61405. Forrest E. Brown (Forrest E. Brown, Sr.) (A); 10Dec58; R226477.

BROWN, FRANCIS YEATS-. SEE
  Yeats-Brown, Francis.

BROWN, NELLIE GATES, joint author.

  Essentials of medicine. SEE Emerson,
    Charles P.

BROWN, OLGA YEATS-. SEE
  Yeats-Brown, Olga.

BROWN, ROWLAND, joint author.

  Quick millions. SEE Terreth,
    Courtenay.

BROWN, WILLIAM ADAMS.

Pathways to certainty. © 7Nov30; A30615. Wlnthrop G. Brown (C); 23Oct58; R223546.

BROWN, WINTHROP G.

  Pathways to certainty. SEE Brown,
    William Adams.

BROWN, ZENITH JONES.

The sound of footsteps, by Leslie Ford, pseud. (Pub. abroad as Footsteps on the stairs) © 1Jun31, AI-15356; 17Sep31, A42970. Zenith Jones Brown (A); 18Sep58; R221549.

BROWNING, DAPHNE DU MAURIER.

  The loving spirit, by Daphne du
    Maurier. © 23Feb31, AI-14998;
    30Jul31, A39825. Daphne du
    Maurier Browning (A); 1Aug58;
    R219197.

BRUCE, MRS. H. J. SEE
  Bruce, Tamara Karsavina.

BRUCE, TAMARA KARSAVINA.

  Theatre Street. By Tamara Karsavina.
    Foreword by J. M. Barrie.
    © 13Jan31; A34129. Mrs. H. J.
    Bruce (A); 24Nov58; R225079.

BRUEGGE, AURELIUS.

  Compendium sacrae liturgiae.
    Entirely rev. ed. © 24Mar31;
    A43837. Pius Barth (E); 7Nov58;
    R224768.

BRUERE, ROBERT W.

J. C. Penney. SEE Penney, J. C.

BRUNER, HERBERT B., ed.

  The adventures of Huckleberry Finn.
    SEE Twain, Mark.

  The prince and the pauper. SEE
    Twain, Mark.

<pb id='228.png' /> BRUNNER, ESTHER, Joint author.

  Problems in textiles. SEE Hess,
    Katharine P.

BRUSH, BERNICB BROWN.

  Secret sentence. (In Collier's,
    Aug. 22, 1931) © 3Aug31;
    B122821. Bernice Brovm Brush
    (A); 5Aug58; R219665.

BRYAN, DOROTHY M.

Johnny Penguin, by Dorothy Bryan and Marguerite Bryan. © 19Jun31; A39273. Dorothy Bryan (A); 8Jul58; R217586.

BRYAN, MARGUERITE, joint author.

  Johnny Penguin. SEE Bryan,
    Dorothy M.

BRYANT, MARGARET M.

English in the law courts. © 15Nov30; A31183. Margaret M. Bryant (A); 4Nov58; R224299.

BUCHANAN, MADELEINE SHARPS.

  The black pearl murders. © 14Mar31;
    A34918. Carolyn Buchanan Lamb
    (C); 21Aug58; R219948.

  The subway murder. © 27Sep30;
    A27958. Carolyn Buchanan Lamb
    (C); 21Aug58; R219947.

BUCK, FRANK.

  Bring 'em back alive, by Frank Buck
    with Edward Anthony. © 18Sep30;
    A28476. Muriel Buck (W) & Barbara
    Buck Larick (C); 28Aug58; R220322.

BUCK, MURIEL.

Bring 'em back alive. SEE Buck, Frank.

BUELL, MARGARET C.

  A country parson looks at religion.
    SEE Prichard, Harold Adye.

BÜLOW, HANS GUIDO VON.

Letters of Hans von Bulow to Richard Wagner, Cosima Wagner, his daughter Danlela, Luise von Bulow, Karl Klindworth, Carl Bechstein. Edited with an introd. by Richard Count Du Moulin Eckart; translated from the German by Hannah Waller; the translation edited with a pref. and notes by Scott Goddard. © 2Jan31; A33191. Alfred A. Knopf, Inc. (PWH); 30Dec58; R227005.

BUIE, LOUIS A.

Proctoscopic examination and the treatment of hemorrhoids and anal pruritus. (Mayo Clinic monographs) © 9Jun31; A37919. Louis A. Buie (A); 12Nov58; R224663.

BULLARD, MARION.

  Robbers in the garden. © 27Aug31;
    A41415. James Rorty (E); 26Nov58;
    R225573.

BULLIET, C. J.

Apples and madonnas, emotional expressionism in modern art. New rev. and enl. ed. © 27Oct30; A50427. C. J. Bulliet (A); 20Oct58; R223115.

BURANELLI, PROSPER.

  Big Nick. © 22Oct31; A43710.
    Prosper Buranelli (A); 24Oct58;
    R223382.

Big Nick. (In College humor, Sept.-Nov. 1931) © 3Jul31, B122749; 1Sep51, B127456; 1Oct31, B128781. Prosper Buranelli (A); 8Oct58; R222300, 222304, 222306.

The cross word puzzle book. Nineteenth series. Edited by Prosper Buranelli, Margaret Petherbridge and F. Gregory Hartswick. © 19Feb31; A33960. Margaret Petherbridge, Prosper Buranelli & F. Gregory Hartswick (A); 30Jul58; R218770.

<pb id='229.png' n='1958_h2/A/1605' />
  The cross word puzzle book. Twentieth
    series. Edited by Prosper Burarelli,
    F. Gregory Hartswick and
    Margaret Petherbridge. © 28May31;
    A38682. Prosper Buranelli,
    F. Gregory Hartswick & Margaret
    Petnerbridge (A); 30Jul58;
    R218775.

  The mammoth cross word puzzle book.
    Edited by Prosper Buranelli,
    F. Gregory Hartswick and Margaret
    Petherbridge. © 25Jun31;
    A40269. Prosper Buranelli, F.
    Gregory Hartswick & Margaret
    Petherbridge (A); 30Jul58;
    R218777.

  The post graduate cross word puzzle.
    Series 2. Edited by Prosper
    Buranelli, Margaret Petherbridge
    and F. Gregory Hartswick.
    © 26Mar31; A35565. Prosper
    Buranelli, F. Gregory Hartswick
    and Margaret Petherbridge (A);
    30Jul58; R218772.

BURCHILL, GEORGINE.

  New progressive road to reading,
    Introductory Book 3. By Georgine
    Burchill, William L. Ettinger,
    Edgar Dubs Shimer and Nathan
    Peyser. © on new matter; 28Nov30,
    A30993. Edgar Dubs Shimer (A);
    20Oct53, R222920.

BURGESS, ERNEST W.

Social attitudes. SEE Young, Kimball, ed.

BURGESS, EVELYN R.

The romance of the Book of common prayer. SEE Burgess, Francis G.

BURGESS, FRANCIS G.

  The romance of the Book of common
    prayer. © 25Nov30; A31414.
    Evelyn R. Burgess (W); 30Oct58;
    R223588.

BURKE, EDMUND.

  Speech on conciliation with America.
    Edited by Howard DeForest Wldger.
    (Golden key series) © on introd.,
    notes & questions; 3Aug31;
    A40725. Lois Wldger (W); 6Nov58;
    R224143.

BURKE, JOHN J., tr.

The doctrine of the mystical body of Christ according to the principles of the theology of St. Thomas. SEE Anger, Joseph.

BURKHARDT, ROBERT F.

  The Camden ruby murder, by Adam
    Bliss, pseud. © 20Feb31;
    A35389. Robert F. Burkhardt
    (Adam Bliss) (A); 29Dec58;
    R226942.

BURNET, DANA.

  Don't call me darling. (In Home,
    Aug. 1931) © 15Jul31; B123505.
    Dana Burnet (A); 16Jul58;
    R217806.

  A look of scorn. (In Collier's,
    Aug. 1, 1931) © 13Jul31;
    B120816. Dana Burnet (A);
    14Jul58; R217804.

  Mrs. Trevalyn serves tea. (In
    Harpers bazaar, July 1931)
    © 28Jun31; B119746. Dana Burnet
    (A); 29Jul58; R218633.

  Omit flowers. (In Collier's,
    Oct. 3, 1931) © 14Sep31;
    B126903. Dana Burnet (A);
    18Sep58; R221333.

  The tenth word. (In Colliers, Dec.
    19, 1931) © 1Dec31; B136390.
    Dana Burnet (A); 2Dec58; R225401.

  Through the nose. (In Collier's,
    Sept. 12, 1931) © 24Aug31;
    B124900. Dana Burnet (A);
    3Sep58; R220890.

  The white buck. (In Colliers, Dec.
    12, 1931) © 20Nov31; B134764.
    Dana Burnet (A); 21Nov58;
    R225030.

<pb id='230.png' /> BURNHAM, FREDERICK R. SEE The Boy scout's book of true adventure.

BURRELL, DAVID DE FOREST.

Three little angels. © 19Sep31; A41915. Margaret Burrell (W); 29Dec58; R227736.

BURRELL, MARGARET.

  Three little angels. SEE Burrell,
    David De Forest.

BURROUGHES, DOROTHY.

The journeyings of Selina Squirrel and her friends. Written and illustrated by Dorothy Burroughes. © 22Jul31; A39879. Dorothy Burroughes (A); 12Nov58; R225112.

BURTIS, THOMSON.

  Double exposure. (In American
    boy-youth's companion, Aug. 1931)
    © 25Jul31; B123354. Thomson
    Burtis (A); 28Jul58; R218648.

Part of the picture. (In American boy-youth's companion, June 1931) © 25May31; B114690. Thomson Burtis (A); 28Jul58; R218646.

  Rex Lee, aerial acrobat.
    © 24Sep30; A27781. Thomson
    Burtis (A); 26Aug58; R220824.

  Rex Lee, trailing air bandits.
    © 12Jan31; A33226. Thomson
    Burtis (A); 29Dec58; R226931.

  Slim Evans, air ranger. © 11Sep31;
    A41660. Thomson Burtis (A);
    16Sep58; R221569.

Straight shooting; adventures of a film flyer. Illustrated by Frank Dobias. © 17Sep31; A44974. Thomson Burtis (A); 18Sep58; R221552.

Straight shooting. (In American boy-youth's companion, July 1931) © 25Jun31; B119481. Thomson Burtis (A); 28Jul58; R218647.

BUSH, CHRISTOPHER.

Dancing death. © 4May31, AI-15087; 17Sep31, A42588. Christopher Bush (A); 18Sep58; R221546.

BUSSY, DOROTHY, tr.

Two symphonies. SEE Gide, Andre.

BUTLER, NICHOLAS MURRAY.

  The path to peace. © 3Oct30;
    A29303. T. Ludlow Chrystle &
    Guaranty Trust Co. of New York
    (Co-executors); 19Sep58; R221469.

BUTTERFIELD, OLIVER M.

Marriage: some practical suggestions for happy married living. © 10Apr31; AA66989. Oliver M. Butterfield (A); 5Dec58; R225988.

BYERS, JOHN REID.

Home town laughter. (In Saturday evening post, Nov. 29, 1930) © 26Nov30; B96030. John Reid Byers (A); 13Nov58; R224606.

BYNNER, WITTER.

  Eden tree. © 28Aug31; A41382.
    Witter Bynner (A); 2Dec58;
    R226462.

BYRD, RICHARD E.

  Little America. © 28Nov30;
    A31450. Second Bank-State Street
    Trust Co. (E); 23Jul58; R218384.

BYRD, RICHARD E. SEE
  The Boy scout's book of true adventure.

BYRON, MAY.

  The littlest ones, Peter Pan &
    Wendy. SEE Barrie, Sir James
    Matthew, Bart.

<pb id='231.png' /> CABOT, HUGH.

  Surgical nursing, by Hugh Cabot and
    Mary Dodd Giles. © 3Feb31;
    A33641. Mary Dodd Giles (A);
    12Nov58; R224662.

CADES, HAZEL RAWSON.

Jobs for girls. © 28Aug30; A28195. Hazel Rawson Cades (A); 25Aug58; R220285.

CALDERONE, MARY STEICHEN MARTIN.

  The first picture book; everyday
    things for babies, by Mary S.
    Martin. Photos, by Edward
    Steichen. © 18Sep30; A28529.
    Mary Steichen Martin (Mrs. Frank
    A. Calderone) (A) & Edward
    Steichen (A); 16Sep58; R221246.

CALIFORNIA. DISTRICT COURTS OF APPEAL.

  Reports of cases determined in the
    District Courts of Appeal of the
    State of California. Randolph V.
    Whiting, reporter, and others.
    © Bancroft-Whitney Co. (PWH)

    v. 104-108, Feb. 10-Oct. 6, 3930.
      © 13Feb31, A33923; 11Apr31,
      A36653; 16Jun31, A39589; 6Aug31,
      A41212; 24Sep31, A43004.
      20Oct58; R223195-223199.

CALIFORNIA. SUPREME COURT.

  Reports of cases determined in the
    Supreme Court of the State of
    California. Vol.209-210. Jan.
    31-Oct. 31, 1930. Randolph V.
    Whiting, reporter. © 16Mar31,
    A36002; 22Aug31, A41330. Bancroft-Whitney
    Co. (PWH); 20Oct58,
    R223193-223194.

CALIFORNIA JURISPRUDENCE. 1950 supplement.
  With a new article on Community
  property. By William M.
  McKinney, and other lawyers.
  © 4Dec30; A31600. Bancroft-Whltney
  Co. (PWH); 20Oct58; R223192.

CALKINS, CLINCH. SEE Merrell, Marion
  Clinch Calkins.

CALLAGHAN, MORLEY.

  Lunch counter. (In The New Yorker,
    May 2, 1931) © 1May31; B112801.
    Morley Callaghan (A); 12Nov58;
    R224736.

  The red hat. (In The New Yorker,
    Oct. 31, 1931) © 30Oct31;
    B132486. Morley Callaghan (A);
    12Nov58; R224734.

  Younger brother. (In The New
    Yorker, May 23, 1931) © 22May31;
    B115838. Morley Callaghan (A);
    12Nov58; R224737.

CALMET, CAMILLE.

  Costes a fait pouet! pouet! SEE
    Yvain, Maurice.

CALVERTON, V. F.

  American literature at the crossroads.
    (University of Washington
    Chapbooks, no.48) © 7Mar31;
    A36748. Nina Melville Berdeshevoky
    (W); 16Jul58; R218275.

  Woman's coming of age, a symposium.
    Edited by V. F. Calverton and
    Samuel D. Schmalhausen. © 16Oct31;
    A44378. Nina Melville Berdeshevsky
    (W of V. F. Calverton);
    12Dec58; R226571.

  Woman's coming of age. SEE
    Schmalhausen, Samuel D., ed.

CAMPBELL, FLORENCE EVYLINN.

  Your days are numbered. © 24Aug31;
    A42018. Florence Evylinn Campbell
    (A); 26Aug58; R220878.

CAMPBELL, MRS. G. H. M. SEE
  Campbell, M. Elizabeth.

<pb id='232.png' n='1958_h2/A/1606' /> CAMPBELL, HARRIETTE R.

  The piper's lad. Illustrated by
    Lui Trugo. © 22Jul31; A39676.
    Alison Phillimore, Lesley Seyd &
    Margaret F. Campbell (C); 3Dec58;
    R225715.

CAMPBELL, M. ELIZABETH.

  English review grammar. SEE Smart,
    Walter Kay.

CAMPBELL, MARGARET F.

  The piper's lad. SEE Campbell,
    Harriette R.

CAMPBELL, MEREDITH F.

Infections of the kidney. (Harper's medical monographs) © 28Oct31; A43659. Meredith F. Campbell (A); 17Dec58; R226991.

CANADY, WILLIAM L.

  A plea for bad golf. SEE Beach,
    Rex.

CANBY, HENRY SEIDEL.

Classic Americans. © 24Sep31; A42649. Henry Seidel Canby (A); 21Nov58; R225380.

CANTOR, EDDIE.

  The rise of the Goldbergs. SEE
    Berg, Gertrude.

Yoo-Hoo, prosperity. The Eddie Cantor five-year plan, by Eddie Cantor and David Freedman. Illus. by C. Vernon Farrow. © 28Aug31; A42089. Eddie Cantor (A); 24Oct58; R223557.

CAPLAN, I. IRVING.

  My little manager. © 3Jul31;
    AA72840. I. Irving Caplan (A);
    1Dec58; R225134.

CARAMEL, BLANCHE, pseud. SEE
  Brion, Blanche.

CARGILL, OSCAR.

Drama and liturgy. © 1Oct30; A29075. Oscar Cargill (A); 23Sep58; R221620.

CARLSEN, CLARENCE J., tr.

  Why I am a Christian. SEE
    Hallesby, O.

CARNAHAN, DAVIS HIBART, joint author.

  Standard French grammar. SEE
    Fraser, W. H.

CARNAHAN, MABEL C.

  Standard French grammar. SEE
    Fraser, W. H.

CARNES, HUGH BYRON.

  Manual de correspondencia commercial
    espanola. © 7Jan31; A32758.
    Hugh Byron Carnes (A); 25Jul58;
    R218423.

CARNEY, MARY VANCE.

  Home study course in lip reading.
    By Mary Vance Carney, Mary Pauline
    Ralli and Kathryn Alling.
    © 13Apr31; AA70009. Kathryn
    Alling Ordman & Mary Pauline
    Ralli (PCW); 10Nov58; R224891.

CARR, JOHN DICKSON.

  Castle Skull. © 10Oct31; A43048.
    John Dickson Carr; 26Nov58;
    R225475.

CARSE, ROBERT.

  Siren song. © 26Sep30; A28603.
    Robert Carse (A); 3Jul58; R217207.

CARTER, JOHN FRANKLIN.

Scandal in the chancery. © 24Aug31; A41262. John Franklin Carter (A); 10Sep58; R221039.

CARY, LUCIAN.

Hard driver. (In Saturday evening post, Nov. 28, 1931) © 24Nov31; B134918. Lucian Cary (A); 25Nov58; R225032.

<pb id='233.png' />
  Only vulgar people quarrel. (In
    Colliers, Dec. 19, 1931)
    © 1Dec31; B136390. Lucian Cary
    (A); 2Dec58; R225400.

CARY, LUCIEN.

  The hideaway. (In Colliers, Oct. 24,
    1931) © 6Oct31; B129889.
    Lucien Cary (A); 7Oct58; R222284.

  One to the button. (In Collier's,
    Oct. 10, 1931) © 21Sep31;
    B128230. Lucien Cary (A);
    23Sep58; R221994.

  The practically perfect young man.
    (In Colliers, Sept. 19, 1931)
    © 31Aug31; B127290. Lucien Cary
    (A); 3Sep58; R220891.

CASEY, ROBERT J.

Cambodian quest. © 4Feb31; A34372. Robert J. Casey (A); 5Sep58; R220881.

CASPARIAN, HARRY.

Instructions; the law and approved forms for Virginia and West Virginia. Vol. 1-2. With the editorial staff of the Michie Co. © 24Feb31, A34505; 14Apr31, A36756. Michie Co. (PWH); 12Nov58; R224640-224639.

CASPARIAN, HARRY, ed. SEE

  Michie's digest of Virginia and
    West Virginia reports.

CASSERLEY, ANNE.

Brian of the mountain. With pictures by the author. © 15Oct31; A43331. Anne Casserley (A); 17Dec58; R226990.

CATHER, WILLA.

  My first novels (There were two)
    (In The Colophon, 1931, Pt.6)
    © 8Jun31; A38936. Edith Lewis
    and City Bank Farmers Trust Co.
    (E); 24Jul58; R218372.

  Poor Marty. (In The Atlantic
    monthly, May 1931) © 14Apr31;
    B111610. Edith Lewis & City
    Bank Farmers Trust Co. (E);
    12Nov58; R225120.

Shadows on the rock; letter to Governor Cross. (In The Saturday review of literature, Oct. 17, 1931) © 13Oct31; B131402. Edith Lewis and City Bank Farmers Trust Co. (E); 12Nov58; R225119.

CATHER, WILLA SIBERT.

  Shadows on the rock. © 1Aug31;
    A40644. Edith Lewis & City Bank
    Farmers Trust Co. (E); 12Nov58;
    R225125.

THE CATHOLIC ENCYCLOPAEDIC DICTIONARY.
  Editor: Donald Attwater. Prelim.
  ed., p. 1-30. © 15Jan31; A33195.
  Macmillan Co. (PCW); 23Dec58;
  R227390.

CATLIN, MRS. G. L.

  Martine and Michel, a story of the
    Jura Mountains, by Mildred Criss,
    pseud. Illustrated by E. A.
    Verpilleux. © 17Sep31; A42492.
    Mrs. G. L. Catlin (A); 18Sep58;
    R221543.

CATTKEY, DORA FANCHON RACETTE, joint
  author.

  Skipper Dee Skee. SEE Long, Marguerite
    Thomson.

CAUFFMAN, STANLEY HART.

  The sun sets red. © 10Oct30;
    A28892. Stanley Hart Cauffman
    (A); 11Aug58; R219187.

CAUMERY, pseud. SEE
  Languereau, Maurice.

CAUMERY, MAURICE, pseud. SEE
  Languereau, Maurice.

<pb id='234.png' /> CECIL, RUSSELL L., ed.

A text-book of medicine, by American authors. Associate editor: Foster Kennedy. 2d ed., rev. © 12Sep30; A27557. W. B. Saunders Co. (PCW); 10Jul58; R217747.

CENDRARS, BLAISE.

Panama; or, The adventures of my seven uncles. Translated from the French and Illustrated by John Dos Passos. 1st ed. © 21Jan31; A33296. John Dos Passos (A); 10Oct58; R222722.

CENTRAL HANOVER BANK & TRUST CO.,
  NEW YORK. TRUST DEPT.

  The world in the air. SEE Miller,
    Francis Trevelyn.

CHALMERS, STEPHEN.

The whispering ghost. (In Complete detective magazine, Jan. 1932) © 5Dec31; B144522. Helen Brereton Chalmers (W); 9Dec58; R226653.

CHAMBERS, ROBERT W.

War paint and rouge. © 25Sep31; A42656. William H. Chambers (C); 13Nov58; R225323.

CHAMBERS, WHITTAKER, tr.

Fifteen rabbits. SEE Salten, Felix.

  Samson and Delilah. SEE Salten,
    Felix.

CHAMBERS, WILLIAM H.

  War paint and rouge. SEE
    Chambers, Robert W.

CHAMPNEYS, ADELAIDE.

The longer day. © 12Nov30; A30675. Adelaide Champneys (A); 28Aug58; R220620.

CHANSLOR, ELAYNE HOPPER.

The flat. SEE Hopper, James.

  Girl and the quarterback. SEE
    Hopper, James.

  The mare queerless. SEE Hopper,
    James.

  Three million percent. SEE Hopper,
    James.

Tin foil. SEE Hopper, James.

CHAPMAN, CHANLER A.

The Antigone. SEE Sophocles.

CHAPMAN, GORDON, pseud. SEE
  Ullman, Allan.

CHAPMAN, JOHN.

When is a playwright? (In The Elks magazine, Oct. 1930) © 1Oct30; A5-23849. John Chapman (A); 29Sep58; R222182.

CHAPMAN, JOHN JAY, tr.

The Antigone. SEE Sophocles.

CHAPMAN, MARGARET STORM JAMESON.

  The decline of Merrie England, by
    Storm Jameson. © 18Sep30,
    AI-14327; 29Oct30, A30681.
    Margaret Storm Jameson Chapman
    (A); 25Aug58; R220486.

CHAPPELL, GEORGE S., JR.

The gardener's friend and other pests. SEE Chappell, George Shepard.

CHAPPELL, GEORGE SHEPARD.

  The gardener's friend and other
    pests, by George Shepard Chappell
    and Ridgely Hunt. Illustrated by
    H. W. Haenigsen. © 15Oct31;
    A43447. George S. Chappell, Jr.
    (C); 21Oct58; R223408.

  Through the alimentary canal with
    gun and camera. With an introd.
    by Robert Benchley. Illustrated
    by O. Soglow. © 3Nov30; A30773.
    George S. Chappell, Jr. (c);
    29Oct58; R224154.

<pb id='235.png' n='1958_h2/A/1607' /> CHAPPELL, GEORGE SHEPARD, JR.

Through the alimentary canal with gun and camera. SEE Chappell, George Shepard.

CHARTERIS, LESLIE.

  Wanted for murder. (Pub. abroad
    as Alias the Saint) © 7May31,
    AI-15264; 20Aug31, A42188.
    Leslie Charteris (A); 26Aug58;
    R220632.

  Wanted for murder. (Pub. abroad
    as Featuring the Saint)
    © 25Feb31, AI-15000; 20Aug31,
    A42188. Leslie Charteris (A);
    26Aug58; R220631.

CHARTERS, WALLACE WERRETT, Joint author.

  Essential language habits. SEE
    Cowan, Esther Marshall.

CHASE MANHATTAN BANK, NEW YORK.

  Bisnark and Mussolini. SEE Sherrill,
    Charles H.

CHATER, ARTHUR G., tr.

The son avenger. SEE Undset, Slgrid.

  The wild orchid. SEE Undset,
    Sigrid.

CHATTERTON, E. KEBLE.

England's greatest statesman. © 23Oct30; A29630. E. Keble Chatterton (A); 22Aug58; R220331.

CHAUCER, GEOFFREY.

Canterbury tales, together with a version in modern English verse by William Van Wyck, Illustrated by Rockwell Kent. Vol.1-2. © 26Sep30; A28761. Crown Publishers, Inc. (PWH of V. Van Wyck); 19Sep58; R222797.

CHAYER, MARY ELLA.

  School nursing. With an introd. by
    Katharine Tucker. © 18Sep31;
    A41785. Mary Ella Chayer (A);
    28Nov58; R225623.

CHEMICAL CORN EXCHANGE, NEW YORK.

  Jinglebob. SEE Rollins, Philip
    Ashton.

CHESTERTON, G. K., illus.

  The man who made gold. SEE Belloc,
    Hilalre.

CHESTERTON, GILBERT K.

The green man. (In Ladies' home journal, Nov. 1930) © 21Oct30; B90758. Oliver Chesterton (NK); 16Oct58; R223201.

CHESTERTON, OLIVER.

  The green man. SEE Chesterton,
    Gilbert K.

CHIDSEY, DONALD BARR.

  Sir Walter Raleigh, that damned
    upstart. © 10Sep31; A43073.
    Donald Barr Chidsey (A); 26Sep58;
    R221868.

CHILD, MAUDE PARKER. SEE Pavenstedt,
  Maude Parker Child.

CHILDREN'S DAY HELPER. No. 17. Words by Elsie Duncan Yale. Music by G. W. Payn, pseud, of C. Austin Miles, Carolyn R. Freeman and Haldor Lillenas. © 20Apr31; AA67291. Rodeheaver Co. (PWH); 14Aug58; R220276.

CHILDS, ELIZABETH HEBERT.

The fun of saving up thrift bank book. Ten dollar ed. © on revisions; 16Oct31; AA88212. Platt & Munk Co., Inc. (PWH); 20Oct58; R223273.

CHILDS, JOHN L.

Education and the philosophy of experimentalism. With a foreword by William Heard Kllpatrick. (The Century studies in education) © 26Jun31; A39140. John L. Childs (A); 8Jul58; R217241.

<pb id='236.png' /> CHITWOOD, OLIVER PERRY.

  A history of colonial America.
    (Harper's historical aeries)
    © 15Jul31; A39498. Oliver Perry
    Chitwood (A); 12Nov58; R225104.

CHOPIN, FREDERIC FRANCOIS.

Le piano revele par le film; 8. etude, op.25, revision avec les doigtes et les signes de liaison de Louta Nouneberg. Interpretee par Wilhelm Backhaus. © 10Oct30; AF10498. Louta Nouneberg (A); 11Jul58; R218602.

CHRISTIANSEN, JULIUS CHRISTIAN.

Exentric brooder houses. © 27Oct31; AA81320. J. Christiansen (A); 8Dec58; R226192.

CHRISTIE, CLARENCE V.

Electrical engineering: the theory and characteristics of electrical circuits and machinery. 4th ed. © 27Jun31; A39145. Clarence V. Christie (A); 24Sep58; R221742.

CHRISTIE, MAY. SEE Mazzavini, May
  Christie.

CHRISTMAS SUGGESTION BOOK. No.5.
  H. von Berge, editor. © 15Jul31;
  AA75939. Lorenz Pub. Co. (PWH);
  24Nov58; R225784.

CHRISTMAS TREASURY. No.42.
  H. von Berge, editor. © 22Jul31;
  AA75941. Lorenz Pub. Co. (PWH);
  24Nov58; R225783.

CHRYSTIE, T. LUDLOW.

  The path to peace. SEE Butler,
    Nicholas Murray.

CHURCHILL, SIR WINSTON SPENCER.

  Dictatorship on trial. SEE Forst-Battaglla,
    Otto, ed.

CICERO, MARCUS TULLIUS.

  Selected letters. Edited by Hubert
    McNeill Poteat. Rev. © 26Jan71;
    A33550. Hubert McNeill Poteat
    (A); 6Nov58; R224125.

CITY BANK FARMERS TRUST CO., NEW YORK.

My first novels. SEE Cather, Willa.

Poor Marty. SEE Cather, Willa.

  Shadows on the rock. SEE Cather,
    Willa.

  Shadows on the rock. SEE Cather,
    Willa Sibert.

CIVORU, SOPHIA.

  The rise of the Goldbergs. SEE
    Berg, Gertrude.

CLARK, DOROTHY PARK, joint author.

  Stage guide for young Handel of
    Hanover. SEE Boswell, Helen.

CLARK, EDWARD W., 3d.

  Concrete plain and reinforced. SEE
    Taylor, Frederick W.

CLARK, FLORENCE S.

  Songs of the campus. SEE Clark,
    Kenneth S., ed.

CLARK, GORDON H., ed.

Readings In ethics. Gordon H. Clark and T. V. Smith, editors. © 6Jan31; A34077. Gordon H. Clark & T. V. Smith (A); 8Jul58; R217240.

CLARK, HAZEL DAVIS.

  The golden book of faith. SEE
    Clark, Thomas Curtis, comp.

CLARK, JANET H.

A text-book of physiology for medical students and physicians. SEE Howell, William H.

CLARK, KENNETH S., ed.

Songs of the campus. © 18Dec31; A46517. Florence S. Clark (W); 19Dec58; R226778.

<pb id='237.png' /> CLARK, MARY CECILIA.

  Gems of thought from St. Margaret
    Mary. SEE Margaret Mary, Saint.

CLARK, MARY VALUE.

  Gods and little fishes. SEE
    Dennis, Alfred Pearce.

CLARK, ROY BENJAMIN.

  William Oifford, Tory satirist,
    critic and editor. © 5Nov38;
    A30402. Roy B. Clark (A); 23Oct58;
    R223816.

CLARK, THOMAS CURTIS, comp.

The golden book of faith, an anthology of verse. © 28Apr31; A37107. Hazel Davis Clark (W); 7Jul58; R217598.

CLARK, W. D.

  The H. & M. collection of Christmas
    carols and choruses. © 5Nov31;
    A46051. Schmitt, Hall & McCreary
    Co. (PWH); 19Dec58; R227278.

CLARK, WM. L., JR.

Handbook of the Law of contracts. 4th ed., by Archibald H. Throckmorton and Alvin C. Brightman. (Hornbook series) © 8May31; A37869. West Pub. Co. (PWH); 3Jul58; R217531.

CLEMENS, CLARA. SEE Samossoud, Clara
  Clemens.

CLEMENS, SAMUEL L.

  My father, Mark Twain. SEE
    Samossoud, Clara Clemens.

CLEMENTS, COLIN, joint author.

Tammany haul. SEE Clements, Florence Ryerson.

CLEMENTS, FLORENCE RYERSON.

Tammany haul, by Florence Ryerson and Colin Clements. (In Woman's world magazine, Nov. 1931) © 29Sep31; A5-35107. Florence Ryerson Clements (A); 1Oct58; R222349.

CLINTON, DANIEL.

Thunder below, by Thomas Rourke, pseud. © 31Aug31; A42323. Daniel Clinton (A); 6Nov58; R224625.

COBB, IRVIN S.

  The sun shines bright. (In Hearst's
    international-cosmopolitan,
    Apr. 1931) © 10Mar31; B108204.
    Elisabeth Cobb Rogers (C); 3Oct58;
    R222162.

The sun shines bright. (In Hearst's international-cosmopolitan magazine, Apr. 1931) © 10Mar31; B108204. Laura Baker Cobb (W), Elisabeth Cobb Rogers (C); 15Oct58; R223586.

COBB, LAURA BAKER.

  The sun shines bright. SEE Cobb,
    Irvin S.

COBB, STANWOOD, ed.

  The wisdon of Wu Ming Fu. SEE
    Wu Ming Fu.

COBLENTZ, STANTON A.

  The answer of the ages. © 4Sep31;
    A42209. Stanton A. Coblentz (A);
    8Sep58; R220874.

  Shadows on a wall. © 27Sep30;
    A33177. Stanton A. Coblentz (A);
    8Sep58; R220873.

COBURN, WALT.

  Ace of diamonds. (In Action stories,
    Apr. 1931) © 1Mar31; B110579.
    Walt Coburn (A); 25Jul58; R218492.

  Barb wire. © 1Sep31; A41430.
    Walt Coburn (A); 2Sep58; R220548.

  The black maverick. (In Lariat
    story magazine. Apr. 1931)
    © 15Mar31; B108974. Walt Coburn
    (A); 25Jul58; R218487.

<pb id='238.png' n='1958_h2/A/1608' />
  Cows don't have wings. (In Lariat
    story magazine, May 1931)
    © 15Apr31; B113853. Walt Coburn
    (A); 25Jul58; R218486.

  Firebrand. (In Action stories, Nov.
    1931) © 1Oct31; B130081. Walt
    Coburn (A); 1Oct58; R222032.

Free rangers. (In Western story magazine, Aug. 8, 1931) © 31Jul31; B122387. Walt Coburn (A); 25Aug58; R219792.

  Gun hands. (In Action stories, Feb.
    1931) © 1Jan31; B99297. Walt
    Coburn (A); 25Jul58; R218490.

  Gunman's legion. (In Action stories,
    Jan. 1931) © 1Dec30; B95762.
    Walt Coburn (A); 25Jul58;
    R218488.

  The killer. (In Action stories,
    Sept. 1931) © 1Aug31; B123836.
    Walt Coburn (A); 25Aug58; R219793.

  The long law. (In Action stories,
    Dec. 1931) © 1Nov31; B133329.
    Walt Coburn (A); 1Dec58; R225603.

  Masked men. (In Action stories,
    May 1931) © 1Apr31; B111869.
    Walt Coburn (A); 25Jul58;
    R218493.

  Outlaw. (In Action stories, Aug.
    1931) © 1Jul31; B121338. Walt
    Coburn (A); 25Aug58; R219791.

  Poker face. (In North west stories,
    Jan. 1931) © 8Dec30; B95766.
    Walt Coburn (A); 25Jul58;
    R218489.

  Pronto. (In Action stories, June
    1931) © 1May31; B113860.
    Walt Coburn (A); 25Jul58; R218494.

  The ramrod. (In Western story
    magazine, Oct. 3, 1931)
    © 25Sep31; B129153. Walt Coburn
    (A); 1Oct58; R222031.

  Rusty rides alone. (In Action
    stories, Mar. 1931) © 1Feb31;
    B103312. Walt Coburn (A);
    25Jul58; R218491.

  Senor Spy. (In Action stories,
    Oct. 1931) © 1Sep31; B126495.
    Walt Coburn (A); 2Sep58; R220549.

  The Texas hellion. (In Action
    stories, July 1931) © 1Jun31;
    B116669. Walt Coburn (A);
    25Jul58; R218495.

  Wanted men. (In Street & Smith's
    Western story magazine, May 30,
    1931) © 22May31; B115632. Walt
    Coburn (A); 11Aug58; R219183.

COCHRAN, RUTH GILBERT.

  Kay Dale in A lady of high degree,
    by Celia Gilbert, pseud.
    Illustrated by Richard H. Rodgers.
    © 4May31; A37558. Celia Gilbert
    (Ruth Gilbert Cochran) (A);
    29Dec58; R226954.

  Kay Dale in South Sea siren, by
    Celia Gilbert, pseud. Illustrated
    by Richard H. Rodgers. © 11May31;
    A37557. Celia Gilbert (Ruth
    Gilbert Cochran) (A); 29Dec58;
    R226953.

COCHRANE, NORMA.

  The education of self. SEE Dubois,
    Paul.

COCHRANE, NORMA. SEE

  Concise standard dictionary of the
    English language.

  The Vest pocket standard dictionary
    of the English language.

COHEN, OCTAVUS ROY.

  Cameos. © 31Jul31; A39822.
    Octavus Roy Cohen (A); 30Sep58;
    R222011.

COLBY, CHARLES C.

  Economic geography for secondary
    schools, by Charles C. Colby and
    Alice Foster. © 2Jan31; A34036.
    Charles C. Colby & Alice Foster
    (A); 23Sep58; R221627.

<pb id='239.png' /> COLCORD, JOANNA C.

Community planning in unemployment emergencies. © 27Dec30; A31863. Russell Sage Foundation (PWH); 10Nov58; R224878.

COLE (M. M.) PUB. CO.

  Mac and Bob's W. L. S. book of songs.
    SEE McFarland, Lester.

COLE (M. M.) PUB. HOUSE.

  Cole's twelve-bass piano accordion.
    SEE Reitler, Mern.

  Ukulele course. SEE Goodwin,
    Lucy J.

COLEMAN, SATIS N.

  The drum book. (Creative music
    series) © 15Jan31; A32918.
    Satis N. Coleman (A); 26Sep58;
    R221865.

The gingerbread man and other songs of the children's story book friends. Illustrated by Ruth Hambridge. © 29Oct31; A45087. Satis N. Coleman (A); 4Dec58; R225746.

COLEMEN, MRS. JOHN R.

  Anne marries again. SEE Hauck,
    Louise Platt.

COLLINS, DOROTHY EDITH.

  The man who made gold. SEE Belloc,
    Hilaire.

COLLINSON, WILSON.

  Blonde baby. © 20Feb31; A34991.
    Anzonetta Collison Atherton (W);
    3Nov58; R224022.

  Expensive women. © 7Aug31;
    A42004. Anzonetta Collison
    Atherton (W); 3Nov58; R224024.

  Woman in purple pajamas, by Willis
    Kent, pseud. © 27Feb31; A36488.
    Anzonetta Atherton (W); 3Nov58;
    R224023.

COLTER, ELI.

  Bad man's trail. © 20Oct31;
    A44380. Eli Colter (A); 21Oct58;
    R223176.

COLUM, PADRAIC.

Cross roads in Ireland. © 11Nov30; A29969. Padraic Colum (A); 17Sep58; R221294.

COLUMBIA UNIVERSITY PRESS.

  A tale of a tub. SEE Swift,
    Jonathan.

COLVER, ALICE ROSS.

  Hilltop house. © 3Oct30; A28830.
    Alice Ross Colver (A); 2Jul58;
    R217199.

COMFORT, WILL LEVINGTON.

  Apache. © 20Jan31; A32969.
    CharLee Flanagan (C); 17Dec58;
    R226923.

CONCISE STANDARD DICTIONARY OF THE ENGLISH LANGUAGE. Abridged from the Funk & Wagnalls new Standard dictionary of the English language by James C. Fernald. A new ed., carefully rev. by Frank H. Vizetelly. © 30Sep30; A29360. Norma Cochrane (C); 19Aug58; R219601.

CONNECTICUT AND ATLANTIC REPORTER DIGEST, covering all cases reported in Connecticut reports and Atlantic reporter. Vol.15-29. © 13May31, A37876; 14May31, A37877-37878; 8Jun31, A39426-39428; 30Jun31, A39429-39431; 29Aug31, A41801-41803; 30Sep31, A44031-44033. West Pub. Co. (PWH); 3Jul58; R217446-217454; 6Oct58, R222387-222392.

CONNECTICUT AND ATLANTIC REPORTER
  DIGEST. May 1931 cumulative
  pamphlet. © 23May31; A37848.
  West Pub. Co. (PWH); 3Jul58; R217511.

<pb id='240.png' />
CONNECTICUT AND ATLANTIC REPORTER
  DIGEST. July 1931 cumulative
  pamphlet. © 31Jul31; A40789.
  West Pub. Co. (PWH); 6Oct58;
  R222386.

CONNECTICUT BANK & TRUST CO., HARTFORD.

Gods. SEE Redfield, Bessie G., comp.

CONNELL, LOUISE FOX.

Racing final. SEE Connell, Richard.

CONNELL, RICHARD.

  Racing final. (In Collier's, Sept.
    5, 1931) © 14Aug31; B124251.
    Louise Fox Connell (W); 15Aug58;
    R219623.

CONNELLY, VERNIE E.

Alimony queens. © 25Jun31; A39133. Vernie E. Connelly (A); 29Dec58; R226979.

CONNER, MARION SMITH.

  Lazy Bear Lane. SEE Smith,
    Thorne.

Turnabout. SEE Smith, Thorne.

CONNOLLY, BRENDA E.

  Bustin' through. SEE Connolly,
    James B.

  The pilot boat. SEE Connolly,
    James B.

  The quest of Sir Thomas. SEE
    Connolly, James B.

CONNOLLY, JAMES B.

  Bustin' through. (In Collier's,
    Oct. 4, 1930) © 15Sep30;
    B86933. Brenda E. Connolly (C);
    14Aug58; R219379.

  The pilot boat. (In Collier's.
    Sept. 20, 1930) © 2Sep30;
    B86026. Brenda E. Connolly (C);
    14Aug58; R219378.

  The quest of Sir Thomas. (In The
    Elks magazine, Sept. 1930)
    © 1Sep30; B83969. Brenda E. Connolly
    (C); 14Aug58; R219377.

CONOVER, ALIDA, joint author.

  The busy book. SEE Bartlett, Floy
    Little.

CONS, JEANNETTE CURTIS.

  Anthologie litteraire de la Rennaissance
    Francaise. SEE Cons, Louis.

CONS, LOUIS.

  Anthologie litteraire de la
    Renaissance Francaise. © 13Aug31;
    A42222. Jeannette Curtis Cons (W);
    28Aug58; R220642.

COOK, HARL.

  Ambrose Holt & family. SEE
    Glaspell, Susan.

COOK, SIRIUS C.

  Ambrose Holt & family. SEE Glaspell,
    Susan.

COOLEY, ROGER W.

Illustrative cases on persons and domestic relations. 2d ed. by Joseph W. Madden. (Hornbook case series) © 13Jul31; A40805. West Pub. Co. (PWH); 6Oct58; R222464.

COOLEY, ROGER WILLIAM.

Illustrative cases on insurance. 2d ed. by William R. Vance. (Hornbook case series) © 29Jun31; A44765. West Pub. Co. (PWH); 3Jul58; R217540.

COOLIDGE, COIT.

Maverick makers. SEE Coolidge, Dane

COOLIDGE, DANE.

Maverick makers. © 13Jan31; A32971. Coit Coolidge (NK); 17Dec58; R226922.

<pb id='241.png' n='1958_h2/A/1609' /> COOLIDGE, EMMA DOWNING.

  Descendants of John and Mary
    Coolidge of Watertown, Massachusetts,
    1630. © 17Dec30;
    A32503. Emma Downing Coolidge
    (A); 11Aug58; R219343.

COOPER, JAMES FENIMORE.

The American Democrat. Edited with an introd. by H. L. Hencken. © on introd. & corrections; 14Aug31; A42595. Alfred A. Knopf, Inc. (PWH); 12Nov58; R225128.

COOPER, LENNA FRANCES.

Nutrition in health and disease for nurses, by Lenna F. Cooper, Edith M. Barber, Helen S. Mitchell. 4th ed. rev. (Lippincott's nursing manuals) © 8Jul31; A41371. Edith M. Barber, Helen S. Mitchell & Lenna F. Cooper (A); 26Aug58; R220503.

COOPER, WINIFRED, tr.

  From day to day. SEE Goetel,
    Ferdynand.

COREY, CARYL MOON.

  The arrow of Tee May. SEE Moon,
    Grace.

CORNING, KYLE, pseud. SEE Gardner,
  Erle Stanley.

CORPUS JURIS. 1931 annotations to
  Corpus juris-Cyc system. Edited
  by William Howard Buchanan, under
  the supervision of William Mack,
  editor-in-chief. © 17Apr31;
  A38425. American Law Book Co.
  (PWH); 3Jul58; R217537.

CORPUS JURIS. Vol.53. Edited by
  William Mack and Donald J. Kiser.
  © 10Jun31; A39447. American Law
  Book Co. (PWH); 3Jul58; R217548.

CORPUS JURIS. Vol.54. Edited by
  William Mack and Donald J. Kiser.
  © 23Jul31; A40811. American Law
  Book Co. (PWH); 6Oct58; R222434.

CORROY, LOUISE. SEE
  Betz, Louise Corroy.

CORTOT, ALFRED.

  Rational principles of pianoforte
    technique. Translated by
    R. Le Roy Metaxas. © 10Oct30;
    AF9319. Editions Salabert & Cie
    (PWH); 7Aug58; R219101.

COSMA, MOTHER.

Bible history. SEE Johnson, George.

COUES, WILLIAM PEARCE.

  Famous American athletes of today.
    SEE Johnston, Charles Haven Ladd.

COUNTS, GEORGE S., tr.

  New Russia's primer. SEE Marshak,
    Ilia Iakovlivich.

COVER, FRANCES MALTBY.

  The dimity sweetheart. SEE Maltby,
    Frances Goggin.

COWAN, ESTHER MARSHALL.

Essential language habits; teachers' manual to accompany A new edition in color, by Esther Marshall Cowan, Wallace Werrett Charters and Annette Betz. © on pref., additional p.XVII-XXX & changes; 8Oct30; A29320. Esther Marshall Cowan (A); 1Oct58; R222145.

COX, ANTHONY BERKELEY.

  Malice aforethought. By Francis
    Iles, pseud. © 23Feb31, AI-14969;
    3Jun31, A40022. Anthony Berkeley
    Cox (A); 20Oct58; R223292.

<pb id='242.png' />
  Top story murder, by Anthony
    Berkeley, pseud. (Pub. abroad as
    Top storey murder) © 7May31,
    AI-15265; 2Nov31, A44981.
    Anthony Berkeley Cox (A);
    17Nov58; R225061.

COZENS, FREDERICK W., joint author.

Tests and measurements in physical education. SEE Bovard, John F.

COZZENS, JAMES GOULD.

  Farewell to Cuba. (In Scribner's,
    Nov. 1931) © 16Oct31; B133106.
    James Gould Cozzens (A); 17Oct58;
    R224583.

  The way to go home. (In Saturday
    evening post, Dec. 26, 1931)
    © 22Dec31; B138507. James Gould
    Cozzens (A); 24Dec58; R226910.

CRAIFHILL, G. BOWDOIN.
  Wild wind. SEE Bailey, Temple.

CRANDALL, MRS. PERRY D. SEE

The Boy scout's book of true adventure.

CRAVEN, THOMAS.

  Men of art. © 30Mar31; A35566.
    Thomas Craven (A); 30Jul58;
    R218773.

CRAWFORD, FINLA GOFF.

State government. © 22Sep31; A41882. Finla Goff Crawford (A); 23Sep58; R221632.

CRAWFORD, JOAN.

  Fiddlers' Green. SEE Wetjen, Albert
    Richard.

CRAWLEY, RAYBURN, pseud.

Chattering gods, by Rayburn Crawley, pseud. of Laura Spencer Porter Pope and Dorothy Giles. © 6May31; A38004. Dorothy Giles (A) & Harry L. Bowlby, Joan Donaldson Manning & W. Hoffman Benjamin (E); 7Jul58; R217600.

CREIGHTON, BASIL, tr.

Grand hotel. SEE Baum, Vlckl.

CRETIN, MADELEINE ADAM.

En derive. SEE Cretin, Roger.

CRETIN, ROGER.

En derive, par Roger Vercel, pseud, of Roger Crentin (i.e. Cretin) © 12Oct31; AF14759. Mme Roger Vercel, nee Madeleine Adam (W); 3Nov58; R224102.

CRETIN, MME ROGER. SEE Cretin,
  Madeleine Adam.

CREWE-JONES, FLORENCE, tr.

  The snake of Luvercy. SEE Renard,
    Maurice.

CRISS, MILDRED, pseud. SEE Catlin,
  Mrs. G. L.

CROCKER, SABIN, joint author.

  Piping handbook. SEE Walker,
    James Herbert.

CROCKETT, DANIEL W.

  Oklahoma digest and statute service.
    Vol.10, no.2, May 1931. Assisted
    by the publisher's editorial
    staff. © 29May31; A37921.
    Bobbs-Merrill Co. (PWH); 3Jul58;
    R217532.

  Oklahoma digest and statute service.
    Vol.10, no.3, Sept. 1931.
    Assisted by the publisher's
    editorial staff. © 26Sep31;
    A43166. Bobbs-Merrill Co. (PWH);
    6Oct58; R222526.

CROCKETT, DANIEL W. SEE
  Indiana three In one service.

<pb id='243.png' /> CROCKETT, DANIEL WOOLSEY.

Supplement to Oklahoma digest annotated; a digest of all Oklahoma decisions of the Oklahoma Supreme Court, the Oklahoma Criminal Court of Appeals and the Federal courts from October 1, 1926 to January 1, 1931. Vol.8. © 24Jun31; A40150. Bobbs-Merrill Cc. (PWH); 3Jul58; R217541.

CROFTS, FREEMAN WILLS.

Mystery in the English Channel. (Pub. abroad as Mystery in the channel) © 30Mar31, AI-15127; 8Jul31, A39341. Mary Bellas Crofts (W); 4Aug58; R218944.

CROFTS, MARY BELLAS.

  Mystery in the English Channel. SEE
    Crofts, Freeman Wills.

CRONIN, A. J.

  Hatter's castle. © 17Jul31;
    A40450. A. J. Cronin (A); 17Jul58;
    R218213.

CRONIN, CHARLES.

  The Christian priesthood; or, The
    sacrament of order. Introd. by
    Joseph P. Donovan. © 20Dec30,
    AI-14743; 26May31, A38492.
    Charles Cronin (A); 26Nov58;
    R226189.

CROS, ROGER, joint author.

  Nineteenth century French verse.
    SEE Galland, Joseph S.

CROSBY, PERCY.

A cartoonist's philosophy. © 17Sep31; A42451. Percy Crosby (A); 27Oct58; R223333.

CROSS, TOM PEETE.

  Good reading for high schools.
    Vol.3: American writers. By
    Tom Peete Cross, Reed Smith and
    Elmer C. Stauffer. © on new
    matter; 12Jan31; A34073. Elmer
    C. Stauffer (A); 23Sep58; R221628.

THE CROSS WORD PUZZLE BOOK. 21st series. By Prosper Buranelli, F. Gregory Hartswick and Margaret Petherbridge. © 27Aug31; A42078. Margaret Petherbridge, Prosper Buranelli & F. Gregory Hartswick (A); 24Oct58; R223556.

CROUSE, RUSSEL.

It seems like yesterday. © 30Nov31; A46233. Russel Crouse (A); 9Dec58; R226652.

CROWELL (THOMAS Y.) CO.

  Lives of girls who became famous.
    SEE Bolton, Sarah K.

  Roget's international thesaurus of
    English words and phrases. SEE
    Mawson, Christopher Orlando
    Sylvester.

CROWN PUBLISHERS, INC.

  Canterbury tales. SEE Chaucer,
    Geoffrey.

  Complete works. SEE Villon,
    Francois.

CROWTHER, MARY OWENS.

The blue book of social and friendly correspondence. © 27Nov31; A46194. Mary Owens Crowther (A); 1Dec58; R225570.

CRUMP, IRVING.

  Craig of the Cloud Patrol.
    Illustrated by William Heaslip.
    © 12Jan31; A33228. Irving
    Crump (A); 29Dec58; R226933.

CULKIN, WILLIAM E.

North Shore place names. © 1Jul31; A39209. St. Louis County Historical Society (PWH); 10Nov58; R224882.

<pb id='244.png' n='1958_h2/A/1610' /> CUMMINGS, E. E.

[* graphic symbol *] (Viva) Seventy new poems. © 16Oct31; A44379. E. E. Cummings (A); 22Oct58; R223247.

CUNNINGHAM, FLOYD F., joint author.

Laboratory manual in the geography of South America. SEE Jones, Clarence F.

CURLE, RICHARD.

Collecting American first editions. © 8Dec30; A32231. Richard Curle (A); 28Aug58; R220623.

CURME, GEORGE O.

Syntax; a grammar of the English language. Vol.3. © 8May31; A38209. Gertrude C. Bragg (C); 6Nov58; R224134.

CURRENT DIGEST (AMERICAN DIGEST SYSTEM) Vol.6. January 1, 1931 to May 31, 1931. Prepared and edited by the editorial staff of the American Digest System. © 21Jul31, A40795. West Pub. Co. (PWH); 6Oct58; R222367.

CURTIS, ARTHUR HALE.

A text book of gynecology. With illus. chiefly by Tom Jones. © 9Sep30; A28257. Mrs. Arthur Hale Curtis (W); 17Jul58; R217986.

CURTIS, MRS. ARTHUR HALE.

  A text book of gynecology. SEE
    Curtis, Arthur Hale.

CUSHING, FRANK HAMILTON, comp. & tr.

  Zuni folk tales; with a foreword by
    J. W. Powell and an introd. by
    Mary Austin. © on introd.;
    23Jan31; A33687. Alfred A. Knopf,
    Inc. (PWH); 30Dec58; R227006.

CUTHRELL, FAITH BALDWIN.

  Make-believe, by Faith Baldwin.
    © 12Sep30; A27582. Faith Baldwin
    Cuthrell (A); 7Jul58; R218892.

CUTHRELL, FAITH BALDWIN. SEE ALSO
  Baldwin, Faith.

CUTLER, CARL C.

Greyhounds of the sea. With a foreword by Charles Francis Adams. © 7Nov30; A31031. Carl C. Cutler (A); 23Jul58; R218422.

CUTTER, RICHARD D., joint author.

  The dissection of the rat. SEE
    Starks, Edwin C.

CUVILLIER, MARIE MIKHAILOVA-. SEE
  Rolland, Marie Mikhailova-Cuvillier.

CYCLOPEDIA OF LAW AND PROCEDURE.
  1931 annotations. Edited by William
  Howard Buchanan, under the supervision
  of William Mack, editor-in-chief.
  © 4May31; A38424. American
  Law Book Co. (PWH); 3Jul58;
  R217536.

CYON, MRS. F. LAFITTE-. SEE Lafitte-Cyon,
  Mrs. F.

DAGUE, WILLIAM E.

  The lady of Godey's, Sarah Josepha
    Hale. SEE Finley, Ruth E.

DAKIN, FLORENCE.

Simplified nursing. 3d ed. © 23Nov31; A46715. Florence Dakin (A); 22Dec58; R227611.

DALE, EDWARD EVERETT.

Frontier trails, the autobiography of Frank M. Canton. © 8Oct30; A28771. Edward Everett Dale (A); 15Sep58; R221351.

<pb id='245.png' /> D'ALMERAS, HENRI. SEE Almeras, Henri d'.

DANE, CLEMENCE, pseud. SEE
  Ashton, Winifred.

DANIEL, HAWTHORNE.

Peggy of Old Annapolis. Illustrated by R. A. Hoeberg. © 29Sep30; A28676. Hawthorne Daniel (A); 30Jul58; R218931.

DANIELSON, FANNIE HURST.

The Russian goose hangs high. (In Saturday evening post, Nov. 7, 1931) © 3Nov31; B132841. Fannie Hurst Danielson (A); 4Nov58; R224274.

DANTE ALIGHIERI.

The Divine comedy. Translated by Jefferson Butler Fletcher. © 29Sep31; A42726. Malcolm C. Law (E of J. B. Fletcher); 25Nov58; R225039.

DARBY, ADA CLAIRE.

Sometimes Jenny Wren. With four illus. in black-and-white and four in colors by Grace Gilkison. © 30Jul31; A40640. Marguerite Marney Letts (E); 9Sep58; R221084.

DASSLER, C. F. W.

A treatise on the civil code of Kansas pleading and practice in civil actions and proceedings. 2d ed. © 20Jul31; A40808. Vernon Law Book Co. (PWH); 6Oct58; R222455.

DAUDET, JULIE ALLARD.

  Fantomes et vivants. SEE Daudet,
    Leon.

DAUDET, LEON.

  Fantomes et vivants. © 15Jul31;
    AF14318. Mme Leon Daudet, nee
    Julie Allard (W); 18Aug58;
    R219681.

DAUDET, MME LEON. SEE
  Daudet, Julie Allard.

DAUGHERTY, JAMES, illus.

  The bold dragoon. SEE Irving,
    Washington.

D'AULAIRE, EDGAR PARIN. SEE
  Aulaire, Edgar Parin d'.

D'AULAIRE, INGRI PARIN. SEE
  Aulaire, Ingri Parin d'.

DAVENPORT, SAMUEL R.

Dog of war. © 1Feb31; AA91846. Wetmore Declamation Bureau (PWH); 20Nov58; R225363.

DAVID, ROBERT B.

Malcolm Campbell, sheriff. © 27Oct31; A44744. Robert B. David (A); 29Oct58; R223562.

DAVIES, MARGARET KENNEDY, LADY.

Return I dare not, by Margaret Kennedy. © 28Sep31, AI-15767; 5Nov31, A44979. Lady Margaret Kennedy Davies (A); 19Nov58; R225059.

DAVIES, PETER LLEWLYN.

  The entrancing life. SEE Barrie,
    Sir James Matthew, Bart.

  Works. SEE Barrie, Sir James
    Matthew, Bart.

DAVIS, ELMER.

Morals for moderns. © 15Oct30; A29464. Mrs. Elmer Davis (W); 30Jul58; R218908.

DAVIS, MRS. ELMER.

  Morals for moderns. SEE Davis,
    Elmer.

<pb id='246.png' /> DAVIS, EMILY CLEVELAND.

  Ancient Americans. © 30Oct31;
    A45003. Emily Cleveland Davis
    (A); 28Nov58; R225588.

DAVIS, H. L.

  Extra gang. (In The American mercury,
    Oct. 1931) © 25Sep31;
    B129381. H. L. Davis (A);
    25Nov58; R224894.

DAVIS, MADGE LEE.

  The caliph of Bagdad. SEE
    Davis, Robert H.

DAVIS, ROBERT H.

The caliph of Bagdad, being Arabian nights flashes of the life, letters and work of O. Henry, William Sydney Porter, by Robert H. Davis and Arthur B. Maurice. © 5Jun31; A37772. Madge Lee Davis (W) & Flora M. Holly (E of Arthur B. Maurice); 13Nov58; R225324.

DAVIS, RUPERT HART-. SEE Hart-Davis,
  Rupert.

DAWSON, ELMER A., pseud.

  Buck's home run drive; or, The
    Chester boys winning against odds,
    by Elmer A. Dawson, pseud. of
    Harriet S. Adams and Edna C
    Squier. Illustrated by Walter S.
    Rogers. © 28Jan31; A33490.
    Harriet S. Adams & Edna C. Squier
    (A); 29Dec58; R226935.

  Garry Grayson's double signals; or,
    Vanquishing the football plotters,
    by Elmer A. Dawson, pseud. of
    Harriet S. Adams and Edna C.
    Squier. Illustrated by Walter S.
    Rogers. © 11May31; A38122.
    Harriet S. Adams & Edna C. Squier
    (A); 29Dec58; R226960.

DAWSON, MARY, ed.

  Old Testament narratives. Selected
    and edited by Mary Dawson and Roy
    L. French. © 17Sep31; A41778.
    Roy L. French (A); 6Nov58; R224147.

DE BAEZA, LUIS.

  Brighter Spanish. © 6Feb31;
    A34239. Luis De Baeza (A);
    25Jul58; R218424.

DE BATTAGLIA, OTTO FORST. SEE
  Forst-Battaglia, Otto.

DE BOISSIEU, R. P. SEE Boissieu,
  R. P. de.

DEEPING, MAUDE PHYLLIS.

  Stories of love, courage and compassion.
    SEE Deeping, Warwick.

  Ten commandments. SEE Deeping,
    Warwick.

DEEPING, WARWICK.

Stories of love, courage and compassion. © 24Oct30; A30570. Maude Phyllis Deeping (W); 12Aug58; R219142.

Ten commandments. (In Physical culture, Mar.-July, 1931) © 13Feb31, B107181; 13Mar31, B112267; 10Apr31, B112268; 8May31, B115829; 5Jun31, B116721. Maude Phyllis Deeping (W); 17Nov58; R225114-225118.

DEGAS, HILAIRE GERMAIN EDGAR.

Lettres de Degas, recueillies et annotees par Marcel Guerin et precedees d'une pref. de Daniel Halevy. © 28Jun31; AF14320. Daniel Guerin, Guillaume Guerin & Mme Indig, nee Edmee Guerin (C); 18Aug58; R219682.

DE HAAS, JACOB, joint author.

  The great betrayal. SEE Wise,
    Stephen S.

<pb id='247.png' n='1958_h2/A/1611' /> DE LACRETELLE, JACQUES. SEE Lacretelle, Jacques de.

DELAGE, EDMOND.

La tragedie des Dardanelles. © 5Apr31; AF12210. Edmond Delage (A); 14Jul58; R217688.

DE LA MARE, C. F.

  On the edge. SEE De la Mare,
    Walter.

DE LA MARE, RICHARD.

On the edge. SEE De la Mare, Walter.

DE LA MARE, WALTER.

On the edge; short stories. With wood-engravings by Elizabeth Rivers. © 25Sep30, AI-14445; 6Feb31, A34267. Richard de la Mare, C. F. de la Mare & Mrs. F. E. Thompson (C); 12Aug58; R219145.

DELANEY, JUNE SMITH.

  Lazy Bear Lane. SEE Smith,
    Thorne.

Turnabout. SEE Smith, Thorne.

DELAWARE AND ATLANTIC REPORTER DIGEST, covering all cases reported in Delaware reports and Atlantic reporter. Vol. 15-23. © 13May31, A37879; 14May31, A37880-37881; 8Jun31, A39432-39434; 30Jun31, A39435-39437. West Pub. Co. (PWH); 3Jul58; R217437-217445.

DELAWARE AND ATLANTIC REPORTER DIGEST;
  covering all cases reported in
  Delaware reports and Atlantic reporter.
  Vol. 24-29. © 29Aug31,
  A41807-41809; 30Sep31, A44018-44020.
  West Pub. Co. (PWH); 6Oct58;
  R222394-222399.

DELAWARE AND ATLANTIC REPORTER DIGEST.
  May 1931 cumulative pamphlet.
  © 23May31; A37854. West Pub. Co.
  (PWH); 3Jul58; R217512.

DELAWARE AND ATLANTIC REPORTER DIGEST.
  July 1931 cumulative pamphlet.
  © 31Jul31; A40788. West Pub. Co.
  (PWH); 6Oct58; R222393.

DELL, ETHEL M.

  Storm drift. © 28Jan31; A34250.
    A. P. Watt & Son (E); 28Nov58;
    R225621.

DELMAR, VINA.

  Forces. (In Saturday evening post,
    Sept. 27, 1930) © 25Sep30;
    B85989. Vina Delmar (A); 15Sep58;
    R221251.

DENNIS, ALFRED PEARCE.

  Gods and little fishes. © 25Feb31;
    A35228. Mary Value Clark (W);
    15Dec58; R227402.

DE ONIS, FEDERICO. SEE Onis,
  Federico de.

DE ONIS, HARRIET. SEE Onis,
  Harriet de.

DERBY, MARGARET L.

  The merchant of Venice. SEE
    Shakespeare, William.

DESCLEE & CO.

Compendio de telogia ascetica y mistica. SEE Tanquerey, Ad.

DESCRIPTIVE WORD INDEX AND TABLE OF CASES AFFIRMED, REVERSED OR MODIFIED, covering Current digest. Vol.6. © 18Jul31; A41826. West Pub. Co. (PWH); 6Oct58; R222461.

DE SELINCOURT, ANNE DOUGLAS SEDGWICK.

Philippa, by Anne Douglas Sedgwick. © 24Oct30; A29832. Basil de Selincourt (Wr); 2Oct58; R221959.

DE SELINCOURT, BASIL.

  Philippa. SEE De Selincourt, Anne
    Douglas Sedgwick.

<pb id='248.png' /> DE SLOOVERE, FREDERICK JOSEPH.

Cases on the Interpretation of statutes selected from decisions of American and English courts. (American casebook series. William Reynolds Vance, general editor) © 15Jul31; A40807. West Pub. Co. (PWH); 6Oct58; R222467.

DESSAIONES, GEORGES RIBEMONT-. SEE
  Ribemont-Dessaignes, Georges.

DE STEUCH, HARRIET HENRY.

Lady with a past, by Harriet Henry. © 11Jun31; A37923. Harriet Henry de Steuch (A); 7Jul58; R217214.

DEUTSCH, BABETTE.

  Crocodile. From the Russian of
    K. Chukousky. © 18Aug31;
    A44358. Babette Deutsch (A);
    2Sep58; R220932.

DEVAL, JACQUES, pseud. SEE
  Boularan, J.

DE WATER, FREDERIC F. VAN. SEE
  Van de Water, Frederic F.

DEWEY, JOHN.

  Individualism old and new.
    © 17Oct30; A32727. Roberta L.
    Dewey (W); 28Aug58; R220509.

  Philosophy and civilization.
    © 25Sep31; A43089. Roberta L.
    Dewey (W); 28Nov58; R225624.

DEWEY, ROBERTA L.

  Individualism old and new. SEE
    Dewey, John.

  Philosophy and civilization. SEE
    Dewey, John.

DE WITT, MARGUERITE E.

  Elements of oral art and silent
    drama material. © 7Feb31;
    AA63032. Marguerite E. de Witt
    (A); 11Sep58; R221332.

  The man who would say R. (In Journal
    of expression, Dec. 1930)
    © 15Dec30; A5-27951. Marguerite
    E. de Witt (A); 11Sep58; R221331.

DEXTER, ELIZABETH ANTHONY.

  Colonial women of affairs. 2d ed.,
    rev. © 18Feb31; A33883. Elizabeth
    Anthony Dexter (A); 17Dec58;
    R227000.

DICKERSON, PENELOPE, pseud. SEE
  Henderson, Gladys.

DICKINSON, ASA DON, ed. SEE
  Grolier encyclopedia.

DIETRICH, A. AUSTIN.

  White April and other poens. SEE
    Reese, Lizette Woodworth.

DIGEST OF DECISIONS OF THE SUPREME COURTS OF ALABAMA, LOUISIANA, FLORIDA, MISSISSIPPI, AND COURTS OF APPEALS OF ALABAMA AND LOUISIANA, reported in the Southern reporter, v.116-130. (National reporter system digests. Southern series. Vol. 9) © 16Feb31; A35838. West Pub. Co. (PWH); 4Apr58; R212976.

DILLER, ANGELA, joint author.

  Bauer-Diller-Quaile course. SEE
    Bauer, Harold.

DILLEY, ARTHUR URBANE.

Oriental rugs and carpets. © 23Oct31; A43782. Arthur Urbane Dilley (A); 27Oct58; R224153.

DINGLE, EDWIN JOHN.

Breathing your way to youth. © 1Aug31; A42695. Edwin John Dungle (A); 4Aug58; R218756.

DINGMAN, CHARLES F.

Estimating building costs. 2d ed. © 6Jan31; A32647. Monna Elizabeth Dingman (C); 6Aug58; R219146.

<pb id='249.png' /> DINGMAN, MONNA ELIZABETH.

  Estimating building costs. SEE
    Dingman, Charles F.

DINSMORE, CHARLES A.

  The English Bible as literature.
    © 18Feb31; A33882. Union & New
    Haven Trust Co. (E); 17Dec58;
    R226999.

DISNEY, WALT.

  Les aventures de Mickey. Appl.
    author: Marie Andrieu. © on
    French text; 25Mar31; AF15041.
    Marcel Lugan (E); 22Sep58;
    R221530.

DISNEY (WALT) PRODUCTIONS.

  Mickey Mouse book. (Hello, everybody)
    Story and game originated
    by Bobette Bibo, drawings by Walt
    Disney Studios. © 1Nov30;
    A56005. Walt Disney Productions
    (PWH); 29Oct58; R225748.

  Mickey Mouse coloring book. No.871.
    © 25Jun31; AA73303. Walt Disney
    Productions (PWH); 10Dec58;
    R226866.

DISNEY (WALT) PRODUCTIONS, LTD.

  The adventures of Mickey Mouse.
    Book 1. © 19May31; A39294.
    Walt Disney Productions;
    20Nov58; R225437.

  Mickey Mouse pictures to paint.
    No.210. © 3Jul31; AA72887.
    Walt Disney Productions (PWH);
    5Dec58; R226428.

DISNEY (WALT) STUDIOS.

  Mickey Mouse book. SEE Bibo,
    Bobette.

DIXON, FRANKLIN W., pseud.

  Danger trails of the sky; or, Ted
    Scott's great mountain climb, by
    Franklin W. Dixon, pseud. of
    Harriet S. Adams and Edna C.
    Squier. Illustrated by Walter S.
    Rogers. © 11May31; A38133.
    Harriet S. Adams & Edna C. Squier
    (A); 29Dec58; R226969.

Hardy boys: What happened at midnight, by Franklin W. Dlxon, pseud, of Harriet S. Adams and Edna C. Squier. Illustrated by Walter S. Rogers. © 11May31; A38126. Harriet S. Adams & Edna C. Squier (A); 29Dec58; R226963.

DOBIAS, FRANK, illus.

  Straight shooting. SEE Burtis,
    Thomson.

DOBINS, FRANK, Illus.

Silver wings. SEE Whitfield, Raoul.

DOCK, LAVINIA L.

A short history of nursing, from the earliest times to the present day, by Lavinia L. Dock and Isabel M. Stewart. 3d ed., rev. © 2Oct31; A43534. Lavinia L. Dock & Isabel M. Stewart (A); 17Nov58; R224965.

DODD, EDWARD H., JR.

Great Dipper to Southern Cross. © 7Nov30; A31027. Edward H. Dodd, Jr. (A); 2Jul58; R217203.

DÖBLIN, ALFRED.

Wissen und Verändern. Offene Briefe an einen jungen Menschen. © 12Feb31; AF12302. Claude Döblin (C); 16Oct58; R222909.

DÖBLIN, CLAUDE.

  Wissen und Verändern. SEE Doblin,
    Alfred.

DOLLE, JEANNE. SEE Aubry, Jeanne
  Dolle.

DOMINICA, SISTER.

Bible history. SEE Johnson, George.

<pb id='250.png' n='1958_h2/A/1612' /> DOMITILLA, SISTER.

An outline of chemistry. © 26Feb31; A35034. Blanche DuRocher & Sister Stephen (NK); 24Oct58; R223842.

DONDO, MATHURHIN, joint author.

La France. SEE Hills, E. C.

DOONAN, GRACE WALLACE.

The high road, by Oraoe Keon, pseud. © 16Oct30; A29566. P. J. Kenedy & Sons (E); 30Jun58; R217064.

DORSEY, GEORGE A.

  Man's own show. © 25Aug31; A42012.
    Susan Dorsey (PPW); 18Dec58;
    R226576.

DORSEY, SUSAN.

  Man's own show. SEE Dorsey,
    George A.

DOS PASSOS, JOHN, tr.

Panama. SEE Cendrars, Blaise.

DOUBLEDAY & CO., INC.

  The fourth New Yorker album. SEE
    The New Yorker.

Grand hotel. SEE Baum, Vicki.

  The Irish beauties. SEE Beck, L.
    Adams.

  The New Yorker scrapbook. SEE
    The New Yorker.

  The night visitor and other stories.
    SEE Bennett, Arnold.

DOUBLEDAY, DORAN & CO., INC. SEE
  Doubleday Co., Inc.

DOUGHEKTY, THOMAS F., joint author.

Fire. SEE Kearney, Paul W.

DOUGLAS, CLAUDE C.

Overstatement in the New Testament. © 6Oct31; A44051. Claude C. Douglas (A); 13Oct58; R222747.

DOUGLAS, DONALD, tr.

Baron Fritz. SEE Federn, Karl.

DOUGLAS, PAUL H.

  Real wages in the United States,
    1890-1926. © 30Apr30; A22610.
    Paul H. Douglas (A); 28Apr58;
    R218754.

DOUGLAS, WILLIAM O.

  Cases and materials on the law of
    corporate reorganization, by
    William O. Douglas and Carrol M.
    Shanks. © 3Sep31; A44024.
    West Pub. Co. (PWH); 6Oct58;
    R222465.

DOWNES, GERALDING NOWELL.

  Gangster's Glory. SEE Oppenheim, E
    Phillips.

DOWNEY, FAIRFAX.

Burton, Arabian nights adventurer. © 10Apr31; A36861. Fairfax Downey (A); 4Sep58; R220828.

DREISER, THEODORE.

  Fine furniture. © 27Dec30;
    A35397. Earl J. Opsahl (Adm.
    c.t.a.); 30Oct58; R224036.

DREISER, THEODORE. SEE
  Living philosophies.

DRESBACH, GLENN WARD.

Selected poems. © 9Sep31; A41548. Glenn Ward Dresbach (A); 16Sep58; R221571.

DRINKWATER, DAISY.

  American vignettes 1860-1865. SEE
    Drinkwater, John.

Inheritance. SEE Drinkwater, John.

DRINKWATER, DAISY KENNEDY.

  The life and adventures of Carl
    Laemmle. SEE Drinkwater, John.

DRINKWATER, JOHN.

  American vignettes 1860-1865.
    © 28Jan31; A33501. Daisy Drinkwater
    (W); 17Dec58; R226998.

<pb id='251.png' />
  Inheritance. © 30Oct31; A45004.
    Daisy Drinkwater (W); 28Nov58;
    R225589.

  The life and adventures of Carl
    Laemmle. Foreword by Will H.
    Hays. © 10Apr31; A36519.
    Daisy Kennedy Drinkwater (W);
    7Nov58; R224660.

DROBKA, MARIE CECILIA.

Bible history. SEE Johnson, George.

DUBOIS, PAUL.

The education of self (L'education de soi-meme) Authorized translation by Edward G. Richards. Rev. ed. by Frank H. Vizetelly. © 2Sep30; A28391. Norma Cochrane (C); 19Aug58; R219600.

DUFOUR, YVONNE, tr.

Conversation. SEE Maurois, Andre.

DUGANNE, PHYLLIS.

  The game called love. (In Country
    home, Sept. 1931) © 19Aug31;
    B125489. Phyllis Duganne (A);
    22Sep58; R221995.

  The house that Jack built. (In
    Cosmopolitan, Oct. 1931)
    © 10Sep31; B126584. Phyllis
    Duganne (A); 11Sep58; R221196.

  Mrs. Bruce Marvin. (In Home, Aug.
    1931) © 15Jul31; B123505.
    Phyllis Duganne (A); 16Jul58;
    R217808.

  Ronny learns life. (In Home,
    August 1931) © 15Jul31; B123505.
    Phyllis Duganne (A); 16Jul58;
    R217807.

  Without drama. (In Good housekeeping,
    Nov. 1931) © 25Oct31;
    B132354. Phyllis Duganne (A);
    28Oct58; R224589.

DUGMORE, ARTHUR RADCLYFFE, illus.

Rolling stone. SEE Thomas, Lowell.

DUGUID, JULIAN.

  Green hell. With a foreword by
    Marques de Merry del Val.
    © 23Feb31; A33999. Julian Duguid
    (A); 30Sep58; R222009.

DULL, CHARLES.

  Laboratory exercises in chemistry.
    Rev. © 12Jun31; A40236.
    Mary Louise Sprague (C); 28Jul58;
    R218669.

DULL, CHARLES E.

  Answers to questions and problems
    in modern chemistry. © 13Jul31;
    A39539. Mary Louise Sprague (C);
    28Jul58; R218666.

  Modern chemistry. © on additional
    material & corrections; 6Apr31;
    A35940. Mary Louise Sprague (c);
    25Jul58; R218430.

  Tests in chemistry. © 3Sep31;
    AA76953. Mary Louise Sprague (C);
    16Sep58; R221577.

DULLES, ELEANOR LANSING.

  Carmen et autres nouvelles. SEE
    Merimee, Prosper.

DUMARCHAY, PIERRE.

  Le bataillonnaire, par Pierre
    Mac Orlan, pseud. © 21Sep31;
    AF14399. Pierre Mac Orlan
    (Pierre Dumarchay) (A); 3Nov58;
    R224100.

DU MAURIER, DAPHNE. SEE Browning,
  Daphne Du Maurier.

DU MAURIER, GEORGE LOUIS PALMELLA
  BUSSON, ed.

Peter Ibbetson, with an Introd. by his cousin Lady ***** ("Madge Plunket") Edited and Illustrated by George du Maurier. Introd. by Deems Taylor. Grand Opera ed. © on introd by Deems Taylor; 6Feb31; A34278. Harper & Bros. (PWH); 12Nov58; R225096.

<pb id='252.png' /> DU MEZ, ANDREW G., joint author.

  Quantitative pharmaceutical
    chemistry. SEE Jenkins, Glenn L.

DUMM, EDWINA.

  Sinbad: a dog's life. © 19Nov30;
    A31166. Edwina Dumm (A); 24Jul58;
    R218411.

DU MOULIN-ECKART, RICHARD MARIA FERDINAND, GRAF.

  Cosima Wagner. Translated from the
    German by Catherine Alison
    Phillips, and with an introd. by
    Ernest Newman. Vol. 1-2.
    © on translation & introd.;
    10Oct30; A29308. Alfred A.
    Knopf, Inc. (PWH); 12Aug58;
    R219137.

DUNLAP, ORRIN E., JR.

  Radio in advertising. Introd. by
    Roy S. Durstine. Foreword by
    David Sarnoff. © 15Jul31;
    A39496. Orrin E. Dunlap, Jr. (A);
    12Nov58; R225103.

DUNSANY, BEATRICE, LADY.

  The travel tales of Mr. Joseph
    Jorkens. SEE Dunsany, Edward
    John Moreton Drax Plunkett, 18th
    Baron.

DUNSANY, EDWARD JOHN MORETON DRAX PLUNKETT, 18TH BARON.

  The travel tales of Mr. Joseph
    Jorkens, by Lord Dunsany.
    © 1Sep31; A41614. Lady Beatrice
    Dunsany (W); 22Dec58; R227558.

DUNSANY, LORD. SEE Dunsany, Edward
  John Moreton Drax Plunkett, 18th
  Baron.

DURANT, WILL.

Adventures in genius. © 28May31; A38683. Will Durant (A); 30Jul58; R218776.

DURHAM, CHARLES H.

  What your voice reveals. SEE
    Hathaway, Helen.

DU ROCHER, BLANCHE.

  An outline of chemistry. SEE
    Domitille, Sister.

DURSTINE, ROY S.

  Radio in advertising. SEE
    Dunlap, Orrin E., Jr.

DUTTON (E. P.) & CO., INC.

Lenin. SEE Ossendowski, Ferdinand.

  Mulatto Johnny. SEE Laubreaux,
    Alin.

  No surrender. SEE Ammers-Kuller,
    Jo Van.

  The snake of Luvercy. SEE Renard,
    Maurice.

  Three virgins of Haworth. SEE
    Romieu, Emilie.

  The tragedies of progress. SEE
    Lombroso, Gina.

  Under three tsars. SEE Nariskin-Kurakin,
    Elizabeth.

DWIGHT, ALICE FORT.

  The age of hate. SEE Milton, George
    Fort.

DWIGHT, MRS. PHILIP T. SEE Dwight,
  Alice Fort.

DYER, GEORGE.

  Three cornered wound. © 29Apr31;
    A37090. George Dyer (A); 2Jan59;
    R227600.

EARHART, WILL, joint author.

  Adventures in music. SEE Giddings,
    Thaddeus P.

<pb id='253.png' n='1958_h2/A/1613' /> EASTMAN, MAX.

  The revival of the scholar-gentleman.
    (In Scribner's magazine,
    Nov. 1931) © 16Oct31; B133106.
    Max Eastman (A); 12Dec58;
    R226595.

EASTON, BURTON SCOTT.

  Christ in the Gospels. © 26Sep30;
    A29144. William H. Easton, Jr.,
    Wilma E. Bowers & Elizabeth A.
    Galle (NK); 19Sep58; R221468.

EASTON, WILLIAM H., JR.

  Christ in the Gospels. SEE Easton,
    Burton Scott.

EATON, JEANETTE.

The flame, Saint Catherine of Siena. Illustrated with photos, and line drawings by Victor Perurd. © 15Oct31; A43329. Jeanette Eaton (A); 3Dec58; R225724.

  Jeanne d'Arc. With drawings by
    Harve Stein. © 25Aug31; A42010.
    Jeanette Eaton (A); 3Dec58;
    R225717.

EBAUGH, FRANKLIN G., joint author.

Practical clinical psychiatry for students and practitioners. SEE Strecker, Edward A.

EBERHART, MIGNON G.

From this dark stairway. © 17Dec31; A45611. M. G. Eberhart (A); 19Dec58; R226917.

EBERLEIN, HAROLD DONALDSON.

The American home book of decoration downstairs. Edited by Reginald T. Townsend. (The American home library) © 22Oct31; A43722. Reginald T. Townsend (A); 24Oct58; R223389.

  The American home book of decoration
    upstairs. Edited by Reginald
    T. Townsend. © 22Oct31; A43721.
    Reginald T. Townsend (A); 24Oct58;
    R223388.

ECHEGARAY, JOSE.

El gran Galeoto; edited with introd., notes, exercises by Wilfred A. Beardsley. (Heath's modern language series) © on pref., introd., notes, exercises & vocabulary; 6Oct30; A28963. Wilfred A. Beardsley (A); 1Oct58; R222109.

ECKART, RICHARD MARIA FERDINAND
  DU MOULIN-, GRAF. SEE Du Moulin-Eckart,
  Richard Maria Ferdinand,
  Graf.

EDDY, JOHN W.

Hunting the Alaska brown bear. © 5Sep30; A27337. John W. Eddy (A); 23Jul58; R218419.

EDGERTON, WILLIAM F.

Notes on Egyptian marriage, chiefly in the Ptolemaic period. (Studies in ancient oriental civilization, v.1, pt.1) © 7Jul31; A42048. William F. Edgerton (A); 21Nov58; R225012.

EDIE, LIONEL D.

The banks and prosperity. © 15Oct31; A43322. Lionel D. Edie (A); 17Dec58; R226989.

EDWARDS, GEORGE WHARTON.

Constantinople: Istamboul. © 3Dec30; A32282. Clifford R. Welmont (E); 8Jul58; R217253.

EDWARDS, LEO.

  Poppy Ott and the prancing pancake.
    Illustrated by Bert Salg.
    © 12Jan31; A33227. Eugene Edwards
    Lee (C); 29Dec58; R226932.

  Trigger Berg and the sacred pig.
    Illustrated by Bert Salg.
    © 4Feb31; A33573. Eugene Edwards
    Lee (C); 29Dec58; R226939.

<pb id='254.png' />
  Tuffy Bean at Funny-Bone Farm.
    Illustrated by Bert Salg.
    © 23May31; A37517. Eugene
    Edwards Lee (C); 29Dec58;
    R226952.

  Tuffy Bean's one-ring circus.
    Illustrated by Bert Salg.
    © 23May31; A37515. Eugene
    Edwards Lee (C); 29Dec58; R226950.

  Tuffy Bean's puppy days. Illustrated
    by Bert Salg. © 23May31;
    A37516. Eugene Edwards Lee (C);
    29Dec58; R226951.

EGERMEIER, ELSIE E.

  Boys' stories of great men.
    © 30Oct31; A43899. Gospel
    Trumpet Co. (PWH); 29Dec58;
    R227732.

EINSTEIN, ALBERT.

About Zionism. Translated and edited with an introd. by Leon Simon. © 1Dec30, AI-14675; 3Feb31, A33526. Leon Simon (A); 4Nov58; R224297.

EINSTEIN, ALBERT. SEE
  Living philosophies.

ELIASON, E. L.

  Surgical nursing. By E. L. Eliason,
    L. Kraeer Ferguson and Elizabeth
    Keller Lewis. 3d ed., rev.
    (Lippincott's nursing manuals)
    © 21Sep31; A44507. L. Kraeer
    Ferguson (A); 10Oct58; R222860.

ELIOT, ETHEL COOK.

  The gay mystery. Illustrated by
    Ruth King. © 22Jun31; A40370.
    Ethel Cook Eliot (A); 8Jul58;
    R217588.

ELLIOTT, ELIZABETH SHIPPEN GREEN,
  illus.

  Mother Carey's chickens. SEE
    Wiggin, Kate Douglas Smith.

ELLIOTT, RICHARD M., joint author.

  Minnesota mechanical ability tests.
    SEE Paterson, Donald G.

ELLIS, AMABEL WILLIAMS-. SEE
  Williams-Ellis, Amabel.

ELLIS, HAVELOCK.

More essays of love and virtue. © 3Sep31; A42262. Mrs. F. Lafitte-Cyon (E); 11Sep58; R221220.

ELLIS, KENNETH M.

  Dolores Divine, guilty or innocent?
    © 25Jun31; A39134. Kenneth M.
    Ellis (A); 29Dec58; R226980.

  The trial of Vivienne Ware; a
    radiodrama. © 4Feb31; A33571.
    Kenneth M. Ellis (A); 29Dec58;
    R226937.

ELLIS, NORMA MILLAY.

  Fatal interview. SEE Boissevain,
    Edna St. Vincent Millay.

  Since of no creature living. SEE
    Boissevain, Edna St. Vincent
    Millay.

  Sonnets. SEE Boissevain, Edna St.
    Vincent Millay.

  There ia a well into whose bottomless
    eye. SEE Boissevain, Edna
    St. Vincent Millay.

  Three sonnets. SEE Millay, Edna
    St. Vincent.

  Two sonnets in memory. SEE Millay,
    Edna St. Vincent.

EMERSON, CHARLES P.

Essentials of medicine. By Charles P. Emerson and Nellie Gates Brown. 10th ed. rev. (Lippincott's nursing manual) © 1Sep31; A44356. Charles P. Emerson, Jr. (C); 15Sep58; R222008.

EMERSON, CHARLES P., JR.

  Essentials of medicine. SEE
    Emerson, Charles P.

<pb id='255.png' /> EMERY, H. G., ed. SEE

  The New Century dictionary of the
    English language.

EMKA, LTD.

  The social secretary. SEE Brackett,
    Charles.

ENCYCLOPAEDIA OF THE SOCIAL SCIENCES.
  Edwin R. A. Seligman, editor-in-chief;
  Alvin Johnson, associate
  editor. Vol.3. © 30Dec30; A32496.
  Macmillan Co. (PCW); 17Sep58;
  R221302.

THE ENCYCLOPEDIC DIGEST OF NORTH
  CAROLINA REPORTS. Vol.16. Under
  the editorial supervision of A.
  Hewson Michie. © 20Jan31; A33301.
  Michie Co. (PWH); 12Nov58; R224641.

ENRIGHT, ELIZABETH, illus.

  Toys and toy makers. SEE Tippett,
    James S.

EPPERSON, CLAIRALICE.

  A calendar for the past, present
    and future. © 15Jul31; AA73994.
    Clairalice Epperson (A); 15Oct58;
    R222892.

ERDMAN, CHARLES R., ed.

  Notes on the Revelation. SEE
    Erdman, William Jacob.

ERDMAN, WILLIAM JACOB.

  Notes on the Revelation. Edited by
    Charles R. Erdman. © 15Nov30;
    A31220. Fleming H. Revell Co.
    (PPW of W. J. Erdman); 13Nov58;
    R225133.

ERNST, BERNARD M. L.

  Houdini's escapes. SEE Gibson,
    Walter Brown.

ERNST, MORRIS L.

  America's primer. Illustrated by
    Walter Cole. © 21Aug31; A40962.
    Morris L. Ernst (A); 17Nov58;
    R224964.

ERNST, ROBERTA C.

  Houdini's escapes. SEE Gibson,
    Walter Brown.

ERSKINE, HELEN WORDEN.

  But what about Mrs. Paul Revere.
    SEE Erskine, John.

  Cinderella's daughter and other
    sequels and consequences. SEE
    Erskine, John.

  The private life of Pocahontas. SEE
    Erskine, John.

  Unfinished business. SEE Erskine,
    John.

ERSKINE, JOHN.

  But what about Mrs. Paul Revere.
    Illus. by Erte. (In Hearst's
    international-cosmopolitan,
    Apr. 1931) © 10Mar31; A5-27953.
    Helen Worden Erskine (W); 25Aug58;
    R220765.

Cinderella's daughter and other sequels and consequences. Illustrated by Graham Erskine. © 30Oct30; A30678. Helen Worden Erskine (W); 28Aug58; R220621.

The private life of Pocahontas. Illus. by Erte. (In Hearst's international-cosmopolitan. Dec. 1930) © 10Nov30; A5-24537. Helen Worden Erskine (W); 25Aug58; R220764.

  Unfinished business. © 16Nov31;
    A44896. Helen Worden Erskine
    (W); 1Dec58; R225550.

ERSKINE, LAURIE YORK.

  Renfrew rides north. Illus. by
    Charles E. Dameron. © 14Aug31;
    A41057. Laurie York Erskine (A);
    13Nov58; R225330.

ERTZ, SUSAN. SEE
  McCrindle, Susan Ertz.

<pb id='256.png' n='1958_h2/A/1614' /> ESKRIDGE, ROBERT LEE.

Manga Reva, the forgotten islands. © 25Feb31; A35229. Robert Lee Eskridge (A); 24Nov58; R225019.

ETTINGER, WILLIAM L., joint author.

  New progressive road to reading.
    SEE Burchill, Georgine.

EVANS, CARADOC.

  Nothing to pay. © 20Oct30; A29087.
    Caradoc Evans (A); 3Jul58;
    R217111.

EVANS, HUBERT.

Derry of Totem Creek. Illustrated by H. E. M. Sellen. © 12Sep30; A27587. Hubert Evans (A); 26Aug58; R220823.

EVANS, M. BLAKEMORE.

  College German, by M. Blakemore
    Evans and Robert O. Röseler.
    Rev. ed. © 11Sep31; A42947.
    Theodora Blakemore Evans (W) &
    Robert O. Röseler (A); 12Sep58;
    R221132.

EVANS, THEODORA BLAKEMORE.

  College German. SEE Evans, M.
    Blakemore.

EYRIER, L.

  Au bon vieux temps des diligences.
    SEE Almeras, Henri D'.

FABIAN, WARNER, pseud. SEE Adams,
  Samuel Hopkins.

FAEGRE, MARION L.

  Child care and training, by Marion
    L. Faegre and John E. Anderson.
    © on revisions; 6Oct30; A34533.
    Marion L. Faegre (A); 14Aug58;
    R219385.

FAGAN, MYRON C.

  Chance mates. © 3Nov30; AA54867.
    Myron C. Fagan (A); 30Sep58;
    R222189.

FAIRBANK, JANET AYER.

  The lions' den. © 5Dec30; A*16**.
    Janet Ayer Fairbank (A); 28Aug58;
    R220622.

FAIRES, VIRGIL MORING, joint author.

  Mechanism. SEE Keown, Robert
    McArdle.

FALKNER, LEONARD.

M, a detective novel. © 27Feb31; A35105. Leonard Falkner (A); 25Jul58; R218427.

FAMOUS MUSIC CORP.

  The songs what am. SEE Frankel,
    Harry, comp.

FARJEON, ELEANOR.

The old nurse's stocking-basket. © 20Aug31; A40993. Eleanor Farjeon (A); 9Sep58; R221085.

FARLEY, HELEN GROZIER.

  One hundred best novels condensed.
    SEE Grozier, Edwin Atkins, ed.

FARNOL, JEFFERY.

  The puzzle. (In Household magazine,
    Jan. 1932) © 5Dec31; B145197.
    Phyllis Farnol (W); 9Dec58;
    R226654.

FARROW, C. Vernon, illus.

  Yoo-hoo, prosperity. SEE Cantor,
    Eddie.

FAULKNER, HAROLD UNDERWOOD.

  American economic history. Rev. ed.
    (Harper's historical series)
    © 16Sep31; A42388. Harold Underwood
    Faulkner (A); 12Nov58;
    R225105.

<pb id='257.png' /> FAULKNER, WILLIAM.

  The hound. (In Harper's magazine,
    Aug. 1931) © 18Jul31; B121709.
    William Faulkner (A); 6Aug58;
    R218858.

  Spotted horses. (In Scribner's
    magazine, June 1931) © 19May31;
    B114704. William Faulkner (A);
    6Aug58; R218857.

FAUST, DOROTHY.

  For works claimed by Dorothy Faust
    SEE Faust, Frederick.

FAUST, FREDERICK.

  Black snake and gun, by George
    Owen Baxter, pseud. (In Street &
    Smith's western story magazine,
    Dec. 19, 1931) © 11Dec31;
    B137450. Dorothy Faust (W);
    12Dec58; R226860.

  Clean courage, by George Owen
    Baxter, pseud. (In Western story
    magazine, July 25, 1931)
    © 17Jul31; B121579. Dorothy
    Faust (W); 18Jul58; R218168.

  Golden lighting. Pt.1. By Max
    Brand, pseud. (In Western story
    magazine, Aug. 22, 1931)
    © 14Aug31; B124146. Dorothy
    Faust (W); 15Aug58; R219622.

  Golden lightning, by Max Brand, pseud.
    Pt.2-3. (In Street & Smith's
    western story magazine, Aug. 29,
    Sept. 5, 1931) © 21Aug31,
    B124554; 28Aug31, B124885.
    Dorothy Faust (W); 3Sep58;
    R220888-220889.

  Golden lightning, by Max Brand,
    pseud. Pt. 4-6. (In Street &
    Smith's Western story magazine,
    Sept. 12-26, 1931) © 4Sep31,
    B127103; 11Sep31, B126441;
    18Sep31, B127941. Dorothy Faust
    (W); 7Oct58; R222281-222283.

The gun pearl trail. Pt.1-6. By George Owen Baxter, pseud. (In Street & Smith's western story magazine, Sept. 12-Oct. 17, 1931) © 4Sep31, B127103; 11Sep31, B126441; 18Sep31, B127941; 25Sep31, B129153; 2Oct31, B128643; 9Oct31, B130021. Dorothy Faust (W); 7Oct58, R222276-222280; 13Oct53, R222845.

  Hawks and eagles, by George Owen
    Baxter, pseud. (In Street &
    Smith's Western story magazine,
    Dec. 5, 1931) © 27Nov31;
    B134879. Dorothy Faust (W);
    1Dec58; R225397.

The mask of Ching Wo, by Max Brand, pseud. Pt.1-6. (In Railroad man's magazine, Aug. 1930-Jan. 1931) © 1Aug30, B81009; 30Aug30, B83505; 1Oct30, B88373; 1Nov30, B91304; 1Dec30, B96226; 31Dec30, B99280. Dorothy Faust (W); 31Jul58; R218923-218928.

  Nine lives, by Max Brand, pseud.
    (In Street & Smith's Western
    story magazine, Oct. 31, 1931)
    © 23Oct31; B130713. Dorothy
    Faust (W); 24Oct58; R224592.

  Outlaw's conscience, by George
    Owen Baxter, pseud. (In Western
    story magazine, July 11, 1931)
    © 3Jul31; B118954. Dorothy
    Faust (W); 7Jul58; R217564.

The rancher returns. Pt.1-6. By John Frederick, pseud. (In Street & Smith's western story magazine, July 11-Aug. 15, 1931) © 3Jul31, B118954; 10Jul31, B121128; 17Jul31, B121579; 24Jul31, B121983; 31Jul31, B122387; 7Aug31, B123558. Dorothy Faust (W); 7Jul58, R217563; 11Jul58, R217802; 18Jul58, R218169; 25Jul58, R218497; 1Aug58, R219662; 8Aug58, R219661.

  Rose of India, by Max Brand, pseud.
    (In Country home, Aug. 1931)
    © 22Jul31; B122174. Dorothy
    Faust (W); 23Jul58; R218357.

<pb id='258.png' />
  Spot Lester, by Max Brand, pseud.
    (In Street & Smith's western story
    magazine, Oct. 17, 1931)
    © 9Oct31; B130021. Dorothy Faust
    (W); 13Oct58; R222844.

Tamer of the wild, by Peter Henry Morland, pseud. Pt.1-6. (In Street & Smith's Western story magazine, Oct. 24-Nov. 28, 1931) © 16Oct31, B130413; 23Oct31, B130713; 30Oct31, B131986; 6Nov31, B133207; 13Nov31, B134374; 20Nov31, B134525. Dorothy Faust (W); 17Oct58, R224584; 24Oct58, R224591; 31Oct58, R224603; 10Nov58, R224581; 14Nov58, R225027; 21Nov58, R225029.

Torture canyon, by Max Brand, pseud. (In Street & Smith's Western story magazine, Nov. 14, 1931) © 6Nov31; B133207. Dorothy Faust (W); 10Nov58; R224582.

Tramp magic, by Max Brand, pseud. Pt.1-2. (In Street & Smith's Western story magazine, Nov. 21,28, 1931) © 13Nov31, B134374; 20Nov31, B134525. Dorothy Faust (W); 14Nov58, R225026; 21Nov58, R225028.

  Tramp magic, by Max Brand, pseud.
    Pt.3. (In Street & Smith's
    Western story magazine, Dec. 5,
    1931) © 27Nov31; B134879.
    Dorothy Faust (W); 1Dec58;
    R225396.

  Tramp magic, by Max Brand, pseud.
    Pt.5. (In Street & Smith's
    western story magazine, Dec. 19,
    1931) © 11Dec31; B137450.
    Dorothy Faust (W); 12Dec58;
    R226859.

FAY, SIDNEY BRADSHAW.

  The origins of the World War. 2d
    ed., rev. © 5Nov30; A30410.
    Sidney Bradshaw Fay (A); 17Sep58;
    R221297.

FEATHER, WILLIAM.

Rules for success In business. © 28Oct30; A29902. Haldeman-Jullus Co. (PWH); 13Oct58; R222779.

FEDERAL DIGEST, covering decisions of the United States courts reported in Federal reporter. Second series. Vol.31-45. Edited by the editorial staff of the American Digest System. © 12May31; A37866. West Pub. Co. (PWH); 3Jul58; R217529.

THE FEDERAL REPORTER. Second series.
  Vol.45-46. With key number annotations.
  © 14Apr31, A38421; 19Jun31,
  A39450. West Pub. Co. (PWH);
  3Jul58; R217491-217492.

THE FEDERAL REPORTER. Second series.
  Vol.47-49. With key number annotations.
  © 7Jul31, A40796; 24Aug31,
  A41819; 22Sep31, A44040. West Pub.
  Co. (PWH); 6Oct58; R222368-222370.

FEDERN, KARL.

  Baron Fritz. Translated from the
    German by Donald Douglas.
    © 29Aug30; A26981. Donald Douglas
    (A); 25Aug58; R219725.

FELDERMAN, LEON.

  The human voice; its care and
    development. © 6Oct31; A44049.
    Leon Felderman (A); 13Oct58;
    R222745.

FELKER, MILDRED A., ed.

Collected papers of the Mayo Clinic and the Mayo Foundation. SEE Mayo Clinic, Rochester, Minn.

FENNEMAN, NEVIN M.

  Physiography of Western United
    States. © 30Jan31; A33598.
    John N. Gatch (E); 6Aug58;
    R219152.

<pb id='259.png' n='1958_h2/A/1615' /> FERBER, EDNA.

  American beauty, pt.2. Illustrated
    by Mead Schaeffer. (In Ladies'
    home journal, Aug. 1931)
    © 10Jul31; A5-32792. Edna
    Ferber (A); 10Jul58; R217684.

  American beauty, pt.3. Illustrated
    by Mead Schaeffer. (In Ladies'
    home Journal, Sept. 1931)
    © 14Aug31; A33906. Edna Ferber
    (A); 20Aug58; R219876.

  American beauty, pt.4. Illustrated
    by Mead Schaeffer. (In Ladies'
    home Journal, Oct. 1931)
    © 11Sep31; A5-34437. Edna Ferber
    (A); 18Sep58; R221513.

  American beauty, pt.5. Illustrated
    by Mead Schaeffer. (In Ladies'
    home Journal, Nov. 1931)
    © 9Oct31; A5-34986. Edna
    Ferber (A); 17Oct58; R223040.

  American beauty. Woodcut decorations
    by Rudolph Ruzicka. 1st ed.
    © 15Oct31; A43769. Edna
    Ferber (A); 17Oct58; R223041.

  No foolin'. (In Hearst's
    international-cosmopolitan, Dec. 1931)
    © 10Nov31; A5-36220. Edna Ferber
    (A); 4Dec58; R226360.

FERBER, NAT J.

  Spawn. © 16Oct30; A29951. Nat J.
    Ferber (A); 3Jul58; R217209.

FERGUSON, CHARLES WRIGHT, comp.

Great themes of the Christian faith, as presented by G. Campbell Morgan, and others. © 28Oct30; A29882. Charles W. Ferguson (A); 24Jan58; R207736.

FERGUSON, L. KRAEER, joint author.

Surgical nursing. SEE Eliason, E. L.

FERGUSON, OSCAR EARL.

  Leaves. © 3Apr31; A37528. Oscar
    E. Ferguson (A); 1Dec58; R225132.

FICKE, ARTHUR DAVISON.

  Memorial for dead friends. (In
    Poetry, Nov. 1931) © 23Oct31;
    B132159. Gladys B. Ficke (W);
    24Oct58; R223404.

FICKE, GLADYS B.

  Memorial for dead friends. SEE
    Ficke, Arthur Davison.

FIDELITY-PHILADELPHIA TRUST CO.

  Times and tendencies. SEE
    Repplier, Agnes.

FIELD, RACHEL.

  The yellow shop. Illustrated by
    the author. © 15Oct31; A43703.
    Arthur S. Pederson (Wr); 3Nov58;
    R224610.

FIELDING, WILLIAM J.

Boccaccio, lover and chronicler of love. © 5Nov30; A29904. Haldeman-Julius Co. (PWH); 3Nov58; R223798.

FILSINGER, SARA TEASDALE.

Stars to-night, by Sara Teasdale. Illustrated by Dorothy P. Lathrop. © 21Oct58; A30100. Guaranty Trust Co. of New York (E); 17Sep58; R221295.

FINLEY, RUTH E.

  The lady of Godey's, Sarah Josepha
    Hale. © 14Oct31; A44808.
    Manufacturers Trust Co., Bruce R.
    Tuttle & William E. Dague (E);
    21Nov58; R225378.

FIRST NATIONAL BANK OF MADISON, WIS.

  Introduction to American government.
    SEE Ogg, Frederic A.

FIRST-STAMFORD (CONN.) NATIONAL BANK
  & TRUST CO.

  Roy Chapman Andrews, dragon hunter.
    SEE Green, Fitzhugh.

<pb id='260.png' /> FISCHEL, MAX.

  Gamble's class method for strings
    (Metodo Gamble para la enseñanza
    de instrumentos de cuerda) Cello,
    bk.3. By Max Fischel and Aileen
    Bennett. Spanish translation by
    J. P. Villarreal. © 18Aug31;
    AA76395. Aileen Bennett (A) &
    Remick Music Corp. (PWH);
    27Aug58; R220531.

  Gamble's class method for strings.
    (Metodo Gamble para la enseñanza
    de instrumentos de cuerda) Viola,
    bk.3. By Max Fischel and Aileen
    Bennett. Traduccion al espanol
    par J. F. Villares. English and
    Spanish. © 13Oct31; AA77188.
    Aileen Bennett (A); 14Oct58;
    R223029.

FISCHER, OTTOKAR.

Illustrated magic. With an introd. by Fulton Oursler and an unpublished chapter by the late Harry Kellar. Translated and edited by J. B. Mussey and Fulton Oursler. © 27Oct31; A43571. April Oursler Armstrong, Fulton Oursler, Jr., Will Oursler & Helen Oursler Balaber (C); 29Oct58; R223988.

FISHER, DOROTHY CANFIELD, tr.

Work, what it has meant to men through the ages. SEE Tilgher, Adriano.

FITE, ALEXANEER G., ed.

Four contemporary one-act comedies. (Heath's modern language series) © on pref., introd., notes, exercises & vocabulary; 23Jan31; A34023. Alexander G. Fite (A); 6Nov58; R224126.

FITLER, MARY BIDDLE.

Anna Mary, a girl of the nineties. © 16Sep31; A42390. Mary Biddle Fitler (A); 3Dec58; R225722.

FITZGERALD, F. SCOTT.

Echoes of the Jazz Age. (In Scribner's magazine, Nov. 1931) © 16Oct31; B133106. Frances Scott Fitzgerald Lanahan (C); 12Dec58; R226596.

FITZHUGH, PERCY KEESE.

  Mark Gilmore, speed flyer.
    Howard L. Hastings, illustrator.
    © 11May31; A38131. Mrs. Percy
    Keese Fitzhugh (W); 29Dec58;
    R226967.

  Mark Gilmore's lucky landing.
    Howard L. Hastings, illustrator.
    © 11May31; A38127. Mrs. Percy
    Keese Fitzhugh (W); 29Dec58;
    R226964.

  Roy Blakeley up in the air.
    Russell H. Tandy, illustrator.
    © 11May31; A38130. Mrs. Percy
    Keese Fitzhugh (W); 29Dec58;
    R226966.

  Westy Martin in the Sierras.
    Illustrated by Machtey.
    © 20May31; A38308. Mrs. Percy
    Keese Fitzhugh (W); 29Dec58;
    R226976.

FITZHUGH, MRS. PERCY KEESE.

  Mark Gilmore, speed flyer. SEE
    Fitzhugh, Percy Keese.

  Mark Gilmore's lucky landing. SEE
    Fitzhugh, Percy Keese.

  Roy Blakeley up in the air. SEE
    Fitzhugh, Percy Keese.

  Westy Martin in the Sierras. SEE
    Fitzhugh, Percy Keese.

FITZPATRICK, BENEDICT.

Frail Anne Boleyn and her fateful loves with Henry VIII. © 28Nov31; A45346. Benedict Fitzpatrick (A); 12Dec58; R227380.

FITZPATRICK, JOHN T., ed. SEE

Parson's practice manual of the state of New York.

<pb id='261.png' /> FLACK, MARJORIE. SEE Larsson, Marjorie Flack.

FLANAGAN, CHARLEE.

  Apache. SEE Comfort, Will
    Levington.

FLAUBERT, GUSTAVE.

Madame Bovary. With introd. and notes by Christian Gauss. (The Modern student's library French series) © on introd., notes & revisions; 20Oct30, A30175. Charles Scribner's Sons (PWH); 13Oct58; R222886.

FLEISSNER, E. MENTZ, joint author.

  Deutsches literatur-Lesebuch. SEE
    Fleissner, Otto Siegfried.

FLEISSNER, OTTO SIEGFRIED.

  Deutsches literatur-Lesebuch,
    by O. S. Fleissner and E. Mentz
    Fleissner. Rev. ed. © 11Sep31;
    A43582. O. S. Fleissner &
    E. Kentz Fleissner (A); 12Sep58;
    R221133.

FLEMING, DOROTHY L. SAYERS.

Suspicious characters, by Dorothy L. Sayers. (Pub. abroad as The five red herrings) © 9Mar31, AI-15036; 4Sep31, A346597. Lloyds Bank, Ltd. (E); 20Oct58; R223296.

FLESCH, BERTHA.

  Das Klangproblem im Geigenspiel.
    SEE Flesch, Carl.

FLESCH, CARL.

Das Klangproblem im Geigenspiel. © 9Nov31; AF21744. Bertha Flesch (W); 21Nov58; R225579.

FLETCHER, INGLIS.

  The White Leopard, a tale of the
    African bush. Illustrated by
    Kurt Wiese. © 25Aug31; A42256.
    Inglis Fletcher (A); 24Oct58;
    R223325.

FLETCHER, J. S.

  The dressing room murder.
    © 2Jan31; A33189. Rosamond Grant
    Fletcher (W); 29Oct58; R223615.

  The South Foreland murder.
    © 19Sep30; A27771. Rosamond
    Grant Fletcher (W); 12Aug58;
    R219131.

FLETCHER, JEFFEHSON BUTLER, tr.

  The Divine comedy. SEE
    Dante Alighieri.

FLETCHER, JOSEPH SMITH.

  Murder at Wrides Park, being entry
    number one in the case-book of
    Ronald Camberwell. © 24Apr31,
    AI-15210; 26Jun31, A39501.
    Rosamond Grant Fletcher (W);
    29Oct58; R223619.

  Murder in four degrees, being entry
    number two in the case-book of
    Ronald Camberwell. © 18Sep31,
    AI-15656; 9Oct31, A43200. Rosamond
    Grant Fletcher (W); 29Oct58;
    R223620.

FLETCHER, ROSAMOND GRANT.

  The dressing room murder. SEE
    Fletcher, J. S.

  Murder at Wrides Park. SEE
    Fletcher, Joseph Smith.

  Murder in four degrees. SEE
    Fletcher, Joseph Smith.

  The South Foreland murder. SEE
    Fletcher, J. S.

FLEXNER, ABRAHAM.

  Universities, American, English,
    German. © 20Nov30; A32649.
    Abraham Flexner (A); 7Jul58;
    R217561.

FLORIDA AND SOUTHERN REPORTER DIGEST.
  May 1931 cumulative pamphlet.
  © 23May31; A37846. West Pub. Co.
  (PWH); 3Jul58; R217513.

<pb id='262.png' n='1958_h2/A/1616' />
FLORIDA AND SOUTHERN REPORTER DIGEST.
  July 1931 cumulative pamphlet.
  © 14Jul31; A41830. West Pub. Co.
  (PWH); 6Oct58; R222400.

FOCH, FERDINAND.

Marshal Foch's war memoirs. Translated from the French by T. Bentley Mott. (In New York American, Jan. 25-Mar. 6, 1931) © 25Jan-6Mar21; A5-28490. Mrs. T. R. Slingluff (NK); 12Sep58; R221205.

The memoirs of Marshal Foch. Translated by T. Bentley Mott. © 6Mar31; A35303. Mrs. T. R. Slingluff (NK); 12Sep58; R221204.

FOERSTER, NORMAN.

Toward standards; a study of the present critical movement in American letters. © 16Oct30; A28929. Norman Foerster (A); 3Jul58; R217258.

FOGARTY, ROSAMOND RYNNING.

Gun notches. SEE Rynning, Thomas H.

FOGERTY, ELSIE.

  Speech craft. With a foreword by
    Belle Kennedy. © 13Jan31;
    A32972. Harold E. Matthews (E of
    Elsie Fogerty); 24Nov58; R225073.

FOKKER, ANTHONY H. G.

  Flying Dutchman, by Anthony H. G.
    Fokker and Bruce Gould.
    © 24Apr31, A36991. Bruce Gould
    (A); 28Jul58; R218653.

FOLSOM, JOSEPH K.

Social psychology. (Harper's social science series) © 18Mar31; A34959. Joseph K. Folsom (A); 4Aug58; R218936.

FOOTE, HENRY WILDER.

  Robert Feke, colonial portait
    painter. © 17Nov30; A31282.
    Wilder Foote (C); 17Sep58;
    R221567.

FOOTE, WILDER.

  Robert Feke. SEE Foote, Henry
    Wilder.

FOOTNER, HULBERT.

Easy to kill. © 16Sep31; A42383. Gladys Footner Hall (W); 3Dec58; R225719.

FORBES, ROSITA.

  Conflict. With a foreword by Sir
    Percy Sykes. © 7May31; A37236.
    Rosita Forbes (A); 21Oct58;
    R223407.

FORD, COREY.

  Cocoanut oil. © 24Aug31; A41310.
    Corey Ford (A); 28Aug58; R220520.

FORD, FORD MADOX.

When the wicked man. © 20May31; A38479. Katharine Lamb (C); 18Sep58; R221306.

FORD, H. E., ed.

Colomba. SEE Merimee, Prosper.

FORD, LESLIE, pseud. SEE Brown,
  Zenith Jones.

FORD, WALTER B.

Colomba. SEE Merimee, Prosper.

FORD, WORTHTNGTON CHAUNCEY, ed.

  Letters of Henry Adams, 1858-1891.
    SEE Adams, Henry.

FOREMAN, CAROLYN T.

  A traveler in Indian territory. SEE
    Foreman, Grant, ed.

FOREMAN, GRANT, ed.

A traveler in Indian territory. © 4Nov30; A31008. Carolyn T. Foreman (W); 18Jul58; R218101.

<pb id='263.png' /> FORESTER, C. S.

  Two and twenty. © 21Aug31; A41205.
    C. S. Forester (A); 9Sep58;
    R220820.

FORST-BATTAGLIA, OTTO, ed.

  Dictatorship on trial, by eminent
    leaders of modern thought.
    Edited by Otto Forst de Battaglia.
    Translated by Huntley Paterson.
    With an introd. by Winston
    Churchill. © 10Oct30, AI-14510;
    19Feb31, A33898. Sir Winston
    Churchill (A); 29Sep58; R222106.

FORST DE BATTAGLIA, OTTO. SEE
  Forst-Battaglia, Otto.

FORT, ALICE. SEE Dwight, Alice Fort.

FOSTER, ALICE, joint author.

Economic geography for secondary schools. SEE Colby, Charles C.

FOSTER, JOSEPHINE C.

The young child and his parents, by Josephine C. Foster and John E. Anderson. (The Institute of Child Welfare. Monograph series no.1) © on new data & revisions; 15Oct30; A34534. John E. Anderson (A); 20Aug58; R219861.

FOSTER, LARRY.

Larry: thoughts of youth. © 11Dec30; A33230. Larry Foster Foundation (PPW); 4Dec58; R225744.

FOSTER (LARRY) FOUNDATION.

Larry. SEE Foster, Larry.

FOWLER, GENE.

  The great mouthpiece. © 9Oct31;
    A44244. Gene Fowler (A); 29Dec58;
    R227729.

FOYE, RALPH T.

  Buy near by. © 1Dec30; AA58244.
    Ralph T. Foye (A); 20Nov58;
    R225377.

FRANC-NOHAIN, pseud. SEE
  Le Grand, Maurice.

FRANC-NOHAIN, FRANCINE. SEE
  Jamieson, Francine Le Grand.

FRANCIS D'ASSISI, MOTHER.

My candle and other poems. © 25Nov31; A46348. Mother Mary Peter (E); 2Dec58; R225731.

FRANK, JEROME N.

Law and the modern mind. With an introd. by Julian W. Mack. © 29Sep30; A29010. Mrs. Jerome N. Frank (W); 26Sep58; R221737.

FRANK, MRS. JEROME N.

  Law and the modern mind. SEE
    Frank, Jerome N.

FRANKAU, GILBERT.

Martin make-believe. © 15Jan31; A33292. Susan Frankau (W); 24Nov58; R225074.

FRANKAU, SUSAN.

  Martin make-believe. SEE
    Frankau, Gilbert.

FRANKEL, HARRY, comp.

The songs what am. © 18Dec31; A886034. Famous Music Corp. (PWH); 18Dec58; R227580.

FRANKFURTER, FELIX, ed.

Mr. Justice Holmes. © 9Mar31; A35178. Felix Frankfurter (A); 19Nov58; R225042.

FRANKLIN, BENJAMIN.

Autobiography. Introd. and marginal glosses by Edward F. O'Day. © on introd. & marginal glosses; 24Nov31; A47689. George Macy Companies. Inc. (PWH); 28Nov58; R225487.

<pb id='264.png' /> FRANTZ, MARIE LOUISE, joint author.

Snappy. SEE Orton, Helen Puller.

FRASER, W. H.

  Standard French grammar. By W. H.
    Fraser, J. Squair and Davis
    Hobart Carnahan. © on new matter;
    21Aug31; A41550. Mabel C. Carnahan
    (W); 6Nov58; R224145.

FREDERICK, JOHN, pseud. SEE
  Faust, Frederick.

FREEDMAN, DAVID, Joint author.

  Yoo-hoo, prosperity. SEE Cantor,
    Eddie.

FREEHOF, SOLOMON B.

  Stormers of heaven. © 16Sep31;
    A42393. Solomon B. Freehof (A);
    3Dec58; R225723.

FREEMAN, CAROLYN R. SEE
  Children's day helper.

FREEMAN, DOROTHY, illus.

7 to 7. SEE Aldis, Dorothy.

FREEMAN, MARGARET, illus.

  New German fairy tales. SEE
    Lebermann, Norbert.

FRENCH, ROY L., Joint ed.

  Old Testament narratives. SEE
    Dawson, Mary, ed.

FRENCH (SAMUEL) INC. SEE
  One-act plays for stage and study.

FRERE, PATRICIA MARION CALDECOTT.

  The Arranways mystery. SEE Wallace,
    Edgar.

The devil man. SEE Wallace, Edgar.

  The double crime. SEE Wallace,
    Edgar.

  His devoted squealer. SEE Wallace,
    Edgar.

  The law of the three just men. SEE
    Wallace, Edgar.

  The man from Sing Sing. SEE Wallace
    Edgar.

On the spot. SEE Wallace, Edgar.

FRIEL, ARTHUR O.

  Forgotten Island. Installment 1-4.
    (In Delineator magazine, Nov.
    1930-Feb. 1931) © 30Sep30,
    B87521; 31Oct30, B92877; 1Dec30,
    B95317; 30Dec30, B98981. Arthur
    O. Friel (A); 24Sep58; R221955-221958.

FROOM, LEROY EDWIN.

Rivers of living water and other symbols of the spirit; wind, water, fire, oil. © 27May31; A37550. LeRoy E. Froom (A); 12Aug58; R219025.

FROTHINGHAM, ELEANOR W.

  Washington, Commander in Chief.
    SEE Frothingham, Thomas G.

FROTHINGHAM, THOMAS G.

  Washington, Commander in Chief.
    © 24Sep30; A28509. Eleanor W.
    Frothingham (W); 15Sep58;
    R221355.

FRY, SHEILA KAYE-SMITH.

  Susan Spray, by Sheila Kaye-Smith.
    (Pub. abroad as The history of
    Susan Spray) © 12Mar31, AI-15043;
    31Aug31, A41366. T. Penrose Pry
    (Wr); 12Nov58; R225111.

FRY, T. PENROSE.

  Susan Spray. SEE Fry, Sheila
    Kaye-Smith.

FRYER, DOUGLAS.

Measurement of interests in relation to human adjustment. Introd. by Lewis M. Terman. © 12Sep31; A41712. Douglas Fryer (A); 16Sep58; R221572.

FU, WU MING. SEE Wu Ming Fu.

<pb id='265.png' n='1958_h2/A/1617' /> FULOP-MILLER, RENE, ed.

  Under three tsars. SEE Narishkin-Kurakin,
    Elizabeth.

FULLER, B. A. G.

History of Greek philosophy. © 15Apr31; A35945. Catherine van Horn (E); 28Jul58; R218652.

FULLER, RAYMOND T.

The doorway to nature. © 27Aug31; A42645. Raymond T. Fuller (A); 26Sep58; R221869.

FUNK & WAGNALLS CO.

  The literary digest, 1931. Atlas
    of the world. © 24Oct70; A30225.
    Funk & Wagnalls Co. (PCW); 19Aug58;
    R219602.

FUNK & WAGNALLS CO. SEE
  The New international year book.

FURMAN, N. HOWELL.

  Potentiometric titrations. SEE
    Kolthoff, I. M.

FYLEMAN, ROSE.

  The doll's house. Illustrated by
    Erick Berry. © 13Aug31; A41139.
    Rose Fyleman & Erick Berry (A);
    21Aug58; R219935.

GAG, ASTA.

  Sue sew-and-sew, by Asta, Dehli
    and Flavia Gag. © 12Aug31;
    A40727. Flavia Gag (A); 19Nov58;
    R225044.

GAG, DEHLI, joint author.

Sue sew-and-sew. SEE Gag, Asta.

GAG, FLAVIA, joint author.

Sue sew-and-sew. SEE Gag, Asta.

GAITHER, FRANCES.

  The fatal river; the life and death
    of La Salle. © 6Oct31; A44053.
    Frances Gaither (A); 13Oct58;
    R222749.

GALANTHIERE, LEWIS.

  Complete works. SEE Villon,
    Francois.

GALDONE, PAUL, illus.

  Emmy Lou. SEE Martin, George
    Madden.

GALE, ZONA.

  Bridal pond. © 7Nov30; A30604.
    Juliette Breese & Leslyn B.
    Keie (C); 4Aug58; R218818.

GALLAND, JOSEPH S.

Nineteenth century French verse. By Joseph S. Galland and Roger Cros. (The Century modern language series) © on pref. notes, introductions, descriptions & explanatory matter; 8Dec31; A45412. Margaret M. Galland (W) & Roger Cros (A); 10Dec58; R226476.

GALLAND, MARGARET M.

  Nineteenth century French verse.
    SEE Galland, Joseph S.

GALLE, ELIZABETH A.

  Christ in the Gospels. SEE Easton,
    Burton Scott.

GALPIN, CHARLES J., joint ed.

A systematic source book in rural sociology. SEE Sorokin, Pitirim A., ed.

GALSWORTHY, JOHN.

  From day to day. SEE Goetel,
    Ferdynand.

GALVIN, HELEN JUDSON, joint ed.

  Story essays. SEE McClay,
    Harriet L., ed.

GANSE, FRANKLIN W., joint author.

  Business life insurance trusts. SEE
    Scully, C. Alison.

<pb id='266.png' /> GARDNER, ANNE.

Working wives. © 12May31; A37282. Anne Gardner (A); 29Dec58; R226949.

GARDNER, ERLE STANLEY.

  Ain't that too bad. (In Detective
    fiction weekly, Aug. 1, 1931)
    © 29Jul31; B123253. Erle Stanley
    Gardner (A); 29Sep58; R222116.

  Carfare to Chi. (In Gang world,
    Aug. 1931) © 25Jun31; B471221.
    Erle Stanley Gardner (A);
    17Jul58; R218119.

  The cat-eyed wench. (In Gang world,
    Nov. 1931) © 25Sep31; B477718.
    Erle Stanley Gardner (A); 29Sep58;
    R222127.

  A chinaman's chance. (In Detective
    fiction weekly, June 6, 1931)
    © 3Jun31; B116339. Erle Stanley
    Gardner (A); 17Jul58; R218110.

  Coffins for killers. (In Detective
    fiction weekly, July 25, 1931)
    © 22Jul31; B121899. Erle Stanley
    Gardner (A); 29Sep58; R222115.

  Dead fingers. (In Detective action,
    Oct. 1931) © 5Sep31; B471691.
    Erle Stanley Gardner (A); 29Sep58;
    R222126.

  Eyes of the law. (In Gangland stories,
    July-Aug. 1931) © 3Jun31;
    B119061. Erle Stanley Gardner
    (A); 17Jul58; R218115.

  Girl with the diamond legs. (In
    Detective fiction weekly, July 11,
    1931) © 8Jul31; B120533. Erle
    Stanley Gardner (A); 17Jul58;
    R218116.

  The gold magnet. (In Detective
    fiction weekly, Sept. 26, 1931)
    © 23Sep31; B129056. Erle Stanley
    Gardner (A); 29Sep58; R222123.

  Hairy hands. (In Black mask magazine.
    Aug. 1931) © 12Jul31;
    B121445. Erle Stanley Gardner
    (A); 17Jul58; R218117.

  Higher up. (In Detective fiction
    weekly, Sept. 19, 1931)
    © 16Sep31; B126733. Erle Stanley
    Gardner (A); 29Sep58; R222122.

  Hoodoo. (In Clues magazine, Aug.
    1931) © 16Jun31; B118280.
    Erle Stanley Gardner (A);
    17Jul58; R218111.

  The hot squat. (In Black mask, Oct.
    1931) © 12Sep31; B126662.
    Erle Stanley Gardner (A); 29Sep58;
    R222121.

  The jellyfish corpse. (In Detective
    action, July 1931) © 5Jun31;
    B471689. Erle Stanley Gardner
    (A); 17Jul58; R218120.

  Loaded with dynamite. (In Gang
    world, Oct. 1931) © 25Aug31;
    B471223. Erle Stanley Gardner (A);
    29Sep58; R222125.

  Muscle man. (In Gang world, Sept.
    1931) © 25Jul31; B471222.
    Erle Stanley Gardner (A); 29Sep58;
    R222124.

  Not so dumb. (In Detective fiction
    weekly, June 27, 1931)
    © 24Jun31; B118617. Erle Stanley
    Gardner (A); 17Jul58; R218114.

  One man gang. (In Gang world, July
    1931) © 25May31; B471220. Erle
    Stanley Gardner (A); 17Jul58;
    R218118.

  Promise to pay. (In Black mask,
    Sept. 1931) © 12Aug31; B124154.
    Erle Stanley Gardner (A); 29Sep58;
    R222119.

  The seal of silence. (In Detective
    action stories, Sept. 1931)
    © 5Aug31; B477719. Erle Stanley
    Gardner (A); 29Sep58; R222128.

  Sign of the sun. (In Argosy magazine,
    June 27, 1931) © 24Jun31;
    B118616. Erle Stanley Gardner
    (A); 17Jul58; R218113.

<pb id='267.png' />
  Silent tongues, by Kyle Corning,
    pseud. (In Street & Smith's
    Detective story magazine, Sept.
    5, 1931) © 28Aug31; B124881.
    Erle Stanley Gardner (A); 29Sep58;
    R222120.

  Tommy talk (In Black mask magazine,
    July 1931) © 12Jun31;
    B118391. Erle Stanley Gardner
    (A); 17Jul58; R218112.

  Two flowers of fate. (In Detective
    action, Aug. 1931) © 5Jul31;
    B471690. Erle Stanley Gardner
    (A); 17Jul58; R218121.

  The vanishing corpse. (In Detective
    fiction weekly, Aug. 15, 1931)
    © 13Aug31; B123967. Erle Stanley
    Gardner (A); 29Sep58; R222117.

  The winner. (In Western adventures,
    Sept. 1931) © 31Jul31; B124082.
    Erle Stanley Gardner (A); 29Sep58;
    R222118.

GARDNER, ROBERT, joint author.

Mac and Bob's W. L. S. book of songs. SEE McFarland, Lester.

GARIS, HOWARD R.

  Uncle Wiggily's icicle spear.
    © 27Feb31; AA65672. Howard R.
    Garis (A); 8Dec58; R226342.

  Uncle Wiggily's jumping boots.
    © 27Feb31; AA65671. Howard R.
    Garis (A); 8Dec58; R226343.

GARIS, LILIAN.

  Judy Jordan. Thelma Gooch, illustrator.
    © 20May31; A38313.
    Roger Garis (C); 29Dec58; R226978.

  Judy Jordan's discovery. Thelma
    Gooch, illustrator. © 20May31;
    A38311. Roger Garis (C); 29Dec58;
    R226977.

GARIS, ROGER.

Judy Jordan. SEE Garis, Lilian.

  Judy Jordan's discovery. SEE
    Garis, Lilian.

GARNER, J. J. SAVILLE.

  The books of the Emperor Wu Ti.
    SEE Meckauer, Walter.

GATCH, JOHN N.

  Physiography of Western United
    States. SEE Fenneman, Nevin M.

GATES, ARTHUR I.

  Third grade manual, by Arthur I.
    Gates, Miriam Blanton Huber and
    Jean Y. Ayer. (The Work-play
    books) © 16Dec30; A32242.
    Arthur I. Gates, Miriam Blanton
    Huber & Jean Y. Ayer (A); 17Sep58;
    R221301.

GATTI, ATTILIO.

  The great invasion of lions. (In
    Boys' life, Jan. 1932) © 22Dec31;
    B147435. Attilio Gatti (A);
    24Dec58; R226920.

GAUSS, CHRISTIAN.

  Life in college. © 24Oct30;
    A30651. Katherine Gauss Jackson
    (Mrs. Andrew Jackson), D. Christian
    Gauss, Natalie Gauss Stephenson
    (Mrs. George Stephenson) (C);
    13Oct58; R222885.

  Madame Bovary. SEE Flaubert,
    Gustave.

GAUSS, D. CHRISTIAN.

  Life in college. SEE Gauss,
    Christian.

GAUVREAU, EMILE HENRY.

  Hot news. © 11Jun31; A39066.
    Winifred R. Gauvreau (W); 30Dec58;
    R227391.

GAUVREAU, WINIFRED R.

  Hot news. SEE Gauvreau, Emile
    Henry.

GAY, JAN, joint author.

The shire colt. SEE Gay, Zhenya.

<pb id='268.png' n='1958_h2/A/1618' /> GAY, ZHENYA.

  The shire colt, by Zhenya and Jan
    Gay. © 15Oct31; A43300.
    Zhenya Gay (A); 3Nov58; R224609.

Stories. SEE Mansfield, Katharine.

GELD, ELLEN BROMFIELD.

Tabloid news. SEE Bromfield, Louis.

  That which never returns. SEE
    Bromfield, Louis.

GELLER, JAMES J.

  Famous songs and their stories.
    © 30Jul31; A40572. James J.
    Geller (A); 5Aug58; R218755.

GENERAL ACCIDENT FIRE & LIFE ASSURANCE
  CO. LTD.

  Man made the town. SEE Pocock, Ruby
    M. Ayres.

GENERAL LAWS OF THE STATE OF NEW YORK, enacted by the Legislature at the regular session of 1931. © 15May31; A37868. West Pub. Co. (PWH); 3Jul58; R217530.

GENIS, AUGUSTO BUTLER.

Cantes andaluces. © 3Nov30; AF14916. Augusto Butler Genis (A); 27Aug58; R220423.

GERAGHTY, E. M.

Essentials of dietetics in health & disease. 3d rev. and enl. ed. © 16Oct31; A44585. E. M. Geraghty (A); 8Dec58; R226250.

GERHARDI, WILLIAM.

  Memoirs of a polyglot. © 25Jun31,
    AI-15346; 9Oct31, A43197.
    William Gerhardi (A); 6Nov58;
    R224063.

GERMAIN, ANDRE.

Revolution espagnole en 25 tableaux. © 10Sep31; AF15329. Andre Germain (A); 3Nov58; R224085.

GESSNER, ROBERT.

  Massacre. © 9Feb31; A34338.
    Robert Gessner (A); 16Jul58;
    R218040.

GEWEHR, WESLEY M.

  The rise of nationalism in the
    Balkans, 1800-1930. © 10Aug31;
    A42225. Wesley M. Gewehr (A);
    20Aug58; R219705.

GIBBS, ELINOR.

  Tongues of angels. SEE Gibbs,
    Wolcott.

GIBBS, GEORGE.

Old Philadelphia. Vol.1: The loyal rebel. Vol.2: Supercargo. Vol.3: Autumn. Vol.4: North star. Decorations by Edward C. Caswell. © 28Aug31; A42037-42040. Maud Harrison Gibbs (W); 13Nov58; R225333-225336.

GIBBS, LORENE CAMPBELL.

  Popular Chinese cook book. (Little
    blue book, no.1548) © 23Sep30;
    AA52136. Haldeman-Julius Co.
    (PWH); 15Sep58; R221259.

GIBBS, MAUD HARRISON.

Old Philadelphia. SEE Gibbs, George.

GIBBS, WOLCOTT.

  Tongues of angels. (In The New
    Yorker, Dec. 6, 1930) © 5Dec30;
    B96354. Elinor Gibbs (W);
    16Oct58; R223200.

GIBSON, WALTER BROWN.

Houdini's escapes, prepared from Houdini's private notebooks and memoranda with the assistance of Beatrice Houdini, widow of Houdini, and Bernard M. L. Ernst, president of the parent assembly of the Society of American Magicians. 1st ed. © 16Oct30; A30099. Roberta C. Ernst (W); 9Oct58; R222738.

<pb id='269.png' /> GIDDINGS, THADDEUS P.

  Adventures in music, by Thaddeus P.
    Giddings, Will Earhart, Ralph L.
    Baldwin, Earl L. Baker and Elbridge
    W. Newton. (Music education series)
    © 2Jan31; A33410.
    Will Earhart (A); 23Sep58;
    R221625.

GIDE, ANDRE.

  Two symphonies. Translated by
    Dorothy Bussy. © 22May31;
    A38406. Alfred A. Knopf, Inc.
    (PWH); 12Nov58; R225123.

GIESEKING, WALTER.

  Modernes Klavierspiel nach Leimer-Gieseking.
    SEE Leimer, Karl.

GILBERT, ARTHUR STUART.

  James Joyce's Ulysses; a study.
    © 18Oct30; A31312. Arthur Stuart
    Gilbert (A); 12Aug58; R219144.

GILBERT, CELIA, pseud. SEE Cochran,
  Ruth Gilbert.

GILDER, ROSAMOND.

Enter the actress; the first women in the theatre. © 18Mar31; A35332. Rosamond Gilder (A); 15Dec58; R226670.

GILES, DOROTHY.

Road through Czechoslavakia. © 1Nov30; A31014. Dorothy Giles (A); 8Jul58; R217252.

GILES, DOROTHY.

For works written in collaboration with Laura Spencer Porter Pope. SEE Crawley, Rayburn, pseud.

GILES, MARY DODD, joint author.

  Surgical nursing. SEE
    Cabot, Hugh.

GILKISON, GRACE.

Little Arthur. Text and drawings by Grace Gilkison. © 17Sep31; A42542. Grace Gilkison (A); 18Sep58; R221545.

  Told under the green umbrella. SEE
    International Kindergarten Union.
    Literature Committee.

GLASMON, KUBEC.

  The public enemy, by Kubec Glasmon
    and John Bright. © 30Apr31;
    A37099. Warner Bros. Pictures,
    Inc. (PWH); 29Dec58; R226946.

GLASPELL, SUSAN.

  Ambrose Holt & family. © 9Apr31;
    A35775. Sirius C. Cook & Harl
    Cook (Co-executors); 10Oct58;
    R222855.

GLASSMAN, WILLIAM.

Cumulative annual digest of Pennsylvania decisions, 1930. SEE Monaghan, James, ed.

GLENN, MABELLE.

Music appreciation for the junior high school. Teachers' manual to accompany Music notes, book 4-5. By Mabelle Glenn and Margaret Lowry. © on new matter; 24Nov30; A30992. Mabelle Glenn (A); 20Oct58; R222919.

Music notes. Book 4. By Mabelle Glenn and Margaret Lowry. © on p.32, 36, 42, 46 & contents; 8Oct30; A29321. Mabelle Glenn (A); 1Oct58; R222146.

GLUECK, EDMUND.

Trial evidence. SEE Abbott, Austin.

GOBLE, GEORGE W.

Cases and other materials on the law of insurance. © 5Jun31; A37922. Bobbs-Merrill Co., Inc. (PWH); 22Dec58; R227410.

GODDARD, SCOTT, ed.

  Letters of Hans von Bulow. SEE
    Bulow, Hans Guido von.

<pb id='270.png' /> GOES, BERTHA.

  Freshmen at Arden. © 11Sep31;
    A41659. Bertha Goes (A); 2Dec58;
    R225581.

GOETEL, FERDYNAND.

From day to day. Translated from the Polish by Winifred Cooper, with a foreword by John Galsworthy. © on translation & foreword; 22Jan31, AI-14807; 1May31, A36983. Viking Press, Inc. (PWH); 19Nov58; R225014.

GOLD, LOUIS.

Evacuation hospital. (In The American mercury, Feb. 1931) © 23Jan31; B102662. Louis Gold (A); 22Sep58; R221595.

Lodge doctor, by Lewis G. Arrowsmith, pseud. (In The American mercury, Dec. 1930) © 25Nov30; B95425. Louis Gold (Lewis G. Arrowsmith) (A); 22Sep58; R221593.

The young doctor in New York, by Lewis G. Arrowsmith, pseud. (In The American mercury, Jan. 1931) © 24Dec30; B98716. Louis Gold (Lewis G. Arrowsmith) (A); 22Sep58; R221594.

GOLD, MICHAEL.

  Charlie Chaplin's parade.
    Illustrated by Otto Soglow.
    © 28Aug30; A28198. Michael
    Gold (A); 25Aug58; R220286.

GOLDWATER, ROBERT.

  Should the hospital tell? SEE
    Goldwater, Robert.

GOLDWATER, S. S.

  Should the hospital tell? (In The
    Modern hospital, Dec. 1930)
    © 1Dec30; B95743. Robert Goldwater
    (C); 17Sep58; R221303.

GOOCH, THELMA, illus.

Judy Jordan. SEE Garis, Lilian.

  Judy Jordan's discovery. SEE
    Garia, Lilian.

GOOD, PAULA REES, illus.

One hundred best poems for boys and girls. SEE Barrows, Marjorie, comp.

GOODE, CARA.

More profits from advertising and more advertising from profits. SEE Goode, Kenneth M.

GOODE, KENNETH M.

More profits from advertising and more advertising from profits, by Kenneth M. Goode and Carroll Rheinstrom. © 25May31; A37520. Cara Goode (W) & Carroll Rheinstrom (A); 17Dec58; R226983.

GOODENOUGH, ERWIN R.

  The church In the Roman empire.
    (Berkshire studies in European
    history) © 2May31; A38513.
    Erwin R. Goodenough (A); 28Jul58;
    R218659.

GOODWIN, LUCY J.

  Ukulele course. © 25Oct31;
    AA82476. M. M. Cole Pub. House
    (PWH); 28Oct58; R223522.

GORDON, CAROLINE.

  Mr. Powers. (In Scribner's magazine,
    Nov. 1931) © 16Oct31;
    B133106. Caroline Gordon (A);
    12Dec58; R226592.

GORDON, MARGERY, comp.

Verse of our day, an anthology of modern American and British poetry. Compiled by Margery Gordon and Marie B. King. Introd. by Charles Hanson Towne. © on end papers & text changes; 10Apr31; A35873. Jule G. King & Paul J. D. King (NK); 14Nov58; R224319.

<pb id='271.png' n='1958_h2/A/1619' /> GORDON, MRS. S. D.

  Quiet talks on difficult questions.
    SEE Gordon, Samuel D.

GORDON, SAMUEL D.

Quiet talks on difficult questions. © 16May31; A38452. Mrs. S. D. Gordon (W); 29Dec58; R227735.

GORDY, WILBUR FISK.

  Elementary history of the United
    States. Book 3, for grade 6A.
    © 20Oct30; A29543. Charles
    Scribner's Sons (PPW); 20Oct58;
    R222027.

  Elementary history of the United
    States. Book 4 for grade 6B.
    © 24Oct50; A30226. Charles
    Scribner's Sons (PPW); 21Oct58;
    R223189.

GOSPEL QUARTETS FOR MEN. Compiled by
  J. E. Sturgis and others.
  © 2Oct30; A29161. Standard Pub.
  Foundation (PCW); 16Sep58; R221279.

GOSPEL TRUMPET CO.

  Boys' stories of great men. SEE
    Egermeier, Elsie E.

GOSS, MADELEINE.

Beethoven, master musician © 15May31; A37809. Madeleine Goss (A); 28Jul58; R218657.

GOTTFRIED, LA VON E.

  Riders of the San Pedro. SEE
    Bechdolt, Frederick R.

  Youth rides victorious. SEE Bechdolt,
    Frederick R.

GOULD, BRUCE, joint author.

  Flying Dutchman. SEE Fokker,
    Anthony H. G.

GRAEME, BRUCE, pseud. SEE
  Jeffries, Graham Montague.

GRANBERRY, EDWIN, tr.

  A man's life. SEE Lacretelle,
    Jacques De.

GRANT, ELLIOTT M.

  Le roi des montagnes. SEE About,
    Edmond.

GRANT, GORDON, illus.

Penrod. SEE Tarkington, Booth.

GRAS, NORMAN SCOTT BRIEN.

  Industrial evolution. © 8Dec30;
    A31727. Norman Scott Brien Gras
    (A); 21Nov58; R225094.

GRASSET, BERNARD.

  Remarques sur le bonheur. © 15Jul31;
    AF14317. Michel Bernard Privat
    (E); 18Aug58; R219680.

GRAY, EDITH STEARNS.

  Up; a true story of aviation, by
    Jack Stearns Gray. © 13Nov31;
    A47379. Edith S. Gray (A);
    25Nov58; R225321.

GRAY, JACK STEARNS. SEE
  Gray, Edith Stearns.

GRAY, OPAL WILKINS.

  Intermediate Spanish reader. SEE
    Wilkins, Lawrence A.

GRAYSON, DAVID, pseud. SEE
  Baker, Ray Stannard.

GREATHOUSE, GEORGE D., illus.

  Stage guide for young Handel of
    Hanover. SEE Boswell, Helen.

GREEN, ADWIN WIGFALL.

  The inns of court and early English
    drama. With pref. by Roscoe
    Pound. © 28Aug31; A41678.
    Adwin Wigfall Green (A); 18Sep58;
    R221325.

GREEN, ALEXANDER, joint author.

  Modern Spanish grammar. SEE
    Pittaro, John M.

<pb id='272.png' /> GREEN, ANNE.

  Reader, I married him. © 14Feb31;
    A34414. Anne Green (A); 25Nov58;
    R225080.

GREEN, DAGMAR.

  The vintage of You Yeo. SEE Miln,
    Louise Jordan.

GREEN, FITZHUGH.

Roy Chapman Andrews, dragon hunter. © 5Sep30; A27336. First-Stamford National Bank & Trust Co. (E); 23Jul58; R218418.

GREEN, LEON.

  The judicial process in tort cases.
    Temporary advance part.
    © 11Sep31; A44027. West Pub. Co.
    (PWH); 6Oct58; R222468.

GREEN, ROBERT M.

  Handbook of anatomy. SEE Warren,
    John.

GREEN, WARD H., ed.

  The House of the Seven Gables. SEE
    Hawthorne, Nathaniel.

GREIG, IAN.

The tragedy of the Chinese mine. © 5Jan31; A33023. Ian Greig (A); 26Jun58; R217162.

GRENFELL, SIR WILFRED.

The fishermen's saint. Rectorial address delivered at St. Andrews University, November 1929. © 17Oct30; A29542. Rosamond Shaw (C); 13Oct58; R222883.

GREY, LOREN ZANE.

  Tales of Tahitian waters. SEE
    Grey, Zane.

West of the Pecos. SEE Grey, Zane.

GREY, ROMER ZANE.

  Tales of Tahitian waters. SEE
    Grey, Zane.

West of the Pecos. SEE Grey, Zane.

GREY, ZANE.

  Tales of Tahitian waters. Illustrated
    by the author. © 15Oct31;
    A43332. Romer Zane Grey, Elizabeth
    Grey Grosso & Loren Zane
    Grey (C); 12Nov58; R225108.

West of the Pecos. (In American magazine, Aug. 1931-Jan. 1932) © 25Jun31, B119595; 30Jul31, B122807; 27Aug31, B127108; 28Sep31, B128671; 28Oct31, B133086; 25Nov31, B136096. Romer Zane Grey, Elizabeth Zane Grosso & Loren Zane Grey (C); 12Dec58; R227369-227374.

GRIEBSCH, MAX, joint ed.

  Neues deutsches Liederbuch. SEE
    Morgan, B. Q., ed.

GRIEBSCH, MAX. SEE Griebsch, Max.

GRIESBACH, HARRY B.

The plumber's and fitter's helper, by Harry B. Griesbach, Robert C. Rahn, and W. J. Mulderick. © 24Jun31; AA72547. Robert C. Rahn & Harry B. Griesbach (A); 17Jul58; R218239.

GRIFFEN, ELIZABETH F.

  Advanced lessons supplementary to
    Foundation to band playing. SEE
    Griffen, Fred O.

GRIFFEN, FRED O.

  Advanced lessons supplementary to
    Foundation to band playing. All
    parts, except solo cornet.
    © 27Sep30; AA52726. Elizabeth F.
    Griffen (W); 16Jul58; R218234.

  Advanced lessons supplementary to
    Foundation to band playing. Solo
    cornet part. © 28Jul30; AA47471.
    Elizabeth P. Griffen (W);
    16Jul58; R218233.

<pb id='273.png' /> GRIFFIN, AUSTIN B., ed. SEE

  Parson's practice manual of the
    state of New York.

GROLIER ENCYCLOPEDIA. Vol.1-10.
  Originally pub. as Doubleday's
  encyclopedia. Editor, Arthur
  Elmore Bostwick; managing editor,
  Asa Don Dickinson; associate editor,
  Nella Braddy; foreign editor, J. A.
  Hammerton. © 1Apr31; A36247.
  Grolier Society. Inc. (PWH);
  31Oct58; R224318.

GROLIER SOCIETY, INC. SEE

The Book of knowledge.

Grolier encyclopedia.

GROPPER, WILLIAM, illus.

  More necessary nonsense. SEE
    Johnson, Burges, comp.

GROSS, PEGGY M.

  Singer of the wilderness. SEE
    Mowery, William Byron.

  The wilderness singer. SEE Mowery,
    William Byron.

GROSSE, ELLEN.

  Modernes Klavierspiel nach Leimer-Gieseking.
    SEE Leimer, Karl.

GROSSO, ELIZABETH GREY.

  Tales of Tahitian waters. SEE
    Grey, Zane.

GROSSO, ELIZABETH ZANE.

West of the Pecos. SEE Grey, Zane.

GROVES, ERNEST R.

  Sex in marriage, by Ernest R.
    Groves and Gladys Hoagland Groves.
    © 15Jun31; A40133. Gladys Hoagland
    Groves (A); 5Dec58; R225989.

GROVES, GLADYS HOAGLAND, joint author.

  Sex in marriage. SEE Groves,
    Ernest R.

GROZIER, EDWIN ATKINS, ed.

One hundred best novels condensed. Edited by Edwin A. Grozier, assisted by Charles E. L. Wingate and Charles H. Lincoln. © 18May31; A38284. Helen Grozier Farley (C); 12Nov58; R225099.

GRUYER, LOUISE FRANCOISE GABRIELLE.
  SEE Herbemont, Louise Francoise
  Gabrielle Gruyer.

GRUYER, PAUL, tr.

  Contes des Mers du Sud. SEE
    London, Jack.

GUARANTY TRUST CO. OF NEW YORK.

  The path to peace. SEE Butler,
    Nicholas Murray.

  Stars to-night. SEE Filsinger,
    Sara Teasdale.

GUEHENNO, JEAN.

Conversion a l'humain. (Les Ecrits, 9) © 8May31; AF13523. Jean Guehenno (A); 14Jul58; R217690.

GUERIN, DANIEL.

  Lettres de Degas. SEE Degas,
    Hilaire Germain Edgar.

GUERIN, EDMEE. SEE
  Indig, Edmee Guerin.

GUERIN, GUILLAUME.

  Lettres de Degas. SEE Degas,
    Hilaire Germain Edgar.

GUERIN, MARCEL.

  Lettres de Degas. SEE Degas,
    Hilaire Germain Edgar.

GUEST, STEPHEN HADEN. SEE
  Haden-Guest, Stephen.

GUILLEMIN, ERNST A.

Communication networks. Vol.1: The classical theory of lumped constant networks. 1st ed. © 27Jan31; A33504. Ernst A. Guillemin (A); 21Nov58; R225543.

<pb id='274.png' n='1958_h2/A/1620' /> GUILLOUX, LOUIS.

  Compagnons. © 4Jun31; AF13510.
    Louis Guilloux (A); 18Aug58;
    R219672.

GUITTEAU, WILLIAM BACKUS.

  Preparing for citizenship. Rev. ed.
    © 8Jan31; A32741. William Backus
    Guitteau (A); 2Jan59; R227595.

GUMILEVSKII, LEV IVANOVICH. SEE
  Goomilevsky, Lev.

GUZMAN, MARTIN LUIS.

The eagle and the serpent. From the Spanish. Translation, Harriet de Onis. © 19Sep30; A27776. Alfred A. Knopf, Inc. (PWH); 12Aug58; R219133.

HABER, WILLIAM.

Industrial relations in the building industry. © 18Oct30; A29583. William Haber (A); 17Sep58; R221566.

HADAS, MOSES.

  Sextus Pompey. © 1Oct30; A29072.
    Moses Hadas (A); 1Oct58; R222064.

HADEN-GUEST, STEPHEN, tr.

  A night in Kurdistan. SEE Bloch,
    Jean Richard.

HADER, BERTA.

  Lions and tigers and elephants,
    too, by Berta and Elmer Hader.
    © 16Jul30; A26486. Berta Hader &
    Elmer Hader (A); 9Jul58; R217550.

  Picture book of Mother Goose.
    By Berta and Elmer Hader.
    © 15Oct30; A29701. Berta & Elmer
    Hader (A); 5Aug58; R219120.

  Under the pig-nut tree, by Berta and
    Elmer Hader. © 8May31; A37253.
    Berta & Elmer Hader (A); 1Dec58;
    R225131.

HADER, BERTA H., illus.

Lion cub. SEE Williamson, Hamilton.

HADER, ELMER, joint author.

  Lions and tigers and elephants, too.
    SEE Hader, Berta.

  Picture book of Mother Goose. SEE
    Hader. Berta.

  Under the pig-nut tree. SEE Hader,
    Berta.

HADER, ELMER S., illus.

Lion cub. SEE Williamson, Hamilton.

HÄNDEL, GEORGE FREDERICK.

Air a la bourree; piano. Transcription: William Mason. Text matter: Arthur Edward Johnstone. (Composition catalog no.565) © on transcription & text matter; 15Jan31; AA60293. Art Publication Society (PWH); 29Dec58; R227727.

HAGEDORN, HERMANN.

  Leonard Wood. Vol.1-2.
    © 16Sep31; A42386-42387.
    Hermann Hagedorn (A); 3Dec58;
    R225720-225721.

HAGEN, JOHN MILTON, comp.

Western college songs. © 16Oct31; AA81042. John Milton Hagen (A); 17Oct58; R222967.

HAI SCHANG SCHUO MONG JEN.

  Fräulein Tschang. Translator:
    Franz Kuhn. © 24Sep31; AF14623.
    Franz Kuhn (A); 14Nov58; R225627.

HALDANE, JOHN.

Judith Paris. SEE Walpole, Hugh.

<pb id='275.png' /> HALDANE, JOHN SCOTT.

The philosophical basis of biology. (Donnellan lectures, University of Dublin, 1930) © 30Jun31, AI-15464; 8Oct31, A42979. Louisa Haldane (W); 9Oct58; R222675.

HALDANE, LOUISA.

  The philosophical basis of biology.
    SEE Haldane, John Scott.

HALDEMAN, HENRY J.

  An encyclopedia of sex. SEE
    Haldeman-Julius, E.

HALDEMAN-JULIUS, E.

An encyclopedia of sex. (Little blue book no.1546) © 22Sep30; AA52137. Henry J. Haldeman (C); 15Sep58; R221260.

HALDEMAN-JULIUS, HENRY.

  The amazing frameup of Mooney and
    Billings. SEE Haldeman-Julius,
    Marcet.

HALDEMAN-JULIUS, MARCET.

The amazing frameup of Mooney and Billings; how California has stolen thirteen years from these labor leaders. © 12Nov30; AA61911. Henry Haldeman-Julius (C); 3Nov58; R223796.

HALDEMAN-JULIUS CO.

Boccaccio. SEE Fielding, William J.

  How to conduct a love affair. SEE
    Van Deventer, Betty.

  Making men happy with jams & jellies.
    SEE Palmer, Elizabeth.

  Popular Chinese cook book. SEE
    Gibbs, Lorene Campbell.

  Rules for success in business.
    SEE Feather, William.

HALE, NANCY.

  Colloque sentimentale. (In
    Scribner's magazine, Aug. 1931)
    © 17Jul31; B122192. Nancy Hale
    (A); 20Aug58; R219880.

HALEVY, DANIEL.

  Decadence de la liberte. (Les
    Ecrits, 10) © 3Jun31; AF13521.
    Daniel Halevy (A); 18Aug58;
    R219675.

HALL, GLADYS FOOTNER.

Easy to kill. SEE Footner, Hulbert.

HALL, J. LINCOLN.

The triad, w by Mattie B. Shannon and Elsie Duncan Yale; m by J. Lincoln Hall, Arthur H. Mann, and others. © 20Apr31; AA67292. Rodeheaver Co. (PWH); 14Aug58; R220277.

HALL, JAMES NORMAN.

Mother Goose Land. With illus. by Herman I. Bacharach. © 17Sep30; A27653. Sarah M. Hall (W); 15Sep58; R221352.

HALL, SARAH M.

  Mother Goose Land. SEE Hall, James
    Norman.

HALLESBY, O.

  Why I am a Christian. Clarence J.
    Carlsen, translator. © 30Aug30;
    A27725. Clarence J. Carlsen (A);
    18Aug58; R219669.

HALLOCK, ADELIA COBB.

  Fraternal sermons and addresses.
    SEE Hallock, G. B. F.

HALLOCK, G. B. F.

Fraternal sermons and addresses © 26Feb31; A34561. Marianna Cobb Hallock & Adelia Cobb Hallock (C); 7Jul58; R217595.

HALLOCK, MARIANNA COBB.

  Fraternal sermons and addresses.
    SEE Hallock, G. B. F.

<pb id='276.png' /> HAMILTON, CLAYTON.

Ruy Blas. SEE Hugo, Victor.

HAMMERTON, J. A., ed. SEE
  Grolier encyclopedia.

HAMMETT, DASHIELL.

  The glass key. © 20Jan31,
    AI-14869; 24Apr31, A36854.
    Dashiell Hammett (A); 29Oct58;
    R223618.

HANDEL-MAZZETTI, ENRICA LUDOVICA MARIA, FREIIN VON.

  Jesse and Maria. Translated by
    George N. Shuster. © 1Sep31;
    A42227. George N. Shuster (A);
    2Dec58; R225582.

HANNAN, JEROME D.

Bible history. SEE Johnson, George.

HANNAY, JAMES OWEN.

  Fed up, by George A. Birmingham,
    pseud. © 12Mar31, AI-15058;
    22Jul31, A39964. Robert Hannay
    (C); 10Sep58; R221191.

  The hymn tune mystery, by George
    A. Birmingham, pseud. © 9Oct30;
    AI-14517; 4Mar31; A34824. Robert
    Hannay (C); 10Sep58; R221190.

HANNAY, ROBERT.

Fed up. SEE Hannay, James Owen.

  The hymn tune mystery. SEE Hannay,
    James Owen.

HANNUM, ALBERTA PIERSON.

  Thursday April. © 22Jul31;
    A39678. Alberta Pierson Hannum
    (A); 17Dec58; R226984.

HARBOUR, J. L.

  The absent minded professor.
    © 1Feb31; AA91859. Wetmore Declamation
    Bureau (PWH); 20Nov58;
    R225369.

  Boys will be boys. © 15Sep31;
    AA91886. Wetmore Declamation
    Bureau (PWH); 20Nov58; R225371.

  Me and Skinny. © 15Sep31;
    AA91900. Wetmore Declamation
    Bureau (PWH); 20Nov58; R225372.

HARER, JOSEPHINE L.

  Famous American athletes of today.
    SEE Johnston, Charles Haven Ladd.

HARGENS, CHARLES, illus.

Roads of roam. SEE Birney, Hoffman.

HARKNESS, GEORGIA.

  John Calvin: the man and his
    ethics. © 18Sep31; A41711.
    Georgia Harkness (A); 26Sep58;
    R221845.

HARLOW, ALVIN F.

  Old Bowery days. © 26Jun31; A40164.
    Alvin F. Harlow (A); 13Nov58;
    R225326.

HARPER, R. TRISTRAM.

  Windy island. SEE Harper,
    Theodore Acland.

HARPER, THEODORE ACLAND.

  Windy island, by Theodore Acland
    Harper in collaboration with
    Winifred Harper. Illustrated by
    Lowell Houser. © 5Nov31;
    A44978. R. Tristram Harper (NK of
    Theodore Acland Harper); 19Nov58;
    R225058.

HARPER, WILHELMINA.

Around the hearth fire. Illustrated by Decie Merwin. © 28Aug31; A42041. Wilhelmina Harper (A); 13Nov58; R225337.

HARPER, WINIFRED.

  Windy island. SEE Harper,
    Theodore Acland.

HARPER & BROS.

  The adventures of Huckleberry Finn.
    SEE Twain, Mark.

<pb id='277.png' n='1958_h2/A/1621' />
  A little book of vagabond songs.
    SEE Shay, Frank, comp.

  Peter Ibbetson. SEE Du Maurier,
    George Louis Palmella Busson.

  The prince and the pauper. SEE
    Twain, Mark.

HARRINGTON, KARL P.

The Abingdon book of Christmas carols. © 20Nov31; AA86199. Mabel Harrington Potter (C); 15Dec58; R226675.

HARRIS, DORETHEA.

  Handbook for prospectors. SEE
    Bernewitz, M. W. von.

HARRISON, CHARLES YALE.

  A child is born. © 9Mar31;
    A34809. Eva Harrison (W);
    15Sep58; R221254.

  Clarence Darrow. © 2Nov31;
    A43805. Eva Harrison (W);
    2Dec58; R226193.

HARRISON, EVA.

  A child is born. SEE Harrison,
    Charles Yale.

  Clarence Darrow. SEE Harrison,
    Charles Yale.

HARRISON, SHELBY M.

The social survey: the idea defined and its development traced. © 27May31; A38860. Russell Sage Foundation (PWH); 10Nov58; R224879.

HART, HORNELL.

Technique of social progress. © 8Sep31; A42314. Hornell Hart (A); 16Sep58; R221576.

HART-DAVIS, RUPERT.

Judith Paris. SEE Walpole, Hugh.

HARTS, HARRY L., comp.

The junior Church choir year book of anthems for soprani and alti. Compiled and arr. by Harry L. Harts. © 3Sep31; A41533. Edwin H. Morris & Co., Inc. (PWH); 3Sep58; R220761.

HARTSWICK, F. GREGORY.

  The cross word puzzle book. SEE
    Buranelli, Prosper, ed.

  The mammoth cross word puzzle book.
    SEE Buranelli, Prosper, ed.

  The post graduate cross word puzzle.
    SEE Buranelli, Prosper, ed.

  Scotch. SEE Mactavish, Angus
    J., comp.

HARTSWICK, F. GREGORY. SEE
  The cross word puzzle book.

HARVARD UNIVERSITY. PRESIDENT & FELLOWS
  OF HARVARD COLLEGE.

  Handbook of anatomy. SEE Warren,
    John.

HASKINS, HOWARD D., joint author.

  A textbook of laboratory diagnosis.
    SEE Osgood, Edwin E.

HASTINGS, HOWARD L., illus.

  Mark Gilmore, speed flyer. SEE
    Fitzhugh, Percy Keese.

  Mark Gilmore's lucky landing. SEE
    Fitzhugh, Percy Keese.

HATCH, LEONARD.

The book of dilemmas. Thirty moral (and immoral) predicaments with suggested solutions by Franklin P. Adams, Bruce Barton, Heywood Broun and Christopher Morley. © 24Sep31; A41877. Leonard Hatch (A); 24Oct58; R223554.

HATHAWAY, HELEN.

What your voice reveals. © 24Feb31; A34537. Charles H. Durham (NK); 25Nov58; R225081.

<pb id='278.png' /> HAUCK, LOUISE PLATT.

  Anne marries again. © 19Sep30;
    A29084. Mrs. John R. Colemen (C);
    21Jul58; R218284.

  Sylvia. © 16Jan31; A33890.
    Louise Platt Hauck (A); 29Dec58;
    R226940.

HAWTHORNE, NATHANIEL.

The House of the Seven Gables. Edited by Ward H. Green. (Golden key series) © on introd., bibliography, questions & problems; 19Jun31; A39310. Ward H. Green (A); 6Nov58; R224135.

  The snow image. Illus. by Dorothy
    P. Lathrop. (The Little library)
    © 18Nov30; A30729. Macmillan Co.
    (PWH); 17Sep58; R221298.

HAYCOX, ERNEST.

  Crossfire. (In Ace-high magazine,
    Oct. 30, 1931) © 9Sep31;
    B127596. Jill Marie Haycox (W);
    5Nov58; R224758.

  An evening's entertainment. (In
    Collier's, Sept. 26, 1931)
    © 8Sep31; B127541. Jill Marie
    Haycox (W); 5Nov58; R224759.

  In answer to summons. (In Short
    stories, Aug. 10, 1931)
    © 25Jul31; B123454. Jill Marie
    Haycox (W); 18Sep58; R221307.

  McQuestion rides. (In Collier's,
    June 20, 1931) © 2Jun31;
    B117356. Jill Marie Haycox (W);
    2Jul58; R217557.

  Manhunt! (In Short stories,
    Aug. 25, 1931) © 10Aug31;
    B124443. Jill Marie Haycox (W);
    18Sep58; R221308.

  Officer's choice. (In Collier's,
    July 4, 1931) © 15Jun31;
    B119161. Jill Marie Haycox (W);
    17Jul58; R218096.

  Ride out. (In West, June 24, 1931)
    © 10Jun31; B119164. Jill Marie
    Haycox (W); 2Jul58; R217559.

  Smoke talk. (In Short stories,
    July 25, 1931) © 10Jul31;
    B120941. Jill Marie Haycox (W);
    17Jul58; R218095.

  Star toter. (In Short stories,
    June 25, 1931) © 10Jun31;
    B119163. Jill Marie Haycox (W);
    2Jul58; R217558.

  When you carry the star. (In
    Collier's, Dec. 5, 1931)
    © 13Nov31; B134394. Jill Marie
    Haycox (W); 10Dec58; R226478.

HAYCOX, JILL MARIE.

  For works claimed by Jill Marie
    Haycox SEE Haycox, Ernest.

HEGLAND, MARTIN.

Walking with God. © 24Nov30; A30926. Martin Hegland (A); 6Nov58; R224060.

HEIDBREDER, EDNA, ed.

  Minnesota mechanical ability teats.
    SEE Paterson, Donald G.

HEINRICH, H. W.

Industrial accident prevention. © 26Jan31; A33418. H. W. Heinrich (A); 6Aug58; R219151.

HELD, JOHN, JR.

Women are necessary. © 26Feb31; A35101. Mrs. John Held, Jr. (W); 5Dec58; R225977.

HELD, MRS. JOHN, JR.

  Women are necessary. SEE Held,
    John, Jr.

HELEN LOUISE, SISTER.

Sister Louise (Josephine van der Schrieck) 1813-1886, American foundress of the Sisters of Notre Dame de Namur, by Sister Helen Louise (Nugent) © 28May31; A40178. Sister Mary Patrick (E); 7Nov58; R224776.

<pb id='362.png' /> HELLER, ARTHUR.

Mount Vernon, Washington's home and the nation's shrine. SEE Wilstach, Paul.

HEMINGWAY, ERNEST.

  In our time. Introd. by Edmund
    Wilson. © on introd.; 24Oct30;
    A31583. Charles Scribner's
    Sons (PWH); 13Oct58; R223036.

  In our time. Rev. & new ed.
    © 24Oct30; A31583. Ernest
    Hemingway (A); 13Oct58; R223035.

HENDERSON, DONALD J.

  Teaching American economic life.
    SEE Tugwell, Rexford Guy.

HENDERSON, GLADYS.

  At the lace counter, by Gracia
    Stayton, pseud. © 15Sep31;
    AA91821. Wetmore Declamation
    Bureau (PWH); 20Nov58; R225354.

  The bride and the broom, by Gracia
    Stayton, pseud. © 15Sep31;
    AA91822. Wetmore Declamation
    Bureau (PWH); 20Nov58; R225355.

  Dotty drives a bargain, by
    Penelope Dickerson, pseud.
    © 15Sep31; AA91829. Wetmore
    Declamation Bureau (PWH);
    20Nov58; R225359.

  Gwendolyn meets the dentist, by
    Gracia Stayton, pseud.
    © 15Sep31; AA91830. Wetmore
    Declamation Bureau (PWH);
    20Nov58; R225360.

The OO-la-la hat, by Gracia Stayton, pseud. © 15Sep31; AA91023. Wetmore Declamation Bureau (PWH); 20Nov58; R225356.

HENDRICKSON, DAVID.

  Adventures in solitude. SEE
    Baker, Ray stannard.

HENDRYX, JAMES B.

Corporal Downey takes the trail. © 8Oct31; A43226. James B. Hendryx (A); 9Oct58; R222676.

Corporal Downey takes the trail. (In Short stories, Sept. 10-Oct. 10, 1931) © 25Aug31, B125876; 10Sep31, B127713; 25Sep31, B129477. James B. Hendryx (A); 29Sep58; R222079-222080, 222084.

Justice on halfaday. (In Short stories, Aug. 25 1931) © 10Aug31; B121443. James B. Hendryx (A); 13Aug58; R219439.

HENNESSY, DAME UNA BIRCH POPE-. SEE
  Pope-Hennessy, Dame Una Birch.

HENNESSY, JAMES POPE-. SEE
  Pope-Hennessy, James.

HENNINGS, RICHARD.

  Klein Heini. Edited by Elizabeth
    Seeber. © 3Sep31; A42221.
    Elizabeth Seeber (A); 16Sep58;
    R221574.

HENRY, GEORGE A.

The probate law and practice of the State of Indiana. Vol. 1-2. Completely rev. as to text and forms by Mahlon E. Bash. 4th ed. © 15Jan31; A34031. Bobbs-Merrill Co., Inc. (PWH); 22Dec58; R227399.

HENRY, HARRIET. SEE De Steuch,
  Harriet Henry.

HENSHAW, JULIA P.

Tiger bayou. SEE Henshaw, Nevil G.

HENSHAW, NEVIL G.

  Tiger bayou. © 4Sep31; A42265.
    Julia P. Henshaw (W); 15Sep58;
    R221253.

HENSINGER, CLAYTON F.

  Beneath the make-up. © 15Sep31;
    AA91873. Wetmore Declamation
    Bureau (PWH); 20Nov58; R225370.

<pb id='280.png' n='1958_h2/A/1622' />
HERBEMONT, MME. SEE
  Herbemont, Louise Francoise Gabrielle
  Gruyer.

HERBEMONT, LOUISE FRANCOISE GABRIELLE GRUYER.

  Contes des Mers du Sud. SEE
    London, Jack.

HERBERG, THEODORE.

Plane geometry workbook. Books 1-2. By Theodore Herberg and Sinclair J. Wilson. © 8Apr31; A35778. Theodore Herberg (A); 6Nov58; R224129.

HERBERT, A. P.

Ballads for broadbrows and others. © 22Oct31; A43768. A. P. Herbert (A); 24Oct58; R223392.

HERBST, WINFRID.

Talks to boys and girls. © 20Apr31; A38598. Winfrid Herbst (A); 2Dec58; R225734.

HERFORD, HELEN B.

  The deb's dictionary. SEE Herford,
    Oliver.

Sea legs. SEE Herford, Oliver.

HERFORD, OLIVER.

  The deb's dictionary. © 26Sep31;
    A44506. Helen B. Herford (NK);
    26Sep58; R221846.

  Sea legs. © 10Mar31; A37333.
    Helen B. Herford (NK); 22Dec58;
    R227607.

HERGESHEIMER, DOROTHY.

  The limestone tree. SEE
    Hergesheimer, Joseph.

HERGESHEIMER, MRS. JOSEPH. SEE
  Hergesheimer, Dorothy.

HERGESHEIMER, JOSEPH.

  The limestone tree. © 2Jan31;
    A34000. Dorothy Hergesheimer
    (Mrs. Joseph Hergesheimer) (W);
    29Oct58; R223617.

HEROLD, J. B., ed.

  Advance reports. SEE Louisiana.
    Courts of Appeal.

  Reports of the Louisiana Courts of
    Appeal. SEE Louisiana. Courts of
    Appeal.

HERRICK, C. JUDSON.

An introduction to neurology. 5th ed., thoroughly rev. © 1Apr31; A36292. C. Judson Herrick (A); 13Nov58; R224970.

HERTZLER, ARTHUR E.

Surgical pathology of the diseases of bones. (Hertzler's monographs on surgical pathology) © on corrections; 16Mar31; A39053. Mrs. Arthur E. Hertzler (W); 26Nov58; R225596.

Surgical pathology of the genitourinary organs. (Hertzler's monographs on surgical pathology) © 9Sep31; A44353. Mrs. Arthur E. Hertzler (W); 15Sep58; R222004.

Surgical pathology of the skin, fascia, muscles, tendons, blood and lymph vessels. (Hertzler's monographs on surgical pathology) © 29Jun31; A41307. Mrs. Arthur E. Hertzler (W); 26Nov58; R225597.

HERTZLER, MRS. ARTHUR E.

Surgical pathology of the diseases of bones. SEE Hertzler, Arthur E.

Surgical pathology of the genitourinary organs. SEE Hertzler, Arthur E.

Surgical pathology of the skin, fascia, muscles, tendons, blood and lymph vessels. SEE Hertzler, Arthur E.

HERZBERG, MAX J.

  Roget's international thesaurus of
    English words and phrases. SEE
    Mawson, Christopher Orlando
    Sylvester.

<pb id='281.png' /> HERZOG, ALFRED W.

  Medical jurisprudence. © 11May31;
    A40242. Bobbs-Merrill Co., Inc.
    (PWH); 22Dec58; R227412.

HERZOG, CHARLES G.

Channels of redemption. © 15Sep31; A43193. Charles G. Herzog (A); 7Nov58; R224767.

HESS, HERBERT W.

Advertising: its economics, philosophy & technique. © 23Jan31; A36367. Henry R. Schaffner (E); 15Sep58; R221144.

HESS, KATHARINE P.

  Problems in textiles, by Katharine
    P. Hess and Esther Brunner.
    © 10Sep31; A44357. Katharine P.
    Hess (A); 15Sep58; R222005.

  Textile fibers & their use.
    (Lippincott enterprise series)
    © 18Aug31; A44361. Katharine P.
    Hess (A); 15Sep58; R222007.

HEWITT, EDGAR L.

  Ancient life in the American Southest.
    © 29Oct30; A30680.
    Edgar L. Hewitt (A); 25Aug58;
    R220485.

HEWITT, JOHN HOLLIS.

  Abendliche hauser. SEE Keyserling,
    E. von.

HEWITT, RICHARD M., ed.

Collected papers of the Mayo Clinic and the Mayo Foundation. SEE Mayo Clinic, Rochester, Minn.

HEWITT, THEODORE B., ed.

  Abendliche hauser. SEE Keyserling,
    E. von.

HICHENS, ROBERT.

The first Lady Brandon. Illus. by Will Foster. (In Chicago Sunday tribune, Aug. 2-Nov. 1, 1931) © 2Aug-1Nov31; A5-36159. Edy Schmidiger (E); 17Nov58; R225064.

The first Lady Brandon. (Pub. abroad in 6 instalments in The Story teller, June-Nov. 1931) © 15May, 15Jun31, AI-15292, 15Jul, 13Aug31, AI-15483, 15Sep, 15Oct31, AI-15645; 22Oct31, A44966. Edy Schmidiger (E); 24Oct58; R223397, 223399, 223398.

HICKS, R. KEITH, ed.

Colomba. SEE Merimee, Prosper.

HIGGINSON, GLENN DEVERE.

Fields of psychology; a study of man and his environment. © 26May31; A39059. Glenn Devere Higginson (A); 28Jul58; R218665.

HILDEBRANOT, JENNIE P.

  Human values. SEE Parker,
    DeWitt H.

HILL, BRIAN.

  Murder out of tune, by Marcus
    Magill, pseud. © 13Mar31,
    AI-15050; 24Jun31, A42016.
    Marcus Magill (Brian Hill) (A);
    9Sep58; R221086.

HILL, GRACE LIVINGSTON.

  Kerry. © 22Sep31; A44360. Ruth H.
    Munce (C); 27Oct58; R224156.

  Memories of yesterdays. SEE
    Alden, Isabella M.

HILL, HARRY S.

  The Conestoga wagon-ship of inland
    commerce. © 20Oct30; A32098.
    Harry S. Hill (A); 13Aug58;
    R219342.

HILLS, E. C.

La Prance, son hlstoire, sa civilisation, cours elementaire. By E. C. Hills and Mathurin Dondo (Heath's modern language series) © 15Jul31; A39544. Mathurin Dondo (A); 6Nov58; R224137.

<pb id='363.png' /> HINTON, EDWARD W.

  Cases on the law of evidence selected
    from decisions of English and
    American courts. 2d ed.
    (American casebook series.
    William Reynolds Vance, general
    editor) © 3Jul31; A40806.
    West Pub. Co. (PWH); 6Oct58;
    R222466.

HITCHCOCK, ALFRED M., joint author.

Sentence craft. SEE Wright, Alfred A.

HITCHCOCK, HARRIET H.

  Sentence craft. SEE Wright,
    Alfred A.

HOBSON, FRANCIS THAYER.

The name Is Lois, by Francis Thayer, pseud. (In McCall's, June 1931) © 8May31; B114125. Francis Thayer Hobson (A); 31Jul58; R218887.

HODGES, HELEN.

Toujours francais cours elementaire, by Helen Hodges, Agnes Nelson, Vivian Vestal. Illustrated by Adelaide Field. © 13Sep30; A28326. Helen Hodges (A); 12Sep58; R221247.

HODNETT, EDWARD, ed.

  A tale of a tub. SEE Swift,
    Jonathan.

HOFFMAN, JAMES IRVIN, joint author.

  Chemical analysis of iron and steel.
    SEE Lundell, G. E. F.

HOHLFIELD, A. R., joint ed.

  Neues deutsches Liederbuch. SEE
    Morgan, B. Q., ed.

HOLDSWORTH, GLADYS BERTHA.

Mosaic, by G. B. Stern, pseud. © 10Oct30; A30577. Gladys Bertha Holdsworth (A); 25Aug58; R220302.

HOLLAND, MARGARET LYON.

  Yankee ships in pirate waters. SEE
    Holland, Rupert Sargent.

HOLLAND, RUPERT S.

  A race for a fortune. © 10Sep31;
    A43550. Mrs. Rupert S. Holland
    (W); 15Sep58; R222001.

HOLLAND, MRS. RUPERT S.

  A race for fortune. SEE Holland,
    Rupert S.

HOLLAND, RUPERT SARGENT.

  Yankee ships in pirate waters.
    Illustrated by Frank E. Schoonover.
    © 5Oct31; A43190. Margaret
    Lyon Holland (W); 8Oct58; R222299.

HOLLAND, W. J.

  The butterfly book. New and
    thoroughly rev. ed. © 9Jul31;
    A40411. Muriel McKaig Miller
    (NK); 10Jul58; R217707.

HOLLIS, CHRISTOPHER. SEE Hollis,
  Maurice Christopher.

HOLLIS, MAURICE CHRISTOPHER.

  Saint Ignatius. © 9Oct71; A44175.
    Christopher Hollis (A); 17Dec58;
    R226996.

HOLLY, FLORA M.

  The caliph of Bagdad. SEE
    Davis, Robert H.

HOLMGREN, E. S., comp.

Rules for admission to the bar in the several states and territories of the United States, in force April 1, 1931, together with the Code of ethics adopted by the American Bar Association annotated to cases in point and list of law schools. 18th ed. © 25Apr31; A38410. West Pub. Co. (PWH); 3Jul58; R217523.

<pb id='283.png' n='1958_h2/A/1623' /> HOLT, EDWIN B.

Animal drive and the learning process. Vol.1. © 29Jan31; A34240. George X. Bernier (E); 25Jul58; R218426.

HOLT, GAVIN, pseud. SEE
  Rodda, Charles.

HOLZINGER, KARL J.

Statistical tables for students in education and psychology. 3d ed. © 21Jul31; A44260. Marion Stone Holzinger (Mrs. Karl J. Holzinger) (W); 24Jul58; R218364.

HOLZINGER, MARION STONE.

Statistical tables for students in education and psychology. SEE Holzinger, Karl J.

HOLZWORTH, JOHN M.

The wild grizzlies of Alaska. © 5Sep30; A27339. John M. Holzworth (A); 30Jul58; R218766.

HOOKER, BRIAN, tr.

Ruy Blas. SEE Hugo, Victor.

HOOKER, DORIS C.

Ruy Blas. SEE Hugo, Victor.

HOOKER, GORDON E.

  All's well; male quartet, vocal.
    (In Gospel quartets for men)
    © 2Oct30; A29161. Gordon E.
    Hooker (A); 29Sep58; R221923.

  Anchored; male quartet, vocal.
    (In Gospel quartets for men)
    © 2Oct30; A29161. Gordon E.
    Hooker (A); 29Sep58; R221922.

  Breath of Calvary; male quartet,
    vocal. (In Gospel quartets for
    men) © 2Oct30; A29161. Gordon
    E. Hooker (A); 29Sep58; R221920.

A burning and a shining light; male quartet, vocal. (In Gospel quartets for men) © 2Oct30; A29161. Gordon E. Hooker (A); 29Sep58; R221919.

  Christ our joy; male quartet,
    vocal. (In Gospel quartets for
    men) © 2Oct30; A29161. Gordon
    E. Hooker (A); 29Sep58; R221921.

  Without a doubt; male quartet,
    vocal. (In Gospel quartets for
    men) © 2Oct30; A29161. Gordon
    E. Hooker (A); 29Sep58; R221924.

HOOPER, THOMAS PLACID.

The angels. SEE Vonier, Anscar.

  Death and judgement. SEE Vonier,
    Anscar.

HOPE, LAURA LEE, pseud.

Bunny Brown and his sister Sue at the summer carnival, by Laura Lee Hope, pseud. of Harriet S. Adams and Edna C. Squier. Illustrated by Walter S. Rogers. © 11May31; A38119. Harriet S. Adams & Edna C. Squier (A); 29Dec58; R226958.

HOPPER, BRUCE C.

  Pan Sovietism, the issue before
    America and the world. © 8Apr31;
    A35684. Bruce C. Hopper (A);
    2Jan59; R227598.

HOPPER, JAMES.

  The flat. (In Liberty magazine,
    Dec. 26, 1931) © 17Dec31;
    B139498. Elayne Hopper Chanslor
    (W); 22Dec58; R226905.

  Girl and the quarterback. (In
    Collier's magazine, Nov. 28, 1931)
    © 9Nov31; B133732. Elayne Hopper
    Chanslor (W); 4Dec58; R226358.

  The mare queerless. (In Collier's
    magazine, Nov. 7, 1931)
    © 19Oct31; B131478. Elayne
    Hopper Chanslor (W); 29Oct58;
    R223604.

<pb id='284.png' />
  Three million percent. (In Liberty
    magazine, July 25, 1931)
    © 16Jul31; B122182. Elayne
    Hopper Chanslor (W); 20Aug58;
    R219878.

Tin foil. (In Liberty, Oct. 17, 1931) © 8Oct31; B136003. Elayne Hopper Chanslor (W); 17Oct58; R223039.

The toy parade. (In Collier's magazine, Dec. 12, 1931) © 20Nov31; B134764. Elayne Hopper Chanslor (W); 8Dec58; R226356.

HORGAN, PAUL.

Figures in a landscape. Five sketches: The landscape, The tularosa bobcat, The captain, Hot st'ff and The last words of Mrs. McDonny. (In Botkin, B. A., ed., Folk-say; a regional miscellany, v.3, 1931) © 5Nov31; A45478. Paul Horgan (A); 26Nov58; R225476.

In a winter dusk. (In Harper's magazine, Aug. 1931) © 18Jul31; B121709. Paul Horgan (A); 22Aug58; R219976.

  Men of arms. Written and drawn by
    Paul Horgan. © 26Oct31; A44902.
    Paul Horgan (A); 18Nov58; R224867.

HORLER, ROSE ELLEN.

  The man who walked with death. SEE
    Horler, Sydney.

HORLER, SYDNEY.

The man who walked with death. (Pub. abroad as The spy) © 28Apr31, AI-15228; 23Oct31, A45040. Rose Ellen Horler (W); 6Nov58; R224064.

HORRABIN, J. F.

The new and revised outline of history. SEE Wells, H. G.

HORTON, WALTER MARSHALL.

  A psychological approach to theology.
    © 8Jul31; A39338. Walter
    Marshall Horton. (A); 20Oct58;
    R223290.

HOSKEN, CLIFFORD JAMES WHEELER.

The Fleet Hall inheritance, by Richard Keverne, pseud. © 30Mar31, AI-15129; 5Aug31, A42095. Emma Hosken (W); 3Dec58; R225710.

HOSKEN, EMMA.

  The Fleet Hall inheritance. SEE
    Hosken, Clifford James Wheeler.

HOUGEN, OLAF A.

  Industrial chemical calculations.
    By O. A. Hougen and K. M. Watson.
    1st ed. © 18Nov31; A45134.
    Olaf A. Hougen & Kenneth M. Watson
    (A); 12Dec58; R227294.

HOUGHTON, CAROLYN WELLS.

  The skeleton at the feast, by
    Carolyn Wells. © 19Jun31;
    A39082. Maurice O'Connell, Jr.
    (Adm d.b.n.c.t.a.); 8Jul58;
    R217584.

HOUGHTON MIFFLIN CO.

  As you like it. SEE Shakespeare,
    William.

  Mother Carey's chickens. SEE
    Wiggin, Kate Douglas Smith.

HOUSER, LOWELL, illus.

  Windy island. SEE Harper,
    Theodore Acland.

HOUTEFF, FLORENCE M.

  The shepherd's rod. SEE Houteff,
    Victor T.

HOUTEFF, VICTOR T.

The shepherd's rod. Vol.1. © 4Dec30; A32559. Florence M. Houteff (W); 2Sep58; R220550.

<pb id='364.png' /> HOWELL, ROGER.

A text-book of physiology for medical students and physicians. SEE Howell, William H.

HOWELL, WILLIAM H.

A text-book of physiology for medical students and physicians. 11th ed., rev. © 18Sep30; A27748. Janet H. Clark, Teresa H. Hulburt & Roger Howell (C); 11Jul58; R217744.

HOWEY, MARTHA M.

A short guide to the art of Europe. © 22Apr31; A35980. Martha M. Howey (A); 2Jan59; R227605.

HOYT, VANCE JOSEPH.

  Bar-rac, the biography of a raccoon.
    © 15Apr31; A36655. Vance Joseph
    Hoyt (A); 7Nov58; R224325.

  Malibu. Illustrated by Charles
    Livingston Bull. © 15Sep31;
    A42443. Vance Joseph Hoyt (A);
    19Sep58; R221634.

HUBACHEK, FRANK R.

The constitutionality of small loan legislation. © 22Apr31; A40473. Russell Sage Foundation (PWH); 10Nov58; R224881.

HUBBARD, KIN.

  Abe Martin's broadcast. Illus. by
    the author. © 29Oct30; A30676.
    Mrs. Kin Hubbard (W); 25Aug58;
    R220483.

HUBBARD, MRS. KIN.

  Abe Martin's broadcast. SEE Hubbard.
    Kin.

HUBER, MIRIAM BLANTON, joint author.

  Third grade manual. SEE Gates,
    Arthur I.

HUDDLESTON, SISLEY.

Back to Montparnasse; glimpses of Broadway in Bohemia. With illus. by Frank M. Armington, and others. © 5May31; A39086. Mrs. Sisley Huddleston (W); 9Sep58; R221083.

HUDDLESTON, MRS. SISLEY.

  Back to Montparnasse. SEE
    Huddleston, Sisley.

HUDDY, XENOPHON P.

  Encyclopedia of automobile law.
    Vol. 3-4, 5-6. 9th ed. © 7Jan31,
    A32663; 2Feb31, A33543. Matthew
    Bender & Co., Inc. (PWH);
    24Oct58; R223321-223322.

HUDDY, XENOPHON PEARCE.

  Encyclopedia of automobile law.
    Vol. 7-8. 9th ed. © 24Mar31;
    A36115. Matthew Bender & Co.,
    Inc. (PWH); 14Nov58; R224545.

  Encyclopedia of automobile law.
    Vol. 9-10. 9th ed. © 25May31;
    A37541. Matthew Bender & Co.,
    Inc. (PWH); 14Nov58; R224546.

  Encyclopedia of automobile law.
    Vol. 11-12. 9th ed. © 30Jun31;
    A40218. Matthew Bender & Co.,
    Inc. (PWH); 15Dec58; R226667.

  Encyclopedia of automobile law.
    Vol. 13-14. 9th ed. © 12Aug31;
    A40752. Matthew Bender & Co.,
    Inc. (PWH); 19Dec58; R226771.

HUGHES, DANIEL GARCIA. tr.

Compendio de telogia ascetica y mistica. SEE Tanquerey, Ad.

HUGHES, RICHARD.

Richard Hughes: an omnibus. © 28Oct31; A43663. Richard Hughes (A); 12Nov58; R225109.

HUGHES, RUPERT.

Love lady no. 99. Illustrated by Henry Raleigh. (In Hearst's international cosmopolitan. Oct. 1931) © 10Sep31; A5-34435. Felix Hughes (E); 5Dec58; R225972.

<pb id='286.png' n='1958_h2/A/1624' />
  Static. Pt.1-2. Illustrated by
    Harry L. Timmins. (In Hearst's
    international cosmopolitan, Nov.-Dec.
    1931) © 8Nov31, A5-34985;
    10Nov31, A5-36221. Felix Hughes
    (E); 5Dec58; R225974-225973.

The war we lost by pacificism. Pt.1-2. (In American Legion, Sept.-Oct. 1931) © 25Aug31, B125363; 25Sep31, B128226. Felix Hughes (E); 5Dec58; R225970-225971.

HUGO, VICTOR.

Ruy Blas; modernized in English verse by Brian Hooker, with an introd. by Clayton Hamilton. © 6Feb31; A34236. Doris C. Hooker (W); 25Jul58; R218425.

HUMPHREY, GRACE.

Poland the unexplored. © 26Mar31; A36301. Grace Humphrey (A); 15Dec58; R227406.

HULBURT, TERESA H.

A text-book of physiology for medical students and physicians. SEE Howell, William H.

HUMPHREY, SETH K.

Following the prairie frontier. © 16May31; A38567. Merchants National Bank of Boston (E); 31Dec58; R227792.

HUNT, RIDGELY, joint author.

The gardener's friend and other pests. SEE Chappell, George Shepard.

HUNTER, ESTELLE B.

A new home study course in practical English and effective speech. Lesson 7-15. © lesson 7-8, 16Jul30, AA46811-46812; lesson 9-10, 5Aug30, AA47844-47845; lesson 11-12, 26Aug30, AA49805-49806; lesson 13-14, 8Oct30, A29433-29434; lesson 15, 13Dec30, AA65465. Estelle B. Hunter (A); 14Jul58, R217678-217679; 4Aug58, R208443-208444; 11Aug58, R219174-219178.

HURST, FANNIE.

Back streets. (In Hearst's international-cosmopolitan, Sept. 1930) © 9Aug30; B81702. Fannie Hurst (A); 21Jul58; R218890.

HURST, VIDA.

Tarnished: a story of love and mystery. © 20May31; A38307. Vida Hurst (A); 29Dec58; R226975.

HUXLEY, ALDOUS.

  And wanton optics roll the melting
    eye. (In The Bookman, Mar. 1931)
    © 14Mar31; B108695. Aldous
    Huxley (A); 20Oct58; R223289.

  The cicadas, and other poems.
    © 7May31, AI-15266; 20Aug31,
    A44132. Aldous Huxley (A);
    20Oct58; R223293.

  Music at night, and other essays.
    © 24Sep31; A43196. Aldous Huxley
    (A); 20Oct58; R223298.

  Music at night, and other essays.
    1st ed. © 15Jun31; A38923.
    Aldous Huxley (A); 20Oct58;
    R223297.

HUXLEY, JULIAN.

  Human power and its control. (In
    The Yale review, summer 1931)
    © 12Jun31; B117897. Julian
    Huxley (A); 26Nov58; R225463.

HUXLEY, JULIAN SORELL.

  What dare I think? © 28Oct31;
    A43668. Julian Sorell Huxley (A);
    12Nov58; R225110.

<pb id='287.png' /> ILES, FRANCIS, pseud. SEE Cox, Anthony Berkeley.

ILIN, M., pseud. SEE
  Marshak, Ilia Iakovlevich.

INDIANA THREE IN ONE SERVICE. Vol.9. 1930 annual volume. Prepared by Daniel W. Crockett, assisted by the publisher's editorial staff. © 9Feb31; A36759. Bobbs-Merrill Co. Inc. (PWH); 22Dec58; R227408.

INDIANA THREE IN ONE SERVICE. Vol.10, no. 1-2. Prepared by Daniel W. Crockett, assisted by the publisher's editorial staff. © 30Mar31, A36760; 25Jun31, A40148. Bobbs-Merrill Co., Inc. (PWH); 22Dec58; R227409, 227411.

INDIG, EDMEE GUERIN.

  Lettres de Degas. SEE Degas,
    Hilaire Germain Edgar.

INDUSTRIAL PRESS.

  Mechanical drawing. SEE Jones,
    Franklin D.

INGLIS, REWEY BELLE.

  Literature tests to accompany
    Adventures in prose and poetry.
    © 18Dec30; A32433. Rewey Belle
    Inglis (A); 16Sep58; R221344.

INTERNATIONAL KINDERGARTEN UNION. LITERATURE COMMITTEE.

Told under the green umbrella; old stories for new children. Grace Gilkison, illustrator. © on illus.; 14Oct30; A29356. Macmillan Co. (PWH); 30Sep58; R221863.

IRVING, WASHINGTON.

The bold dragoon, and other ghostly tales. Selected and edited by Anne Carroll Moore; with decorative diversions by James Daugherty. © on corrections, introd. & illus.; 22Aug30; A27182. Alfred A. Knopf, Inc. (PWH); 12Aug58; R219130.

IRWIN, INEZ HAYNES.

  Family circle. © 25Feb31; A35227.
    Inez Haynes Irwin (A); 19Dec58;
    R227401.

IRWIN, WALLACE.

Troubadour. (In Delineator, Apr. 1931) © 2Mar31; B106611. Wallace Irwin (A); 4Aug58; R219666.

JACKSON, ALICE.

The American home book of furniture, by Alice and Bettina Jackson. With line drawings by the authors, edited by Reginald T. Townsend. (The American home library) © 22Oct31; A43719. Reginald T. Townsend (A); 24Oct58; R223386.

JACKSON, MRS. ANDREW. SEE Jackson,
  Katherine Gauss.

JACKSON, BETTINA, joint author.

  The American home book of furniture.
    SEE Jackson, Alice.

JACKSON, ELBERT MCGRAN, illus.

  The deputy at Snow Mountain. SEE
    Marshall, Edison.

JACKSON, KATHERINE GAUSS.

  Life in college. SEE Gauss,
    Christian.

<pb id='365.png' /> JACOB, FRANCIS W.

  Cases on the law of personal property.
    SEE Bigelow, Harry Augustus.

JACOBS, AGNES L.

  Practical English drillbook. SEE
    Jones, Easley S.

JACOBS, BERTHA E., Joint author.

  The nation's history. SEE
    Leonard, Arthur R.

JACOBY, JEAN.

Le Tsar Nicolas II et la revolution. © 18Jun31; AF14329. Jean Jacoby (A); 18Aug58; R219684.

JAMES, HENRY.

  Charles W. Eliot, president of
    Harvard University, 1869-1909.
    Vol.1-2. © 31Oct30; A30313.
    Mrs. Henry James (W); 2Oct58;
    R221964.

JAMES, MRS. HENRY.

  Charles W. Eliot, president of Harvard
    University, 1069-1909. SEE
    Janes, Henry.

JAMES, RIAN.

  Love is a racket. © 9Oct31;
    A43161. Rian James (A); 13Oct58;
    R222777.

JAMESON, STORK. SEE Chapman, Margaret
  Storm Jameson.

JAMIESON, MME. SEE
  Jamieson, Francine Le Grand.

JAMIESON, ELIZABETH H.

  Ethics note-book for nurses, by
    Elizabeth M. Jamieson and Mary
    Sewall. © 8Sep31; A44352.
    Mary Sewall (A); 15Sep58; R222003.

JEANS, SIR JAMES. SEE
  Living philosophies.

JEBB, ELEANOR.

  A conversation with a cat. SEE
    Belloc, Hilaire.

  Cranmer, Archbishop of Canterbury.
    SEE Belloc, Hilaire.

JEFFRIES, GRAHAM MONTAGUE.

  A murder of some importance, by
    Bruce Graeme, pseud. Foreword by
    Basil Thomson. © 30Apr31;
    A40067. Bruce Graeme (A);
    29Aug58; R220644.

JEHL, FRANCIS.

  A boy with Edison. SEE Simonds,
    William A.

JEN, HAI SCHANG SCHUO MONG. SEE
  Hai Schang Schuo Mong Jen.

JENKINS, GLENN L.

Quantitative pharmaceutical chemistry containing theory and practice of quantitative analysis applied to pharmacy, by Glenn L. Jenkins and Andrew G. Du Mez. © 10Jan31; A33164. Glenn L. Jenkins (A); 6Aug58; R219150.

JOHNSON, ALVIN, ed. SEE
  Encyclopaedia of the social sciences.

JOHNSON, BUBOES, comp.

More necessary nonsense. Illustrated by William Cropper. © 17Aug31; A41092. Surges Johnson (A); 12Nov58; R225113.

JOHNSON, EDWIN LEE.

Latin words of common English. © 19Oct31; A44409. Irene L. Johnson (W); 6Nov58; R224149.

JOHNSON, GEORGE.

  Bible history, a textbook of the Old
    and New Testaments for grades
    5-6 of Catholic schools, by George
    Johnson, Jerome D. Hannan and
    Sister M. Dominica. © 16Sep31;
    A43839. Jerome D. Hannan (A),
    Marie Cecilia Drobka (E of G.
    Johnson) & Mother M. Cosma (E of
    Sister M. Dominica); 2Dec58;
    R225730.

<pb id='289.png' n='1958_h2/A/1625' /> JOHNSON, GERALD W.

By reason of strength. © 17Oct30; A32726. Gerald W. Johnson (A); 30Jul58; R218888.

JOHNSON, IRENE L.

  Latin words of common English. SEE
    Johnson, Edwin Lee.

JOHNSON, MALCOLM.

  A portfolio of Currier and Ives.
    © 24Sep31; A42981. Mildred Young
    Johnson (W); 29Sep58; R222074.

JOHNSON, MRS. MARTIN. SEE
  Johnson, Osa Helen Leighty.

JOHNSON, MILDRED YOUNG.

  A portfolio of Currier and Ives.
    SEE Johnson, Malcolm.

JOHNSON, NUNNALLY.

  The angler's prayer. (In Saturday
    evening post, Apr. 25, 1931)
    © 23Apr31; B111862. Nunnally
    Johnson (A); 18Jul58; R218182.

  Author! Author! (In Saturday
    evening post, July 4, 1931)
    © 30Jun31; B119764. Nunnally
    Johnson (A); 18Jul58; R218186.

  The lion of the Bronx. (In Saturday
    evening post, June 6, 1931)
    © 4Jun31; B116642. Nunnally
    Johnson (A); 18Jul58; R218184.

  The man on horseback. (In Saturday
    evening post, July 11, 1931)
    © 7Jul31; B120395. Nunnally
    Johnson (A); 18Jul58; R218187.

  Recognition. (In Saturday evening
    post, May 30, 1931) © 28May31;
    B116249. Nunnally Johnson (A);
    18Jul58; R218183.

JOHNSON, OSA HELEN LEIGHTY.

Jungle babies, by Mrs. Martin Johnson. With 21 illus. from drawings by Margaret Flinsch. © 22Aug30; A26974. Stapleton, Flynn & Lilly (E); 30Jul58; R218929.

JOHNSON, WILLIS FLETCHER.

The national flag. © 1Oct30; A28635. Florence Gilson Law (NK); 15Sep58; R221356.

JOHNSTON, CHARLES HAVEN LADD.

Famous American athletes of today. Second series. © 28Oct30; A31064. William Pearce Coues & Josephine L. Harer, trustees of the L. C. Page Trust (PWH); 23Sep58; R221661.

JOHNSTONE, ARTHUR EDWARD.

  Air a la bourree. SEE Handel,
    George Frederick.

  Gavotte in D major. SEE Bach,
    Johann Sebastian.

  Military march in D. SEE Schubert,
    Franz Peter.

JOHNSTONE, CHARLES WM.

  The mirror of life. © 15Jan31;
    A33867. Charles Wm. Johnstone
    (A); 9Sep58; R221025.

JONES, CLARENCE F.

Laboratory manual in the geography of South America for college students, by Clarence F. Jones and Floyd F. Cunningham. © 7Aug31; A41071. Clarence F. Jones (A); 20Aug58; R219706.

JONES, EASLEY S.

  Practical English drillbook.
    © 9Sep31; A41578. Agnes L.
    Jacobs (W); 12Sep58; R221131.

JONES, FLORENCE CREWE-. SEE
  Crewe-Jones, Florence.

JONES, FRANKLIN D.

Mechanical drawing. 2d ed. © 31Oct31; A47525. Industrial Press (PWH); 21Nov58; R225381.

<pb id='290.png' /> JONES, HOWARD MUMFORD, joint ed.

Plays of the restoration and eighteenth century as they were acted at the theatres-royal. SEE MacMillan, Dougald, ed.

JONES, MARC EDMUND.

  The ritual of living; an occult
    manual. © 17Oct30; A29705.
    Marc Edmund Jones (A); 14Oct58;
    R222792.

JONES, VERNON.

What would you have done? © 14Feb31; A35468. Vernon Jones (A); 23Sep58; R221629.

JORDAN, G. RAY.

  Intimate interests of youth.
    © 10Oct31; A44369. G. Ray
    Jordan (A); 17Oct58; R222943.

  The intolerance of Christianity.
    © 16May31; A38445. G. Ray
    Jordan (A); 17Nov58; R224821.

JUDSON, CLARA INGRAM.

  Mary Jane in Switzerland.
    © 4May31; A38213. Clara Ingram
    Judson (A); 29Dec58; R226971.

JULIUS, E. HALDEMAN-. SEE
  Haldeman-Julius, E.

JULIUS, HENRY HALDEMAN-. SEE
  Haldeman-Julius, Henry.

JULIUS, MARCET HALDEMAN-. SEE
  Haldeman-Julius, Marcet.

JUSTUS, MAY.

The other side of the mountain. Illustrated by Mabel Pugh. © 13Aug31; A41138. May Justus (A); 21Aug58; R219934.

KAESTNER, ERICH.

  Ein mann gibt auskunft. Umschlagzeichnung
    und vignetten von Erich
    Ohser. © 10Sep30; AF10033.
    Erich Kaestner (A); 31Jul58;
    R218690.

KAHLER, HUGH.

  All is fair. (In Woman's home
    companion, Sept. 1931) © 27Jul31;
    B123373. Hugh Kahler (A);
    29Jul58; R218635.

  The big pink. Pt.1. (In Colliers,
    Nov. 21, 1931) © 2Nov31;
    B133225. Hugh Kahler (A); 4Nov58;
    R224588.

  The big pink. Pt.2-5. (In Colliers,
    Nov. 28-Dec. 19, 1931) © 9Nov31,
    B133732; 13Nov31, B134394;
    20Nov31, B134764; 1Dec31, B136390.
    Hugh Kahler (A); 12Nov58, R225404;
    2Dec58, R225393; 21Nov58, R225394;
    2Dec58, R225395.

  The big pink. Pt.6. (In Colliers,
    Dec. 26, 1931) © 8Dec31;
    B136815. Hugh Kahler (A);
    9Dec58; R226625.

  The big pink. Pt.7-8. (In Colliers,
    Jan. 2-Jan. 9, 1932) © 14Dec31,
    B137900; 18Dec31, B139129.
    Hugh Kahler (A); 16Dec58, R226908;
    22Dec58, R226909.

  Hindsight. (In Colliers, Sept. 19,
    1931) © 31Aug31; B127290.
    Hugh Kahler (A); 3Sep58; R220892.

KAPPEL, PHILIP, illus.

  A little book of vagabond songs.
    SEE Shay, Frank, comp.

KARSAVINA, TAMARA. SEE
  Bruce, Tamara Karsavina.

KARSNER, HOWARD A.

Human pathology. A textbook with introd. by Simon Flexner. 3d ed., rev. © 30Sep31; A44759. Howard A. Karsner (A); 10Oct58; R222853.

<pb id='366.png' /> KASER, ARTHUR LE ROY.

  Domestic dialogues, by Ward Morley,
    pseud. © 15Aug30; A26804.
    Arthur LeRoy Kaser (A); 3Jul58;
    R217196.

  In the spotlight, by Ward Morley,
    pseud. © 18Aug30; A26805.
    Arthur LeRoy Kaser (A); 3Jul58;
    R217179.

KAUPMAN, GERALD LYNTON.

The American home book of building. Illustrated with photos. & diagrams by the author. Edited by Reginald T. Townsend. (The American home library) © 22Oct31; A43723. Reginald T. Townsend (A); 24Oct58; R223390.

KAYE-SMITH, SHEILA. SEE
  Pry, Sheila Kaye-Smith.

KEARNEY, PAUL W.

  Fire, by Paul W, Kearney and Thomas
    F. Dougherty. Foreword by W. E.
    Mallalieu. © 27Mar31; A35953.
    Paul W. Kearney (A); 7Nov58;
    R224661.

KEELER, HARRY STEPHEN.

The Matilda Hunter murder. © 2Oct31; A43828. Harry Stephen Keeler (A); 25Nov58; R225091.

KEENE, CAROLYN, pseud.

  Nancy Drew: The secret of Red Gate
    Farm, by Carolyn Keene, pseud, of
    Harriet S. Adams and Edna C.
    Squier. Illustrated by Russell H.
    Tandy. © 12Aug31; A41004.
    Harriet S. Adams & Edna C.
    Squier (A); 29Dec58; R226981.

KEIE, LESLYN B.

Bridal pond. SEE Gale, Zona.

KELIHER, ALICE VIRGINIA.

A critical study of homogeneous grouping. © 9Apr31; A38080. Alice Virginia Keliher (A); 8Jul58; R217236.

KELLAM, SADIE SCOTT.

Old houses in Princess Anne, Virginia, by Sadie Scott Kellam and V. Hope Kellam. © 20Jun31; A39407. Sadie Scott Kellam (Co-author); 7Aug58; R218871.

KELLAM, V. HOPE, joint author.

  Old houses in Princess Anne, Virginia.
    SEE Kellam, Sadie Scott.

KELLAND, CLARENCE BUDINGTON.

  Scattergood uses an eraser. (In
    American magazine, Nov. 1931)
    © 28Sep31; B128671. Clarence
    Budington Kelland (A); 26Nov58;
    R225468.

KELLAR, HARRY.

  Illustrated maffic. SEE Flscher,
    Ottokar.

KELLEY, H. T., joint author.

  Simplified diabetic management.
    SEE Beardwood, J. T., Jr.

KELTY, MARY G.

The growth of the American people and nation. (Tryon-Lingley history series) © 19Jan31; A33495. Mary G. Kelty (A); 23Sep58; R221626.

KENEDY (P. J.) & SONS.

  The high road. SEE Doonan, Grace
    Wallace.

KENNEDY, BELLE.

Speech craft. SEE Fogerty, Elsie.

KENNEDY, MARGARET. SEE
  Davies, Margaret Kennedy, Lady.

KENT, ROCKWELL.

  A birthday book. © 10Sep31;
    A43111. Rockwell Kent (A);
    4Sep58; R221124.

<pb id='292.png' n='1958_h2/A/1626' />
  Canterbury tales. SEE Chaucer,
    Geoffrey.

City child. SEE Robinson, Selma.

  Venus and Adonis. SEE Shakespeare,
    William.

KENT, WILLIS, pseud. SEE
  Collison, Wilson.

KENTUCKY DECISIONS REPORTED IN SOUTH
  WESTERN REPORTER, ANNOTATED. Second
  series. © West Pub. Co. (PWH) v.

  30-33, Sept. 1930-Feb. 1931.
    © 15Apr31; A38420. 3Jul58;
    R217535.

  34-37, Feb.-May 1931. © 28Aug31;
    A41816. 6Oct58; R222405.

KENTUCKY DIGEST; covering all cases
  reported in Kentucky reports,
  Kentucky law reporter, Kentucky
  opinions and Kentucky decisions in
  South western reporter. Vol. 9-14.
  Key number system. © 16Apr31,
  A38422; 16Apr31, A38423; 26May31,
  A37888; 26May31, A37889; 23Jun31,
  A39444; 23Jun31, A39445. West Pub.
  Co. (PWH); 3Jul58; R217485-217490.

KENTUCKY DIGEST; covering all cases reported in Kentucky reports, Kentucky law reporter, Kentucky opinions and Kentucky decisions in South western reporter. Vol. 15-18. © 23Jul31, A40803-40804; 16Sep31; A44029-44030. West Pub. Co. (PWH); 6Oct58; R222401-222404.

KENTUCKY DIGEST. 1931 semi-annual
  pamphlet. © 15Apr31; A38415.
  West Pub. Co. (PWH); 3Jul58;
  R217526.

KEOWN, FRANCES B.

  Mechanism. SEE Keown, Robert
    McArdle.

KEOWN, ROBERT MCARDLE.

Mechanism, by Robert McArdle Keown and Virgil Moring Faires. 3d ed. © 17Jun31; A40046. Frances B. Keown (W) & Virgil Moring Faires (A); 6Aug58; R219167.

KETCHUM, ALTON.

  Follow the sun. © 5Sep30; A28274.
    Alton Ketchum (A); 3Jul58;
    R217260.

KEVERNE, RICHARD, pseud. SEE
  Hosken, Clifford James Wheeler.

KEYES, ROWENA KEITH, ed.

Florence Nightingale: the angel of the Crimea. SEE Richards, Laura E.

KEYSERLING, E. VON.

Abendliche hauser. Edited with notes, exercises and vocabulary by Theodore B. Hewitt. © on p.i-xvii, 151-240; 1Sep31; A42202. John Hollis Hewitt & Berenice Hewitt Lothrop (C); 8Sep58; R220871.

KIDDER, BRADLEY P.

Kidder-Parker architects' and builders' handbook. SEE Kidder, Frank E.

KIDDER, FRANK E.

Kidder-Parker architects' and builders' handbook. Compiled by a staff of specialists and Harry Parker, editor-in-chief. 18th ed., enl. © 4Nov31; A43860. Bradley P. Kidder (PWH); 21Nov58; R225548.

KILBOURNE, FANNIE.

  The downtrodden sex. (In American
    magazine, Sept. 1931) © 30Jul31;
    B122807. Fannie Kilbourne (A);
    20Aug58; R219879.

  Girl meets boy. (In Ladies' home
    journal, Oct. 1931) © 11Sep31;
    B126594. Fannie Kilbourne (A);
    11Sep58; R221184.

<pb id='293.png' />
  Too many parties. (In American
    magazine, Oct. 1931) © 27Aug31;
    B127108. Fannie Kilbourne (A);
    11Sep58; R221185.

KIMBALL, KATHRYN, pseud. SEE
  Alexander, Ruth.

KINCADE, ELIZABETH P.

  Experimental plant physiology. SEE
    Peirce, George James.

KING, ALEXANDER, illus.

Tom Jones. SEE Priestly, J. B.

KING, BARBARA LAIT.

Gangster girl. SEE Lait, Jack.

Put on the spot. SEE Lait, Jack.

KING, FRANK.

  The cabinet of Ling Fu. (In
    Detective story magazine,
    Dec. 13, 1930) © 5Dec30;
    B95121. Frank King (A); 18Jul58;
    R218170.

KING, HELEN L.

  A country parson looks at religion.
    SEE Prichard, Harold Adye.

KING, JULE G.

  Verse of our day. SEE Gordon,
    Margery, comp.

KING, LOIS.

Gangster girl. SEE Lait, Jack.

Put on the spot. SEE Lait, Jack.

KING, MARIAN.

The story of athletics. With pictures by Bernard Westmacott. (City and country series) © 3Jun31; A37699. Marian King (A); 7Jul58; R217599.

KING, MARIE B., joint comp.

  Verse of our day. SEE Gordon,
    Margery, comp.

KING, PAUL J. D.

  Verse of our day. SEE Gordon,
    Margery, comp.

KING, RUFUS.

Murder in the Willett family. © 16Jul31; A39661. Rufus King (A); 17Jul58; R217821.

KING, RUTH, illus.

  The gay mystery. SEE Eliot, Ethel
    Cook.

KIPLING, RUDYARD.

  Address at the annual banquet of the
    France Grande Bretagne Association,
    Paris, July 2, 1931. (Pub.
    abroad as Mr. Kipling in Paris, in
    The Morning post) © 3Jul31,
    AI-15315; 24Jul31, A39681. Elsie
    Bambridge (C); 25Jul58; R218501.

  A naval mutiny. © 13Nov31;
    A44960. Elsie Bambridge (C);
    19Nov58; R225053.

KIRSCH, FELIX M.

The spiritual direction of sisters. © 2Apr31; A38599. Claude Vogel (E); 7Nov58; R224773.

KIRTLAND, JOHN COPELAND, ed.

  Fabulae faciles. SEE Ritchie,
    Francis.

KIRTLAND, LYNN.

  Fabulae faciles. SEE Ritchie,
    Francis.

KISER, DONALD J., ed. SEE
  Corpus juris.

KLEINE-NATROP, JOHANNES.

  Maria. © 20Nov30; AF15853.
    Verlag Ars Sacra, Josef Müller
    (PWH); 2Sep58; R221602.

KLEISER, GRENVILLE.

  Side talks A 1-5. © 20Feb31;
    AA64822. Anne Elizabeth McCargar
    & George A. Lawrence (E); 19Aug58;
    R219604.

<pb id='367.png' /> KNICKERBOCKER, EDWIN VAN B., ed.

Short plays. © 15Apr31; A35942. Edwin Van B. Knickerbocker (A); 25Jul58; R218431.

KNITTEL, JOHN.

Midnight people. © 24Sep31; A43224. John Knittel (A); 29Sep58; R222075.

KNOPF (ALFRED A.) INC.

  After Robespierre the Thermidorian
    reaction. SEE Mathiez, Albert.

  The American Democrat. SEE
    Cooper, James Penimore.

  The bold dragoon. SEE Irving,
    Washington.

  Cosima Wagner. SEE Du Moulin-Eckart,
    Richard Maria Ferdinand, Graf.

Death in Venice. SEE Mann, Thomas.

  The eagle and the serpent. SEE
    Guzman, Martin Luis.

  Letters of Hans von Bulow. SEE
    Bulow, Hans Guide von.

A man and his dog. SEE Mann, Thomas.

  Marlo and the magician. SEE
    Mann, Thomas.

  New French cooking. SEE Reboux.
    Paul.

  New German fairy tales. SEE
    Lebermann, Norbert.

  Novels and novelists. SEE Murry,
    Kathleen Beauchamp.

The son avenger. SEE Undset, Sigrid.

Stories. SEE Mansfield, Katherine.

Two symphonies. SEE Gide, Andre.

  The wild orchid. SEE Undset,
    Sigrid.

  Zuni folk tales. SEE Gushing,
    Frank Hamilton, comp. & tr.

KNOWLES, MAY WYNNE.

Patient Pat Joins the circus, by May Wynne. Artist: Bess Goe Willis. (Altemus' wee books for wee folks) © 21Aug31; A40969. Platt & Munk Co., Inc. (PWH); 27Aug58; R220*24.

KNOX, ROSE B.

Miss Jimmy Deane and what happened at Pleasant Meadows. Illustrated by Manning De V. Lee. © 17Sep31; A42493. Rose B. Knox (A); 18Sep58; R221544.

KOLMER, JOHN A.

Approved laboratory teohnlo. Prepared under the auspices of the American Society of Clinical pathologists, by John A. Kolaer and Frederick Boerner. © 18Sep31; A41736. John A. Kolner (A) Joan Boerner Saunders, Doris Boerner, Frederick Boerner, Jr., Nancy Ann Boerner Langstaff, Eleana Boerner Nalack, Robert Reese Boerner (C); 13Nov58; R225332.

KOLTHOFP, I. M.

Potentiometric titrations; a theoretical and practical treatise, by I. M. Kolthoff and N. Howell Furman. 2d ed. © 22Oct31; A43477. I. M. Kolthoff & N. Howell Furman (A); 21Nov58; R225546.

KREYMBORG, ALFRED, ed.

  Lyric America, an anthology of
    American poetry, 1630-1930.
    © 10Nov30; A30578. Alfred Kreymborg
    (A); 5Aug58; R219119.

KRUTCH, JOSEPH WOOD.

Five masters, a study in the mutations of the novel. © 20Oct30; A29517. Joseph Wood Krutch (A); 13Oct58; R223210.

KÜLLER, JO VAN AMMERS-. SEE
  Ammers-Kuller, Jo van.

KUHN, FRANZ, tr.

  Fraulein Tschang. SEE Hai Schang
    Schuo Mong Jen.

<pb id='295.png' n='1958_h2/A/1627' /> KULLER, JO VAN AMMERS-. SEE Ammers-Küller, Jo Van.

KURAKIN, ELIZABETH NARISHKIN-. SEE
  Narishkin-Kurakin, Elizabeth.

KUYPERS, MARY SHAW.

Studies in the eighteenth century background of Hume's empiricism. © 19Dec30; A31879. Mary Shaw Kuypers (A); 10Dec58; R226474.

LACRETELLE, JACQUES DE.

  A man's life (Amour nuptial)
    Translated by Edwin Granberry.
    © 13Mar31; A36180. Edwin
    Granberry (A); 25Jul58; R218436.

LAFITTE-CYON, MRS. F.

  More essays of love and virtue.
    SEE Ellis, Havelock.

LAHEE, FREDERIC H.

Field geology. 3d ed. © 4Feb31; A33756. Frederic H. Lahee (A); 6Aug58; R219154.

LAING, ALEXANDER.

End of roaming. © 5Sep30; A28276. Alexander Laing (A); 28Jul58; R218438.

LAIT, JACK.

Gangster girl. With a rev. glossary of underworld slang. © 26Dec30; A32450. Laura Belle Lait (W), Jack Lait, Jr., Lois King & Barbara Lait King (C); 26Aug58; R220825.

  Put on the spot. © 28Oct30;
    A29791. Laura Belle Lait (W),
    Jack Lait, Jr., Lois King & Barbara
    Lait King (C); 26Aug58;
    R220826.

LAIT, JACK, JR.

Gangster girl. SEE Lait, Jack.

Put on the spot. SEE Lait, Jack.

LAIT, LAURA BELLE.

Gangster girl. SEE Lait, Jack.

Put on the spot. SEE Lait, Jack.

LAKE, STUART N.

  Buffalo hunters. (In Saturday
    evening post, Oct. 25, 1930)
    © 23Oct30; B90859. Stuart N.
    Lake (A); 22Oct58; R223782.

  The frontier marshall. (In Saturday
    evening post, Nov. 15, 1930)
    © 13Nov30; B93168. Stuart N.
    Lake (A); 22Oct30; R223785.

  Guns and gunfighters. (In Saturday
    evening post, Nov. 1, 1930)
    © 30Oct58; B92433. Stuart N.
    Lake (A); 22Oct30; R223783.

  Tales of the Kansas cow towns.
    (In Saturday evening post, Nov.
    8, 1930) © 6Nov30; B92776.
    Stuart N. Lake (A); 22Oct58;
    R223784.

LAMB, CAROLYN BUCHANAN.

  The black pearl murders. SEE
    Buchanan, Madeleine Sharps.

  The subway murder. SEE Buchanan,
    Madeleine Sharps.

LAMB, HAROLD.

  Durandal, a crusader in the horde.
    Illustrated by Allan McNab.
    © 15Oct31; A43707. Harold Lamb
    (A); 3Nov58; R224614.

LAMB, KATHERINE.

  When the wicked man. SEE Ford,
    Ford Madox.

<pb id='296.png' /> LANGDON, GRACE.

Home guidance for young children. A parents' handbook with an introd. by Lois Hayden Meek. © 15Jan31; A34083. Grace Langdon (A); 26Sep58; R221866.

LANGLEY, JOHN PRENTICE.

  The staircase of the wind; or,
    Over the Himalayas to Calcutta.
    Illustrated by John M. Foster.
    © 18Apr31; A38214. John Prentice
    Langley (A); 29Dec58; R226972.

LANGSTAFF, NANCY ANN BOERNER.

  Approved laboratory technic. SEE
    Kolmer, John A.

LANGUEREAU, MAURICE.

  Becassine en aeroplane, par Maurice
    Caumery, pseud. Illus. de J. P.
    Pinchou. © 1Nov30; AF11472.
    Mme. Maurice Languereau, nee
    Yvonne Gallien (W); 27Oct58;
    R223967.

  Becassine fait du scoutism, par
    Caumery, pseud. Illus. by J. P.
    Pinchou. © 27Aug31; AF15651.
    Mme. Maurice Languereau, nee
    Yvonne Gallien (W); 3Nov58;
    R224086.

LANGUEREAU, MME. MAURICE. SEE
  Languereau, Yvonne Gallien.

LANGUEREAU, YVONNE GALLIEN.

  Becassine en aeroplane. SEE
    Languereau, Maurice.

  Becassine fait du scoutisme. SEE
    Languereau, Maurice.

Notre maison. SEE Brion, Blanche.

LANKES, J. J., Illus.

John Henry. SEE Bradford, Roark.

LANZ, HENRY.

  The physical basis of rime.
    © 31Jan31; A33750. Lisa Lanz
    (Mrs. Henry Lanz) (W); 16Dec58;
    R226606.

LANZ, MRS. HENRY. SEE Lanz, Lisa.

LANZ, LISA.

  The physical basis of rime. SEE
    Lanz, Henry.

LARICK, BARBARA BUCK.

  Bring 'em back alive. SEE Buck,
    Frank.

LARSSON, MARJORIE FLACK.

Angus and the cat. Told and pictured by Marjorie Flack. © 29Oct31; A44652. Hilma L. Barnum (C); 1Dec58; R225564.

LASANCE, F. X., ed.

  Let us go to Jesus. © 10Oct51;
    A46349. Benziger Bros., Inc.
    (PWH); 7Nov58; R224775.

LASKI, HAROLD J.

Politics. (The Hour library) © 18Feb31; A37332. Mrs. W. M. Laski (W); 10Oct58; R222849.

LASKI, MRS. W. M.

Politics. SEE Laski, Harold J.

LASKY, BESSIE.

And I shall make music. © 4Dec30; A32075. Bessie Lasky (A); 3Dec58; R225738.

LATHAM, MINOR WHITE.

  The Elizabethan fairies: the fairies
    of folklore and the fairies of
    Shakespeare. © 1Oct30; A29074.
    Minor W. Latham (A); 23Sep58;
    R221619.

LATHROP, DOROTHY P., illus.

  The snow image. SEE Hawthorne,
    Nathaniel.

<pb id='368.png' /> LAUBREAUX, ALIN.

Mulatto Johnny. Translated from the French by Coley Taylor. © on translation; 3Mar31; A34689. E. P. Dutton & Co., Inc. (PWH); 25Nov58; R225082.

LAUFER, CALVIN W.

Happy at work; words. (In Primary music and worship, no. 74) © 24Dec30; AA59034. Board of Christian Education of the Presbyterian Church in the U. S. A (PWH); 8Oct58; R222626.

Primary music and worship for church school and home.

LAUGHLIN, CLARA E.

  So you're going to Spain. © 4Feb31;
    A34345. Mary Clara Laughlin &
    Betty Laughlin Sweeney (NK);
    17Dec58; R227001.

LAUGHLIN, MARY CLARA.

  So you're going to Spain. SEE
    Laughlin, Clara E.

LAUT, AGNES C.

  Cadillac, knight errant of the
    wilderness. © 18Feb31; A33935.
    Agnes C. Laut (A); 19Dec58;
    R227398.

LAW, FLORENCE GILS ON.

  The national flag. SEE Johnson,
    Willis Fletcher.

LAW, MALCOIM C.

  The Divine comedy. SEE
    Dante Alighieri.

LAWLESS, ANTHONY, pseud. SEE
  MacDonald, Philip.

LAWRENCE, GSORGE A.

  Side talks A 1-5. SEE Kleiser,
    Grenville.

LAWSON, MARIE.

Hall Columbia. Written and illustrated by Marie Lawson. © 1Nov31; A44982. John W. Boyd (Adm. c.t.a.d.b.n. Estate of Marie Lawson); 17Nov58; R225062.

LAWSON, ROBERT, illus.

  From the horn of the moon. SEE
    Mason, Arthur.

LAWYERS CO-OPERATIVE PUB. CO. SEE

Abbott New York digest.

New York annual digest.

LEACOCK, GEORGE.

  Laugh with Leacock. SEE Leacock,
    Stephen.

LEACOCK, STEPHEN.

Laugh with Leacock. © 3Oct30; A28829. Qeorge Leacock (C); 2Jul58; R217198.

LEAKY, WILLIAM HARRALL.

Window display for profit. © 1Apr31; A36269. William Harrall Leahy (A); 4Aug58; R218938.

LEBERMANN, NORBERT.

  New Qerraan fairy tales. Frieda
    Bachmann, translator. Margaret
    Freeman, illustrator. © on
    translation & illus.; 5Sep30;
    A28114. Alfred A. Knopf, Inc.
    (PWH); 12Aug58; R219134.

LEBHAR-FRIEDMAN PUBLICATIONS, INC.
  SEE Chain store age.

LEBLANC, CLAUDE.

Arsene Lupin. SEE Leblanc, Maurice.

La Barre-y-va. SEE Leblanc, Maurice.

LEBLANC, MAURICE.

Arsene Lupin, piece en 4 actes, en collaboration avec Francis de Croisset, et La pitle, piece en 3 actea. Illustrations de R. Brodere. © 8Jul31; AF15038. Claude Leblanc (C); 15Sep58; R221199.

<pb id='298.png' n='1958_h2/A/1628' />
  Arsene Lupin, La Barre-Y-Va. (In
    Le Journal, Paris) © 8Aug-15Sep30;
    AF9666. Claude Leblanc;
    7Jul58; R217212.

  La Barre-y-va. (Adventures
    extraordinaires d'Arsene Lupin.
    Nouvelles aventures) © 17Jun31;
    AF13917. Claude Leblanc (C);
    18Aug58; R219676.

LEE, EUGENE.

  Poppy Ott and the prancing pancake.
    SEE Edwards, Leo.

  Trigger Berg and the sacred pig.
    SEE Edwards, Leo.

  Tuffy Bean at Funny-Bone Farm. SEE
    Edwards, Leo.

  Tuffy Bean's one-ring circus. SEE
    Edwards, Leo.

  Tuffy Bean's puppy days. SEE
    Edwards, Leo.

LEE, FRANK HAROLD.

Folk tales of all nations. © 10Nov30; A31162. F. H. Lee (A); 24Jul58; R218410.

LEE, LOUISA CARTER.

  Love and Betty. © 1Apr31; A36255.
    Street & Smith Publications,
    Inc. (PWH); 31Jul58; R218778.

LEE, MANNING DE V.

  The brass keys of Kenwick. SEE
    Seaman, Augusta Huiell.

  Miss Jimmy Deane and what happened
    at Pleasant Meadows. SEE Knox,
    Rose B.

  The town of the fearless. SEE
    Snedeker, Caroline Dale.

LE GRAND, FRANCINE. SEE
  Jamieson, Francine Le Grand.

LEIDING, HARRIETTE KERSHAW.

Charleston, historic and romantic. © 30Oct31; A46074. Harriette K. Leiding (A); 22Dec58; R227612.

LEIGHOU, BERTHA E.

  Chemistry of engineering materials.
    SEE Leighou, Robert B.

LEIGHOU, ROBERT B.

  Chemistry of engineering materials.
    3d ed. © 10Feb31; A33806.
    Bertha E. Leighou (W); 6Aug58;
    R219155.

LEIMER, KARL.

Modernes Klavierspiel nach Leimer-Gieseking, von Karl Leimer. Mit einem vorwort von Walter Gieseking. © 5Jan31; AF10068. Ellen Grosse (C of K. Leimer); 19Dec58; R227170.

LENSKI, LOIS.

Grandmother Tippytoe. © 10Sep31; A41598. Lois Lenski (A); 15Sep58; R222000.

LENSKI, LOIS L., Illus.

  Mother Goose rhymes. SEE Piper,
    Watty, ed.

LENZ, SIDNEY S.

1-2-3 on the official system of contract bidding. © 1Sep31; A43105. Sidney S. Lenz (A); 24Oct58; R223558.

LEONARD, ARTHUR R.

The nation's history, by Arthur R. Leonard and Bertha E. Jacobs. Maps by Max Mayer. New ed. © on corrections & new chap.; 8May31; A37451. Bertha E. Jacobs (A); 28Jul58; R218655.

LEONARD, IRIS., joint author.

  Iridor complete candy making course.
    SEE Weigert, Dorit K.

<pb id='299.png' /> LEONARD, JONATHAN.

  Sympathetic to bare feet.
    © 24Feb31; A34571. Jonathan
    Norton Leonard & Mary Leonard
    Shaw (C); 19Nov58; R225016.

LEONARD, PAULINE W., ed.

  The merchant of Venice. SEE
    Shakespeare, William.

LETTS, MARGUERITE MARNEY.

  Sometimes Jenny Wren. SEE Darby,
    Ada Claire.

LEWARS, ELSIE SINGMASTER.

  Gettysburg; stories of the Red
    Harvest and the aftermath.
    New & enl. ed. © 31Oct30;
    A30309. Elsie Singmaster Lewars
    (A); 20Oct58; R221962.

  A little money ahead. © 8Oct30;
    A28774. Elsie Singmaster Lewars
    (A); 15Sep58; R221357.

LEWIS, EDITH.

My first novels. SEE Cather, Willa.

Poor Marty. SEE Cather, Willa.

Shadows on the rock. SEE Cather, Willa.

LEWIS, EDWIN.

  God and ourselves. © 24Aug31;
    A43234. Edwin Lewis (A); 19Sep58;
    R221443.

LEWIS, ELIZABETH KELLER, joint author.

Surgical nursing. SEE Eliason, E. L.

LEWIS, GRACE HEGGER.

  Half a loaf. © 18Sep31; A41976.
    Grace Hegger Lewis (A); 22Oct58;
    R223243.

LEWIS, MICHAEL.

Dollar chasers. SEE Lewis, Sinclair.

Land. SEE Lewis, Sinclair.

LEWIS, SINCLAIR.

  Dollar chasers. (In Saturday
    evening post, Oct. 17, 1931)
    © 13Oct31; B130351. Michael
    Lewis (C); 24Oct58; R223402.

  Dollar chasers. (In Saturday
    evening post, Oct. 24, 1931)
    © 20Oct31; B130754. Michael
    Lewis (C); 24Oct58; R223403.

  Land. (In Saturday evening post,
    Sept. 12, 1931) © 8Sep31;
    B127443. Michael Lewis (C);
    11Sep58; R221217.

LEWISOHN, LUDWIG.

Death in Venice. SEE Mann, Thomas.

LIBBEY, MRS. SNOWDEN M.

  Getting along together. SEE Monroe,
    Anne Shannon.

  Lead from strength. SEE Monroe,
    Anne Shannon.

LIBRARIE PLON.

  Lettres a la comtesse de noailles.
    SEE Proust, Marcel.

LICHTENBERGER, ANDRE.

  Nane et la vie de chateau. Illus.
    by Henri Morin. © 10Sep31;
    AF15653. Marguerite Lichtenberger
    (C); 3Nov58; R224088.

LICHTENBERGER, MARGUERITE.

  Nane et la vie de chateau. SEE
    Lichtenberger, Andre.

LIEBERMAN, BERNARD.

  Accounting system for retail
    stores. © 6Dec30; AA59201.
    Bernard Lieberman (A); 6Oct58;
    R222250.

LIEBERMAN, ELIAS.

Poems for enjoyment. © 15Apr31; A36539. Elias Lieberman (A); 6Aug58; R219165.

<pb id='369.png' /> LIEBERMAN, MILTON N.

New Jersey abstracts and titles. © 12May31; A38109. Soney & Sage Co. (PWH); 3Jul58; R217522.

LIEF, ALFRED.

  The social and economic views of Mr.
    Justice Brandels. SEE Brandela
    Louis Dembitz.

LILLENAS, HALDOR. SEE
  Children's day helper.

LINCOLN, CHARLES H.

  One hundred best novels condensed.
    SEE Grozier, Edwin Atkins, ed.

LINCOLN, FREEMAN.

  All alongshore. SEE Lincoln,
    Joseph C.

  Sam. © 23Mar31; A36066. Freeman
    Lincoln (A); 19Nov58; R225043.

LINCOLN, JOSEPH C.

  All alongshore. © 27Jul31;
    A40778. Freeman Lincoln (C);
    19Nov58; R225045.

LINCOLN, VICTORIA. SEE Lowe, Victoria
  Lincoln.

LINDERMAN, FRANK B.

  Old man coyote. Illustrated by
    Herbert Morton Stoops. © 27Nov31;
    A46108. Norma Linderman Waller,
    Verne Linderman & Wilda Linderman
    (C); 4Dec58; R225745.

LINDERMAN, VERNE.

  Old man coyote. SEE Linderman,
    Frank B.

LINDERMAN, WILDA.

  Old man coyote. SEE Linderman,
    Frank B.

LIPPERT, PETER.

  Liebfrauenminne, ein Pilgergang
    durch das Marienleben. © 29Oct31;
    AF15925. Verlag Ars Sacra Josef
    Muller (PWH); 3Nov58; R223793.

LITTLE, BROWN & CO. SEE
  Massachusetts digest.

LIVERIGHT PUB. CORP.

  Woman's coming of age. SEE
    Schmalhausen, Samuel D., ed.

LIVING PHILOSOPHIES. By Albert
  Einstein, Sir James Jeans, Theodore
  Dreiser, and others. Compiler:
  Lincoln Schuster. © 6Jul31;
  A39827. Simon & Schuster, Inc. PCW;
  24Oct58; R223552.

LIVINGSTON, ARMSTRONG.

  The murder trap. © 26Dec30;
    A32540. Armstrong Livingston
    (A); 28Aug58; R220624.

LLOYD, HUGH.

  The Copperhead Trail mystery.
    Bert Salg, illustrator.
    © 11May31; A38128. Hugh Lloyd
    (A); 29Dec58; R226965.

  The hermit of Gordon's Creek.
    Berg Salg, illustrator.
    © 11May31; A28123. Hugh Lloyd (A);
    29Dec58; R226961.

  Kidnapped in the Jungle. Bert Salg,
    illustrator. © 11May31; A38132.
    Hugh Lloyd (A); 29Dec58; R226968.

LLOYDS BANK, LTD., LONDON.

  Suspicious characters. SEE
    Fleming, Dorothy L. Sayers.

LOCAL TRADEMARKS, INC.

  Advertising manual for loan advertising.
    SEE Penarts Advertising, Inc.

  History of beginnings advertising
    manual for general business. SEE
    Penarts Advertising, Inc.

  Vital questions advertising manual
    for furniture dealers. SEE
    Penarts Advertising, Inc.

<pb id='301.png' n='1958_h2/A/1629' />
  Wee golfers advertising manual for
    miniature golf. SEE Penarts
    Advertising, Inc.

LOCKE, WILLIAM J.

  The shorn lamb. © 12Sep30;
    A30895. Leslie Scott Falconer
    Mitchell (PPW); 13Aug58; R219344.

LOCKRIDGE, RICHARD.

  Domestic setback. (In The New
    Yorker, Sept. 19, 1931)
    © 18Sep31; B127973. Richard Lockridge
    (A); 19Sep58; R221638.

  I'se Ophelia. (In The New Yorker,
    Sept. 5, 1931) © 4Sep31;
    B126210. Richard Lockridge (A);
    19Sep58; R221637.

  Lady vs. Hubcap. (In The New Yorker,
    July 11, 1931) © 10Jul31;
    B120498. Richard Lockridge (A);
    23Jul58; R218514.

  Meaty taste. (In The New Yorker,
    Dec. 19, 1931) © 18Dec31;
    B138286. Richard Lockrldge (A);
    19Dec58; R227020.

LODGE, CAPTER.

  A woman on her way. SEE Van Druten,
    John.

LODGE, NUCIA P., tr.

  New Russia's primer. SEE Marshak,
    Ilia lakovlevich.

LOESSER, JULIA E., tr.

  Under three tsars. SEE Narishkin-Kurakin,
    Elizabeth.

LOGAN, LEONARD M.

  Stabilization of the petroleum industry.
    © 9Nov30; A30780.
    Leonard M. Logan (A); 23Jul58;
    R218528.

LOMBROSO, GINA.

The tragedies of progress. Translation by Coley Taylor. © on translation; 31Mar31; A37216. E. P. Dutton & Co., Inc (PWH); 25Nov58; R225088.

LONDON, JACK.

Contes des Mers du Sud. Traduction de Paul Gruyer et Louis Postif. © 1Jul31; AF13926. Mme Herbemont, nee Louise Prancoise Gabrlelle Gruyer (NK) & Mme Louis Postif, nee Jeanne-Marle Andre (W); 18Aug58; R219677.

LONG, GABRIEL.

Tumult in the north, by George Preedy, pseud. © 17-18Oct, 20-22Oct, 30-31Oct, 1Nov, 3-8Nov, 10-12Nov, 14-15Nov, 17-18Nov30, AI-14505; 6Feb31, A33662. Hilary Long (C); 17Oct58; R225049.

LONG, GABRIELLE.

Bagatelle, by George Preedy, pseud. © 3Oct30, AI-14488; 27Mar31, A36261. George Preedy (A); 2Jul58; R217204.

LONG, HILARY.

  Tumult in the north. SEE Long,
    Gabriel.

LONG, MARGUERITE THOMSON.

  Skipper Dee Skee, by Marguerite
    Thomson Long and Dora Panchon
    Racette. Illustrated by Helen
    W. Piaget and Florence R. A.
    Wilde. © 4Sep30; A28129. Dora
    Fanchon Racette Cattley (A);
    1Aug58; R218749.

LORD, PHILLIPS H.

  Seth Parker's album, by Seth Parker,
    pseud. Illustrated by Frederick
    A. Larson. © 29Aug30; A27286.
    Phillips H. Lord (A); 8Jul58;
    R217239.

LORENZ PUB. CO.

  Rally day treasury. SEE Von Berge,
    H., ed.

<pb id='302.png' /> LORENZ PUB. CO. SEE

Christmas suggestion book. No.5.

Christmas treasury. No.42.

The Organist.

The Volunteer choir.

LOTH, DAVID GOLDSMITH.

Royal Charles, ruler and rake. © 29Sep30; A29012. David Loth (A); 24Sep58; R221707.

LOTHAR, ERNST.

Kleine Freundin. © 30Sep31; AF14657. Ernst Lothar (A); 14Nov58; R225628.

LOTHROP, BERENICE HEWITT.

  Abendliche hauser. SEE Keyserling,
    E. von.

LOUISIANA. COURTS OF APPEAL.

Advance reports. Edited and annotated by J. B. Herold. Vol.15, no.55-56, vol.16, no.57, Apr. 27-June 18, 1931. © 27Apr31, A37052; 25May31, A38995; 19Jun31, A38996. West Pub. Co. (PWH); 3Jul58; R217471-217473.

Advance reports. Edited and annotated by J. B. Herold. Vol.16, no.58-60. © 27Jul31, A40578; 10Aug31, A42239; 18Aug31, A42240. West Pub. Co. (PWH); 6Oct58; R222444-222446.

  Reports of the Louisiana Courts of
    Appeal. Vol.15. Edited by J. B.
    Herold. © 15Jul31; A40579.
    West Pub. Co. (PWH); 6Oct58;
    R222443.

LOUISIANA AND SOUTHERN REPORTER
  DIGEST. May 1931 cumulative
  pamphlet. © 23May31; A37853.
  West Pub. Co. (PWH); 3Jul58;
  R217514.

LOUISIANA AND SOUTHERN REPORTER
  DIGEST. July 1931 cumulative
  pamphlet. © 14Jul31; A41831.
  West Pub. Co. (PWH); 6Oct58;
  R222406.

LOUISIANA REPORTS. Vol.171. Cases
  argued and determined in the Supreme
  Court of Louisiana. © 30Jun31;
  A39451. West Pub. Co. (PWH);
  3Jul58; R217538.

LOVELACE, DELOS W.

Rockne of Notre Dame. © 29May31; A37754. Delos Lovelace (A); 13Nov58; R224968.

LOW, RUTH IRMA.

  Peggy Moran. © 8Aug31; A43838.
    Benziger Bros., Inc. (PWH); 7Nov58;
    R224766.

LOWE, HELEN TRACY PORTER, tr.

  Mario and the magician. SEE
    Mann, Thomas.

LOWE, HELEN TRACY PORTER. SEE ALSO
  Lowe-porter, H. T.

LOWE, VICTORIA LINCOLN.

  The Swan Island murders, by Victoria
    Lincoln. © 12Sep30; A28322.
    Victoria Lincoln Lowe (A); 3Jul58;
    R217206.

LOWE-PORTER, H. T., tr.

Death in Venice. SEE Mann, Thomas.

LOWE-PORTER, H. T., pseud. SEE
  Lowe, Helen Tracy Porter.

LOWES, EMILY E. F.

  Letters of Henry Adams, 1858-1891.
    SEE Adams, Henry.

LOWRY, MARGARET, Joint author.

Music appreciation for the junior high school. SEE Glenn, Mabelle.

Music notes. SEE Glenn, Mabelle.

LUCAS, ELIZABETH, tr.

  New French cooking. SEE Reboux,
    Paul.

<pb id='370.png' /> LUDMANN, OSCAR.

  Stepchild of the Rhine; an autobiography.
    © 9Oct31; A43162.
    Oecar Ludmann (A); 13Oct58;
    R222778.

LUDWIG, ELSA.

Three Titans. SEE Ludwig, Etnil.

LUDWIG, EMIL.

  Three Titans. © 5Sep30; A29160.
    Elsa Ludwig (W); 30Jul58;
    R218765.

LUGAN, MARCEL.

  Les aventures de Mickey. SEE
    Disney, Walt.

LUNDELL, G. E. F.

Chemical analysis of iron and steel, by G. E. P. Lundell, James Irvin Hoffman and H. A. Bright. 1st ed. © 16Oct31; A43657. Helen Drake Lundell (W), James Irvin Hoffman & Harry Aaron Bright (A); 21Nov58; R225547.

LUNDELL, HELEN DRAKE.

  Chemical analysis of iron and steel.
    SEE Lundell, G. E. F.

LUTZ, E. G.

Animal drawing in outline. © 27Feb31; A35167. Royd C. Lutz (E); 17Oct58; R223044.

LUTZ, ROYD C.

  Animal drawing in outline. SEE
    Lutz, E. G.

LYMAN, DOROTHY VAN SICKLEN.

John Marsh. SEE Lyman, George D.

LYMAN, GEORGE D.

  John Marsh, pioneer. © 12Sep30;
    A27553. Dorothy Van Sicklen
    Lyman (W); 10Sep58; R220963.

LYNCH, WILLIAM O.

Fifty years of party warfare, 1789-1837. © 1Apr31; A35607. William O. Lynch (A); 15Dec58; R227403.

LYTLE, ANDREW NELSON.

  Bedford Forrest and his critter
    company. © 29May31; A38594.
    Andrew Nelson Lytle (A); 13Nov58;
    R224966.

MABARDI, GEORGES.

  Vanity Fair's backgammon to win.
    Two chapters by Clare Booth
    Brokaw. © 12Dec30; A31715.
    Georges Mabardl & Clare Booth
    Brokaw (A); 3Dec58; R225739.

MAC. SEE McFarland, Lester.

MACARTNEY, CLARENCE EDWARD.

The way of a man with a maid. © 13Oct31; A44366. People's First National Bank & Trust Co. (E); 17Oct58; R222942.

MCBRIDE, MARY MARGARET.

  New York is everybody's town, by
    Mary Margaret McBride and Helen
    Josephy Robeson. Drawings by
    Margaret Freeman. © 24Apr31;
    A37076. Mary Margaret McBride
    (A); 23Oct58; R223648.

MCCANN, HERBERT L.

Expert driving, by H, L. McCann and James O. Spearing. © 4Nov31; A44785. Herbert L. McCann (A); 18Nov58; R224835.

MCCANN, MARY RUNYON.

Guys and dolls. SEE Runyon, Damon.

  The snatching of Bookie Bob. SEE
    Runyon, Danon.

  A story gosa with it. SEE Runyon,
    Damon.

<pb id='304.png' n='1958_h2/A/1630' />
  That ever-loving wife. SEE Runyon,
    Damon.

MCCARGAR, ANNE ELIZABETH.

  Side talks A 1-5. SEE Kleiser,
    Grenville.

MCCLAY, HARRIET L., ed.

Story essays, edited by Harriet L. McClay and Helen Judson. © 22Oct31; A44524. Harriet L. McClay & Helen Judson Galvin (A); 28Nov58; R225586.

MCCORKLE, JULIA NORTON.

Learning to spell; an informal guide for college students. © 1Oct30; A28964. Julia Norton McCorkle (A); 1Oct58; R222110.

MCCRACKEN, HAROLD.

Alaska bear trails. Illustrated with photos, by the author. © 17Sep31; A43225. Harold McCracken (A); 18Sep58; R221550.

  All bull's eyes, no corpses. (In
    St. Nicholas, Sept. 1931)
    © 20Aug31; B128504. Harold
    McCracken (A); 26Aug58; R220637.

MCCRINDLE, SUSAN ERTZ.

The story of Julian, by Susan Ertz. © 28Aug31; A42042. Susan Ertz McCrindle (A); 13Nov58; R225338.

MCCULLEY, JOHNSTON.

Rollicking rogue. (In All star detective stories, Nov. 1930) © 30Sep30; B87577. Johnston McCulley, by his attorney in fact, Republic Productions, Inc. (A); 18Aug58; R219584.

MACDONALD, E. S.

  A tangled web. SEE MacDonald,
    Lucy Maud Montgomery.

MACDONALD, GREGORY, tr.

Lenin. SEE Ossendowski, Ferdinand.

MACDONALD, LUCY MAUD MONTGOMERY.

  A tangled web. © 10Sep31; A43541.
    E. S. MacDonald (C); 21Oct58;
    R223409.

MACDONALD, PHILIP.

The crime conductor. © 13Aug31; A41135. Philip MacDonald (A); 21Aug58; R219932.

  Moonfisher, by Anthony Lawless,
    pseud. © 1Jun31, AI-15342;
    28Nov31, A53697. Philip MacDonald
    (A); 1Dec58; R225563.

  Murder gone mad. © 2Feb31,
    AI-14901; 31Jul31, A41099.
    Philip MacDonald (A); 1Aug58;
    R219198.

  The Polferry riddle. (Pub. abroad
    as The choice) © 30Mar31,
    AI-15109; 19Jun31, A39081.
    Philip MacDonald (A); 8Jul58;
    R217591.

MCDOWALL, KENNETH STEWART PATRICK.

Mapp and Lucia. SEE Benson, E. F.

MCEVOY, J. P.

  Mister Noodle. © 19Mar31;
    A36070. J. P. McEvoy (A);
    30Jul58; R218774.

  Society. © 24Sep31; A41878.
    J. P. McEvoy (A); 24Oct58;
    R223555.

MCEWEN, ROBERT S.

Vertebrate embryology. Rev. ed. © 28Sep31; A44052. Robert S. McEwen (A); 13Oct58; R222748.

MCFARLAND, LESTER.

  Mac and Bob's W. L. S. book of
    songs. © 3Dec31; AA84991.
    M. M. Cole Pub. Co. (PWH); 5Dec58;
    R227351.

MCFEE, INEZ F.

  Lives of girls who became famous.
    SEE Bolton, Sarah K.

<pb id='305.png' /> MCFEE, WILLIAM.

  A bibliography of the writings of
    William McFee. SEE Babb, James T.

  The harbourmaster. © 15Dec31;
    A45614. William McFee (A);
    17Dec58; R226918.

Oil, and the hairy ape. (In Harper's magazine, Jan. 1932) © 18Dec31; B138281. William McFee (A); 22Dec58; R226921.

MACGREOOR, M. M.

  Palmistry. © 10Oct30; A28890.
    M. M. MacGregor (A); 8Jul58;
    R217251.

MACHTEY, illus.

  Westy Martin in the Sierras. SEE
    Fitzhugh, Percy Keese.

MACK, WILLIAM, ed. SEE
  Corpus juris.

MACKENTY, JOHN E.

  Nursing in diseases of the eye, ear,
    nose and throat. SEE Manhattan
    Eye, Ear & Throat Hospital, New
    York.

MACKENZIE, SIR COMPTON.

  For sale. (Pub. abroad as Buttercups
    and daisies) © 12Jun31,
    AI-15349; 20Aug31, A42182. Sir
    Compton Mackenzie (A); 26Aug58;
    R220628.

MCKEON, RICHARD, ed.

Selections from medieval philosophers; Roger Bacon to William of Ockham. Edited and translated with introductory notes and glossary by Richard McKeon. (Modern student's library. Philosophy series) © 20Nov30; A31584. Richard McKeon (A); 23Oct58; R223547.

MCKIBBEN, FRANK M.

Improving religious education through supervision. © 27Jul31; A39938. Frank M. McKibben (A); 19Sep58; R221441.

MCKINNEY, WILLIAM M. SEE
  California Jurisprudence.

MCKINNEY'S CONSOLIDATED LAWS OF NEW
  YORK, ANNOTATED. Quarterly
  supplement, April 1931. © 15Apr31;
  A37930. Edward Thompson Co.
  (PWH); 3Jul58; R217533.

MCLAUGHLIN, EDITH M.

  Second year reading. Book 2.
    Teacher's manual for American
    cardinal readers. © 12Sep31;
    A43826. Benziger Bros., Inc.
    (PWH); 7Nov58; R224777.

  Silent reading tests for seatwork.
    Book 2-3. For use with American
    cardinal readers. © 29Oct31,
    AA83267; 15Apr31, AA72568.
    Benziger Bros., Inc. (PWH);
    7Nov58; R224761, 224763.

  Silent reading tests for seatwork.
    Pre-primer (Ready to read) and
    Primer. For use with American
    cardinal readers. © 21Sep31;
    AA82212. Benziger Bros., Inc.
    (PWH); 7Nov58; R224764.

  Third year reading teacher's
    manual accompanying book 3,
    American cardinal readers.
    © 15Apr31; AA72567. Benziger
    Bros., Inc. (PWH); 7Nov58;
    R224762.

MCLESTER, JAMES B.

Nutrition and diet in health and disease. SEE McLester, James S.

MCLESTER, JAMES S.

Nutrition and diet in health and disease. 2d ed., rev. © 1Apr31; A36293. James B. McLester (C); 6Nov58; R224260.

<pb id='371.png' /> MACMILLAN, DOUGALD, ed.

Plays of the restoration and eighteenth century as they were acted at the theatres-royal by Their Majesties' servants. Edited by Dougald MacMillan and Howard Mumford Jones. © 13Mar31; A35475. Dougald MacMillan & Howard Mumford Jones (A); 25Jul58; R218429.

MACMILLAN CO.

  The snow image. SEE Hawthorne,
    Nathaniel.

  Told under the green umbrella. SEE
    International Kindergarten Union.
    Literature Committee.

MACMILLAN CO. SEE

The Catholic encyclopaedic dictionary.

Encyclopaedia of the social sciences.

MCMOLLEN, J. C.

An evening of plays for men. © 18Aug30; A26803. Marie McMullen (NK); 3Jul58; R217178.

MCMULLEN, MARIE.

  An evening of plays for men. SEE
    McMullen, J. C.

MCNAB, ALLAN, illus.

Durandal. SEE Lamb, Harold.

MCNEER, MAY.

  Stop Tim: the tale of a car, by
    May McNeer and Lynd Ward.
    © 9Oct30; A29298. May McNeer &
    Lynd Ward (A); 22Sep58; R221590.

MCNEER, MAY YONGE. SEE Ward, May
  Yonge McNeer.

MCNEILE, HERMAN CYRIL.

The haunted rectory. (Pub. abroad in The Strand magazine, Feb. 1931. Illustrated by Sydney Seymour Lucas) © 26Jan31, AI-14906; 30Jun31, A40428. Violet Evelyn McNeile (W); 9Jul58; R217583.

The missing chauffeur. (Pub. abroad in The Strand magazine, June 1931, by Sapper, pseud.; illustrated by Sydney Seymour Lucas) © 25May31, AI-15314; 20Nov31, A44961. Violet Evelyn McNeile (W); 24Dec58; R226915-226936.

MCNEILE, VIOLET EVELYN.

  The haunted rectory. SEE McNeile,
    Herman Cyril.

  The missing chauffeur. SEE McNeile,
    Herman Cyril.

MACTAVISH, ANGUS J., comp.

Scotch; or, It's smart to be thrifty. Edited by P. Gregory Hartswick. © 11Jun31; A38810. Simon & Schuster, Inc. (PCW); 24Oct58; R223943.

MACY (GEORGE) COMPANIES, INC.

  Autobiography. SEE Franklin,
    Benjamin.

Tom Jones. SEE Priestly, J. B.

MADDEN, JOSEPH W.

Handbook of the law of persons and domestic relations. (Hornbook series) © 25Sep31; A44026. West Pub. Co. (PWH); 6Oct58; R222462.

Illustrative cases on persons and domestic relations. SEE Cooley, Roger W.

MAGILL, MARCUS, pseud. SEE Hill, Brian.

MAGRAUTH, JOSEPH WALKER.

  Forms of pleading in actions for
    legal or equitable relief. SEE
    Abbott, Austin.

<pb id='307.png' n='1958_h2/A/1631' />
MAINE AND ATLANTIC REPORTER DIGEST,
  covering all cases reported in
  Maine reports and Atlantic reporter.
  Vol.15-23. Key number system.
  © 14May31, A37882-37884; 8Jun31,
  A39408-39410; 30Jun31, A39411-39413.
  West Pub. Co. (PWH); 3Jul58;
  R217428-217436.

MAINE AND ATLANTIC REPORTER DIGEST;
  covering all cases reported in Maine
  reports and Atlantic reporter.
  Vol.24-29. © 29Aug31, A41813-41815;
  30Sep31, A44015-44017.
  West Pub. Co. (PWH); 6Oct58;
  R222408-222413.

MAINE AND ATLANTIC REPORTER DIGEST.
  May 1931 cumulative pamphlet.
  © 23May31; A37849. West Pub. Co.
  (PWH); 3Jul58; R217516.

MAINE AND ATLANTIC REPORTER DIGEST.
  July 1931 cumulative pamphlet.
  © 31Jul31; A40785. West Pub. Co.
  (PWH); 6Oct58; R222407.

MALTBY, FRANCES GOGGIN.

The dimity sweetheart; O. Henry's own love story. Limited ed. © 25Oct30; A38378. Mary Page Trask, Anne Maltby Rouse & Frances Maltby Cover (C); 14Oct58; R222795.

MAMAPARTE, CURZIO.

  Technique du coup d'etat.
    Traduit de l'italien par Juliette
    Bertrand. © 25Jul31; AF15333.
    Juliette Bertrand (A); 10Oct58;
    R222725.

MANHATTAN EYE, EAR & THROAT HOSPITAL,
  NEW YORK.

Nursing in diseases of the eye, ear, nose and throat. By Harmon Smith, editor, John R. Shannon and John E. Mackenty. 5th ed. © 12Mar31; A34858. W. B. Saunders Co. (PCW); 15Oct58; R223034.

MANN, ARTHUR H.

The triad. SEE Hall, J. Lincoln.

MANN, GORDON LEE.

  The nu-way pick-style guitar, chord
    system. © 10Jun31; AA75759.
    Ruth K. Mann (W); 28Nov58;
    R225301.

MANN, RUTH K.

The nu-way pick-style guitar, chord system. SEE Mann, Gordon Lee.

MANN, THOMAS.

Death in Venice; translated from the German by H. T. Lowe-Porter; with an introd. by Ludwig Lewisohn. © on translation & introd.; 24Oct30; A30569. Alfred A. Knopf, Inc. (PWH); 12Aug58; R219141.

A man and his dog. From the German. Herman George Scheffauer, translator. © 10Oct30; A29361. Alfred A. Knopf, Inc. (PWH); 12Aug58; R219138.

  Mario and the magician. Translated
    from the German by H. T. Lowe-Porter,
    pseud. of Helen Tracy
    Porter Lowe. © on translation;
    2Jan31; A33190. Alfred A. Knopf,
    Inc. (PWH); 29Oct58; R223616.

  La montagne magique (Der Zauberberg)
    T.1-2. Traduit de I'allemand par
    Maurice Betz. © 11Jun31 (t.1),
    9Jul31 (t.2); AF14337. Mme
    Maurice Betz, nee Louise Corroy
    (W); 18Aug58; R219686.

MANNIN, ETHEL. SEE
  Porteous, Ethel Mannin.

MANNING, JOAN DONALDSON.

  Chattering gods. SEE Crawley,
    Rayburn, pseud.

<pb id='308.png' /> MANSFIELD, KATHERINE.

Stories. A selection made by J. Middleton Hurry; with designs by Zhenya Gay. © on illus.; 7Nov30; A30573. Alfred A. Knopf, Inc. (PWH); 12Aug58; R219143.

MANSFIELD, KATHERINE, pseud. SEE
  Murry, Kathleen Beauchamp.

MANTE, MME. GERARD. SEE Mante,
  Sivy Proust.

MANTE, SIVY PROUST.

  Lettres a la comtesse de noailles.
    SEE Proust, Marcel.

MANTLE, BURNS, ed. SEE

The best plays of 1929-1930, and the year book of the drama In America.

MANTLE, LYDIA BURNS. SEE

The best plays of 1929-1930, and the year book of the drama in America.

MANUFACTURERS TRUST CO.

  The lady of Godey's, Sarah Josepha
    Hale. SEE Finley, Ruth E.

MARCHAND, LOUIS.

La famille Dupont; ou, Le premier livre de Francais. Par Louis Marchand et Alfred I. Roehm. Chansons populaires harmonisees par E. Bouillon. © on new matter & illus.; 1Sep31; A42224. Louis Marchand (A); 3Sep58; R220923.

MARCHON, ALBERT.

Les demons de l'aube. © 10Oct31; AF16007. Albert Marchon (A); 3Nov58; R224089.

MARGARET MARY, SAINT.

  Gems of thought from St. Margaret
    Mary. Rev. and ed. by A Visitation
    Nun. © 28Oct31; A44910.
    Mary Cecilla Clark (E); 7Nov58;
    R224770.

MARKEY, CORINNE HARRIS, Joint author.

  The climbing path. SEE Whiton.
    Louis C.

MARPLE, ALLEN C.

  Best seller, by N. O. Youmans,
    pseud. © 22Oct30; A29629.
    Allen C. Marple (A); 22Aug58;
    R220330.

MARQUAND, JOHN P.

  Call me Joe. (In Saturday evening
    post, Nov. 28, 1931) © 24Nov31;
    B134918. John P. Marquand (A);
    25Nov58; R225031.

  Gentlemen ride. (In Saturday evening
    post, Nov. 7, 1931)
    © 3Nov31; B132841. John P. Marquand
    (A); 4Nov58; R224587.

  Tolerance. (In Saturday evening
    post, Oct. 17, 1931) © 13Oct31;
    B130351. John P. Marquand (A);
    14Oct58; R222842.

  Upstairs. (In Saturday evening
    post, Aug. 8, 1931) © 4Aug31;
    B122719. John P. Marquand (A);
    5Aug58; R219664.

MARROW, EDWARD J., pseud. SEE
  Sherman, Harold M.

MARSH, EVA.

  Three little Ojibwas. SEE Marsh,
    George Tracy.

MARSH, GEORGE TRACY.

  Three little Ojibwas; Amik (the
    beaver), Nika (the goose),
    Wabos (the rabbit) © 19Sep30;
    A29081. Eva Marsh (W); 11Aug58;
    R219188.

MARSH, HALBERT W.

Correct legal titles for all additions, subdivisions and resubdivisions in the city and county of Denver, Colo., with supplement for adjacent subdivisions in Adams and Arapahoe counties and index map. © 28May31; A37691. Halbert W. Marsh (A); 15Sep58; R221248.

<pb id='372.png' /> MARSHAK, ILIA. IAKOVLEVICH.

New Russia's primer; the story of the five-year plan, by M. Ilin, pseud. Translated from the Russian by George S. Counts and Nucia P. Lodge. © 29Apr31; A37091. George S. Counts & Nucia P. Lodge (A); 2Jan59; R227601.

MARSHALL, EDISON.

  The deputy at Snow Mountain.
    Pt.1-6. Illustrated by Elbert
    McGran Jackson. (In Good housekeeping,
    June-Nov. 1931)
    © 25May31, A5-31365; 25Jun71,
    A5-31836; 25Jul31, A5-32791;
    25Aug31, A5-34261; 25Sep31,
    A5-35215; 24Oct31, A5-36063.
    Edison Marshall (A); 31Oct58;
    R224030-224035.

  The most thrilling night of my life.
    Illustrated by C. Leroy Baldridge.
    (In Good housekeeping, Mar. 1931)
    © 25Feb31; A5-27792. Edison Marshall
    (A); 10Jul58; R217634.

MARTEL, J.

  La novela de un novelista. SEE
    Palacio Valdes, Armando.

MARTIN, CLINTON S., ed.

  Boy Scouts and the Oregon Trail,
    1830-1930. © 5Dec30; A31488.
    Clinton S. Martin (A); 6Aug58;
    R219100.

MARTIN, DAVID, JR.

A boy scout with the Sea Devil. With an introd. by Count Felix von Luckner; with 33 illus. from photos, by the author. © 24Oct30; A30210. David Martin, Jr. (A); 23Jul58; R218416.

MARTIN, GEORGE MADDEN.

  Emray Lou. Illustrated by Paul
    Galdone. © on illus.; 15Sep31;
    A42489. Paul Galdone (A);
    16Sep58; R221540.

MARTIN, MARY.

  The hangman's guests. SEE Martin,
    Stuart.

MARTIN, MARY STEICHEN. SEE
  Calderone, Mary Steichen Martin.

MARTIN, STUART.

The hangman's guests. (Harper sealed mystery stories) © 6May31; A38002. Mary Martin (W); 4Aug58; R218940.

MARTIN, WILLARD.

Forms of pleading in actions for legal or equitable relief. SEE Abbott, Austin.

Trial evidence. SEE Abbott, Austin.

MARY COSMA, MOTHER. SEE Cosma, Mother.

MARY DOMINICA, SISTER. SEE Dominica, Sister.

MARY PATRICK, SISTER.
  Sister Louise. SEE Helen Louise, Sister.

MARY PETER, MOTHER.

  My candle and other poems. SEE
    Francis d'Assisi, Mother.

MASEFIELD, JOHN.

The wanderer of Liverpool. © 3Nov30; A30383. John Masefield (A); 17Sep58; R221296.

MASON, ARTHUR.

  From the horn of the moon. Illustrated
    by Robert Lawson
    © 22Aug31; A42980. Mary Frank
    Mason (W); 26Aug58; R220635.

  Moving of the bog. (In St. Nicholas,
    July 1931) © 20Jun31; B118797.
    Mary Frank Mason (W); 8Jul58;
    R217592.

  Pigs in the castle. (In Golden
    book magazine, July 1931)
    © 20Jun31; B118956. Mary Frank
    Mason (W); 8Jul58; R217594.

<pb id='310.png' n='1958_h2/A/1632' />
  Willie the wagger. (In Delineator,
    August 1931) © 27Jun31; B119766.
    Mary Frank Mason (W); 9Jul58;
    R217582.

MASON, DANIEL GREGORY.

  Beethoven and his forerunners.
    New ed. with new introd.
    © 30Sep30; A27994. Mary Lord
    Mason (W); 17Sep58; R221293.

MASON, DEXTER, pseud. SEE
  Wright, William Mason, Jr.

MASON, F. VAN WYCK.

The Fort Terror murders. © 17Dec31; A45612. F. Van Wyck Mason (A); 22Dec58; R227610.

MASON, GREGORY.

Columbus came late. © 5Nov31; A44682. Gregory Mason (A); 13Nov58; R225340.

MASON, JOSEPHINE DWIGHT.

  A practical reader for adults.
    Book 1. By Josephine Dwight
    Mason and Gertrude E. O'Brien.
    Illustrated by Margo Sylvester.
    © 13Jul31; A40393. Josephine
    Dwight Mason (A); 6Nov58; R224141.

  A practical reader for adults.
    Book 1. By Josephine Dwight
    Mason and Gertrude E. O'Brien.
    Teachers ed. © 15Sep31; A41777.
    Josephine Dwight Mason (A);
    6Nov58; R224146.

  A practical reader for adults.
    Book 2. By Josephine Dwight
    Mason and Gertrude E. O'Brien.
    Illustrated by Margo Sylvester.
    © 1Oct31; A43100. Josephine
    Dwight Mason (A); 6Nov58; R224148.

MASON, MARY FRANK.

  From the horn of the moon. SEE
    Mason, Arthur.

  Moving of the bog. SEE Mason,
    Arthur.

  Pigs in the castle. SEE Mason,
    Arthur.

  Willie the wagger. SEE Mason,
    Arthur.

MASON, MARY LORD.

  Beethoven and his forerunners. SEE
    Mason, Daniel Gregory.

MASON, WILLIAM.

  Air a la bourree. SEE Handel,
    George Frederick.

  Gavotte in D major. SEE Bach,
    Johann Sebastian.

MASSACHUSETTS DIGEST. Vol.11A. Nov. 1926-Oct. 1929. Compiled under the American digest classification. © 14Jul31; A40809. Little, Brown & Co. & West Pub. Co. (PWH); 6Oct58; R222436.

MASSEE, J. C.

The day of Jesus Christ. © 16May31; A38449. J. C. Massee (A); 29Dec58; R227734.

MASTERMAN, OLIVE D.

  The mystery of fifty-two. SEE
    Masterman, Walter S.

MASTERMAN, WALTER S.

The mystery of fifty-two. © 1Sep31; A41469. Olive D. Masterman (W); 26Nov58; R225574.

MATHER, ELLEN MILLS.

  Estimates in art. SEE Mather,
    Frank Jewett, Jr.

MATHER, FRANK JEWETT, JR.

Estimates in art. (Series 2) © 6Apr71; A35943. Ellen Mills Mather (W); 25Jul58; R218432.

MATHESON, MRS. J. R. D.

  The needle in the haystack. SEE
    Matheson, John.

<pb id='311.png' /> MATHESON, JOHN.

  The needle In the haystack.
    Pictures by E. Parin d'Aulaire.
    © 16Oct30; A29568. Mrs. J. R. D.
    Matheson (W); 8Sep58; R221118.

MATHIEZ, ALBERT.

After Robespierre the Thermidorian reaction. Catherine Alison Phillips, translator. W. Alison Phillips, author of introd. © 23Jan31; A34003. Alfred A. Knopf, Inc. (PWH); 30Dec58; R227008.

MATTHEWS, HAROLD E.

Speech craft. SEE Fogerty, Elsie.

MAUGHAM, W. SOMERSET.

  The alien corn. (In Hearst's
    international-cosmopolitan,
    Aug. 1931) © 10Jul31; B120753.
    W. Somerset Maugham (A); 11Jul58;
    R217705.

  The door of opportunity. (In
    Hearst's international-cosmopolitan,
    Oct. 1931) © 10Sep31;
    B126584. W. Somerset Maugham (A);
    11Sep58; R221213.

  Six stories written in the first
    person singular. © 17Sep31;
    A42589. W. Somerset Maugham
    (A); 18Sep58; R221547.

MAURER, MEYER EMIL.

Cumulative annual digest of Pennsylvania decisions, 1930. SEE Monaghan, James, ed.

MAURIAC, FRANCOIS.

Souffrances et bonheur du chretien. © 15Jun31; AF13520. Francois Mauriac (A); 18Aug58; R219674.

MAURICE, ARTHUR B., joint author.

  The caliph of Bagdad. SEE Davis,
    Robert H.

MAUROIS, ANDRE.

  Conversation. Translated from the
    French by Yvonne Dufour.
    © 7Oct30, A30056. Andre Maurois
    (PWH); 23Sep58; R221554.

  Three ghosts of America. (In Scribner's
    magazine, Sept. 1931)
    © 21Aug31; B124804. Andre Maurois
    (A); 26Nov58; R225465.

  The weigher of souls. (In Scribner's
    magazine, Mar. 1931)
    © 19Feb31; B107887. Andre Maurois
    (A); 26Nov58; R225460.

MAVITY, NANCY BARR.

  Sister Aimee. © 24Sep31; A42973.
    Nancy Barr Mavity (A); 29Sep58;
    R222069.

MAWSON, MRS. C. O. S. SEE Mawson,
  Katherine.

MAWSON, CHRISTOPHER O. S., ed. SEE

The Roget dictionary of synonyms and antonyms.

MAWSON, CHRISTOPHER ORLANDO SYLVESTER.

Roget's international thesaurus of English words and phrases. New matter by Max J. Herzberg and F. H. Pritchard. © on p.viii, xxxv, xxvi; 30Oct30; A29784. Thomas Y. Crowell Co. (PWH); 7Oct58; R222585.

MAYO CLINIC, ROCHESTER, MINN.

Collected papers of the Mayo Clinic and the Mayo Foundation. Vol.22, 1930. Edited by Maud H. Mellish-Wilson, Richard H. Hewitt and Mildred A. Felker. © 26May31; A38527. W. B. Saunders Co. (PCW); 12Nov58; R224664.

MAZZAVINI, MAY CHRISTIE.

  Flirting wives, by May Christie.
    © 30Apr31; A37096. May Christie
    Mazzavini (A); 29Dec58; R226945.

<pb id='373.png' />
  The high speed girl, by May
    Christie. © 12May31; A37280.
    May Christie Mazzavini (A);
    29Dec58; R226947.

MAZZETTI, ENRICA LUDOVICA MARIA,
  FREIIN VON HANDEL-. SEE Handel-Mazzetti,
  Enrica Ludovica Maria,
  Freiin von.

MECKAUER, WALTER.

  The books of the Emperor Wu Ti.
    Translated from the German by
    J. J. Saville Oarner. © 14Jul31;
    A39988. Walter Meckauer (PWH);
    20Aug58; R219820.

MEIK, VIVIAN.

The people of the leaves. © 16Apr31, AI-15054; 20Aug31, A42481. Vivian Meik (A); 3Sep58; R220926.

MEINER, FELIX.

  Aus meinem leben und denken. SEE
    Schweitzer, Albert.

MEISTER, MORRIS.

Energy and power. (Living in a world of science) © 23Oct30; A30650. Morris Meister (A); 13Oct58; R222887.

MELLISH, MAUD H. SEE
  Wilson, Maud H. Meliish.

MENCKEN, H. LOUIS.

  The American Democrat. SEE
    Cooper, James Fenimore.

MERCER, C. W.

  Adele & Co., by Dornford Yates,
    pseud. © 24Jul31; A39754.
    Dornford Yates (C. W. Mercer)
    (A); 21Nov58; R224963.

MERCHANTS NATIONAL BANK OF BOSTON.

  Following the prairie frontier.
    SEE Humphrey, Seth K.

MEREDITH, BOBBIE.

  Speakeasy girl. Edited by Fulton
    Oursler. © 28Jul71; A40559.
    April Oursler Armstrong, Fulton
    Oursler, Jr., Will Oursler & Helen
    Oursler Balaber (C); 15Aug58;
    R219701.

MERIMEE, PROSPER.

Carmen et autres nouvelles; edited, with introd., notes, exercises, and vocabulary by D. S. Blondheim. (Heath's modern language series) © on pref., introd., notes, exercises & vocabulary; 25Nov30; A31351. Eleanor Lansing Dulles (C of D. S. Blondheim); 6Nov58; R224124.

Colomba. Editors: R. Keith Hicks and H. E. Ford. © on simplification of vocabulary, introd., notes & vocabulary; 16Sep31; A41706. R. Keith Hicks (A) & Walter B. Ford (C); 20Feb59; R221630.

MERREL, CONCORDIA. SEE Morton, Concordia
  Merrel.

MERRELL, MARION CLINCH CALKINS.

  Some folks won't work, by Clinch
    Calkins. © 16Oct30; A29793.
    Marion Clinch Calkins Merrell (A);
    29Sep58; R222107.

MERSEREAU, GRACE T.

  Materials of industry. SEE
    Mersereau, Samuel Foster.

MERSEREAU, SAMUEL FOSTER.

Materials of industry, their distribution and production. With an introd. by Albert L. Colston. © 13Feb31; A34409. Grace T. Mersereau (W); 6Aug58; R219169.

METAXAS, R. LE ROY, tr.

  Rational principles of pianoforte
    technique. SEE Cortot, Alfred.

<pb id='313.png' n='1958_h2/A/1633' /> METCALFE, EVELYN DUNN SCOTT.

A calendar of sin, by Evelyn Scott. © 5Oct31; A43087. Evelyn Scott (A); 30Oct58; R224042.

MEYER, MILFORD J., joint author.

  Handbook of collection practice.
    SEE Abrahams, Robert D.

MEYNELL, LAURENCE.

  Storm against the wall. © 9Jan31,
    AI-14861; 8Apr31, A40068.
    Laurence Meynell (A); 17Jul58;
    R218226.

MICHELL, WM. A.

The doctrine of the mystical body of Christ according to the principles of the theology of St. Thomas. SEE Anger, Joseph.

MICHIE, A. HEWSON, ed.

  Michie on banks and banking.
    SEE Michie Co.

MICHIE, A. HEWSON, ed. SEE

  Annual supplement to Massachusetts
    cumulative statutes.

  The Encyclopedic digest of North
    Carolina reports.

  Michie's digest of Virginia and
    West Virginia reports.

The North Carolina code of 1931.

MICHIE, THOMAS JOHNSON, ed. SEE

Annual supplement to Massachusetts cumulative statutes.

MICHIE CO.

Instructions. SEE Casparlan, Harry.

Michie on banks and banking. Vol. 1-4. Permanent ed. By the editorial staff of the Michie Co. under the supervision of A. Hewson Michie, assisted by Beirne Stedman. © 23Jun31, A40101; 23Jun31, A40102; 27Jul31, A39759; 20Oct31, A43382. Michie Co. (PWH); 12Nov58; R224631-224633, 224630.

MICHIE CO. SEE

  Annual supplement to Massachusetts
    cumulative statutes.

  The Encyclopedic digest of North
    Carolina reports.

  Michie's digest of Virginia and
    West Virginia reports.

The North Carolina code of 1931.

MICHIE'S DIGEST OF VIRGINIA AND
  WEST VIRGINIA REPORTS. Vol. 8-9.
  Under the editorial supervision of
  A. Hewson Michie, assisted by Beirne
  Stedman, A. R. Yellott and Harry
  Casparian. © 1Jan31, A31997;
  8May31, A38046. Michie Co. (PWH);
  12Nov58; R224634-224635.

MICHIE'S DIGEST OF VIRGINIA AND
  WEST VIRGINIA REPORTS. Vol. 11.
  Under the editorial supervision of
  A. Hewson Michie, assisted by Beirne
  Stedman, A. R. Yellott and Harry
  Casparlan. Indexed by Thomas Johnson
  Michie. © 9Sep31; A41528. Michie
  Co. (PWH); 12Nov58; R224637.

MICHIGAN DIGEST. April 1931 cumulative
  pamphlet. © 27Apr31; A38414.
  West Pub. Co. (PWH); 3Jul58;
  R217525.

MICHIGAN DIGEST. July 1931 cumulative
  pamphlet. © 25Jul31; A41825.
  West Pub. Co. (PWH); 6Oct58;
  R222414.

MIDLAND BANK EXECUTIVE & TRUSTEE CO., LTD.

  The border trail. SEE Bindloss,
    Harold.

  The prairie patrol. SEE Bindloss,
    Harold.

MIKHAILOVA-CUVILLIER, MARIE. SEE
  Rolland, Marie Mikhailova-Cuvillier.

<pb id='314.png' /> MILES, C. AUSTIN, ed.

  Christian hymns and songs; a choice
    selection of songs for worship &
    praise. © 23Mar31; AA65602.
    Rodeheaver Co. (PWH); 14Aug58;
    R220268.

  The flambeau; a book of songs for
    schools, institutes, academies,
    by C. Austin Miles, and others.
    © 2Jul31; AA75911. Rodeheaver
    Co. (PWH); 14Aug58; R220269.

MILES, C. AUSTIN. SEE
  Children's day helper.

MILLAY, EDNA ST. VINCENT.

  Three sonnets: Women have loved
    before; I know my mind; and
    Even in the moment. (In Poetry,
    Oct. 1, 1930) © 23Sep30;
    B88130. Norma Millay Ellis (E);
    12Sep58; R221134.

  Three sonnets: Women have loved
    before; I know my mind; and
    Even in the moment. (In Poetry,
    Oct. 1, 1930) © 23Sep30;
    B88130. Norma Millay Ellis (NK);
    12Sep58; R221135.

  Two sonnets in memory. (In New
    republic, Aug. 27, 1930)
    © 21Aug30; B85196. Norma Millay
    Ellis (E); 20Aug58; R219863.

  Two sonnets in memory. (In New
    republic, Aug. 27, 1930)
    © 21Aug30; B85196. Norma Millay
    Ellis (NK); 20Aug58; R219864.

MILLAY, EDNA ST. VINCENT. SEE
  Boissevain, Edna St. Vincent Millay.

MILLER, ALICE DUER.

The bishop's nephew. (In Woman's home companion, Aug.-Sept. 1931) © 24Jun31, B119643; 27Jul31, B123373. Denning Duer Miller (C); 17Sep58; R221285, 221287.

  Forsaking all others. Decorations
    by Enid Bell. © 22Oct31; A44654.
    Denning Duer Miller (C); 23Oct58;
    R223801.

  Grandmother's gigolo. (In Ladies'
    home journal, Nov. 1931)
    © 9Oct31; B129915. Denning Duer
    Miller (C); 23Oct58; R223802.

  Happy marriage. (In McCall's
    magazine, Nov. 1931) © 9Oct31;
    B129940. Denning Duer Miller (C);
    23Oct58; R223803.

  The Medici ruby. (In McCall's magazine,
    Aug. 1931) © 10Jul31;
    B121337. Denning Duer Miller (C);
    17Sep58; R221286.

  Mother announcing. (In Ladies'
    home journal, July 1931)
    © 16Jun31; B119028. Denning Duer
    Miller (C); 17Sep58; R221284.

MILLER, B. HAROLD.

  Young Trajan. SEE Miller, Elizabeth
    Cleveland.

MILLER, DELLA S.

Plant physiology with references to the green plant. SEE Miller, Edwin C.

MILLER, DENNING DUER.

  The bishop's nephew. SEE Miller,
    Alice Duer.

  Forsaking all others. SEE Miller,
    Alice Duer.

  Grandmother's gigolo. SEE Miller,
    Alice Duer.

  Happy marriage. SEE Miller, Alice
    Duer.

  The Medici ruby. SEE Miller, Alice
    Duer.

  Mother announcing. SEE Miller,
    Alice Duer.

MILLER, EDWIN C.

Plant physiology with references to the green plant. © 18Apr31; A36690. Della S. Miller (W); 6Aug58; R219166.

<pb id='374.png' /> MILLER, ELIZABETH CLEVELAND.

Young Trajan. Illustrated by Maud and Mlska Petersham. © 15Oct31; A43705. B. Harold Miller (Wr), Maud & Miska Petersham (A); 3Nov58; R224612.

MILLER, ERNESTINE H.

  Solutions to C. P. A. problems.
    SEE Taylor, Jacob B.

MILLER, FRANCIS TREVELYN.

  The world In the air. © 7Nov30;
    A31452. Trust Dept. Central
    Hanover Bank & Trus Co. (E);
    23Jul58; R218421.

MILLER, HERMANN C., Joint author.

  Solutions to C. P. A. problems.
    SEE Taylor, Jacob B.

MILLER, MURIEL MCKAIG.

  The butterfly book. SEE Holland,
    W. J.

MILLER, RENE FÜLOP-. SEE
  Fülop-Miller, Rene.

MILLIN, SARAH GERTRUDE.

The sons of Mrs. Aab. © 20Aug31; A41316. Sarah Gertrude Millin (A); 22Oct58; R223242.

MILLS, ENOS A.

Bird memories of the Rockies. © 24Jul31; A40516. Esther B. Mills (PPW); 24Nov58; R225196.

MILLS, ESTHER B.

  Bird memories of the Rockies. SEE
    Mills, Enos A.

MILLS, NANCY THEODOSIA.

Bach. SEE Terry, Charles Sanford.

MILN, LOUISE JORDAN.

The vintage of You Yee. © 16Apr31; A36660. Dagmar Green (C); 9Sep58; R221082.

MILNE, A. A.

Michael and Mary; a comedy in 3 acts. (In The Best plays of 1929-30 and the Year book of the drama In America. Edited by Bums Mantle) © 7Nov30; A31026. Dorothy Daphne Milne (W); 30Sep58; R222598.

MILNE, ALAN ALEXANDER.

  The Christopher Robin birthday book.
    Decorated by E. H. Shepard.
    © on compilation; 13Nov30,
    AI-14646; 17Feb31, A33843.
    Daphne Milne (W); 7Aug58; R219123.

  Two people. © 21Sep31; A41781.
    Daphne Milne (W); 25Nov58;
    R225090.

MILNE, DAPHNE.

  The Christopher Robin birthday book.
    SEE Milne, Alan Alexander, comp.

  Two people. SEE Milne, Alan
    Alexander.

MILNE, DOROTHY DAPHNE.

Michael and Mary. SEE Milne, A. A.

MILTON, GEORGE FORT.

  The age of hate. © 19Nov30;
    A31165. Mrs. Philip T. Dwight
    (Alice Port) (C); 24Jul58;
    R218414.

MINNICH, HELEN BENTON.

  The bright book of lights.
    © 10Sep31; A41596. Helen Benton
    Minnich (A); 15Sep58; R221148.

MISSISSIPPI AND SOUTHERN REPORTER
  DIGEST. May 1931 cumulative
  pamphlet. © 23May31; A37845.
  West Pub. Co. (PWH); 3Jul58;
  R217515.

<pb id='316.png' n='1958_h2/A/1634' />
MISSISSIPPI AND SOUTHERN REPORTER
  DIGEST. July 1931 cumulative
  pamphlet. © 14Jul31; A41829.
  West Pub. Co. (PWH); 6Oct58;
  R222415.

MISSOURI DECISIONS REPORTED IN THE
  SOUTH WESTERN REPORTER ANNOTATED,
  second series. © West Pub. Co.
  (PWH) v.

  33-34, Jan.-March 1931.
    © 15May31; A37861. 3Jul58;
    R217520.

MISSOURI DECISIONS REPORTED IN THE
  SOUTH WESTERN REPORTER ANNOTATED.
  Second series. © West Pub. Co.
  (PWH) v.

  35-37, Mar.-May 1931.
    © 27Aug31; A41817. 6Oct58;
    R222416.

MISSOURI DIGEST. 1931 semi-annual
  pamphlet. © 9May31; A37852.
  West Pub. Co. (PWH); 3Jul58;
  R217517.

MITCHELL, HELEN S., joint author.

Nutrition in health and disease for nurses. SEE Cooper, Lenna Frances.

MITCHELL, HOWARD.

French verb and idiom achievement tests, by Howard Mltchell and Alice A. Puffer. © 16Jan31; AA59919. Alice A. Puffer (A); 6Nov58; R224151.

MITCHELL, LESLIE SCOTT FALCONER.

The shorn lamb. SEE Locke, William J.

MITCHISON, NAOMI.

  The hostages & other stories for
    boys and girls. Illustrated by
    Logi Southby. © 29Oct30,
    AI-14606; 19Feb31; A33900.
    Naoral Mltchison (A); 16Sep58;
    R221347.

MOLLEX, ALFRED.

  Costes a fait pouet! pouet! SEE
    Yvain, Maurice.

MONAGHAN, JAMES, ed.

Cumulative annual digest of Pennsylvania decisions, 1930. Assisted by Meyer Emil Maurer and William Glassman. © 1Apr31; A35635. West Pub. Co. (PWH); 3Jul58; R217544.

MONAGHAN'S CUMULATIVE DIGEST OF PENNSYLVANIA DECISIONS. Vol. 33, no.3, Aug. 1931. © 25Aug31; B124336. Soney & Sage Co. (PWH); 6Oct58; R222523.

MONG, HAI SCHANG SCHUO JEN. SEE
  Hai Schang Schuo Mong Jen.

MONROE, ANNE SHANNON.

  Getting along together. (In
    Good housekeeping, Sept. 1931)
    © 25Aug31; B125803. Mrs. Snowden
    M. Libbey (NK); 26Aug58;
    R220636.

  Lead from strength. (In Good housekeeping,
    Sept. 1931) © 25Sep31;
    B129338. Mrs. Snowden M. Libbey
    (NK); 29Sep58; R222082.

MONTANI, NICOLA A.

  Essentials in sight singing.
    Book 1-2. © 15Sep31; A43031-43032.
    Mrs. Nicola A. Montani
    (W); 12Nov58; R225725-225726.

MONTANI, MRS. NICOLA A.

  Essentials in sight singing. SEE
    Montani, Nicola A.

MONTEITH, ERNESTINE DORIS.

  Red man's luck. SEE Skinner,
    Constance Llndsay.

MONTGOMERY, LUCY MAUD. SEE
  MacDonald, Lucy Maud Montgomery.

MOOK, CHARLES C.

  Tales of the first animals. SEE
    Walker, Edith B.

<pb id='317.png' /> MOON, CARL.

  The arrow of Tea May. SEE
    Moon, Grace.

  Painted moccasin. © 13Aug31;
    A40766. Francis M. Moon (C);
    15Sep58; R221146.

MOON, FRANCIS M.

  The arrow of Tee May. SEE Moon,
    Grace.

Painted moccasin. SEE Moon, Carl.

MOON, GRACE.

The arrow of Tee May. Illustrated by Carl Moon. © 29Oct31; A44647. Caryl Moon Corey & Francis M. Moon (C of Grace Moon); 17Nov58; R225050.

MOORE, ALBERT H.

Judaism In the first centuries of the Christian era. SEE Moore, George Foot.

MOORE, ANNE CARROLL.

  The bold dragoon. SEE Irving,
    Washington.

MOORE, GEORGE FOOT.

Judaism in the first centuries of the Christian era, the age of the tannaim. Vol.3. © 29Nov30; A32191. Albert H. Moore (C); 17Sep58; R221565.

MOORE, SAMUEL TAYLOR, ed.

  More they told Barron. SEE Pound,
    Arthur, ed.

MORAIN, ALFRED.

The underworld of Paris; secrets of the surete. © on translation; 20Jan31; A32973. Alfred Morain (A); 2Dec58; R225571.

MORAN, ELIZABETH V.

  Sins of America as exposed by the
    Police gazette. SEE Van Every,
    Edward.

MORGAN, ANGELA.

Angela Morgan's recitals. © 18Jul30; A26705. Angela Morgan (A); 8Jul58; R217250.

MORGAN, B. Q., ed.

Neues deutsches Liederbuch. Texte und Melodlen hrsg. von B. Q Morgan, Max Griebsch und A. R. Hohlfeld. © on rearrangement & new songs; 9Oct31; A44413. B. Morgan (A); 6Nov58; R224150.

MORGAN, F. CROSSLEY.

  The Gospel according to Luke. SEE
    Morgan, G. Campbell.

MORGAN, G. CAMPBELL.

  The Gospel according to Luke.
    © 12Dec31; A145889. F. Crossley
    Morgan, Kingsley Morgan & Howard
    Moody Morgan (C); 29Dec58;
    R227737.

  Great themes of the Christian faith.
    SEE Ferguson, Charles Wright, comp.

MORGAN, HOWARD MOODY.

  The Gospel according to Luke. SEE
    Morgan, G. Campbell.

MORGAN, KINGSLEY.

  The Gospel according to Luke. SEE
    Morgan, G. Campbell.

MORLAND, PETER HENRY, pseud. SEE
  Faust, Frederick.

MORLEY, CHRISTOPHER.

  Best college verse, 1931. SEE
    Render, Jessie, ed.

  John Mistletoe. © 1May31; A38181.
    Helen F. Morley (W); 22Dec58;
    R227608.

<pb id='375.png' />
  Notes on Bermuda. (In The Saturday
    review of literature, Sept. 5-Sept. 19,
    1931) © 1Sep31,
    B126599; 8Sep31, B127861;
    19Sep31, B129412. Helen F.
    Morley (W); 22Dec58; R227614-227616.

MORLEY, FRANK V., ed.

  Everybody's Boswell. SEE Boswell,
    James.

MORLEY, HELEN F.

John Mistletoe. SEE Morley, Christopher.

Notes on Bermuda. SEE Morley, Christopher.

MORLEY, WARD, pseud. SEE Kaser, Arthur Le Roy.

MORRIS (EDWIN H.) & CO., INC.

The junior Church choir year book of anthems for soprani and alti. SEE Harts, Harry L., comp.

MORRISON, HENRY C.

The practice of teaching In the secondary school. Rev. ed. © 3Mar31; A35745. Hugh S. Morrlson (C); 24Jul58; R218363.

MORRISON, HUGH S.

The practice of teaching in the secondary school. SEE Morrison, Henry C.

MORRISON, WHITELAW REID, joint author.

  A text-book of physical education.
    SEE Williams, Jesse Feiring.

MORTON, CONCORDIA MERREL.

  Consequences, by Concordia Merrel.
    (Pub. abroad as The cad's party)
    © 20Aug31, AI-15541; 22Oct31;
    A43712. Concordia Merrel Morton
    (A); 24Oct58; R223383.

MOSS, PRED A.

Psychology for nurses. © 14Jan31; A33215. Pred A. Moss (A); 2Jan59; R227596.

MOTHER GOOSE.

  Picture book of Mother Goose. SEE
    Hader, Berta.

MOTT, T. BENTLEY, tr.

  Marshal Foch's war memoirs. SEE
    Foch, Ferdinand.

MOTTRAM, RALPH HALE.

  Castle Island. © 23Apr31, AI-15214;
    8Jul31, A39342. Ralph Hale
    Mottram (A); 4Aug58; R218945.

MOULIN-ECKART, RICHARD MARIA
  FERDINAND DU, GRAF. SEE
  Du Moulin-Eckart, Richard Maria
  Ferdinand, Graf.

MOULT, THOMAS.

  Saturday night. © 17Aug31,
    AI-15400; 20Aug31, A42190.
    Thomas Moult (A); 26Aug58;
    R220633.

MOWERY, WILLIAM BYRON.

Singer of the wilderness. © 24Sep31; A42974. Peggy M. Gross (C); 29Sep58; R222070.

The wilderness singer. (In Redbook magazine, Apr.-Oct. 1931) © 5Mar31, B106778; 3Apr31, B110367; 5May31, B113657; 5Jun31, B116662; 3Jul31, B120332; 5Aug31, B123745; 4Sep31, B127353. Peggy M. Gross (C); 11Sep58; R221206-221210, 221212, 221216.

MOXLEY, P. WRIGHT.

  Red snow. © 31Jul30; A26499.
    P. Wright Moxley, Jr. & Joan
    Moxley (C); 30Jul58; R218589.

MOXLEY, F. WRIGHT, JR.

Red snow. SEE Moxley, F. Wright.

MOXLEY, JOAN.

Red snow. SEE Moxley, F. Wright.

<pb id='318.png' n='1958_h2/A/1635' /> MOYER, WILL D. SEE Smith's method for plectrum guitar.

MULLER, JOSEF, VERLAG ARS SACRA.
  SEE Verlag Ars Sacra.

MUKERJI, DHAN GOPAL.

  Bunny, hound and clown.
    © 25Aug31; A41331. Mrs. Dhan
    Gopal Mukerji (W); 26Nov58;
    R225572.

The song of God. SEE The Bhagavad-Gita.

MUKERJI, MRS. DHAN GOPAL.

  Bunny, hound and clown. SEE
    Mukerji, Dhan Gopal.

The song of God. SEE The Bhagavad-Gita.

MULDERICK, W. J., joint author.

  The plumber's and fitter's helper.
    SEE Griesbach, Harry B.

MUNCE, RUTH H.

Kerry. SEE Hill, Grace Livingston.

MUNDY, TALBOT.

  The Babu. (In Adventure, Oct. 1,
    1931) © 18Sep31; B129257.
    Dawn Mundy Provost (W); 19Sep58;
    R221998.

  Black light. © 29Oct30; A30677.
    Mrs. Dawn Mundy Provost (W);
    25Aug58; R220484.

  The man on the mat. (In Adventure,
    Aug. 1, 1931) © 20Jul31;
    B122162. Dawn Mundy Provost (W);
    21Jul58; R218360.

MURPHY, GARDNER.

  Experimental social psychology, by
    Gardner Murphy and Lois Barclay
    Murphy. © 15Jul31; A39497.
    Gardner Murphy & Lois Barclay
    Murphy (A); 12Nov58; R225102.

MURPHY, LOIS BARCLAY, joint author.

  Experimental social psychology. SEE
    Murphy, Gardner.

MURRAY, CLAY RAY.

Treatment of injury by the general practitioner. Vol.1-2. With drawings by the author. (Harper's medical monographs) © 25May31; A37518-37519. Mary Hamilton Murray (W); 20Oct58; R223294-223295.

MURRAY, MARY HAMILTON.

Treatment of injury by the general practitioner. SEE Murray, Clay Ray.

MURRY, KATHLEEN BEAUCHAMP.

  Novels and novelists, by Katherine
    Mansfield, pseud. Edited by
    J. Middleton Murry. © 24Oct30;
    A30198. Alfred A. Knopf, Inc.
    (PPW); 12Aug58; R219140.

MUSIL, ALOIS.

In the Arabian desert. Edited and arranged for publication by Katharine McGiffert Wright. © 26Nov30; A31532. Katharine McGiffert Wright & Alois Musil (A); 28Nov58; R225271.

MUSSEY, J. R.

  Illustrated magic. SEE Fischer,
    Ottokar.

MYERS, MARGARET BARR.

  The American government of today.
    SEE Myers, William Starr.

MYERS, WILLIAM STARR.

The American government of today. © 3Jun31; A37703. Margaret Barr Meyers (W); 4Aug58; R218939.

NAEGELE, P. BEDA.

  Tage mit Gott. © 23Sep30;
    AF14077. Verlag Ars Sacra Josef
    Müller (PWH); 11Sep58; R221278.

<pb id='319.png' /> NALACK, ELEANA BOERNER.

  Approved laboratory technic. SEE
    Kolmer, John A.

NARISHKIN-KURAKIN, ELIZABETH.

Under three tsars. Edited by Rene Fulop-Miller. Translated from the German by Julia E. Loesser. © on translation; 27Jan31; A33430. E. P. Dutton & Co., Inc. (PWH); 24Nov58; R225075.

NASH, OGDEN.

  Atop the mooring mast. (In New
    Yorker, Mar. 21, 1931) © 20Mar31;
    B107630. Ogden Nash (A); 6Nov58;
    R224070.

  Encyclopedia Britannica. (In New
    Yorker, Mar. 21, 1931) © 20Mar31;
    B107630. Ogden Nash (A); 6Nov58;
    R224069.

  Eyewitness. (In New Yorker, May
    16, 1931) © 15May31; B115385.
    Ogden Nash (A); 6Nov58; R224076.

  Forever and ever. (In New Yorker,
    Oct. 3, 1931) © 2Oct31,
    B128680. Ogden Nash (A);
    6Nov58; R224078.

  From a Manhattan tomb. (In New
    Yorker, Jan. 31, 1931) © 30Jan31;
    B102634. Ogden Nash (A); 6Nov58;
    R224067.

  Hard lines. Illustrated by Soglow.
    © 15Jan31; A34131. Ogden Nash
    (A); 6Nov58; R224061.

  Including the Scandinavian. (In
    New Yorker, Jan. 10, 1931)
    © 9Jan31; B100363. Ogden Nash (A);
    6Nov58; R224065.

  Irrelevant, incompetent, and immaterial.
    (In New Yorker, Oct.
    24, 1931) © 23Oct31; B131593.
    Ogden Nash (A); 6Nov58; R224081.

  It's all wrong. (In New Yorker,
    May 23, 1931) © 22May31;
    B115838. Ogden Nash (A);
    6Nov58; R224077.

Leading ladies; shouldn't we name another bridge?, malice domestic. (In New Yorker, Oct. 17, 1931) © 16Oct31; B130446. Ogden Nash (A); 6Nov58; R224080.

My child is phlegmatic, anxious parent. (In New Yorker, Mar. 14, 1931) © 13Mar31; B107190. Ogden Nash (A); 6Nov58; R224068.

Ogden Nash in reply to Dorothy Parker. (In Saturday review of literature, Jan. 17, 1931) © 13Jan31; B101373. Ogden. Nash (A); 6Nov58; R224066.

  Portrait. (In Publisher's weekly,
    Mar. 28, 1931) © 28Mar31;
    B109680. Ogden Nash (A); 6Nov58;
    R224072.

They live, they breathe; the cow, the rabbits, the cobra, the judge, the roach, the baby. (In New Yorker, Apr. 11, 1931) © 10Apr31; B109809. Ogden Nash (A); 6Nov58; R224073.

  They live, they breathe; the
    phoenix, the lama, the oyster.
    (In New Yorker, April 4, 1931)
    © 3Apr31; B109380. Ogden Nash (A);
    6Nov58; R224071.

  To a small boy standing on my shoes
    while I am wearing them. (In
    New Yorker, May 9, 1931)
    © 8May31; B113803. Ogden Nash
    (A); 6Nov58; R224075.

  Vs. descendants. (In New Yorker,
    Oct. 10, 1931) © 9Oct31;
    B130033. Ogden Nash (A);
    6Nov58; R224079.

  Without all due respect. (In New
    Yorker, Apr. 25, 1931)
    © 24Apr31; B111849. Ogden Nash
    (A); 6Nov58; R224074.

NATHAN, GEORGE JEAN.

  Androcles and the lioness. (In
    The Nation, Oct. 14, 1931)
    © 7Oct31; B129985. Julie H.
    Nathan (W); 29Oct58; R223621.

<pb id='376.png' />
  Testament of a critic. © 2Jan31;
    A32714. Julie H. Nathan (W);
    29Oct58; R223614.

NATHAN, JULIE H.

  Androcles and the lioness. SEE
    Nathan, George Jean.

  Testament of a critic. SEE
    Nathan, George Jean.

NATHAN, ROBERT.

  The orchid. © 18Mar31; A36349.
    Robert Nathan (A); 12Nov58;
    R225122.

NATIONAL COUNCIL OF TEACHERS OF MATHEMATICS.

  Mathematics in modern life. SEE
    Reeve, W. D., ed.

THE NATIONAL GEOGRAPHIC MAGAZINE.

  The Geographic's upper masses.
    © 9Oct31; A43448. National
    Geographic Society (PWH); 21Nov58;
    R225615.

NATIONAL GEOGRAPHIC SOCIETY, WASHINGTON, D. C.

  Announcing rare journeys.
    © 3Aug31; AA74724. National
    Geographic Society (PWH);
    27Aug58; R220652.

  Announcing rare journeys. (Circular
    S-11-31) © 10Nov31; AA83062.
    National Geographic Society (PWH);
    21Nov58; R225619.

  Earth's wonder spots in prose and
    pictures. (Circular S-9-31)
    © 7Sep31; AA79318. National
    Geographic Society (PWH); 21Nov58;
    R225618.

  Features soon to come in your essential
    National geographic magazine.
    © 6Jul31; AA73529. National
    Qeograohic Society (PWH); 27Aug58;
    R220651.

  The Geographic's upper masses. SEE
    The National geographic magazine.

  The National Geographic magazine.
    © 3Sep31; AA79317. National
    Geographic Society (PWH); 21Nov58;
    R225617.

  To the members of the National
    Geographic Society. (U. S.
    members circular) © 30Oct31;
    AA84363. National Geographic
    Society (PWH); 21Nov58; R225620.

Visit alluring regions with coming Issues of your National Geographic magazine. (Circular S-10-31) © 13Oct31; AA78868. National Geographic Society (PWH); 21Nov58; R225616.

NATIONAL METROPOLITAN BANK OF WASHINGTON.

  Slave trading in the Old South.
    SEE Bancroft, Frederic.

NATROP, JOHANNES KLEINE-.
  SEE Kleine-Natrop, Johannes.

NAZHIVIN, IVAN.

  The dogs. Translated from the
    Russian by C. J. Hogarth.
    © 7Mar31; A37386. Ivan Nazhlvin
    (A); 10Oct58; R222850.

NEALE, RUSSELL.

The story of a country place. © 28Oct31; A43665. Russell Neale (A); 17Dec58; R226993.

NEBEL, FREDERICK.

  Death's not enough. (In Black
    mask, Oct. 1931) © 12Sep31;
    B126662. Frederick Nebel (A);
    15Sep58; R221997.

  It's the live ones that talk. (In
    Black mask, Nov. 1931) © 12Oct31;
    B131292. Frederick Nebel (A);
    14Oct58; R222843.

  Pearls are tears. (In Black mask,
    Sept. 1931) © 12Aug31; B124154.
    Frederick Nebel (A); 13Aug58;
    R219668.

  Spare the rod. (In Black mask,
    Aug. 1931) © 12Jul31, B121445.
    Frederick Nebel (A); 14Jul58;
    R217805.

<pb id='320.png' n='1958_h2/A/1636' /> NELSON, AGNES, joint author.

  Toujours francais cours elementaire.
    SEE Hodges, Helen.

NEVINS, ALLAN.

American social history as recorded by British travellers. © on new material & changes; 24Mar31; A35944. Allan Nevins (A); 25Jul58; R218433.

Masters' essays in history; a manual of instructions and suggestions. © 12Nov30; A30602. Allan Nevins (A); 29Oct58; R223609.

THE NEW CENTURY DICTIONARY OF THE
  ENGLISH LANGUAGE. Vol.1-2.
  Edited by H. G. Emery and K. G.
  Brewster. © on additions & alterations;
  9Sep31; A41582. Appleton-Century-Crofts,
  Inc. (PWH); 15Nov58;
  R225328.

THE NEW INTERNATIONAL YEAR BOOK: a compendium of the world's progress for the year 1930. Herbert Treadwell Wade, editor. © 23Apr31; A36835. Funk & Wagnalls Co. (PCW); 19Aug58; R222177.

NEW JERSEY AND ATLANTIC REPORTER DIGEST; covering all cases reported in New Jersey reports and Atlantic reporter. Vol.15-23. Key number system. © 13May31, A37870; 14May31, A37871; 14May31, A37872; 8Jun31, A39420; 8Jun31, A39421; 8Jun31, A39422; 30Jun31, A39423; 30Jun31, A39424; 30Jun31, A39425. West Pub. Co. (PWH); 3Jul58; R217410-217418.

NEW JERSEY AND ATLANTIC REPORTER DIGEST, covering all cases reported in New Jersey reports and Atlantic reporter. Vol.24-29. Key number system. © 29Aug31, A41804-41806; 29Sep31, A44021-44023. West Pub. Co. (PWH); 6Oct58; R222418-222423.

NEW JERSEY AND ATLANTIC REPORTER
  DIGEST. May 1931 cumulative
  pamphlet. © 22May31; A37851.
  West Pub. Co. (PWH); 3Jul58; R217518.

NEW JERSEY AND ATLANTIC REPORTER
  DIGEST. July 1931 cumulative
  pamphlet. © 3Jul31; A40787.
  West Pub. Co. (PWH); 6Oct58;
  R222417.

NEW JERSEY STATUTE SERVICE. 1931
  annual, with annotations.
  © 3Jun31; A39446. Soney & Sage
  Co. & West Pub. Co. (PWH); 3Jul58;
  R217547.

NEW JERSEY STATUTE SERVICE. Sept.

1931. Cumulative quarterly pamphlet, with annotations. © 16Sep31; A44014. Soney & Sage Co. & West Pub. Co. (PWH); 6Oct58; R222437.

NEW JOY IN SERVICE SONGS. No.3.

C. A. Blackmore, Carl Blackmore and Homer Welch, compilers. Carl Blackmore, editor. © on editing, compilation, & new songs; 25Aug31; AA78222. Carl Blackmore (A & C of C. A. Blackmore); 28Oct58; R225792.

NEW YORK ANNUAL DIGEST, covering all reported decisions of the courts of New York, 1930. Supplementing and continuing New York annual digest, 1929. © 11Feb31; A35815. West Pub. Co. & Lawyers Co-operative Pub. Co. (PWH); 6Oct58; R222452.

NEW YORK ANNUAL DIGEST, covering all reported decisions of the courts of New York. July 1930. Cumulative quarterly. © 29Jul30; A26665. West Pub. Co. & Lawyers Co-operative Pub. Co. (PWH); 27Jul58; R218224.

<pb id='321.png' />
NEW YORK ANNUAL DIGEST, covering all
  reported decisions of the courts
  of New York. Oct. 1930. Cumulative
  quarterly. © 18Oct30; A30522.
  West Pub. Co. & Lawyers Co-operative
  Pub. Co. (PWH); 6Oct58; R222451.

NEW YORK ANNUAL DIGEST, covering all
  reported decisions of the courts
  of New York. Apr. 1931. Cumulative
  quarterly. © 15Apr31; A38417.
  West Pub. Co. & Lawyers Co-operative
  Pub. Co. (PWH); 6Oct58; R222453.

NEW YORK ANNUAL DIGEST, covering all
  reported decisions of the courts
  of New York. July 1931. Cumulative
  quarterly. © 25Jul31; A41832.
  West Pub. Co. & Lawyers Co-operative
  Pub. Co. (PWH); 6Oct58; R222450.

THE NEW YORK SUPPLEMENT. Vol. 246-247.
  Permanent ed., with key number
  annotations. (National reporter
  system) © 11May31, A37860;
  23Jun31, A39454. West Pub. Co.
  (PWH); 3Jul58; R217534, 217504.

THE NEW YORK SUPPLEMENT. Vol. 248-249.
  Permanent ed., with key number
  annotations. (National reporter
  system) © 1Aug31, A41818; 24Sep31,
  A44045. West Pub. Co. (PWH);
  6Oct58; R222371-222372.

NEW YORK TIMES CO. SEE
  The New York times index.

THE NEW YORK TIMES INDEX. © New
  York Times Co. (PWH)

v.19, no.

    6, Jun31. © 22Jul31; A39739.
      11Aug58; R219173.

    7, Jul31. © 18Aug31; A40976.
      12Sep58; R221168.

    8, Aug31. © 16Sep31; A45268.
      26Sep58; R222141.

    9, Sep31. © 22Oct31; A44425.
      27Oct58; R223912.

    10, Oct31. © 16Nov31; A44853.
      12Dec58; R227484.

THE NEW YORKER.

  The fourth New Yorker album.
    With a foreword by Robert Benchley.
    © 5Nov31; A44983. Doubleday & Co.,
    Inc. (PWH); 5Dec58;
    R225562.

The New Yorker scrapbook. © 23Nov31; A44962. Doubleday & Co., Inc. (PWH); 26Nov58; R225566.

NEWMAN, ERNEST.

  Cosima Wagner. SEE Du Moulin-Eckart,
    Richard Maria Ferdinand. Graf.

NEWTON, ELBRIDGE W., joint author.

  Adventures in music. SEE Giddings,
    Thaddeus P.

NICHOLAS, GROSVENOR.

Winning backgammon: problems and answers, by Grosvenor Nicholas and C. Wheaton Vaughan. © 29Oct30; A29734. Grosvenor Nicholas (C); 27Aug58; R220427.

NICHOLS, CHARLES WASHBURN, ed.

  The two gentlemen of Verona.
    SEE Shakespeare, William.

NIOBEY, JEANNE. SEE
  Bainville, Jeanne Niobey.

NOHAIN, FRANC, pseud. SEE
  Le Grand, Maurice.

NOLL, VICTOR HERBERT.

Laboratory instruction in the field of inorganic chemistry. © 30Oct30; A31051. Victor Herbert Noll (A); 30Oct58; R223587.

NORRIS, KATHLEEN.

  Belle-Mere. © 20Aug31; A41590.
    Kathleen Norris (A); 26Aug58;
    R220627.

<pb id='377.png' />
  Belle Mere. Illustrated by Jules
    Gotlieb. (In Woman's home companion,
    Apr.-July, Aug.-Sept. 1931)
    © 24Feb31, A5-28212; 24Mar31,
    A5-28640; 24Apr31, A5-29809;
    23May31, A5-31263; 24Jun71, 27Jul31,
    A5-32819. Kathleen Norris (A);
    15Aug58; R219696-219700.

THE NORTH CAROLINA CODE OF 1931, complete annotations. Under the editorial supervision of A. Hewson Mlchie, assisted by Belrne Stedman. Indexed by Thomas Johnson Michie. © 5Nov31; A43884. Mlchie Co. (PWH); 12Nov58; R224636.

THE NORTH EASTERN REPORTER. Permanent
  ed. (National Reporter System.
  State aeries) © West Pub. Co.
  (PWH) v.

  174. © 7May31; A37862. 3Jul58;
    R217506.

  175. © 18Jul31; A40799. 6Oct58;
    R222373.

  176. © 28Sep31; A44044. 6Oct58;
    R222374.

NORTHWESTERN NATIONAL BANK OF MINNEAPOLIS.

Blankety-blank. SEE Pack, Ruth Hardiny.

THE NORTH WESTERN REPORTER. Vol.234-235. Permanent ed., with key number annotations. (National reporter system. State series) © 5May31, A37863; 29Jun31, A39453. West Pub. Co. (PWH); 3Jul58; R217464-217463.

THE NORTH WESTERN REPORTER. Vol.236.
  Permanent ed., with key number annotations.
  (National reporter system.
  State series) © 1Sep31; A44041.
  West Pub. Co. (PWH); 6Oct58;
  R222375.

NOUNEHERG, LOUTA.

  Le piano revele par le film. SEE
    Chopin, Frederic Francois.

NUHN, MRS. FERMEN. SEE Nuhn, Ruth
  Suckow.

NUHN, RUTH SUCKOW.

  Children and older people, by Mrs.
    Ferraen Nuhn. © 14Aug31; A40973.
    Ruth Suckow Nuhn (A); 3Oct58;
    R222161.

O. W., pseud. SEE
  Smith, Marjorie Zrskine.

O'BRIEN, GERTRUDE E., joint author.

  A practical reader for adults. SEE
    Mason, Josephine Dwight.

O'BRIEN, KATE.

Without my cloak. © 12Nov31; A44968. Kate O'Brien (A); 26Nov58; R225568.

O'BRIEN, RAYMOND J.

  Midget. © 17Oct31; A46350.
    Raymond J. O'Brien (A); 7Nov58;
    R224778.

O'BRIEN, WILLIAM A.

How to serve Low Mass. © 2Apr31; A38596. William A. O'Brien (A); 7Nov58; R224771.

O'CONNELL, MAURICE, JR.

Horror house. SEE Wells, Carolyn.

  The skeleton at the feast. SEE
    Houghton, Carolyn Walla.

  The umbrella murder. SEE Wells,
    Carolyn.

O'CONNOR, FRANK.

Guests of the nation. © 2Sep31; A42197. Frank O'Connor (A); 28Nov58; R225269.

O'DAY, EDWARD F.

Autobiography. SEE Franklin, Benjamin.

<pb id='322.png' n='1958_h2/A/1637' /> ODEGARD, PETER H.

The American public mind. © 1Oct30; A29076. Peter H. Odegard (A); 1Oct58; R222065.

ODUM, HOWARD W.

  Cold blue moon, Black Ulysses afar
    off. © 11Mar31, A36231. Mrs.
    Howard W. Odum (W); 15Dec58;
    R227405.

ODUM, MRS. HOWARD W.

Cold blue moon. SEE Odum, Howard W.

O'FLAHERTY, LIAM.

  I went to Russia. © 15Jun31,
    AI-15376; 17Sep31, A41793.
    Liam O'Flaherty (A); 18Sep58;
    R221512.

OGG, FREDERIC A.

Introduction to American government; the national government, by Frederic A. Ogg, and P. Orman Ray. 4th ed., thoroughly rev. (The Century political science series) © 22Jun31; A40107. First National Bank of Madison, trustee under will of Frederic A. Ogg (E) & Rosalind Ray Watkin (C); 8Jul58; R217242.

O'HARA, JOHN.

  Alone. (In Scribner's magazine,
    Dec. 1931) © 20Nov31; B135260.
    John O'Hara (A); 15Dec58;
    R226672.

OLCOTT, FRANCES JENKINS.

Wonder tales from Goblin hills, from the German and English. Illustrated by Harold Sichel. © 3Sep30; A28241. Frances Jenkins Olcott (A); 14Jul58; R217756.

O'LEARY, PAUL M.

Questions and problems, by Paul M. O'Leary and Sumner H. Slichter. © 13Jul31; A40665. Paul M. O'Leary & Sumner H. Slichter (A); 28Jul58; R218670.

OLIVER, BERTA RUCK.

  The love-hater, by Berta Ruck.
    © 12Sep30; A27580. Berta Ruck
    Oliver (A); 2Jul58; R217197.

  Offer of marriage, by Berta Ruck.
    © 6Feb31; A33668. Berta Ruck
    Oliver (A); 17Oct58; R225048.

OLIVER, DOUGLAS L.

  Boy scout in the Grand Cavern.
    Illus. from photos, by the author.
    © 3Oct30; A29153. Douglas Oliver
    (A); 23Jul58; R218420.

OLNEY, DOROTHY.

The American home book of garages, by Dorothy and Julian Olney. Edited by Reginald T. Townsend. © 22Oct31; A44646. Reginald T. Townsend (A); 24Oct58; R223395.

OLNEY, JULIAN, joint author.

  The American home book of garages.
    SEE Olney, Dorothy.

ONE-ACT PLAYS FOR STAGE AND STUDY, sixth series; twenty-one contemporary plays never before published in book form, by American, English, and Irish dramatists; pref. by Martin Flavin. © 10Apr31; A38292. Samuel French, Inc. (PCW); 11Dec58; R226521.

O'NEILL, CARLOTTA MONTEREY.

  Mourning becomes Electra. SEE
    O'Neill, Eugene.

O'NEILL, EUGENE.

  Mourning becomes Electra. © 2Nov31;
    A46082. Carlotta Monterey O'Neill
    (W); 19Nov58; R225349.

ONIS, FEDERICO DE.

  La novela de un novelista. SEE
    Palacio Valdes, Armando.

<pb id='323.png' /> ONIS, HARRIET DE, tr.

  The eagle and the serpent. SEE
    Guzman, Martin Luis.

OPPENHEIM, E. PHILLIPS.

  Gangster's glory. © 23Oct31;
    A43626. Geraldine Nowell Downes
    (C); 17Nov58; R225170.

OPSAHL, EARL J.

  Fine furniture. SEE Dreiser,
    Theodore.

ORDMAN, KATHRYN ALLING, joint author.

  Home study course in lip reading.
    SEE Carney, Mary Vance.

ORDWAY, FRANK L.

  Directions for playing Sunk, the
    Navy game. © 30Apr31; AA67979.
    Parker Bros., Inc. (PWH);
    3Nov58; R224304.

ORLAN, PIERRE MAC, pseud. SEE
  Dumarchay, Pierre.

ORR, FREDERICK W.

  Essentials of effective speaking.
    © on new & rev. material; 20Jan31;
    A33280. Frederick W. Orr (A);
    29Dec58; R227738.

  Student's workbook to be used with
    Essentials of effective speaking.
    © 20Jan31; A33287. Frederick W.
    Orr (A); 29Dec58; R227739.

ORTON, DOUGLAS T.

Snappy. SEE Orton, Helen Fuller.

  The twin lambs. SEE Orton, Helen
    Fuller.

ORTON, HELEN FULLER.

  Snappy, the puppy dog. By Helen
    Fuller Orton and Marie Louise
    Frantz. © 21Aug31; A42008.
    Malcolm F. Orton, Lawrence M.
    Orton, Robert M. Orton, Douglas
    T. Orton (C); 13Oct58; R223206.

  The twin lambs. © 13Aug31; A40763.
    Malcolm F. Orton, Lawrence M.
    Orton, Robert M. Orton., Douglas
    T. Orton (C); 13Oct58; R223205.

ORTON, LAWRENCE M.

Snappy. SEE Orton, Helen Fuller.

  The twin lambs. SEE Orton, Helen
    Fuller.

ORTON, MALCOLM F.

Snappy. SEE Orton, Helen Fuller.

  The twin lambs. SEE Orton, Helen
    Fuller.

ORTON, ROBERT M.

Snappy. SEE Orton, Helen Fuller.

  The twin lambs. SEE Orton, Helen
    Fuller.

OSBORNE, DAVID R.

Self-management in selling. © 6May31; A38008. David R. Osborne (A); 4Aug58; R218941.

OSBORNE, MARGHERITA O.

Conundrums. © 11Jul30; A26703. Margherita O. Osborne (A); 8Jul58; R217248.

OSGOOD, EDWIN E.

  A textbook of laboratory diagnosis,
    by Edwin E. Osgood and Howard D.
    Haskins. © 2Mar31; A35117.
    Edwin E. Osgood (A); 6Aug58;
    R219159.

OSSENDOWSKI, FERDINAND.

Lenin, god of the godless. Translated from the Polish by Gregory MacDonald. © on translation; 7Apr31; A35650. E. P. Dutton & Co., Inc. (PWH); 25Nov58; R225084.

OURSLER, FULTON.

  About the murder of Geraldine Foster.
    By Anthony Abbot, pseud.
    © 25Nov30; A31364. Grace Perkins
    Oursler (W); 6Nov58; R224323.

<pb id='378.png' />
  About the murder of the clergyman's
    mistress, by Anthony Abbot, pseud.
    © 21Apr31; A36755. Grace Perkins
    Oursler (W); 24Dec58; R227304.

  About the murder of the night club
    lady, by Anthony Abbot, pseud.
    (A Thatcher Colt detective mystery)
    © 4Dec31; A45391. April
    Oursler Armstrong, Fulton Oursler,
    Jr., Will Oursler & Helen Oursler
    Balaber (c); 9Dec58; R226651.

  The great Jasper. © 18Sep70;
    A28435. Grace Perkins Oursler
    (W); 15Sep58; R221249.

  Illustrated magic. SEE Fischer,
    Ottokar.

  Speakeasy girl. SEE Meredith,
    Bobbie.

OURSLER, FULTON, JR.

  About the murder of the night club
    lady. SEE Oursler, Fulton.

  Ex-mistress. SEE Oursler, Grace
    Perkins.

  Illustrated magic. SEE Fischer,
    Ottokar.

  Speakeasy girl. SEE Meredith,
    Bobbie.

OURSLER, GRACE PERKINS.

  About the murder of Geraldine
    Poster. SEE Oursler, Fulton.

  About the murder of the clergyman's
    mistress. SEE Oursler, Fulton.

  About the murder of the niyht club
    lady. SEE Oursler, Fulton.

  Ex-mistress. © 27Jan30; A19274.
    April Oursler Armstrong & Pulton
    Oursler, Jr. (C); 15Jan58;
    R207023.

  The great Jasper. SEE Oursler,
    Pulton.

OURSLER, WILL.

About the murder of the night club lady. SEE Oursler, Fulton.

Illustrated magic. SEE Fischer, Ottokar.

Speakeasy girl. SEE Meredith, Bobbie.

PACIFIC REPORTER. Vol.291-299, Oct. 17, 1930-July 3, 1931. Permanent ed. (National Reporter System. State series) © 26Dec30, A33699; 10Feb31, A35845; 17Mar31, A36582; 7Apr31, A38416; 15May31, A37864; 9Jun31, A39452; 3Jul31, A40797; 26Aug31, A41820; 18Sep31, A44046. West Pub. Co. (PWH); 4Apr58, R212935-212937; 3Jul58, R217468-217470; 6Oct58; R222376-222378.

PACK, RUTH HARDING.

  Blankety-blank. © 24Jul31; A40620.
    Northwestern National Bank of
    Minneapolis (E); 22Dec58; R227559.

PACKARD, FRANK L.

  The gold skull murders. © 12Nov31;
    A44971. Marguerite Pearl Packard
    (W); 19Nov58; R225055.

The gold skull murders. (In Argosy, Sept. 26-Nov. 7, 1931) © 23Sep31, B129055; 29Sep31, B129396; 6Oct31, B130071; 20Oct31, B131229; 13Oct31, B131366; 27Oct31, B132039; 2Nov31, B132497. Marguerite Pearl Packard (W); 17Nov58; R225065-225071.

PACKARD, MARGUERITE PEARL.

  The gold skull murders. SEE
    Packard, Prank L.

PAGE (L. C.) TRUST. SEE

Coues, William Pearce.

Harer, Josephine L.

<pb id='324.png' n='1958_h2/A/1638' /> PALACIO VALDES, ARMANDO.

La novela de un novelista. Notes, exercises, and vocabulary by H. Alpern and J. Martel. with a critical introd. by Federico de Onis. (Heath's modern language series) © on introductory matter, notes, vocabulary & exercises; 1May31; A37245. Hymen Alpern (A); 6Nov58; R224132.

PALMBORG, RILLA PAGE.

The private life of Greta Garbo. © 20Aug31; A42186. Rilla Page Palmborg (A); 22Aug58; R219978.

PALMER, ANTHONY.

  The three fishers. SEE Beeding,
    Francis, pseud.

PALMER, ELIZABETH.

  Making men happy with jams &
    jellies. © 12Nov30; A30640.
    Haldeman-Julius Co. (PWH); 3Nov58;
    R223799.

PALMER, JOHN LESLIE.

For works written in collaboration with Hilary Aidan St. George Saunders under the name Francis Beeding SEE Beeding, Francis, pseud.

PARKER, CLIFFORD S.

  French drill and composition book.
    (Heath's modern language series)
    © 9May31; A38208. Clifford S.
    Parker (A); 6Nov58; R224133.

PARKER, CORNELIA STRATTON.

English summer. © 1Oct31; A44209. Cornelia Stratton Parker (A); 22Oct58; R223245.

PARKER, DEWITT H.

  Human values. © 15Apr31; A36542.
    G. Vaughan Parker & Jennie P.
    Hildebrandt (C); 12Nov58;
    R225098.

PARKER, DOROTHY.

Here we are. (In Hearst's international-cosmopolitan, Mar. 1931) © 10Feb31; B103478. Dorothy Parker (A); 19Nov58; R225013.

PARKER, G. VAUGHAN.

  Human values. SEE Parker,
    DeWitt H.

PARKER, GEORGE S.

  Rook, the game of games. © on
    p.42-48; 20Aug31; AA78214.
    Grace M. Parker (W) & Sally
    Parker Barton (C); 12Sep58;
    R221366.

PARKER, GRACE M.

  Rook, the game of games. SEE
    Parker, George S.

PARKER, HARRY, ed.

  Kidder-Parker architects' and
    builders' handbook. SEE
    Kidder, Frank E.

PARKER, MRS. JAMESON. SEE Parker,
  Sydney B.

PARKER, MARY MONCURE.

  Snappy monologues. © 22May31;
    A37543. Alyce Tucker West (NK);
    11Dec58; R226520.

PARKER, SETH, pseud. SEE
  Lord, Phillips H.

PARKER, SYDNEY B.

Our times. SEE Sullivan, Mark.

PARKER BROS., INC.

  Directions for playing Sunk. SEE
    Ordway, Frank L.

PARKHILL, FORBES.

Col. Colt's challenge. (In Cowboy stories, Nov. 11, 1930) © 10Sep30; B86401. Forbes Parkhill (A); 6Aug58; R218864.

<pb id='325.png' />
  Pecos on the prod. (In Ace high
    magazine, Oct. 10, 1930)
    © 13Aug30; B82748. Forbes Parkhill
    (A); 6Aug58; R218863.

  Ring of death. (In Two gun stories,
    Dec. 1930) © 29Oct30; B97247.
    Forbes Parkhill (A); 6Aug58;
    R218866.

  Wrangler of fortune. (In Ace high
    magazine, Dec. 19, 1930)
    © 20Oct30; B90767. Forbes Parkhill
    (A); 6Aug58; R218865.

PARKHURST, GENEVIEVE.

  Headlong. © 6Oct31; A44054.
    Genevieve Parkhurst (A); 13Oct58;
    R222750.

PARRINGTON, VERNON L., JR.

  Main currents in American thought.
    SEE Parrington, Vernon Louis.

PARRINGTON, VERNON LOUIS.

Main currents in American thought. Vol.3: The beginnings of critical realism in America, 1860-1920. © 23Oct30; A30249. Vernon L. Parrington, Jr., Louise P. Tucker & Elizabeth P. Thomas (C); 16Sep58; R221343.

PARSON'S PRACTICE MANUAL OF THE STATE OF NEW YORK. Edited and annotated by Austin B. Griffin and John T. Fitzpatrick. 8th ed. © 17Jun31; A39003. Matthew Bender & Co., Inc. & Baker, Voorhis & Co. (PWH); 15Dec58; R226668.

PATERSON, DONALD G.

Minnesota mechanical ability tests. By Donald G. Paterson, Richard M. Elliott, L. Dewey Anderson and Herbert A. Toops. Edna Heidbreder, editor. © 7Oct30; A28824. Donald G. Paterson (A); 15Aug58; R219403.

PATERSON, HUNTLEY, tr.

  Dictatorship on trial. SEE Forst-Battaglia,
    Otto, ed.

PATRICK, DIANA, pseud. SEE
  Wilson, Desemea Newman.

PATTEN, BRADLEY M.

The embryology of the pig. 2d ed. © 16Mar31; A35367. Bradley M. Patten (A); 6Aug58; R219161.

PATTERSON, INNIS.

The Eppworth case. © 9Oct30; A29294. Innis Patterson (A); 7Jul58; R217610.

PATTERSON, S. HOWARD.

  Economic problems of modern life,
    by S. Howard Patterson and Karl
    W. H. Scholz. 2d ed. © 10Feb31;
    A34383. S. Howard Patterson &
    Karl W. H. Scholz (A); 6Aug58;
    R219168.

PAVENSTEDT, MRS. E. W. SEE
  Pavenstedt, Maude Parker Child.

PAVENSTEDT, MAUDE PARKER CHILD.

  The wrong side of the tracks, by
    Maude Parker Child. © on new
    matter & revisions; 4Mar31;
    A34822. Maude Parker Child (Mrs.
    E. W. Pavenstedt) (A); 15Dec58;
    R227400.

PAYN, G. W., pseud. SEE Miles,
  C. Austin.

PAYNE, ELIZABETH STANCY.

  Easy street. © 10Oct30; A28891.
    Richard M. Payne (C); 8Jul58;
    R217254.

PAYNE, LESLEY.

  Letters of James Whitcomb Rilay.
    SEE Riley, James Whitcomb.

PAYNE, RICHARD M.

  Easy street. SEE Payne, Elizabeth
    Stancy.

<pb id='379.png' /> PEAR, TOM HATHERLEY.

The art of study. © 13Jan31; A34128. Tom Hatherley Pear (A); 24Nov58; R225078.

PEARSON, DREW.

Washington Merry-go-round, by Drew Pearson and Robert S. Alien. © 14Jul31; A40438. Drew Pearson & Robert S. Alien (A); 16Jul58; R218088.

PEARSON, EDMUND.

Instigation of the devil. © 5Sep30; A27379. Mary S. Pearson (W); 29Aug58; R220659.

PEARSON, MARY S.

  Instigation of the devil. SEE
    Pears on, Edmund.

PEATTIE, DONALD CULROSS.

  Pride of India, by Donald and
    Louise Peattie. Illustrated by
    R. L. Lambdin. (In Elks magazine,
    Oct. 1930) © 1Oct30; A5-22884.
    Donald Culross Peafctle & Louise
    Redfield Peattie (A); 8Jul58;
    R217237.

PEATTIE, LOUISE REDFIELD.

  Pan's parish. © 18Aug31; A41431.
    Louise Redffield Peattie (A);
    30Sep58; R222012.

  Pride of India. SEE Peattie, Donald
    Culross.

PECK, ANNE MERRIMAN.

Roundabout Europe. With many illus. by the author. © 6May31; A38009. Anne Merriman Peck (A); 4Aug58; R218942.

PEDERSON, ARTHUR S.

The yellow shop. SEE Field, Rachel.

PEDLER, MARGARET.

Kindled flame. Illustrator: Albert Bailey. (Pub. abroad in 10 installments in Woman's pictorial, Feb. 28-May 2, 1931) © 27Feb31, 2Mar, 9Mar, 16Mar, 23Mar, 30Mar, 6Apr31, AI-15012; 15Apr71, 20Apr, 28Apr31, AI-15299; 30Jul31, A41134. Flora Mabel Warhurst & Harold Pincott (E); 1Aug58; R219199-219200.

Kindled flame. (In McCall's, Apr.-Aug. 1931) © 10Mar31, B107115; 10Apr31, B110717; 8May71, B114125; 10Jun31, B116891; 10Jul31, B121337. Flora Mabel Warhurst & Harold Pincott (co-executors); 4Jul58; R217700-217704.

PEEL, DORIS.

  Five on parade. © 24Oct30;
    A30169. Doris Peel (A); 2Oct58;
    R221960.

PEIRCE, GEORGE JAMES.

  Experimental plant physiology.
    © 12Nov31; A451835. Carolyn Peirce
    Brown, Elizabeth P. Kincade &
    Rosamond H. Peirce (C); 28Nov58;
    R225591.

PEIRCE, ROSAMOND H.

  Experimental plant physiology. SEE
    Peirce, George James.

PENARTS ADVERTISING, INC.

Advertising manual for loan advertising; series of newspaper advertisements. Vol. A. © 9Oct51; AA81129. Local Trademarks, Inc. (PWH); 7Nov58; R224889.

History of beginnings advertising manual for general business; series of newspaper advertisements. Vol. A. © 9Oct31; AA81130. Local Trademarks, Inc. (PWH); 7Nov58; R224890.

Vital questions advertising manual for furniture dealers; series of newspaper advertisements. Vol.B. © 9Oct31; AA81128. Local Trademarks. Inc. (PWH); 7Nov58; R224888.

<pb id='326.png' n='1958_h2/A/1639' />
  Wee golfers advertising manual for
    miniature golf; series of newspaper
    advertisements. Vol. A.
    © 9Oct31; AA81127. Local Trademarks,
    Inc. (PWH); 7Nov58;
    R224887.

PENNEY, J. C.

J. C. Penney, the man with a thousand partners. An autobiography of J. C. Penney as told to Robert W. Bruere. © 19Feb31; A34465. J. C. Penney (A); 26Nov58; R225471.

PEOPLE'S FIRST NATIONAL BANK & TRUST
  CO., PITTSBURGH.

  The way of a man with a maid. SEE
    MacArtney, Clarence Edward.

PERKINS, ELEANOR ELLIS.

  The Indian twins. SEE Perkins, Lucy
    Fitch.

PERKINS, GRACE B.

Voodoo'd. SEE Perkins, Kenneth.

PERKINS, KENNETH.

  Voodoo'd. © 19Feb31; A34462.
    Grace B. Perkins (W); 4Aug58;
    R218934.

PERKINS, LAWRENCE B.

  The Indian twins. SEE Perkins, Lucy
    Fitch.

PERKINS, LUCY FITCH.

  The Indian twins. Illustrated by
    the author. © 31Oct30; A30312.
    Eleanor Ellis Perkins & Lawrence
    B. Perkins (C); 2Oct58; R221963.

PERRY, BERNARD B.

  A defence of philosophy. SEE Perry,
    Ralph Barton.

PERRY, RALPH BARTON.

A defence of philosophy. © 17Feb31; A35029. Bernard B. Perry (C); 24Nov58; R225095.

PERSHING, F. WARREN.

  My experiences in the World War.
    SEE Pershing, Jonn Joseph.

PERURD, VICTOR, illus.

  The flame, Saint Catherine of Siena.
    SEE Eaton, Jeanette.

PETERS, HARRY T.

  America on stone. © 28Oct31;
    A44984. Harry T. Peters, Jr. &
    Natalie Peters Webster (C);
    29Oct58; R223989.

PETERS, HARRY T., JR.

  America on stone. SEE Peters,
    Harry T.

PETERSHAM, MAUD.

  The Christ child, as told by
    Matthew and Luke. Made by Maud
    and Miska Petersham. © 5Nov31;
    A46195. Maud & Miska Petersham
    (A); 19Nov58; R225063.

  Young Trajan. SEE Miller, Elizabeth
    Cleveland.

PETERSHAM, MISKA.

  The Christ child. SEE Petersham,
    Maud.

  Young Trajan. SEE Miller, Elizabeth
    Cleveland.

PETHERBRIDGE, MARGARET.

  The cross word puzzle book. SEE
    Buranalli, Prosper, ed.

  The mammoth cross word puzzle book.
    SEE Buranelli, Prosper, ed.

  The post graduate cross word puzzle.
    SEE Buranelli, Prosper, ed.

PETHERBRIDGE, MARGARET. SEE
  The cross word puzzle book.

PETTIT, E., pseud. SEE
  Roche, Mrs. Arthur Somers.

<pb id='327.png' /> PEYSER, NATHAN, joint author.

  New progressive road to reading.
    SEE Burchill, Georgine.

PHILLIMORE, ALISON.

  The piper's lad. SEE Campbell,
    Harriette R.

PHILLIPS, CATHERINE ALISON, tr.

  After Robespierre the Thermidorian
    reaction. SEE Mathiez, Albert.

  Cosima Wagner. SEE Du Moulin-Eckart,
    Richard Maria Ferdinand, Graf.

PHILLIPS, W. ALISON.

After Robespierre the Thermidorian reaction. SEE Mathiez, Albert.

PHYLO, pseud. SEE Mollex, Alfred.

PINCOTT, HAROLD.

Kindled flame. SEE Pedler, Margaret.

PINKERTON, ROBERT E.

  A chip for death. (In West, Apr.
    29, 1931) © 15Apr31; B111981.
    Robert E. Pinkerton (A); 3Nov58;
    R224595.

  The fighting prodigal. Pt.1-4.
    (In Argosy, Sept. 10-Oct. 10,
    1931) © 16Sep31, B126732;
    23Sep31, B129055; 29Sep31,
    B129396; 6Oct31, B130071. Robert
    E. Pinkerton (A); 3Nov58; R224599-224602.

  A guttersnipe grow wings. (In
    American magazine, Apr. 1931)
    © 24Feb31; B105219. Robert E.
    Pinkerton (A); 3Nov58; R224594.

  Hudson's Bay Company. © 30Oct31;
    A45005. Robert E. Pinkerton (A);
    28Nov58; R225590.

  Like a lynx. (In Short stories,
    Feb. 10, 1931) © 23Jan31;
    B101734. Robert E. Pinkerton (A);
    3Nov58; R224593.

  Ofaafo. (In Argosy, Feb. 28, 1931)
    © 25Feb31; B106174. Robert E.
    Pinkerton (A); 3Nov58; R224596.

  Salty cold. (In Short stories, June
    10, 1931) © 26May31; B117060.
    Robert E. Pinkerton (A); 3Nov58;
    R224597.

  Winning his corks. (In Popular magazine,
    Oct. 1931) © 2Sep31;
    B127101. Robert E. Pinkerton (A);
    3Nov58; R224598.

PINTNER, MARGARET.

  Intelligence testing. SEE Pintner,
    Rudolph.

PINTNER, RUDOLPH.

Intelligence testing. New ed. © 17Feb31; A35106. Margaret Pintner (W); 25Jul58; R218428.

PIPER, WATTY, ed.

  Fairy tales that never grow old.
    Illus. by Eulalie Wilson. Star
    ed. © on illus., jacket &
    p.5, 55-56, 70, 82, 99-100;
    1Dec31; AA88370. Platt & Munk Co.,
    Inc.; 11Dec58; R226511.

  Mother Goose rhymes. Illus. by
    Eulalie Wilson & Lois L. Lenski.
    Star ed. © on illus., p.69-103
    & jacket; 1Dec31; AA88371. Platt
    & Munk Co., Inc. (PWH); 11Dec58;
    R226512.

PIRANDELLO, FAUSTO.

Soffio. SEE Pirandello, Luigi.

Uno di piu'. SEE Pirandello, Luigi.

PIRANDELLO, LUIGI.

  Soffio. © 1Jul31; AF13097.
    Stefano Pirandello, Fausto
    Pirandello & Rosalia Lietta
    Aguirre Pirandello (C); 3Sep58;
    R220591.

  Uno di piu'. © 1Feb31; AF13096.
    Stefano Pirandello, Fausto Pirandello
    & Rosalia Lietta Aguirre
    Pirandello (C); 3Sep58; R220590.

<pb id='380.png' /> PIRANDELLO, ROSALIA LIETTA AGUIRRE.

Soffio. SEE Pirandello, Luigi.

Uno di piu'. SEE Pirandello, Luigi.

PIRANDELLO, STEFANO.

Soffio. SEE Pirandello, Luigl.

Uno di piu'. SEE Pirandello, Luigi.

PITTARO, JOHN M.

  Modern Spanish grammar, by John M.
    Pittaro and Alexander Green.
    Illustrated by Herbert Deland
    Williams and Norman Braley.
    (Heath's modern language series)
    © 6Jul31; A39488. John M.
    Plttaro (A); 6Nov58; R224136.

PITZ, HENRY C., illus. SEE
  The Tale of the warrior lord.

PLATT & MUNK CO., INC.

  Fairy tales that never grow old.
    SEE Piper, Watty, ed.

  The fun of saving up thrift bank
    book. SEE Childs, Elizabeth
    Hebert.

  Mother Goose rhymes. SEE Piper,
    Ytetty, ed.

  Patient Pat joins the circus. SEE
    Knowles, May Wynne.

POCOCK, RUBY M. AYRES.

Man made the town, by Ruby M. Ayres. © 13Aug31, AI-15472; 20Aug31, A42966. General Accident Fire & Life Assurance Co., Ltd. (E); 26Aug58; R220634.

POLIER, JUSTINE WISE.

  The great betrayal. SEE Wise,
    Stephen S.

POMEROY, CLAIRE.

  Joy Street. © 1Oct31; A43074.
    Street & Smith Publications, Inc.
    (PWH); 7Nov58; R224727.

POORE, HENRY RANKIN.

Modern art: why, what and how. © 29May31; A38595. Katherine S. Poore (W); 17Nov58; R224962.

POORE, KATHERINE S.

  Modern art. SEE Poore, Henry
    Rankin.

POPE, LAURA SPENCER PORTER.

For works written in collaboration with Dorothy Giles. SEE Crawiey, Rayburn, pseud.

POPE-HENNESSY, JAMES.

  Aristocratic journey. SEE
    Pope-Hennesay, Dame Una Birch.

POPE-HENNESSY, DAME UNA BIRCH.

Aristocratic Journey. © 27Feb31; A35135. James Pope-Hennessy (C); 7Nov58; R224659.

PORTEOUS, ETHEL MANNIN.

  Common sense and the child, by
    Ethel Mannin. With an introd. by
    A. S. Belli. © 19Jun31,
    AI-15390; 1Dec31, A48679. Ethel
    Mannin (A); 22Dec58; R227613.

  Ragged banners, by Ethel Mannin.
    © 9Jan31, AI-14860; 26Jun31,
    A39500. Ethel Mannin Porteous
    (A); 30Dec58; R227007.

PORTER, FRANK CHAMBERLIN.

The mind of Christ in Paul. © 21Nov30; A31586. Lyman Edwards Porter & Quincy Porter (C); 6Nov58; R224261.

PORTER, H. T. LOWE-. SEE Lowe-Porter, H. T.

PORTER, H. T. LOWE-, pseud. SEE
  Lowe, Helen Tracy Porter.

PORTER, LYMAK EDWARDS.

  The mind of Christ In Paul. SEE
    Porter, Frank Chamberlin.

<pb id='328.png' n='1958_h2/A/1640' /> PORTER, QUINCY.

  The mind of Christ in Paul. SEE
    Porter, Frank Chamerlin.

POSGATE, HELEN B. SMITH.

  Advanced French composition. (Oxford
    French series) © on revision;
    9Oct30; A31121. Helen B.
    Smith Posgate (A); 2Jul58;
    R217114.

POSTIF, LOUIS, tr.

  Contes des Mers du Sud. SEE
    London, Jack.

POSTIF, MME LOUIS. SEE
  Postif, Jeanne Marie Andre.

POTEAT, HUBERT MCNEILL, ed.

  Selected letters. SEE Cicero,
    Marcus Tullius.

POTTER, MABEL HARRINGTON.

The Abingdon book of Christmas carols. SEE Harrington, Karl P.

POTTLE, FREDERICK A., ed.

  The journal of James Boswell. SEE
    Boswell, James.

  Private papers of James Boswell from
    Malahide Castle. SEE Boswell,
    James.

POUND, ARTHUR, ed.

  More they told Barron. SEE Barron,
    Clarence W.

POURRAT, HENRI.

  La tour du Levant; ou, Quand
    Gaspard mit fin a l'histoire.
    © 20Jun31; AF13498. Henri Pourrat
    (A); 18Aug58; R219687.

POURTIER, J. A.

  Mekong. © 10Sep31; AF15324.
    J. A. Pourtier (A); 3Nov58;
    R224105.

POWER, RICHARD E.

  Collection of prayers and good works.
    © 13Nov31; A44909. Richard E.
    Power (A); 2Dec58; R225732.

PREEDY, GEORGE, pseud. SEE Long,
  Gabriel.

PREEDY, GEORGE, pseud. SEE Long,
  Gabrielle.

PRESBYTERIAN CHURCH IN THE U. S. A. BOARD OF CHRISTIAN EDUCATION.

Being true. SEE Rodgers, Elsie G.

  Children's Thanksgiving. SEE
    Stephens, Wilhelmina D'Arcy.

  Christmas night. SEE Turner, Nancy
    Byrd.

  Every Christmas night. SEE Turner,
    Nancy Byrd.

  Father, as the morning sun. SEE
    Shields, Elizabeth McE.

  Friends all over the world. SEE
    Turner, Nancy Byrd.

  Happy at work. SEE Laufer,
    Calvin W.

  In the Father's a house. SEE
    Stephens, Wilhelmina D'Arcy.

PRESBYTERIAN CHURCH IN THE U. S. A. BOARD OF CHRISTIAN EDUCATION. SEE

  Primary music and worship for church
    school and home.

PRESCOTT, P. ALBION.

  Building and loan procedure in New
    Jersey; a handbook. © 14Apr31;
    A35877. Soney & Sage Co. (PWH);
    3Jul58; R217543.

PRESIDENT & FELLOWS OF HARVARD
  COLLEGE. SEE Harvard University.
  President & Fellows of Harvard
  College.

PRICHARD, HAROLD ADYE.

A country parson looks at religion. © 19Feb31; A34463. Margaret C. Buell, Helen L. King, Sybil A. Walk & Norman A. Prichard (C); 12Nov58; R225097.

<pb id='329.png' /> PRICHARD, NORMAN A.

  A country parson looks at religion.
    SEE Prichard, Harold Adye.

PRIESTLY, J. B.

  Tom Jones; the history of a
    foundling. Illus. by Alexander
    King. © on introd. & illus.;
    24Oct31; A47687. George Macy
    Companies, Inc. (PWH); 28Nov58;
    R225486.

PRIMARY MUSIC AND WORSHIP FOR CHURCH
  SCHOOL AND HOME. Edited by Calvin
  W. Laufer. © 24Dec30; A33175.
  Board of Christian Education of the
  Presbyterian Church in the U. S. A.
  (PWH); 8Oct58; R222620.

PRITCHARD, F. H.

  Roget's International thesaurus of
    English words and phrases. SEE
    Mawson, Christopher Orlando
    Sylvester.

PRIVAT, MICHEL BERNARD.

  Remarques sur le bonheur. SEE
    Grasset, Bernard.

PROBST, JOHN B.

The Probst service report. © 7Dec31; AA83947. John B. Probst (A); 15Dec58; R226669.

PROKOSCH, EDWARD.

  Supplementary exercises to Deutsche
    Sprachlehre. © 14Sep31; A41707.
    Frederick Prokosch (C); 23Sep58;
    R221631.

PROKOSCH, FREDERICK.

  Supplementary exercises to Deutsche
    Sprachlehre. SEE Prokosch, Edward.

PROUSE, ROBERT.

  Lettres a la comtesse de noailles.
    SEE Proust, Marcel.

PROUST, MARCEL.

Lettres a la comtesse de Noailles, 1901-1919, presentees par la comtesse de Noailles et suivies d'un article de Marcel Proust. Publiee par Robert Proust et Paul Brach. (Correspondance generale de Marcel Proust, 2) © 22May31; AF13304. Mme. Gerard Mante, nee Sivy Proust (C of R. Proust) & Librairie Plon (PPW); 14Jul58; R217689.

PROUST, SIVY. SEE Mante, Mme.
  Gerard.

PROUTY, OLIVE HIGGINS.

  White fawn. © 18Mar31; A35331.
    Olive Higgins Prouty (A); 17Dec58;
    R227002.

PROVOST, DAWN MUNDY.

The Babu. SEE Mundy, Talbot.

Black light. SEE Mundy, Talbot.

  The man on the mat. SEE Mundy,
    Talbot.

PRYDE, ANTHONY, pseud. SEE
  Weekes, Agnes R.

PUBLIC TRUSTEE.

  The collected works. SEE Shaw,
    George Bernard.

  Ellen Terry and Bernard Shaw. SEE
    Terry, Ellen.

PUFFER, ALICE A., Joint author.

French verb and idiom achievement tests. SEE Mitchell, Howard.

PUGH, MABEL, illus.

  The other side of the mountain. SEE
    Justus, May.

PURDON'S PENNSYLVANIA STATUTES,
  ANNOTATED. Cumulative pamphlet.
  Permanent ed., June 1931.
  © 15Jun31; A39448. George T.
  Bisel Co., Soney & Sage Co. & West
  Pub. Co. (PWH); 3Jul58; R217460.

<pb id='381.png' />
PURDON'S PENNSYLVANIA STATUTES
  ANNOTATED. Permanent ed. © George
  T. Bisel Co., Soney & Sage Co. &
  West Pub. Co. (PWH) Title

  12, section 1-730. © 16Jun31;
    A40792. 6Oct58; R222439.

  12, section 731-1820. © 17Jul31;
    A40791. 6Oct58; R222440.

  12, section 1821-end and 13.
    © 16Jul31; A40793. 6Oct58;
    R222441.

  General Index. © 17Jul31;
    A40794. 6Oct58; R222442.

PURDON'S PENNSYLVANIA STATUTES, ANNOTATED. Title 53: Municipal and quasi-municipal corporations. Permanent ed. © 18May31, A37390; 18May31, A37891; 26May71, A37592; 27May31, A37893; 27May31, A37594. George T. Blsel Co., Soney & Sage Co. & West Pub. Co. (PWH); 3Jul58; R217455-217459.

PURNELL, IDELLA.

Lost princess of Yucatan. © 15Sep31; A42313. Idella Purnell (A); 16Sep58; R221573.

PYNCHON, ADELINE ATWATER.

  The marriage of Don Quixote, by
    Adeline Atwater. © 18Feb31;
    A33934. Mrs. Harold C. Pynchon
    (Adeline Atwater) (A); 19Dec58;
    R227397.

PYNCHON, MRS. HAROLD C. SEE Pynchon,
  Adeline Atwater.

QUAILE, ELIZABETH, joint author.

  Bauer-Diller-Quaile course. SEE
    Bauer, Harold.

QUEEN, ELLERY, pseud.

The Dutch shoe mystery, by Ellery Queen, pseud, of Manfred B. Lee and Frederic Dannay. © 24Sep31; A42672. Ellery Queen (Manfred B. Lee & Frederic Dannay) (A); 10Oct58; R222857.

QUINN, VERNON.

  Picture map geography of the United
    States. With picture maps by
    Paul Spener Johst. © 24Sep51;
    A42762. Vernon Quinn (A); 10Oct58;
    R222858.

RACETTE, DORA FANCHON.
  SEE Cattley, Dora Fanchon Racette.

RADER, CLAUDE.

Groundwork of orchestral training; with band parts. © violin, 27Sep30, AA53204; B flat clarinet, cornet, 12Nov30, AA54921-54922; C melody saxophone, B flat tenor saxophone, E flat alto saxophone, oboe, viola, 28Nov30, AA55761-55765; violin obbligato, cello, trombone t.c., trombone b.c., E flat alto, 9Dec30, AA57201-57205; bassoon, E flat bass, flute, bass, horns in F, drums, 19Dec30, AA5754-1-57546. Claude Rader (A); 16Jul58; R218070-218071, 218069, 218072-218087.

RADFORD, RUBY LORRAINE.

Marie of Old New Orleans. Illustrated by Harold E. Snyder. © 5Sep31; A42575. Ruby Lorraine Radford (A); 25Sep58; R221658.

RAHN, ROBERT C., Joint author.

  The plumber's and fitter's helper.
    SEE Griesbach, Harry B.

<pb id='330.png' n='1958_h2/A/1641' /> RAINE, NORMAN REILLY.

  Barratry. (In Saturday evening post,
    Aug. 1, 1931) © 28Jul31; B122422.
    Norman Reilly Raine (A); 29Jul58;
    R218634.

  Singapore Jack. (In Saturday evening
    post, Aug. 29, 1931)
    © 25Aug31; B124808. Norman Reilly
    Raine (A); 3Sep58; R220887.

  Tugboat Annie. (In Saturday
    evening post, July 11, 1931)
    © 7Jul31; B120395. Norman Reilly
    Raine (A); 8Jul58; R217565.

Tugboat Annie. (In The Saturday evening post, July 11, 1931) © 7Jul31; B120395. Norman Reilly Raine (A); 9Jul58; R217714.

Windy Bill. (In Collier's, Dec. 26, 1931) © 8Dec31; B136815. Norman Reilly Raine (A); 9Dec58; R226626.

RALLI, MARY PAULINE, joint author.

  Home study course in lip reading.
    SEE Carney, Mary Vance.

RAMSAY, EMMA L.

Rough and tumble on old clipper ships. SEE Ramsay, Robert.

RAMSAY, ROBERT.

  Rough and tumble on old clipper
    ships. © 29Aug30; A26998.
    Emma L. Ramsay (W); 8Jul58;
    R217238.

RAND, WINIFRED.

Growth and development of the young child, by Winifred Rand, Mary E. Sweeny and E. Lee Vincent. © 29Sep30; A29097. Mary E. Sweeny (A); 11Jul58; R217745.

RANSOM, JOHN CROWE.

God without thunder. © 16Oct30; A30098. John Crowe Ransom (A); 16Sep58; R221342.

RANSON, STEPHEN WALTER.

  The anatomy of the nervous system.
    4th ed. © 1Jun31; A37760.
    Tessie Rowland Ranson (W); 3Dec58;
    R225539.

RANSON, TESSIE ROWLAND.

  The anatomy of the nervous system.
    SEE Ranson, Stephen Walter.

RAVEN, CHARLES E.

Jesus and the gospel of love. © 13Oct31; A44295. Charles E. Raven (A); 28Nov58; R225585.

RAVENSCROFT, BYFLEET G.

Trade marks throughout the world, by Byfleet G. Ravenscroft, William Wallace White and Wallace White. © on rev.; 22Dec30; A31837. Trade Activities, Inc. (PCW); 4Aug58; R220327.

RAWLINGS, MARJORIE KINNAN.

  Cracker chidlings. (In Scribner's
    magazine, Feb. 1931) © 20Jan31;
    B101636. Norton Baskin (Wr);
    12Dec58; R226597.

  Jacob's ladder. (In Scribner's
    magazine, Apr. 5, 1931)
    © 19Mar31; B110331. Norton
    Baskin (Wr); 10Sep58; R221197.

  A plumb clare conscience. (In
    Scribner's magazine, Dec. 1931)
    © 20Nov31; B135250. Norton
    Baskin (Wr); 12Dec58; R226593.

RAY, P. ORMAN, joint author.

  Introduction to American government.
    SEE Ogg, Frederic A.

RAYNOLDS, ROBERT.

Brothers in the West. © 17Aug31; A41094. Robert Raynolds (A); 3Dec58; R225716.

REBOUX, PAUL.

New French cooking. Translated from the French by Elizabeth Lucas. © 5Sep30; A28115. Alfred A. Knopf, Inc. (PWH); 18Aug58; R219452.

<pb id='331.png' /> REDFIELD, BESSIE G., comp.

Gods, a dictionary of the deities of all lands. © 29May31; A40245. Connecticut Bank & Trust Co. (E); 28Nov58; R225622.

REESE, LIZETTE WOODWORTH.

White April and other poems. © 5Sep30; A28074. A. Austin Dietrich (E); 3Jul58; R217259.

REEVE, W. D., ed.

  Mathematics in modern life.
    © 18Feb31; A35309. National
    Council of Teachers of Mathematics
    (PCW); 1Oct58; R222234.

REEVES, J. WALTER.

Parliamentary procedure. © 10Aug31; A41026. J. Walter Reeves (A); 6Nov58; R224144.

REHDER, JESSIE, ed.

Best college verse, 1931. With a pref. by Christopher Morley. © 6May31; A38007. Jessie Rehder (A); 26Nov58; R225472.

REID, JAMES.

The life of Christ in woodcuts. © 20Nov30; A32059. James Reid (A); 3Jul58; R217210.

REILLY, HELEN.

Murder in the mews. © 16Jul31; A39660. Helen Reilly (A); 17Jul58; R217820.

REIS, CLAIRE R.

American composers of today. 1st ed. © 1Sep30; A35533. Claire R. Reis (A); 11Jul58; R217659.

REITLER, MERN.

Cole's twelve-bass piano accordion; simplified progressive method. © 10Oct31; AA82477. M. M. Cole Pub. House (PWH); 13Oct58; R222776.

REITMAN, BEN L.

The second oldest profession. © 26Feb31; A35102. Dorothy Reitman (W); 5Dec58; R225976.

REITMAN, DOROTHY.

  The second oldest profession. SEE
    Reitman, Ben L.

REMARQUE, ERICH MARIA.

The road back. Pt.1-12. (In Collier's, the national weekly, Dec. 13, 1930-Feb. 28, 1931) © 21Nov30, B93743; 1Dec30, B95319; 8Dec30, B95726; 12Dec30, B97192; 19Dec30, B97321; 29Dec30, B98933; 5Jan31, B100216; 12Jan31, B100784; 16Jan31, B99913; 26Jan31, B101617; 2Feb31, B104027; 10Feb31, B103467. Erich Maria Remarque (A); 29Jul58; R218460-218471.

  The road back. Pt.1-12. Translated
    by Arthur Wesley Wheen.
    (In Collier's, Dec. 13, 1930-Feb.
    28, 1931) © 21Nov30,
    B93743; 1Dec30, B95319; 8Dec30,
    B95726; 12Dec30, B97192; 19Dec30,
    B97321; 29Dec30, B98933; 5Jan31,
    B100216; 12Jan31, B100784; 16Jan31,
    B99913; 26Jan31, B101617; 2Feb31,
    B104027; 10Feb31, B103467. Erich
    Maria Remarque (PWH); 14Jul58;
    R217770-217781.

  The road back. Translated from
    the German, by Arthur Wesley
    Wheen. © 30Apr31; AI-15036;
    11May31; A38149. Erich Maria
    Remarque (PWH); 14Jul58; R217766.

  Der weg zuruck. © 30Apr31;
    AF12782. Erich Maria Remarque
    (A); 14Jul58; R217767.

  Where Karl had fought. (In Collier's,
    Aug. 23, 1930) © 2Aug30;
    B81338. Erich Maria Remarque (A);
    14Jul58; R217769.

<pb id='382.png' />
  Where Karl had fought. (In Collier's,
    Aug. 23, 1930) © 2Aug30; B81338.
    Erich Maria Remarque (PWH);
    14Jul58; R217768.

REMICK MUSIC CORP.

  Gamble's class method for strings.
    SEE Flsohel, Max.

RENARD, MAURICE.

The snake of Luvercy. Translated from the French by Florence Crewe-Jones. © 21Oct30; A29941. E. P. Dutton & Co., Inc. (PWH); 13Aug58; R219443.

REPPLIER, AQNES.

  Times and tendencies. © 28Oct31;
    A44534. Fidelity-Philadelphia
    Trust Co. (E); 30Oct58; R223791.

REPUBLIC PRODUCTIONS, INC.,
  ATTORNEY IN FACT FOR JOHNSTON MCCULLEY. SEE
  McCuiley, Jonnston.

REVELL (FLEMING H.) CO.

  Notes on the Revelation. SEE
    Erdman, William Jacob.

REYNOLDS, MRS. BAILLIE. SEE
  Reynolds, Gertrude Mary Robins.

REYNOLDS, DONALD HUGH BAILLIE.

  Whereabouts unknown. SEE Reynolds,
    Gertrude Mary Robins.

REYNOLDS, GERTRUDE MARY ROBINS.

  Whereabouts unknown. © 24Apr31,
    AI-15069; 19Jun31, A39080.
    Paul K. Baillie Reynolds & Donald
    Hugh Baillie Reynolds (C);
    8Jul58; R317590.

REYNOLDS, JOHN, illus.

1066 and all that. SEE Sellar, Walter Carruthers.

REYNOLDS, PAUL K. BAILLIE.

  Whereabouts unknown. SEE Reynolds,
    Gertrude Mary Robins.

RHEINSTROM, CARROLL, joint author.

More profits from advertising and more advertising from profits. SEE Goode, Kenneth M.

RHODE ISLAND AND ATLANTIC REPORTER
  DIGEST, covering all cases reported
  in Rhode Island reports and Atlantic
  reporter. Vol.15-23. © 14May31,
  A37873-37875; 8Jun31, A39414-39416;
  30Jun31, A39417-39419. West Pub.
  Co. (PWH); 3Jul58; R217419-217427.

RHODE ISLAND AND ATLANTIC REPORTER
  DIGEST, covering all cases reported
  in Rhode Island reports and Atlantic
  reporter. Vol.24-29. © 29Aug31,
  A41798-41800; 30Sep31, A44037-44039.
  West Pub. Co. (PWH); 6Oct58;
  R222425-222430.

RHODE ISLAND AND ATLANTIC REPORTER
  DIGEST. May 1931 cumulative
  pamphlet. © 23May31; A37847.
  West Pub. Co. (PWH); 3Jul58;
  R217519.

RIBEMONT-DESSAIGNES, GEORGES.

Ellsa. © 6Oct31; AF15327. Georges Rlbemont-Dessaignes (A); 3Nov58; R224109.

RICH, MRS. WILLIS.

  The dissection of the rat. SEE
    Starks, Edwin C.

RICHARD, ALICE HALIBURTON.

Mount Veraon, Washington's home and the nation's shrine. SEE Wilstach, Paul.

RICHARDS, JOHN.

  Stepping westward. SEE Richards,
    Laura E.

RICHARDS, LAURA E.

Florence Nightingale: the angel of the Crimea. Edited by Rowena Keith Keyea. © on introd. to teachers, appendix, teaching apparatus; 27Feb31; A35058. Appleton-Century-Crofts, Inc. (PWH); 9Feb59; R216826.

<pb id='332.png' n='1958_h2/A/1642' />
  Stepping westward. © 30Oct31;
    A43751. Rosalind Richards &
    John Richards (c); 13Nov58;
    R225339.

RICHARDS, ROSALIND.

  Stepping westward. SEE Richards,
    Laura E.

RICHMOND, GRACE S.

Red Pepper returns. © 26Jun31; A39272. Grace S. Richmond (A); 9Jul58; R217581.

RIDDELL, FLORENCE.

  Suspicion. © 17Jan31, A36250.
    Florence Riddell (A); 26Aug50,
    R220504.

  Wives win. © 6Jul31, A42109.
    Florence Riddell (A); 26Aug50,
    R220505.

RILEY, JAMES WHITCOMB.

Letters of James Whitcomb Riley, edited by William Lyon Phelps. © 3Nov30, A32210. Lesley Payne (PPW); 25Sep58, R222190.

RINEHART, MARY ROBERTS.

My story. Painting by Mead Schaeffer. Drawings by Rose O'Neill. Pt.1-7 and conclusion. (In Good housekeeping, Oct. 1930-May 1931) © 25Sep30, A5-27322, 25Oct30, A5-27284, 25Nov30, A5-27285; 23Dec30, A5-28128; 25Jan31, A5-27791; 25Feb31, A5-27794, 25Mar31, A5-28648, 25Apr31, A5-29777. Mary Roberts Rinehart (A); 10Sep58, R221170-221177.

RITCHIE, FRANCIS.

Fabulae faciles; a first Latin reader. Edited by John Copeland Kirtland. Authorized ed., rev. © 21Jan31; A33542. Lynn Kirtland (C); 29Dec58; R227733.

RIVERA, GUILLERMO.

  Libro de temas castellanos.
    (Heath's modern language series)
    © 9Jun31; A40024. Guillermo
    Rivera (A); 6Nov58; R224138.

RIVERS, ELIZABETH, illus.

  On the edge. SEE De la Mare,
    Walter.

ROBBINS, ARTHUR VICTOR.

  A comedy of the woods. SEE Robbins,
    Estelle Harriet.

ROBBINS, ESTELLE HARRIET.

A comedy of the woods (animated botany) Written and illustrated by Estelle Harriet Robbins. © 22Oct30, A30551. Arthur Victor Robbins (Wr); 22Jul58, R218241.

ROBBINS, HENRY C., joint author.

  Concrete plain and reinforced.
    SEE Taylor, Frederick W.

ROBERTS, MARY ASHMUN.

  Susie Sugarbeet. SEE Ashmun,
    Margaret.

ROBERTSON, E. ARNOT. SEE Turner,
  Eileen Arbuthnot Robertson.

ROBERTSON, FRANK C.

We want that range. © 5Jun31; A37799. Frank C. Robertson (A); 29Dec58; R226957.

ROBERTSON, MARY MAZYCK.

  Nelson W. Aldrich, a leader in
    American politics. SEE Stephenson,
    Nathaniel W.

ROBESON, HELEN JOSEPHY, joint author.

  New York is everybody's town. SEE
    McBride, Mary Margaret.

<pb id='333.png' /> ROBINSON, CYRIL E.

England: a history of British progress from the early ages to the present day. © on revisions & new matter; 31Oct30; A30429. Cyril E. Robinson (A); 7Oct58; R222586.

ROBINSON, RUTH.

  Thomas B. Reed. SEE Robinson,
    William A.

ROBINSON, SELMA.

  City child. Decorations by Rockwell
    Kent. © on decorations; 30Oct31;
    A44002. Rockwell Kent (A);
    9Oct58; R222662.

ROBINSON, WILLIAM A.

Thomas B. Reed, parliamentarian. © 7Nov30; A31028. Mrs. William A. Robinson (Ruth Robinson) (W); 17Oct58; R223043.

ROBINSON, MRS. WILLIAM A. SEE
  Robinson, Ruth.

ROBSON-SCOTT, W. D., tr.

No surrender. SEE Ammers-Küller, Jo Van.

ROCHE, ARTHUR SOMERS.

  Disappeared. (In Redbook magazine,
    May 1931) © 3Apr31; B110367.
    Ethel Pettit Roche (W), Jeffrey
    Roche & Clyde Roche (C); 27Oct58;
    R223355.

  Four blocks apart. © on compilation,
    editorial revision & additional
    text; 2Jan31; A34093. Ethel
    Pettit Roche (W), Jeffrey Roche &
    Clyde Roche (C); 25Sep58; R221719.

  Four blocks apart. Instalments
    5-6. (In American magazine,
    Nov.-Dec. 1930) © 29Sep30,
    B88306; 27Oct30, B91261. Ethel
    Pettit Roche (W), Jeffrey Roche
    & Clyde Roche (C); 25Sep58;
    R221717-221718.

  Fried potatoes. (In Collier's,
    Mar. 21, 1931) © 27Feb31;
    B105440. Ethel Pettit Roche (W),
    Jeffrey Roche & Clyde Roche (C);
    27Oct58; R223353.

  The good name of a woman. (In
    Redbook magazine, Apr. 1931)
    © 5Mar31; B106778. Ethel Pettit
    Roche (W), Jeffrey Roche & Clyde
    Roche (C); 27Oct58; R223354.

  The haunting terror. (In Redbook
    magazine, July 1931) © 5Jun31;
    B116662. Ethel Pettit Roche (W),
    Jeffrey Roche & Clyde Roche (C);
    27Oct58; R223356.

  I couldn't face it. (In Redbook
    magazine, Mar. 1931) © 5Feb31;
    B104165. Ethel Pettit Roche (W),
    Jeffrey Roche & Clyde Roche (C);
    27Oct58; R223352.

  The king of swindlers. (In Redbook
    magazine, Feb. 1931) © 5Jan31;
    B100132. Ethel Pettit Roche (W),
    Jeffrey Roche & Clyde Roche (C);
    27Oct58; R223351.

  A lady of resource. (In Collier's,
    Dec. 27, 1930-Mar. 7, 1931)
    © 8Dec30, B95726; 12Dec30, B97192;
    19Dec30, B97321; 29Dec30, B98933;
    5Jan31, B100216; 12Jan31, B100784;
    16Jan31, B99913; 26Jan31, B101617;
    2Feb31, B104027; 10Feb31, B103467;
    16Feb31, B103872. Ethel Pettit
    Roche (W), Jeffrey Roche & Clyde
    Roche (C); 24Nov58; R225201-225211.

  The lady of resource. Pt.1-11.
    (In Collier's, Dec. 27, 1930-Mar.
    7, 1931) © 8Dec30, B95726;
    12Dec30, B97192; 19Dec30, B97321;
    29Dec30, B98933; 5Jan31, B100216;
    12Jan31, B100784; 16Jan31, B99913;
    26Jan31, B101617; 2Feb31, B104027;
    10Feb31, B103467; 16Feb31, B103872.
    Ethel P. Roche (W); 18Jul58;
    R218171-218181.

<pb id='383.png' />
  Out of bounds. (In Redbook, Sept.
    1931-Jan. 1932) © 5Aug31,
    B123745; 4Sep31, B127353; 2Oct31,
    B129616; 5Nov31, B132860; 4Dec31,
    B136482. Ethel Pettit Roche (W),
    Jeffrey Roche & Clyde Roche (C);
    5Dec58; R225982-225986.

  The private detective. (In Redbook
    magazine, Jan. 1931) © 5Dec30;
    B95503. Ethel Pettit Roche (W),
    Jeffrey Roche & Clyde Roche (C);
    27Oct58; R223349.

  The Rakraanoff ruby. (In Redbook
    magazine, Dec. 1930) © 5Nov30;
    B91819. Ethel Pettit Roche (W),
    Jeffrey Roche & Clyde Roche (C);
    27Oct58; R223348.

  The reckless adventures of Lydia
    Gray. (In Redbook magazine,
    Nov. 1930) © 10Oct30; B89252.
    Ethel Pettit Roche (W), Jeffrey
    Roche, Clyde Roche (C); 9Oct58;
    R222661.

  Rhapsody In gold. © on compilation,
    revision & additions;
    26Aug31; A42115. Ethel Pettit
    Roche (W) & Jeffrey Roche, Clyde
    Roche (C); 28Nov58; R225274.

  Rhapsody In gold. (In McCall's,
    Feb.-July, 1931) © 9Jan31,
    B100419; 10Feb31, B104448;
    10Mar31, B107115; 10Apr31,
    B110717; 8May31, B114125; 10Jun31,
    B116891. Ethel Pettit Roche (W),
    Jeffrev Roche & Clyde Roche (C);
    28Nov58; R225272-225273, 225275-225278.

$10.00 down. (In American Legion monthly, Jan. 1931) © 25Dec30; B97472. Ethel Pettit Roche (W), Jeffrey Roche & Clyde Roche (C); 27Oct58; R223350.

ROCHE, MRS. ARTHUR SOMERS.

  The rich are always with us, by
    E. Pettit, pseud. © 25Apr31;
    A37016. Mrs. Arthur Somers
    Roche (E. Pettit) (A); 16Jul58;
    R218039.

ROCHE, CLYDE.

  For works claimed by Clyde Roche
    SEE Roche, Arthur Somers.

ROCHE, ETHEL P.

  The lady of resource. SEE Roche,
    Arthur Somers.

ROCHE, ETHEL PBTTIT.

  For works claimed by Ethel Pettit
    Roche SEE Roche, Arthur Sonera.

ROCHE, JEFFREY.

  For works claimed by Jeffrey Roche
    SEE Roche, Arthur Somers.

ROCKWOOD, ROY, pseud.

  Bomba, the Jungle boy among the
    Pygmies; or, Battling with
    stealthy foes, by Roy Rockwood,
    pseud, of Harriet S. Adams and
    Edna C. Squler. © 28May31;
    A37678. Harriet S. Adams & Edna
    C. Squler (A); 29Dec58; R226956.

  Bomba, the jungle boy in a strange
    land; or. Facing the unknown, by
    Roy Rockwood, pseud, of Harriet S.
    Adams and Edna C. Squler.
    © 14Mar71; A37664. Harriet S.
    Adams & Edna C. Squler (A);
    29Dec58; R226955.

RODDA, CHARLES.

The praying monkey, by Qavin Holt, pseud. © 31Oct30; A30456. Qavin Holt (A); 2Oct58; R222296.

RODEHEAVER CO.

  Christian hymns and songs. SEE
    Miles, C. Austin, ed.

The flambeau. SEE Miles, C. Austin.

The triad. SEE Hall, J. Lincoln.

RODEHEAVER CO. SEE
  Children's day helper.

<pb id='334.png' n='1958_h2/A/1643' /> RODGERS, ELSIE G.

Being true; words. (In Primary music and worship, no. 62) © 24Dec30; AA59031. Board of Christian Education of the Presbyterian Church in the U. S. A. (PWH); 8Oct58; R222625.

RODGERS, RICHARD, illus.

  Smuggler's luck. SEE Stackpole,
    Edouard Alexandre.

ROEHM, ALFRED I.

  La famille Dupont. SEE Marchand,
    Louis.

RÖSELER, ROBERT O., joint author.

  College German. SEE Evans, M.
    Blakemore.

ROGERS, ELISABETH COBB.

  The sun shines bright. SEE
    Cobb, Irvin S.

THE ROGET DICTIONARY OF SYNONYMS AND ANTONYMS. Comprised in one alphabetical arrangement, with an appendix of foreign words and expressions by C. O. Sylvester Mawson. 1st ed. © 10Apr31; A36520. Katherine Mawson (Mrs. C. O. S.) (W); 21Nov58; R224960.

ROLLAND, MARIE MIKHAILOVA-CUVILLIER.

  Jean Christophe. SEE Rolland,
    Romain.

ROLLAND, ROMAIN.

  Jean Christophe. T.1: L'aube.
    © 21Sep31; AF14401. Mme Romain
    Rolland, nee Marie Mikhailova-Cuvillier
    (W); 3Nov58; R224101.

ROLLAND, MME ROMAIN. SEE Rolland,
  Marie Mikhailova-Cuvillier.

ROLLINS, PHILIP ASHTON.

  Jinglebob. Illus. by N. C. Wyeth.
    © on pref. & revisions; 5Sep30;
    A27381. Charles Scribner's Sons
    (PWH); 29Aug58; R222360.

Jinglebob. Illustrated in color by N. C. Wyeth. © on pref. & revisions; 5Sep30; A27381. Chemical Corn Exchange (E); 29Aug58; R221180.

ROMIEU, EMILIE.

Three virgins of Haworth, by Emilie and Georges Romieu. Translated from the French by Roberts Tapley. © 23Sep30; A27963. E. P. Dutton & Co., Inc. (PWH); 13Aug58; R219442.

ROMIEU, GEORGES, joint author.

  Three virgins of Haworth. SEE
    Romieu, Emilie.

ROOF, KATHARINE M.

Murder on the Salem Road. © 14Jan31; A33157. Katharine M. Roof (A); 17Dec58; R227004.

RORTY, JAMES.

  Robbers in the garden. SEE Bullard,
    Marion.

ROSMAN, ALICE GRANT.

  Jack, the Scot. Illus. by Joan
    Esley. © 17Oct30; A32728.
    Alice Grant Rosman (A); 23Jul58;
    R218417.

  The sixth journey. © 26Jun31;
    A39161. Alice Grant Rosman (A);
    7Nov58; R224657.

ROSNY, J. H., JR., joint author.

  Vers la toison d'or. SEE Rosny,
    J. H., Sr.

ROSNY, J. H., SR.

  Vers la toison d'or, par Rosny, Sr.
    et Rosny, Jr. Illustrations de
    A. Pecoud. © 26Nov30; AF11107.
    Rosny, Jr. (A); 30Jan58; R207679.

ROSS, SARAH BRADFORD.

  The quick and the dead. SEE
    Bradford, Gamaliel.

<pb id='335.png' /> ROSSINI, CARLO.

Cantate Domino; prima anthologia melodica, liturgica, 145 cantus sacri tribus vocibus aequalibus quos composuit vel transcripsit Carlo Rossini. © 27Dec30; A31834. Carlo Rossini (A); 16Jul58; R218060.

ROURKE, THOMAS, pseud. SEE Clinton,
  Daniel.

ROUSE, ANNE MALTBY.

  The dimity sweetheart. SEE Maltby,
    Frances Goggin.

ROWAN, RICHARD WILMER.

The Pinkertons, a detective dynasty. © 6Mar31; A35202. Richard Wilmer Rowan (A); 24Sep58; R221705.

ROWNTREE, LEONARD G.

A clinical study of Addison's disease, by Leonard G. Rowntree and Albert M. Snell. (Mayo Clinic monographs) © 25Jun31; A39131. Leonard G. Rowntree (A); 21Nov58; R224969.

ROY, LILLIAN ELIZABETH.

  Polly and Carola at Ravenswood.
    Russell H. Tandy, illustrator.
    © 12May71; A37281. Lillian
    Elizabeth Roy (A); 29Dec58;
    R226948.

RUCK, BERTA. SEE
  Oliver, Berta Ruck.

RUGG, HAROLD.

  A history of American government
    and culture. © 2Jan31; A33408.
    Harold Rugg (A); 23Sep58;
    R221623.

RUNYON, DAMON.

  Guys and dolls. With an introd. by
    Heywood Broun. © 20Aug31;
    A40991. Damon Runyon, Jr. & Mary
    Runyon McCann (C); 22Aug58;
    R219887.

  The snatching of Bookie Bob. (In
    Collier's, Sept. 26, 1931)
    © 8Sep31; B127541. Danon Runyon,
    Jr. & Mary Runyon McCann (C);
    10Sep58; R221066.

  A story goes with it. (In Hearst's
    international cosmopolitan,
    Nov. 1931) © 8Oct31; B130438.
    Damon Runyon, Jr. & Mary Runyon
    McCann (C); 9Oct58; R222732.

  That ever-loving wife. (In Hearst's
    international-cosmopolitan,
    Sept. 1931) © 6Aug31; B123929.
    Damon Runyon, Jr. & Mary Runyon
    McCann (C); 8Aug58; R219113.

RUNYON, DAMON, JR.

Guys and dolls. SEE Runyon, Daraon.

  The snatching of Bookie Bob. SEE
    Runyon, Damon.

  A story goes with it. SEE
    Runyon, Damon.

  That ever-loving wife. SEE Runyon,
    Damon.

RUSACK, HEDWIG HOFFMANN.

Gozzi in Germany. © 15Nov30; A31274. Hedwig H. Rusack (A); 23Oct58; R223249.

RUSSELL, MARY M.

  Producing your own plays.
    © 16Apr31; A35931. Mary M.
    Russell (A); 7Jul58; R217596.

RYERSON, FLORENCE. SEE
  Clements, Florence Ryerson.

RYNNING, MARGARET E.

Gun notches. SEE Rynning, Thomas H.

RYNNING, THOMAS H.

Gun notches; the life story of a cowboy soldier. © 17Sep31; A42671. Margaret E. Rynning (W), Linda M. Ward, Margaret A. Swalm & Rosamond Rynning Pogarty (C); 26Sep58; R221864.

<pb id='384.png' /> SABATINI, CHRISTINE.

  The duel on the beach. SEE Sabatini,
    Rafael.

  The King's minion. SEE Sabatini,
    Rafael.

  Scaramouch, the kingmaker. SEE
    Sabatini, Rafael.

SABATINI, RAFAEL.

The duel on the beach. (In Ladies' home Journal, Sept. 1931) © 14Aug31; B125148. Christine Sabatini (W); 15Aug58; R219624.

  The king's minion. © 24Sep30;
    A23507. Christine Sabatini (W);
    15Sep58; R221354.

  Scaramouch the kingmaker. Pt.5.
    (In Hearat's international-cosmopolitan,
    Aug. 1931)
    © 10Jul31; B120753. Christine
    Sabatini (W); 11Jul58; R217803.

  Scaramouch the kingmaker. Pt.6.
    (In Hearst's international-cosmopolitan,
    Sept. 1931) © 6Aug31;
    B123929. Christine Sabatini (W);
    7Aug58; R219667.

  Scaramouch the kingmaker. Pt.7.
    (In Hearst'a liternational-cosmopolitan,
    Oct. 1931) © 10Sep31;
    B126584. Christine Sabatini (W);
    11Sep58; R221195.

SACKVILLE-WEST, V.

  All passion spent. © 27May31,
    AI-15317; 27Aug31, A42490.
    V. Sackville-West (A); 4Sep58;
    R221221.

  The poet. (In North American review,
    Aug. 1931) © 15Jul31; B120965.
    V. Sackville-West (A); 16Jul58;
    R217822.

SAGE (RUSSELL) FOUNDATION.

  Community planning in unemployment
    emergencies. SEE Colcord,
    Joanna C.

  The constitutionality of small loan
    legistration. SEE Hubachek,
    Frank R.

  Labor agreements in coal mines. SEE
    Bloch, Louis.

  The social survey. SEE Harrison,
    Shelby. M.

ST. JOHN, CHRISTOPHER, pseud., ed.

  Ellen Terry and Bernard Shaw. SEE
    Terry, Ellen.

ST. LOUIS COUNTY (MINN.) HISTORICAL SOCIETY.

  North Shore place names. SEE Culkin,
    William E.

SALABERT & CIE, EDITIONS.

Rational principles of pianoforte technique. SEE Cortot, Alfred.

SALG, BERT, illus.

  The Copperhead Trail mystery. SEE
    Lloyd, Hugh.

  The hermit of Gordon's Creek. SEE
    Lloyd, Hugh.

  Kidnapped in the Jungle. SEE
    Lloyd, Hugh.

SALMON, EDWARD DWIGHT.

Imperial Spain; the rise of the empire and the dawn of modern sea power. (Berkshire studies in European history) © 2May31; A38514. Edward Dwight Salmon (A); 28Jul58; R218660.

SALTEN, PELIX.

  Fifteen rabbits. Translator: Whittaker
    Chambers. © 31Jul30;
    A31253. Simon & Schuater, Inc.
    (PWH); 13Feb58; R208916.

  Samson and Delilah. Translated by
    Vhittaker Chambers. © 9Mar31;
    A35712. Simon 4 Schuster, Inc.
    (PWH); 1Aug58; R218894.

<pb id='336.png' n='1958_h2/A/1644' /> SAMOSSOUD, CLARA CLEMENS.

My father, Mark Twain, by Clara Clemens. Illustrated from family photos, with hitherto unpublished letters of Mark Twain. © 1Oct31; A43053. Clara Clemens Samossoud (A & PPW); 3Dec58; R225757.

SANFORD, ARTHUR HAWLEY, joint author.

Clinical diagnosis by laboratory methods. SEE Todd, James Campbell.

SANGSTER, MARGARET E.

The rugged road; a tale of Bethlehem and Calvary, and other stories. © 13Dec30; A31673. Margaret E. Sangster (A); 17Nov58; R224820.

SAPPER, pseud. SEE McNeile, Herman
  Cyril.

SARNOFF, DAVID.

  Radio in advertising. SEE
    Dunlap, Orrin E., Jr.

SATTERFIELD, MABEL S.

Objective tests in English. Dr. Jekyll and Mr. Hyde and Key to answers. © 28Mar31; AA81150. Turner E. Smith & Co. (PWH); 10Nov58; R224883.

Objective tests in English. The House of Seven Gables and Key to answers, by Mabel S. Satterfield and Bertha S. Wilber. © 28Mar31; AA81153. Turner E. Smith & Co. (PWH); 10Nov58; R224885.

Objective tests in English. The Lady of the Lake and Key to answers. © 28Mar31; AA81155. Turner E. Smith & Co. (PWH); 10Nov58; R224884.

SAUNDERS, HILARY AIDAN ST. GEORGE.

For works written in collaboration with John Leslie Palmer under the name Francis Beeding SEE Beeding, Francis, pseud.

SAUNDERS, JOAN BOERNER.

  Approved laboratory technic. SEE
    Kolmer, John A.

SAUNDERS, JOAN W. ST. GEORGE.

  The three fishers. SEE Beeding,
    Francis, pseud.

SAUNDERS, LUCY S., joint author.

  The story of Virginia. SEE Willis,
    Carrie Hunter.

SAUNDERS (W. B.) CO.

  Collected papers of the Mayo Clinic
    and the Mayo Foundation. SEE
    Mayo Clinic, Rochester, Minn.

  Nursing in diseases of the eye, ear,
    nose and throat. SEE Manhattan
    Eye, Ear & Throat Hospital, New
    York.

  A text-book of medicine. SEE Cecil,
    Russell L., ed.

SAYERS, DOROTHY L. SEE Fleming,
  Dorothy L. Sayers.

SAYLER, OLIVER M.

Revolt in the arts. © 20Oct30; A29510. Oliver M. Sayler (A); 18Sep58; R221531.

SAYLOR, HENRY H., illus.

Mount Vernon, Washington's home and the nation's shrine. SEE Wilstach, Paul.

SCARBERRY, ALMA SIOUX.

Dimpled racketeer. © 28Jan31; A33493. Alma Sioux Scarberry (A); 29Dec58; R226936.

Make-up; a romance of the footlights. © 4Feb31; A34344. Alma Sioux Scarberry (A); 29Dec58; R226941.

<pb id='337.png' /> SCARBOROUGH, JAMES BLAINE.

  Numerical mathematical analysis.
    © 29Dec30; A31835. James Blaine
    Scarborough (A); 17Nov58;
    R224819.

SCHAFFNER, HENRY R.

Advertising: its economics, philosophy & technique. SEE Hess, Herbert W.

SCHAFFNER, JAKOB.

  Ihr Gluck, ihr Elend. © 21May31;
    AF13066. Paul Zsolnay Verlag
    G.M.B.H. (PWH); 14Nov58; R225626.

SCHANG, HAI SCHUO MONG JEN. SEE
  Hai Schang Schuo Mong Jen.

SCHAUFFLER, ROBERT HAVEN.

  The junior poetry cure. © 18Sep31;
    A41899. Robert Haven Schauffler
    (A); 18Sep58; R221514.

A manthology; songs that are fit for men, and a few women. © 9Oct31; A43247. Robert Haven Schauffler (A); 29Oct58; R223602.

SCHEFFAUER, HERMAN GEORGE, tr.

A man and his dog. SEE Mann, Thomas.

SCHEVILL, FERDINAND.

  A history of Europe. New ed.
    © 30Sep30; A29396. Marietta Bitter
    Abel, John Bitter, William
    Edward Schevill, Francis T. Bitter,
    James E. Schevill, Karl Schevill
    (NK); 16Sep58; R221340.

SCHEVILL, JAMES E.

  A history of Europe. SEE Schevill,
    Ferdinand.

SCHEVILL, KARL.

  A history of Europe. SEE Schevill,
    Ferdinand.

SCHEVILL, WILLIAM EDWARD.

  A history of Europe. SEE Schevill,
    Ferdinand.

SCHINNERER, OTTO P.

  Viennese novelettes. SEE Schnitzler,
    Arthur.

SCHMALHAUSEN, SAMUEL D.

  Woman's coming of age, a symposium.
    Edited by Samuel D. Schmalhausen
    and V. F. Calverton. © 16Oct31;
    A44378. Liveright Pub. Corp.
    (PCW); 22Oct58; R223246.

  Woman's coming of age. SEE
    Calverton, V. F., ed.

SCHMID, MAX.

  The sister in charge. Translated
    from the German by Norman F.
    Speicher. © 16Sep31; A43192.
    Stella Steighner (E. of N. F.
    Speicher); 7Nov58; R224765.

SCHMIDIGER, EDY.

  The first Lady Brandon. SEE
    Hichens, Robert.

SCHMITT, BERNADOTTE E.

  The coming of the war, 1914.
    Vol. 1-2. © 12Sep30; A27661-27662.
    Bernadotte E. Schmitt (A);
    29Aug58; R220420-220421.

SCHMITT, HALL & MCCREARY CO.

The H. & M. collection of Christmas carols and choruses. SEE Clark, W. D.

SCHNITZLER, ARTHUR.

Viennese novelettes. With illus. by Kurt Wiese. Introd. by Otto P. Schinnerer. © on introd.; 6Aug31; A41001. Simon & Schuster, Inc. (PWH); 24Oct58; R223553.

SCHOLZ, KARL W. H., joint author.

  Economic problems of modern life.
    SEE Patterson, S. Howard.

SCHOONOVER, FRANK E., illus.

  Yankee ships in pirate waters. SEE
    Holland, Rupert Sargent.

<pb id='279.png' /> SCHUBERT, FRANZ PETER.

Military march in D, op.51, no.1. Original four-hand piano arrangement. Biographical sketch and glossary, fingering, phrasing, pedaling, and instructive annotations on form and structure and interpretation, by Arthur Edward Johnstone. © on editorial matter; 26Aug30; AA49628. Art Publication Society (PWH); 4Aug58; R218821.

SCHUO, HAI SCHANG MONG JEN. SEE
  Hai Schang Schuo Mong Jen.

SCHUSTER, LINCOLN, comp. SEE
  Living philosophies.

SCHWEITZER, ALBERT.

Aus meinem leben und denken. © 12Nov31; AF15175. Felix Meiner (PWH); 8Dec58; R226195.

SCHWOB, MARCEL.

Portail royal. SEE Schwob, Rene.

SCHWOB, RENE.

Portail royal. © 20Mar31; AF12203. Marcel Schwob (NK); 14Jul58; R217687.

SCOGGINS, C. E.

The house of darkness. © 30Jan31; A34524. Lois Scoggins (W); 24Nov58; R225018.

SCOGGINS, LOIS.

  The house of darkness. SEE
    Scoggins, C. E.

SCOTT, D. R.

  The cultural significance of
    accounts. © 8Sep31; A42315.
    D. R. Scott (A); 2Dec58; R225584.

SCOTT, EVELYN. SEE
  Metcalfe, Evelyn Dunn Scott.

SCOTT, FRANKLIN W., joint ed.

  High school handbook of composition.
    SEE Woolley, Edwin C., ed.

SCOTT, GABRIEL.

Kari. Translated by Anvor Barstad. Illustrated by Edgar Parir, d'Aulaire. © 13Aug31; A41137. Edgar Parin d'Aulaire (A); 21Aug58; R219933.

SCOTT, GEOFFREY, ed.

  The Journal of James Boswell. SEE
    Boswell, James.

  Private papers of James Boswell from
    Malahide Castle. SEE Boswell,
    James.

SCOTT, R. T. M.

  The mad monk. © 15Oct31; A43319.
    R. T. M. Scott (A); 28Nov58;
    R225268.

SCOTT, W. D. ROBSON-. SEE
  Robson-Scott, W. D.

SCRIBNER'S (CHARLES) SONS.

The desert. SEE Van Dyke, John Charles.

  Elementary history of the United
    States. SEE Gordy, Wilbur Fisk.

In our time. SEE Hemingway, Ernest.

Jinglebob. SEE Rollins, Philip Ashton.

  The littlest ones. SEE Barrie,
    Sir James Matthew, Bart.

Madame Bovary. SEE Flaubert, Gustave.

SCULLY, C. ALISON.

  Business life insurance trusts.
    By C. Alison Scully and Franklin
    W. Ganse. © 24Sep30; A27783.
    Elizabeth W. Scully (W); 27Aug58;
    R220426.

SCULLY, ELIZABETH W.

  Business life insurance trusts.
    SEE Scully, C. Alison.

<pb id='338.png' n='1958_h2/A/1645' /> SEAMAN, AUGUSTA HUIELL.

The brass keys of Kenwick. Illustrated by Manning De V. Lee. © 29Oct31; A44648. Janet H. Washburn (E of A. H. Seaman); 17Nov58; R225051.

SEAY, NOBLE H.

  Report of cases argued and determined
    in the Supreme Court of
    Alabama. SEE Alabama. Supreme
    Court.

SECOND BANK-STATE STREET TRUST CO., BOSTON.

  Little America. SEE Byrd,
    Richard E.

SECURITY-FIRST NATIONAL BANK OF LOS ANGELES.

  Songs of the seven senses. SEE
    Blanding, Don.

SEDGWICK, ANNE DOUGLAS. SEE De Selincourt,
  Anne Douglas Sedgwick.

SEEBEP, ELIZABETH, ed.

Klein Heini. SEE Hennings, Richard.

SEEMAN, CLARA LEWIS.

  Choir practice. © 15Sep31;
    AA91849. Wetmore Declamation
    Bureau (PWH); 20Nov58; R225366.

SEITZ, DON C.

  Lincoln, the politician.
    © 12Feb31; A34334. Don C. Seitz
    (A); 19Nov58; R225041.

SELIGMAN, EDWIN R. A., ed. SEE
  Encyclopaedia of the social sciences.

SELL, HENRY B.

  Prayer-meeting talks. SEE Sell,
    Henry T.

SELL, HENRY T.

Prayer-meeting talks. © 11Jul31; A39461. Henry B. Sell (C); 21Nov58; R225382.

SELLAR, WALTER CARRUTHERS.

1066 and all that. By Walter Carruthers Sellar and Robert Julian Yeatman. Illustrated by John Reynolds. © 17Mar31; A34964. Robert Julian Yeatman (A); 25Nov58, R225083.

SELTZER, CHARLES ALDEN.

  Double Cross Ranch. (In Argosy,
    Aug. 29-Oct. 3, 1931) © 26Aug31,
    B125743; 2Sep31, B127045; 9Sep31,
    B127473; 16Sep31, B126732; 23Sep31,
    B129055; 29Sep31, B129396.
    Robert M. Seltzer (C); 8Oct58;
    R222301, 222303, 222305, 222302,
    222307-222308.

  A son of Arizona. © 9Jul31;
    A40408. Robert M. Seltzer (C);
    10Jul58; R217706.

SELTZER, ROBERT M.

  Double Cross Ranch. SEE Seltzer,
    Charles Alden.

  A son of Arizona. SEE Seltzer,
    Charles Alden.

SELWIN-TAIT, MONICA.

Three ships come sailing. © 1Apr31; A38597. Monica Selwin-Tait (A); 7Nov58; R224772.

SEUSS, THEOPHRASTUS, illus.

Boners. SEE Abingdon, Alexander.

SEWALL, MARY, joint author.

  Ethics note-book for nurses. SEE
    Jamieson, Elizabeth M.

SEYD, LESLEY.

  The piper's lad. SEE Campbell,
    Harriette R.

SHAKESPEARE, WILLIAM.

As you like it. Edited by R. Adelaide Witham. (The Riverside literature series) © on editing; 16Mar31; A36171. Houghton Mifflin Co. (PWH); 29Jan59; R227603.

<pb id='339.png' />
  The merchant of Venice. Edited by
    Pauline W. Leonard. (Golden key
    series) © on pref., introd.,
    notes & appendix; 16Feb31; A34507.
    Margaret L. Derby (C of P. W.
    Leonard); 6Nov58; R224127.

  The two gentlemen of Verona,
    edited by Charles Washburn Nichols.
    (The Arden Shakespeare) © on
    introd., notes, appendix &
    glossary; 31Jul31; A40724.
    Charles Washburn Nichols (A);
    6Nov58; R224142.

  Venus and Adonis. Illustrated by
    Rockwell Kent. © on illus.;
    3Nov31; A46984. Rockwell Kent
    (A); 19Nov58; R224860.

SHANKS, CARROL M., joint author.

Cases and materials on the law of corporate reorganization. SEE Douglas, William O.

SHANKS, GEORGE, illus.

  Lazy Bear Lane. SEE Smith,
    Thorne.

SHANNON, GEORGE POPE, Joint author.

  English in action. SEE
    Tressler, J. C.

SHANNON, JOHN R.

  Nursing in diseases of the eye, ear,
    nose and throat. SEE Manhattan
    Eye, Ear & Throat Hospital, New
    York.

SHANNON, MATTIE B.

The triad. SEE Hall, J. Lincoln.

SHANNON, MONICA. SEE Wing, Monica
  Shannon.

SHARP, C. J.

  The Communion. © 27Oct30; A30407.
    Standard Pub. Co. (PWH); 23Oct58;
    R223473.

SHAW, GEORGE BERNARD.

  Collected works. Vol.23-25. © on
    new matter; 19Oct31; A45347-45349.
    Public Trustee (E); 21Oct58;
    R223905-223907.

  Collected works. Vol.26-28.
    Ayot St. Lawrence ed. © 24Nov31,
    A47172-47174. Public Trustee
    (E); 26Nov58; R225540-225542.

  Ellen Terry and Bernard Shaw. SEE
    Terry, Ellen.

SHAW, MARY LEONARD.

  Sympathetic to bare feet. SEE
    Leonard, Jonathan.

SHAW, ROSAMOND.

  The fishermen's saint. SEE
    Grenfell, Sir Wilfred.

SHAY, FRANK, comp.

  A little book of vagabond songs.
    Etchings by Philip Kappel.
    © 8Jul31; A39335. Harper & Bros.
    (PWH); 12Nov58; R225100.

SHEARON, LILLIAN NICHOLSON.

  The other little mustard seed.
    © 15Oct30; A29463. Lillian
    Nicholson Shearon (A); 30Jul58;
    R218907.

SHEEAN, VINCENT.

  Gog and Magog. © 11Sep30; A28422.
    Vincent Sheean (A); 25Aug58;
    R220288.

SHEEN, FULTON J.

Old errors and new labels. © 1May31; A37159. Fulton J. Sheen (A); 30Sep58; R222010.

SHEEN, JAMES MORGAN.

  New Jersey law practice. Vol.1.
    2nd ed. © 23Apr31; A35991.
    Soney & Sage Co. (PWH); 3Jul58;
    R217527.

SHERMAN, HAROLD M.

  The land of monsters, by Edward J.
    Marrow, pseud. Illustrated by
    Harold N. Anderson. © 11May31;
    A38125. Harold M. Sherman (A);
    29Dec58; R226992.

<pb id='282.png' />
  Slashing sticks and other hockey
    stories. © 12Jan31; A33224.
    Harold M. Sherman (A); 29Dec58;
    R226930.

SHERRILL, CHARLES H.

Bismark and Mussolini. © 22Apr31; A35984. Chase Manhattan Bank (E); 2Jan59; R227599.

SHERWOOD, MADELINE H.

  Virtuous knight. SEE Sherwood,
    Robert Emmet.

SHERWOOD, MERRIAM, tr. SEE
  The Tale of the warrior lord.

SHERWOOD, ROBERT EMMET.

  Virtuous knight. © 28Aug31;
    A41424. Madeline H. Sherwood
    (W); 22Sep58; R221587.

SHIELDS, ELIZABETH MCE.

Father, as the morning sun; words. (In Primary music and worship, no.3) © 24Dec30; AA59036. Board of Christian Education of the Presbyterian Church in the U. S. A. (PWH); 8Oct58; R222628.

SHIMER, EDGAR DUBS, joint author.

  New progressive road to reading.
    SEE Burchill, Georgine.

SHORE, VIOLA BROTHERS.

  The beauty mask murder. Pt.3.
    Illus. by R. P. Schabelitz. (In
    Hearst's international-cosmopolitan,
    Aug. 1930) © 10Jul30;
    A5-20788. Viola Brothers Shore
    (A); 3Jul58; R217103.

SHULL, A. FRANKLIN.

Heredity. 2d ed. © 28May31; A37649. A. Franklin Shull (A); 6Aug58; R219170.

SHUSTER, GEORGE N., tr.

  Jesse and Maria. SEE Handel-Mazzetti,
    Enrica Ludovica Maria,
    Freiin von.

SIEGCHRIST, MRS. DALE. SEE Siegchrist,
  Narcissa.

SIEGCHRIST, NARCISSA.

Our times. SEE Sullivan, Mark.

SIMENON, GEORGES.

  Au rendez-vous des terre-neuvas.
    © 21Aug31; AF14331. Georges
    Simenon (A); 3Nov58; R224096.

  Un crime en Hollande. © 20Jul31;
    AF14330. Georges Simenon (A);
    18Aug58; R219685.

  Les errants. © 15Sep31; AF14338.
    Georges Simenon (A); 3Nov58;
    R224098.

  Katia acrobate. © 15Aug31;
    AF14332. Georges Simenon (A);
    3Nov58; R224097.

  La nuit du carrefour. © 20Jun31;
    AF13476. Georges Simenon (A);
    18Aug58; R219671.

  La tete d'un homme. © 1Oct31;
    AF15677. Georges Simenon (A);
    3Nov58; R224087.

SIMON, LEON, tr. & ed.

  About Zionism. SEE Einstein,
    Albert.

SIMON & SCHUSTER, INC.

  Fifteen rabbits. SEE Salten.
    Felix.

  A night in Kurdistan. SEE Bloch,
    Jean Richard.

  Samson and Delilah. SEE Salten,
    Felix.

  Scotch. SEE Mactavish, Angus
    J., comp.

  Viennese novelettes. SEE Schnitzler,
    Arthur.

SIMON & SCHUSTER, INC. SEE
  Living philosophies.

<pb id='340.png' n='1958_h2/A/1646' /> SIMONDS, WILLIAM A.

A boy with Edison. With an introd. by Francis Jehl. © 22Jun31; A39271. William A. Simonds (A); 8Jul58; R217585.

SINCLAIR, UPTON.

The wet parade. © 10Sep31; A42263. Upton Sinclair (A); 19Sep58; R221635.

SIPE, CHESTER HALE.

  The Indian wars of Pennsylvania.
    Introd. by George P. Donehoo.
    2d ed. © 21Aug31; A41390.
    C. Hale Sipe (A); 2Sep58; R220612.

SIPLE, PAUL A.

A boy scout with Byrd. © 28Jan31; A34251. Paul A. Siple (A); 13Nov58; R224967.

SISSON, DIXIE LADD.

  One hundred red days. SEE Sisson,
    Edgar G.

SISSON, EDGAR G.

  One hundred red days; a personal
    chronicle of the Bolshevik
    Revolution. © 17Apr31; A36891.
    Dixie Ladd Sisson (Mrs. Edgar G.
    Sisson) (W); 15Sep58; R221604.

SISSON, MRS. EDGAR G. SEE Sisson,
  Dixie Ladd.

SKINNER, CONSTANCE LINDSAY.

  Red man's luck. Illustrated by
    Caroline Gibbons Granger.
    © 17Sep30; A27762. Ernestine
    Doris Monteith (NK); 24Jul58;
    R218413.

SLACK, EDGAR P.

Elementary electricity. © 16Jan31; A32941. Edgar P. Slack (A); 6Aug58; R219148.

SLATTERY, ANNIE F.

  He took it upon himself. SEE
    Slattery, Margaret.

SLATTERY, J. FLORENCE.

  He took it upon himself. SEE
    Slattery, Margaret.

SLATTERY, MARGARET.

  He took it upon himself. Rev. &
    enl. ed. © 11Dec30; A32357.
    Annie F. Slattery & J. Florence
    Slattery (E); 3Dec58; R225737.

SLICHTER, SUMNER H.

Modern economic society. © on changes & additions in chapters 17-31; 22Jun31; A40235. Sumner H. Slichter (A); 28Jul58; R218668.

  Questions and problems. SEE
    O'Leary, Paul M.

SLINGLUFF, MRS. T. R.

  Marshal Foch's war memoirs. SEE
    Foch, Ferdinand.

  The memoirs of Marshal Foch. SEE
    Foch, Ferdinand.

SLOOVERE, FREDERICK JOSEPH DE. SEE
  De Sloovere, Frederick Joseph.

SLOSSON, EDWIN EMERY.

A number of things, Arr. and edited with a biographical memoir by Preston W. Slosson. 1st ed. © 30Oct30; A29844. Preston W. Slosson (PPW); 22Oct58; R223017.

SLOSSON, PRESTON W., ed.

  A number of things. SEE Slosson,
    Edwin Emery.

SMART, WALTER KAY.

English review grammar. 2d rev. ed. © 4Sep31; A42946. M. Elizabeth Campbell (Mrs. G. H. M.) (C); 8Sep58; R220872.

<pb id='341.png' /> SMITH, LADY ELEANOR FURNEAUX.

Flamenco. © 12Jan31, AI-14768; 25Mar31, A36250. Lady Eleanor Smith (A); 18Dec58; R227404.

SMITH, GEORGE D.

  The sacrament of the Eucharist.
    Introd. by James M. Gillis.
    (The Treasury of the faith
    series, 25) © 17Oct30,
    AI-14535; 31Mar31, A36215.
    George D. Smith (A); 15Oct58;
    R222713.

SMITH, H. AUGUSTINE.

Lyric religion. © 2Oct31; A44956. H. Augustine Smith, Jr. (C); 3Nov58; R224027.

SMITH, H. AUGUSTINE, JR.

  Lyric religion. SEE Smith, H.
    Augustine.

SMITH, HARMON, ed.

  Nursing in diseases of the eye, ear,
    nose and throat. SEE Manhattan
    Eye, Ear & Throat Hospital, New
    York.

SMITH, HARRY B.

First nights and first editions. © 2Oct31; A42873. Sydney R. Smith (C); 11Dec58; R227381.

SMITH, JOHN COLLIS.

  Indian summer. © 26Jun31; A40163.
    H. M. Stanley (E); 13Nov58;
    R225325.

SMITH, MARJORIE ERSKINE.

No bed of roses; the diary of a lost soul, by O. W., pseud. © 18Jul30; A26337. Marjorie Erskine Smith (A); 11Jul58; R221603.

SMITH, MARJORIE ERSKINE. SEE Walker,
  Marjorie Erskine Smith.

SMITH, REED, joint author.

  Good reading for high schools. SEE
    Cross, Tom Peete.

SMITH, SHEILA KAYE-. SEE Fry, Sheila
  Kaye-Smith.

SMITH, SYDNEY R.

  First nights and first editions.
    SEE Smith, Harry B.

SMITH, T. V., joint ed.

  Readings in ethics. SEE Clark,
    Gordon H., ed.

SMITH, THORNE.

  Lazy Bear Lane. Illustrated by
    George Shanks. © 5Nov31; A44980.
    June Smith Delaney & Marion Smith
    Conner (C); 19Nov58; R225060.

  Turnabout. © 24Sep31; A42975.
    June Smith Delaney & Marion Smith
    Conner (C); 29Sep58; R222071.

SMITH (TURNER E.) & CO.

  Objective tests in English. SEE
    Satterfield, Mabel S.

SMITH (WM. J.) MUSIC CO., INC. SEE
  Smith's method for plectrum guitar.

SMITH'S METHOD FOR PLECTRUM GUITAR,
  SIX STRING. By Will D. Moyer.
  © 1Oct31; AA79664. Wm. J. Smith
  Music Co., Inc. (PWH); 14Nov58;
  R224534.

SMULSKI, EDWARD, joint author.

  Concrete plain and reinforced. SEE
    Taylor, Frederick W.

SNAITH, J. C.

The unforeseen. © 31Jul30; A25774. H. M. Stanley (E); 21Mar58; R211028.

<pb id='285.png' /> SNEDEKER, CAROLINE DALE.

The town of the fearless. With pictorial supplement and illus. by Manning De V. Lee. © 15Oct31; A43713. Nina Parke Stilwell (NK of C. D. Snedeker) & Manning De V. Lee (A); 25Nov58; R225750.

SNELL, ALBERT M., joint author.

A clinical study of Addison's disease. SEE Rowntree, Leonard G.

SNYDER, HAROLD E., illus.

  Marie of Old New Orleans. SEE Radford,
    Ruby Lorraine.

SOBEL, BERNARD.

Burleycue; an underground history of burlesque days. © 16Nov31; A44855. Bernard Sobel (A); 28Nov58; R225549.

SOGLOW, illus.
  Hard lines. SEE Nash, Ogden.

SONEY & SAGE CO.

  Building and loan procedure in
    New Jersey. SEE Prescott, P.
    Albion.

  Handbook of collection practice.
    SEE Abrahams, Robert D.

  New Jersey abstracts and titles.
    SEE Lieberman, Milton N.

  New Jersey law practice. SEE Sheen,
    James Morgan.

  New Jersey probate practice with
    annotated statutes. SEE
    Waltzinger, Frederick J.

SONEY & SAGE CO. SEE

  Monaghan's cumulative digest of
    Pennsylvania decisions.

New Jersey statute service.

Purdon's Pennsylvania statutes annotated.

SOPHOCLES.

  The Antigone. Translated by John
    Jay Chapman. © on translation;
    19Nov30; A30872. Chanler A.
    Chapman (C); 2Oct58; R221967.

SOROKIN, PITIRIM A., ed.

A systematic source book in rural sociology, edited by Pitirim A. Sorokin, Carle C. Zimmerman and Charles J. Galpin. Vol. 1-2. © 13Nov30, A30824; 25Jun31, A40629. Pitirim A. Sorokin (A); 25Aug58; R220303-220304.

THE SOUTH EASTERN REPORTER. Vol. 156-157.
  Permanent ed., with key
  number annotations. (National
  reporter system. State series)
  © 6May31, A37857; 27Jun31; A39455.
  West Pub. Co. (PWH); 3Jul58;
  R217461-217462.

THE SOUTH EASTERN REPORTER. Vol.158.
  Permanent ed., with key number annotations.
  (National reporter system.
  State series) © 12Sep31; A44047.
  West Pub. Co. (PWH); 6Oct58;
  R222379.

SOUTH WESTERN REPORTER. Second series.
  Permanent ed. (National Reporter
  System) © West Pub. Co. (PWH) v.

  34, Feb. 17-Mar. 10, 1931.
    © 16Apr31; A38419. 3Jul58;
    R217465.

  35, Mar. 17-Apr. 7, 1931.
    © 19May31; A37859. 3Jul58;
    R217466.

  36. Apr. 14-May 5, 1931.
    © 22Jun31; A39456. 3Jul58;
    R217467.

  37, May 12-26, 1931. © 15Jul31;
    A40802. 6Oct58; R222380.

  38, June 2-30, 1931. © 27Aug31;
    A41822. 6Oct58; R222381.

  39. July 7-28, 1931. © 26Sep31;
    A44043. 6Oct58; R222382.

SOUTHERN REPORTER. Permanent ed.
  (National Reporter System. State
  series) © West Pub. Co. (PWH) v.

  132. © 5Jun31; A39449. 3Jul58;
    R217505.

<pb id='342.png' n='1958_h2/A/1647' />
  133. © 9Jul31; A40798. 6Oct58;
    R222383.

  134. © 3Sep31; A44048. 6Oct58;
    R222384.

SOUTHERN REPORTER DIGEST. May 1931
  cumulative pamphlet. © 23May31;
  A37855. West Pub. Co. (PWH);
  3Jul58; R217503.

SOUTHERN REPORTER DIGEST. July 1931
  cumulative pamphlet. © 14Jul31;
  A41828. West Pub. Co. (PWH);
  6Oct58; R222385.

SPARKES, BOYDEN.

  Customers' man. © 7May31; A37532.
    Boyden Sparkes (A); 2Sep58;
    R220930.

SPAULDING, CHARLES R.

  A happy home. © 15Aug30;
    AA49354. Charles R. Spaulding
    (A); 12Aug58; R219036.

  Private lessons versus class
    lessons. © 15Aug30; AA49355.
    Charles R. Spaulding (A); 12Aug58;
    R219037.

  Why do we need music, anyway?
    © 15Aug30; AA49356. Charles R.
    Spaulding (A); 12Aug58; R219038.

SPAULDING, ROBERT K.

Syntax of the Spanish verb. © 28May31; A39057. Robert K. Spaulding (A); 28Jul58; R218663.

SPEARING, JAMES O., joint author.

  Expert driving. SEE McCann,
    Herbert L.

SPEARMAN, FRANK H.

Spanish lover. © 12Sep30; A27551. Frank H. Spearman, Jr. (C); 10Sep58; R220962.

SPEARMAN, FRANK H., JR.

  Spanish lover. SEE Spearman,
    Frank H.

SPEARS, MARY.

Sarah Defiant, by Mary Borden, pseud. (Pub. abroad as Sarah Gay) © 28Sep31, AI-15602; 22Oct31, A44973. Mary Spears (A); 24Oct58; R223400.

SPEICHER, NORMAN F., tr.

  The sister in charge. SEE
    Schmid, Max.

SPRAGUE, MARY LOUISE.

  Answers to questions and problems in
    modern chemistry. SEE Dull,
    Charles E.

  Laboratory exercises in chemistry.
    SEE Dull, Charles.

  Modern chemistry. SEE Dull,
    Charles E.

  Tests in chemistry. SEE Dull,
    Charles E.

SPRUNT, ALEXANDER, JR.

Dwellers of the silences. © 6Feb31; A33669. Alexander Sprunt, Jr. (A); 26Sep58; R221873.

SQUAIR, J., joint author.

  Standard French grammar. SEE
    Fraser, W. H.

SQUIER, EDNA C.

  For works written in collaboration
    with Harriet S. Adams SEE
    Appleton, Victor, pseud.
    Dawson, Elmer A., pseud.
    Dixon, Franklin W., pseud.
    Hope, Laura Lee, pseud.
    Keene, Carolyn, pseud.

SQUIER, EMMA LINDSAY.

  At the rising of the moon. (In
    Good housekeeping, Aug. 1931)
    © 25Jul31; B122706. John Bransby
    (Wr); 31Oct58; R224315.

<pb id='343.png' />
  Going down the golden trail. (In
    Good housekeeping, Apr. 1931)
    © 25Mar31; B110225. John Bransby
    (Wr); 31Oct58; R224314.

  Little queen of pearls. (In
    Collier's, Aug. 29, 1931)
    © 10Aug31; B124158. John
    Bransby (Wr); 31Oct58; R224316.

  Something for nothing. (In
    Collier's, Oct. 10, 1931)
    © 21Sep31; B128230. John
    Bransby (Wr); 31Oct58; R224317.

STACKPOLE, EDOUARD ALEXANDRE.

  Smuggler's luck. Illustrator:
    Richard Rodgers. © 11Jul31;
    A39471. Edouard Alexandre Stackpole
    (A); 5Sep58; R220842.

STANDARD PUB. CO.

The Communion. SEE Sharp, C. J.

STANDARD PUB. FOUNDATION. SEE
  Gospel quartets for men.

STANISTREET, GRACE MARIE.

Recitations for children. © 10Oct30; A28889. Grace Stanistreet (A); 11Aug58; R219184.

STANLEY, H. M.

  Indian summer. SEE Smith, John
    Collis.

The unforeseen. SEE Snaith, J. C.

STANTON, J. M.

French drill and test pad. © 9May31; AA70047. J. M. Stanton (A); 28Jul58; R218661.

STAPLETON, FLYNN & LILLY.

  Jungle babies. SEE Johnson, Osa
    Helen Leighty.

STARKEY, GLENN WENDELL.

Maine, its history, resources and government. Rev. ed. © 22Oct30; A30445. Glenn Wendell Starkey (A); 1Oct58; R222147.

STARKS, EDWIN C.

  The dissection of the rat, by Edwin
    C. Starks and Richard D. Cutter.
    © 26Jan31; A33608. Mrs. Willis
    Rich (C of Edwin C. Starks) &
    Richard D. Cutter (A); 16Dec58;
    R226607.

STARRETT, VINCENT.

  Dead man inside. © 15Oct31;
    A43706. Vincent Starrett (A);
    3Nov58; R224613.

  Dead man inside. (In Short stories,
    July 10-Aug. 25, 1931) © 26Jun31,
    B119734; 10Jul31, B120941; 25Jul31,
    B123454; 10Aug31, B124443.
    Vincent Starrett (A); 13Aug58;
    R219435-219438.

STAUFFER, ELMER C., joint author.

  Good reading for high schools. SEE
    Cross, Tom Peete.

STAYTON, GRACIA, pseud. SEE
  Henderson, Gladys.

STEDMAN, BEIRNE, ed.

  Michie on banks and banking. SEE
    Michie Co.

STEDMAN, BEIRNE, ed. SEE

  Michie's digest of Virginia and
    West Virginia reports.

The North Carolina code of 1931.

STEELE, WILBUR DANIEL.

  The body of the crime. (In Ladies'
    home journal, Mar. 1931)
    © 17Feb31; B104848. Wilbur Daniel
    Steele (A); 12Nov58; R224735.

  Green vigil. (In Ladies' home journal,
    Sept. 1930) © 19Aug30;
    B84046. Wilbur Daniel Steele (A);
    8Aug58; R219570.

  Hills of heaven. (In Good housekeeping,
    Jan. 1931) © 24Dec30;
    B97695. Wilbur Daniel Steele
    (A); 12Dec58; R227375.

<pb id='288.png' />
  Renegade. (In Ladies' home journal,
    Feb. 1931) © 20Jan31; B102081.
    Wilbur Daniel Steele (A); 12Dec58;
    R227376.

STEEMAN, STANISLAS ANDRE.

  Six hommes morts. © 15Jun31;
    AF14186. Stanislas Andre Steeman
    (A); 18Aug58; R219679.

STEICHEN, EDWARD, illus.

  The first picture book. SEE Calderone,
    Mary Steichen Martin.

STEIGHNER, STELLA.

  The sister in charge. SEE
    Schmid, Max.

STEIN, HARVE, illus.

Jeanne d'Arc. SEE Eaton, Jeanette.

STEINER, RUDOLF.

  Geisterkenntnis in glücklichen und
    ernsten Stunden des Lebens, eine
    Zeitbetrachtung. Oeffentlicher
    Vortrag, Berlin 1915. (Aus
    schicksaltragender Zeit, eine
    Schriftenreihe, 6) © 15Sep30;
    AF15907. Rudolf Steiner Nachlassverwaltung
    (PPW); 23Dec57;
    R205490.

STEINER (RUDOLF) NACHLASSVERWALTUNG.

Geisterkenntnis in glücklichen und ernsten Stunden des Lebens. SEE Steiner, Rudolf.

STEPHEN, SISTER.

  An outline of chemistry. SEE
    Domitilla, Sister.

STEPHENS, WILHELMINA D'ARCY.

  Children's Thanksgiving; words.
    (In Primary music and worship,
    no.14) © 24Dec30; AA59025.
    Board of Christian Education of
    the Presbyterian Church in the
    U. S. A. (PWH); 8Oct58; R222622.

  In the Father's house; words.
    (In Primary music and worship,
    no.13) © 24Dec30; AA59024.
    Board of Christian Education of
    the Presbyterian Church in the
    U. S. A. (PWH); 8Oct58; R222621.

STEPHENSON, MRS. DUNCAN. SEE

Stephenson, Holly.

STEPHENSON, MRS. GEORGE. SEE
  Stephenson, Natalie Gauss.

STEPHENSON, HOLLY.

Harmonium. SEE Stevens, Wallace.

STEPHENSON, NATALIE GAUSS.

  Life in college. SEE Gauss,
    Christian.

STEPHENSON, NATHANIEL M.

  Nelson W. Aldrich, a leader in
    American politics. © 19Sep70;
    A29147. Mary Mazyck Robertson
    (NK); 11Sep58; R221179.

STERN, G. B., pseud. SEE
  Holdsworth, Gladys Bertha.

STERNE, EMMA GELDERS.

  Loud sing cuckoo. Illus. by
    Dorothy Owen. © 1Oct30; A28684.
    Emma Gelders Sterne (A); 26Sep58;
    R221870.

STERRETT, FRANCES R.

  Sophie. © 1Aug30; A26708.
    Frances R. Sterrett (A); 31Jul58;
    R218693.

STEUCH, HARRIET HENRY DE. SEE
  De Steuch, Harriet Henry.

STEVENS, ELSIE.

Harmonium. SEE Stevens, Wallace.

STEVENS, HOPE BROMFIELD.

Tabloid news. SEE Bromfield, Louis.

  That which never returns. SEE
    Bromfield, Louis.

<pb id='344.png' n='1958_h2/A/1648' /> STEVENS, LOUIS.

Here comes Pancho Villa. © 9Oct30; A28819. Louis Stevens (A); 24Sep58; R221706.

STEVENS, WALLACE.

  Harmonium. © on new matter;
    24Jul31; A41989. Elsie Stevens
    (Mrs. Wallace Stevens) (W) & Holly
    Stephenson (Mrs. Duncan Stephenson)
    (C); 12Nov58; R225126.

STEVENS, MRS. WALLACE.
  SEE Stevens, Elsie.

STEVENSON, AUGUSTA.

  Children's classics in dramatic form.
    Book 3. © on new play; 15Sep30;
    A27652. Augusta Stevenson (A);
    15Sep58; R221350.

STEVENSON, PHILIP.

The Gospel accoring to St. Luke's. © 4Mar31; A35207. Philip Stevenson (A); 29Sep58; R221904.

STEWART, GEORGE.

Jesus as a friend. © 26Feb31; A34559. George Stewart (A); 4Aug58; R218935.

STEWART, ISABEL M., joint author.

  A short history of nursing. SEE
    Dock, Lavinia L.

STEWART, LUCY SHELTON.

The reward of patriotism. © 23Oct20; A30155. Lucy Shelton Stewart (A); 5Aug58; R218844.

STEWART, OSCAR M.

  Physics, a textbook for colleges.
    Rev. ed. © 9Jan31; A33409.
    Boatmen's National Bank of St.
    Louis (E); 23Sep58; R221624.

STILES, EDMUND K.

  Nutritional physiology. SEE
    Stiles, Percy Goldthwait.

STILES, PERCY GOLDTHWAIT.

Nutritional physiology. 7th ed. © 21Jul31; A40498. Edmund K. Stiles (C); 25Nov58; R224971.

STILLMAN, DONALD GALE.

Twenty-five points of grammar. © 21Jan71; A32938. Donald Gale Stillman (A); 8Dec58; R226197.

STILLWELL, MARGARET BINGHAM.

  Incunabula and Americana, 1450-1800.
    © 27Jan31; A34143. Margaret
    Bingham Stillwell (A); 22Dec58;
    R227430.

STILWELL, NINA PARKE.

  The town of the fearless. SEE
    Snedeker, Caroline Dale.

STOKES, CLAUDE NEWTON.

A comparative study of the results of a certain individual method and a certain group method of instruction in ninth-grade mathematics. © 3Sep31; A42226. Claude Newton Stokes (A); 16Sep58; R221575.

STRAHAN, KAY CLEAVER.

  October house. © 4May31, AI-15263;
    24Oct31, A44976. William N.
    Strahan (Wr); 29Oct58; R223990.

  Oh happy youth. © 20Aug31; A42185.
    William N. Strahan (Wr); 26Aug58;
    R220629.

STRAHAN, WILLIAM N.

  October house. SEE Strahan, Kay
    Cleaver.

  Oh happy youth. SEE Strahan, Kay
    Cleaver.

STRANGE, JOHN STEPHEN, pseud. SEE
  Tillett, Dorothy Stockbridge.

<pb id='345.png' /> STRAUB, RALPH.

The consolidated laws of New York annotated. SEE Bronaugh, Minor, ed.

STRECKER, EDWARD A.

  Practical clinical psychiatry for
    students and practitioners, by
    Edward A. Strecker and Franklin
    G. Ebaugh. 3d ed. © 31Mar31;
    A35560. Edward A. Strecker &
    Franklin G. Ebaugh (A); 6Aug58;
    R219163.

STREET, JULIAN.

  Enchanted island. (In Ladies'
    home Journal, Aug. 1931)
    © 10Jul31; B121323. Margot
    Street (W); 10Jul58; R217685.

  Sitting pretty. (In Saturday
    evening post, July 25, 1931)
    © 21Jul31; B122074. Margot
    Street (W); 20Aug58; R219877.

STREET, MARGOT.

Enchanted island. SEE Street, Julian.

Sitting pretty. SEE Street, Julian.

STREET & SMITH PUBLICATIONS, INC.

Joy Street. SEE Pomeroy, Claire.

  Love and Betty. SEE Lee, Louisa
    Carter.

STRINGER, ARTHUR.

A lady quite lost. © 30Jan31; A34374. Robert A. Stringer (C); 5Sep58; R220882.

STRINGER, ROBERT A.

  A lady quite lost. SEE Stringer,
    Arthur.

STRONG, ANNA LOUISE.

The Soviets conquer wheat. © 28Aug31; A42228. Anna Louise Strong (A); 2Dec58; R225583.

STRUBEL, CAROLYN L.

  Stage guide for young Handel of
    Hanover. SEE Boswell, Helen.

STUART, GRAHAM H.

The international city of Tangier. © 21Jan31; A32999. Graham H. Stuart (A); 16Dec58; R226603.

STUHLDREHER, HARRY A.

  Knute Rockne, man builder.
    © 21Sep31; A41855. Harry A.
    Stuhldreher (A); 21Oct58; R223300.

STURGIS, J. E., comp. SEE
  Gospel quartets for men.

SULLIVAN, MARK.

Our times; the United States, 1900-1925. III: Pre-war America. © 20Oct30; A29544. Mark Sullivan, Jr., Sydney B. Parker (Mrs. Jameson Parker), Narcissa Siegchrist (Mrs. Dale Siegchrist) (C); 13Oct58; R222884.

SULLIVAN, MARK, JR.

Our times. SEE Sullivan Mark.

SWALM, MARGARET A.

Gun notches. SEE Rynning, Thomas H.

SWEENEY, BETTY LAUGHLIN.

  So you're going to Spain. SEE
    Laughlin, Clara E.

SWEENY, MARY E., joint author.

Growth and development of the young child. SEE Rand, Winifred.

SWIFT, JONATHAN.

A tale of a tub. Edited by Edward Hodnett. Illustrated with woodcuts executed by Warren Chappell from designs by Charles Locke. © on half-title, front., translations & new matter; 15Oct30; A29444. Columbia University Press (PWH); 23Sep58; R221618.

<pb id='291.png' /> SWIHART, ALTMAN K.

  Since Mrs. Eddy. © 12Jun31;
    A39058. Altman K. Swihart (A);
    28Jul58; R218664.

TAIT, MONICA SELWIN. SEE Selwin-Tait,
  Monica.

THE TALE OF THE WARRIOR LORD (El cantar de mio Cid) Translated by Merriam Sherwood. Decorated by Henry C. Pitz. 1st ed. © 13Aug30; A27229. Merriam Sherwood (A); 20Jan58; R206951.

TANDY, RUSSELL H., illus.

  Polly and Carola at Ravenswood. SEE
    Roy, Lillian Elizabeth.

  Roy Blakeley up In the air. SEE
    Fitzhugh, Percy Keese.

TANNENBAUM, HERMAN.

  The handwriting of the Renaissance.
    SEE Tannenbaum, Samuel A.

TANNENBAUM, SAMUEL A.

  The handwriting of the Renaissance.
    Introd. by Ashley H. Thorndike.
    © 15Nov30; A31182. Herman
    Tannenbaum (C); 29Oct58; R223608.

TANQUEREY, AD.

Compendio de telogia ascetica y mistica. Daniel Garcia Hughes, translator. © 16Aug30; AF9031. Desclee & Co. (PWH); 26Jun58; R217079.

TAPLEY, ROBERTS, tr.

  Three virgins of Haworth. SEE
    Romieu, Emilie.

TARKINGTON, BOOTH.

High summer. (In American mercury, June-Oct 1931) © 25May31, B116645; 25Jun31, B122342; 24Jul31, B122343; 25Aug31, B123268; 25Sep31, B129381. Susanah K. Tarkington (W); 29Sep58; R222076-222078, 222081, 222083.

  Mothuh. (In Hearst's
    international-cosmopolitan, Oct. 1931)
    © 10Sep31; B126584. Susanah K
    Tarkington (W); 11Sep58; R221214.

  Penrod, his complete story.
    Illustrated by Gordon Grant.
    © 24Sep31; A42969. Susanah K.
    Tarkington (W); 29Sep58; R222068.

TARKINGTON, SUSANAH K.

High summer. SEE Tarkington, Booth.

Mothuh. SEE Tarkington, Booth.

Penrod. SEE Tarkington, Booth.

TATE, ALIEN.

  Mother and son. (In New Republic,
    Aug. 27, 1930) © 21Aug30;
    B85196. Alien Tate (A); 15Jul58;
    R217987.

TAYLOR, COLEY, tr.

  Mulatto Johnny. SEE Laubreaux,
    Alin.

  The tragedies of progress. SEE
    Lombroso, Gina.

TAYLOR, DEEMS.

  Peter Ibbetson. SEE Du Maurler,
    George Louis Palmella Busson.

TAYLOR, FREDERICK W.

Concrete plain and reinforced. Vol.1: Theory and design of concrete and reinforced structures. By Frederick W. Taylor, Sanford E. Thompson & Edward Smulski, with a chapter by Henry C. Robbins. 4th ed. © 22May31; A38484. Edward W. Clark, 3d (PWH) & Frances L. Thompson (W); 21Nov58; R225544.

TAYLOR, JACOB B.

  Solutions to C. P. A. problems,
    by Jacob B. Taylor and Hermann C.
    Miller. © 16Jan31, A32942.
    Jacob B. Taylor (A) & Ernestine H.
    Miller (W); 6Aug58; R219149.

<pb id='346.png' n='1958_h2/A/1649' /> TAYLOR, PAUL BARTLETT.

  King Scramble. © 28Aug31; A42130.
    Paul Bartlett Taylor (A);
    3Sep58; R220922.

  Tippletappleteven Town. © 28Aug31;
    A42149. Paul Bartlett Taylor (A);
    3Sep58; R220925.

TAYLOR, WILLIAM P.

  One line wisdom. © 16Apr31;
    AA66843. Elizabeth R. Taylor
    (E); 24Dec58; R227393.

TEASDALE, SARA. SEE
  Filsinger, Sara Teasdele.

TELLY, VINCENT, pseud. SEE Vincentelli,
  Joseph.

TEMPORARY NORTH EASTERN REPORTER DIGEST, including cases reported in volumes 171 to 175 North eastern reporter. Edited by the editorial staff of the American Digest System. © 24Jul31; A41823. West Pub. Co. (PWH); 6Oct58; R222470.

TEMPORARY NORTH WESTERN REPORTER DIGEST, including cases reported in volumes 231 to 235 North western reporter. Edited by the editorial staff of the American Digest System. © 6Jul31; A41824. West Pub. Co. (PWH); 6Oct58; R222469.

TEMPORARY PACIFIC DIGEST OF VOL.291-295
  PACIFIC REPORTER. By the
  editorial staff of the American
  Digest System. © 20May31; A37842.
  West Pub. Co. (PWH); 3Jul58;
  R217546.

TEMPORARY SOUTH WESTERN REPORTER
  DIGEST OF VOL.31-35 SOUTH WESTERN
  REPORTER. Second series. By the
  editorial staff of the American
  Digest System. © 29May31; A37843.
  West Pub. Co. (PWH); 3Jul58;
  R217545.

TERMAN, LEWIS M.

Measurement of interests in relation to human adjustment. SEE Fryer, Douglas.

TERRELL, MARY FIELD.

Bird house to let. © 10Sep31; A41597. Mary Field Terrell (A); 15Sep58; R221999.

TERRETH, COURTENAY.

  Quick millions. Pt.1-6. By
    Courtenay Terreth and Rowland
    Brown. © 14Apr31; AA65876.
    Twentieth Century-Fox Film Corp.
    (PWH); 18Nov58; R225007.

TERRY, CHARLES SANFORD.

  Bach: the historical approach.
    © 16Oct30; A30353. Nancy
    Theodosia Mills (E); 19Aug58;
    R219723.

TERRY, ELLEN.

Ellen Terry and Bernard Shaw; a correspondence. Edited by Christopher St. John, pseud. © 4Sep31; A41552. Public Trustee (E of George Bernard Shaw); 26Sep58; R221657.

TEXAS DECISIONS REPORTED IN SOUTH WESTERN REPORTER, ANNOTATED. Second series. © West Pub. Co. (PWH) v.

  33-34, Jan.-March 1931. © 19May31;
    A370858. 3Jul58; R217521.

  35-36, Mar.-May 1931. © 14Jul31;
    A40801. 6Oct58; R222431.

  37-38, May-June 1931. © 28Sep31;
    A44042. 6Oct58; R222432.

THACKSTON, JAMES F., joint author.

  Human health. SEE Thackston,
    John A.

THACKSTON, JOHN A.

  Human health, by John A. Thackston
    and James F. Thackston. © 24Jun31;
    A40234. John A. Thackston &
    James F. Thackston (A); 28Jul58;
    R218667.

<pb id='347.png' /> THANE, ELSWYTH. SEE Beebe, Elswyth Thane.

THAYER, FRANCIS, pseud. SEE
  Hobson, Francis Thayer.

THOMAS, ELIZABETH P.

  Main currents in American thought.
    SEE Parrington, Vernon Louis.

THOMAS, KATHERYNE COLVIN. SEE
  Whittemore, Katheryne Colvin Thomas.

THOMAS, LOWELL.

Rolling stone, the life and adventures of Arthur Radclyffe Dugmore. Illus. from photos, and paintings by Arthur Radclyffe Dugmore. © 24Sep31; A42976. Lowell Thomas (A); 29Sep58; R222072.

THOMAS, MARGARET LORING.

  The burro's money bag. © 20Jul31;
    A39936. Margaret Loring Thomas
    (A); 19Sep58; R221444.

THOMASON, JOHN W., JR.

J. E. B. Stuart: The Wilderness and Yellow Tavern. (In Scribner's magazine, Oct. 1930) © 19Sep30; B87110. Leda B. Thomason (W); 29Aug58; R220658.

  Jeb Stuart. With illus. & maps by
    the author. © 17Oct30; A29545.
    Leda B. Thomason (W); 19Sep58;
    R221470.

THOMASON, LEDA B.

  J. E. B, Stuart. SEE Thomason,
    John W., Jr.

  Jeb Stuart. SEE Thomason, John
    W., Jr.

THOMPSON, MRS. CHARLES D. SEE Thompson,
  Mary Wolfe.

THOMPSON (EDWARD) CO.

The consolidated laws of New York annotated. SEE Bronaugh, Minor, ed.

THOMPSON (EDWARD) CO. SEE

  McKinney'a consolidated laws of New
    York, annotated.

Uniform laws annotated.

United States code.

United States code annotated.

THOMPSON, MRS. F. E.

  On the edge. SEE De la Mare,
    Walter.

THOMPSON, FRANCIS L.

  Concrete plain and reinforced.
    SEE Taylor, Frederick W.

THOMPSON, HOLLAND, ed. SEE
  The Book of knowledge.

THOMPSON, HOMER C.

Vegetable crops. 2d ed. © 30Jan31; A33600. Homer C. Thompson (A); 6Aug58; R219153.

THOMPSON, JAMES WESTFALL.

Economic and social history of Europe in the later Middle Ages, 1300-1530. (The Century historical series) © 10Oct31; A43342. Martha Landers Thompson (W); 31Oct58; R224028.

THOMPSON, MARTHA LANDERS.

  Economic and social history of
    Europe in the later Middle Ages,
    1300-1530. SEE Thompson, James
    Westfall.

THOMPSON, MARY WOLFE.

  The circle of braves, by Wolf
    Thompson, pseud. © 20Aug31;
    A40992. Mrs. Charles D.
    Thompson (A); 10Oct58; R222856.

THOMPSON, SANFORD E., joint author.

  Concrete plain and reinforced. SEE
    Taylor, Frederick W.

THOMPSON, WOLF, pseud. SEE Thompson,
  Mary Wolfe.

<pb id='294.png' /> THORNDIKE, ASHLEY H.

  The handwriting of the Renaissance.
    SEE Tannenbaum, Samuel A.

THORNE, HAROLD.

Backgammon tactics. © 17Feb31; A33844. Harold Thorne (A); 25Nov58; R225077.

Contract bridge in 20 minutes. With an introd. by Ely Culbertson. Rev. ed. with new rapid index. © on new index; 10Feb31; A33685. Harold Thorne (A); 25Nov58; R225076.

  Culbertson vs. the official system.
    © 24Nov31; A45228. Harold Thorne
    (A); 25Nov58; R225093.

  Ready reference contract.
    © 1Apr31; A36248. Harold Thorne
    (A); 25Nov58; R225085.

THORPE, LILIAN DAY.

How's business? SEE Thorpe, Merle.

  Organized business leadership.
    SEE Thorpe, Merle.

THORPE, MERLE.

  How's business? Foreword by Julius
    H. Barnes. © 22Jul31; A39677.
    Lilian Day Thorpe (W); 26Nov58;
    R225473.

  Organized business leadership.
    Foreword by William Butterworth.
    © 2Sep31; A41409. Lilian Day
    Thorpe (W); 26Nov58; R225474.

THROCKMORTON, ARCHIBALD H.

  Handbook of the Law of contracts.
    SEE Clark, Wm. L., Jr.

THURSTON, HENRY W.

  The dependent child. © 5Nov30;
    A30403. Henry W. Thurston, Jr.
    (C); 29Oct58; R223607.

THURSTON, HENRY W., JR.

  The dependent child. SEE
    Thurston, Henry W.

TILGHER, ADRIANO.

Work, what it has meant to men through the ages (Homo faber) Translated from the Italian by Dorothy Canfield Fisher. © 29Dec30; A31925. Dorothy Canfield Fisher (A); 16Sep58; R221346.

TILLETT, DOROTHY STOCKBRIDGE.

  Murder on the ten-yard line, by
    John Stephen Strange, pseud.
    © 17Sep31; A42971. Dorothy
    Stockbridge Tillett (A); 18Sep58;
    R221553.

TILLMAN, FLORENCE WHITBECK.

  Economic geography of South America.
    SEE Whitbeck, R. H.

TIMBIE, WILLIAM H.

Essentials of electricity; an introductory textbook for school and shop. 2d ed. © 27Aug31; A42067. William H. Timbie (A); 21Nov58; R225545.

TIPPETT, JAMES S.

  Toys and toy makers. Illus. by
    Elizabeth Enright. © 28Oct31;
    A43660. Martha K. Tippett (W);
    17Dec58; R226992.

TIPPETT, MARTHA K.

  Toys and toy makers. SEE Tippett,
    James S.

TISDALL, FREDERICK F.

  The home care of the infant and
    child. © 19Feb31; A34467.
    Mary F. Tisdall (W); 15Sep58;
    R221277.

TISDALL, MARY F.

The home care of the infant and child. SEE Tisdall, Frederick F.

TITTLE, ERNEST FREMONT.

We need religion. © 6Oct31; A44050. Glenna Tittle (W); 13Oct58; R222746.

<pb id='348.png' n='1958_h2/A/1650' /> TITTLE, GLENNA.

  We need religion. SEE Tittle,
    Ernest Fremont.

TITUS, HAROLD.

Present when needed. (In The Elks magazine, Dec. 1931) © 1Dec31; B135993. Harold Titus (A); 2Dec58; R225399.

TOBENKIN, ELI AS.

  In the dark. © 24Sep31; A42977.
    Ellas Tobenkin (A); 29Sep58;
    R222073.

TOBEY, JAMES A.

Riders of the plagues. © 12Sep50; A27552. James A. Tobey (A); 29Aug58; R220419.

TODD, JAMES CAMPBELL.

Clinical diagnosis by laboratory methods. By James Campbell Todd and Arthur Hawley Sanford. 7th ed. © 26Mar31; A36196. Arthur Hawley Sanford (A); 5Nov58; R224258.

TOLLY, ASA ELMER.

The handy lumber reckoner. © 22Apr31; A36808. Asa Elmer Tolly (A); 5Sep58; R221117.

TOMLINSON, FLORENCE MARGARET.

  Norman Douglas. SEE Tomlinson,
    Henry Major.

TOMLINSON, HENRY MAJOR.

Norman Douglas. © 1Oct31; A43330. Florence Margaret Tomlinson (W); 12Nov58; R225107.

TOOPS, HERBERT A., joint author.

  Minnesota mechanical ability tests.
    SEE Paterson, Donald G.

TOTHEROH, DAN.

  The great dark, a play in one act.
    (In The Drama magazine, Feb.
    1931) © 6Feb31; B103472.
    Dan Totheroh (A); 22Oct58;
    R223240.

  Mirthful marionettes, a play for
    children in one act. (In The
    Drama magazine, Apr. 1931)
    © 10Apr31; B110802. Dan Totheroh
    (A); 22Oct58; R223241.

TOWNSEND, REGINALD T., ed.

  The American home book of building.
    SEE Kaufman, Gerald Lynton.

  The American home book of decoration
    downstairs. SEE Eberleln, Harold
    Donaldson.

  The American home book of decoration
    upstairs. SEE Eberlein, Harold
    Donaldson.

  The American home book of furniture.
    SEE Jackson, Alice.

  The American home book of garages.
    SEE Olney, Dorothy.

  The American home book of gardening.
    SEE Barren, Leonard.

  The American home book of heating,
    plumbing and wiring. SEE Whitman,
    Roger B.

  The American home book of kitchens.
    SEE Wangner, Ellen D.

  The American home book of outdoors.
    SEE Wangner, Ellen D.

TRADE ACTIVITIES, INC.

  Trade marks throughout the world.
    SEE Ravenseroft, Byfleet G.

TRASK, MARY PAGE.

  The dimity sweetheart. SEE Maltby,
    Frances Goggin.

TRESSLER, EDITH H.

  English In action. SEE
    Tressler, J. C.

  Grammar in action. SEE
    Tressler, J. C.

  Grammar minimum essentials. SEE
    Tressler, J. C.

<pb id='349.png' /> TRESSLER, J. C.

  English In action. Book 2.
    By J. C. Tressler and George Pope
    Shannon. © on revisions;
    5Jan31; A36336. Edith H.
    Tressler (W); 6Nov58; R224131.

  Grammar in action; with answers.
    © 13Jun31; A40026. Edith H.
    Tressler (W); 6Nov58; R224139.

  Grammar minimum essentials.
    © 10Apr31; A35780. Edith H.
    Tressler (W); 6Nov58; R224130.

  High school handbook of composition.
    SEE Woolley, Edwin C., ed.

TRUGO, LUI, illus.

  The piper's lad. SEE Campbell,
    Harriette R.

TRUSTEES OF THE L. C. PAGE TRUST. SEE
  Coues, William Pearce.
  Harer, Josephine L.

TSANOFF, RADOSLAV A.

The nature of evil. © 6Jan31; A33030. Radoslav A. Tsanoff (A); 5Nov58; R224757.

TUCKER, LOUISE P.

  Main currents in American thought.
    SEE Parrington, Vernon Louis.

TUGWELL, REXFORD GUY.

  Teaching American economic life.
    3d ed. A manual of questions by
    Rexford Guy Tugwell and Donald J.
    Henderson. © 16Oct30; A29983.
    Rexford Guy Tugwell (A); 16Sep58;
    R221341.

TURNER, EILEEN ARBUTHNOT ROBERTSON.

  Four frightened people, by E.
    Arnot Robertson. © 27Apr31,
    AI-15313; 8Oct31, A43716.
    Eileen Arbuthnot Robertson
    Turner (A); 9Oct58; R222677.

TURNER, NANCY BYRD.

  Christmas night; words. (In
    Primary music and worship, no.41)
    © 24Dec30; AA59028. Board of
    Christian Education of the Presbyterian
    Church in the U. S. A.
    (PWH); 8Oct58; R222624.

  Every Christmas night; words.
    (In Primary music and worship,
    no.38) © 24Dec30; AA59026.
    Board of Christian Education of
    the Presbyterian Church in the
    U. S. A. (PWH); 8Oct58; R222623.

  Friends all over the world; words.
    (In Primary music and worship,
    no.65) © 24Dec30; AA59035.
    Board of Christian Education of
    the Presbyterian Church in the
    U. S. A. (PWH); 8Oct58; R222627.

TUTTLE, BRUCE R.

  The lady of Godey's, Sarah Josepha
    Hale. SEE Finley, Ruth E.

TWAIN, MARK.

The adventures of Huckleberry Finn. Edited by Emily Fanning Barry and Herbert B. Bruner. © on new matter; 8Jul31; A39336. Harper & Bros. (PWH); 12Nov58; R225101.

The prince and the pauper. Edited by Emily Fanning Barry and Herbert B. Bruner. (Harper's modern classics) © on pages XI-XXIV & 283-313; 1Oct31; A43043. Harper & Bros. (PWH); 12Nov58; R225106.

TWAIN, MARK, pseud. SEE Clemens,
  Samuel L.

TWENTIETH CENTURY-FOX FILM CORP.

Heartbreak. Book based on a story by Llewellyn Hughes. © 19Oct31; AA80940. Twentieth Century-Fox Film Corp. (PWH); 18Nov58; R225010.

  Over the hill. © 9Nov31; AA94272.
    Twentieth Century-Fox Film Corp.
    (PWH); 18Nov58; R225011.

  Quick millions. SEE Terreth,
    Courtenay.

<pb id='297.png' />
  Sob sister. Book based on the
    Fox picture version of Mildred
    Gilman's novel. © 5Oct31;
    AA79971. Twentieth Century-Fox
    Film Corp. (PWH); 18Nov58;
    R225009.

  Young as you feel. Book based on
    Will Roger's Fox picture from
    play by George Ade. © 30Jun31;
    AA72768. Twentieth Century-Fox
    Film Corp. (PWH); 18Nov58;
    R225008.

TYLER, PAULA F.

  Bauer-Diller-Quaile course. SEE
    Bauer, Harold.

UHLER, JOHN EARLE.

  Cane Juice. © 22Sep31; A41890.
    John Earle Uhler (A); 24Sep58;
    R221704.

ULLMAN, ALLAN.

Rex Cole, Junior, and the crystal clue, by Gordon Chapman, pseud. Illustrated by Richard H. Rodgers. © 18Apr31; A38215. Gordon Chapman (Allan Ullman) (A); 29Dec58; R226973.

  Rex Cole, junior, and the grinning
    ghost. Illustrated by John M.
    Foster. © 11May31; A38216.
    Gordon Chapman (Allan Ullman)
    (A); 29Dec58; R226974.

UNDSET, SIGRID.

  The son avenger. From the Norwegian
    Arthur G. Chater, translator.
    © 5Sep30; A28118. Alfred A.
    Knopf, Inc. (PWH); 12Aug58;
    R219136.

  The wild orchid. Translated by
    Arthur G. Chater. © 25Sep31;
    A41991. Alfred A. Knopf, Inc.
    (PWH); 12Nov58; R225127.

UNIFORM LAWS ANNOTATED. Book 1.
  Edited by Theofor Megaarden.
  © 23Apr31; A38748. Edward Thompson
  Co. (PWH); 3Jul58; R217474.

UNIFORM LAWS ANNOTATED. Supplement 1930. Vol.2, 2A, 3-10. © 23Apr31; A38748, 37941-37945, 40033, 37946-37948. Edward Thompson Co. (PWH); 3Jul58; R217475-217484.

UNION & NEW HAVEN TRUST CO.

  The English Bible as literature.
    SEE Dinsmore, Charles A.

UNITED STATES CODE. April 1931
  pamphlet supplement. Compact ed.
  © 1May31; A37844. West Pub. Co. &
  Edward Thompson Co. (PWH); 3Jul58;
  R217508.

UNITED STATES CODE ANNOTATED. April
  1931 cumulative pamphlet.
  © 28Apr31; A38411. West Pub. Co.
  & Edward Thompson Co. (PWH); 3Jul58;
  R217509.

UPSON, WILLIAM HAZLETT.

Gladwin is willing to accept a position. (In Saturday evening post, Dec. 26, 1931) © 22Dec31; B138507. William Hazlett Upson (A); 24Dec58; R226911.

  I need $300. (In Saturday evening
    post, July 25, 1931) © 21Jul31;
    B122074. William Hazlett Upson
    (A); 23Jul58; R218358.

I've got a responsible job. (In Saturday evening post, Nov. 14, 1931) © 10Nov31; B134167. William Hazlett Upson (A); 12Nov58; R225403.

UTTLEY, MARGUERITE, joint author.

  Across seven seas to seven continents.
    SEE Aitchison, Alison E.

  North America by plane and train.
    SEE Aitchison, Alison E.

<pb id='350.png' n='1958_h2/A/1651' /> VACHELL, HORACE ANNESLEY.

  The best of England. © 15Aug30;
    A26751. Lydia Lyttleton
    Annesley Vachell (C); 11Aug58;
    R219105.

VACHELL, LYDIA LYTTLETON ANNESLEY.

  The best of England. SEE Vachell,
    Horace Annesley.

VAGTS, MIRIAM BEARD.

  On understanding women. SEE
    Beard, Mary Ritter.

VALDES, ARMANDO PALACIO. SEE
  Palacio Valdes, Armando.

VAN AMMERS-KÜLLER, JO. SEE Ammers-Küller,
  Jo Van.

VANCE, LOUIS JOSEPH.

  The lone wolf's son. © 17Jul31;
    A42326. Wilson Beall Vance (C);
    26Aug58; R220506.

  The trembling flame. © 16Mar31;
    A39052. Wilson Beall Vance (C);
    26Aug58; R220502.

VANCE, WILLIAM R.

  Illustrative cases on insurance. SEE
    Cooley, Roger William.

VANCE, WILLIAM REYNOLDS, ed.

  Cases on the interpretation of statutes
    selected from decisions of
    American and English courts. SEE
    De Sloovere, Frederick Joseph.

  Cases on the law of personal property.
    SEE Bigelow, Harry Augustus.

VANCE, WILSON BEALL.

  The lone wolf's son. SEE Vance,
    Louis Joseph.

  The trembling flame. SEE Vance,
    Louis Joseph.

VANDERCOOK, JOHN W.

Forty stay in. © 16Sep31; A42380. John W. Vandercook (A); 3Dec58; R225718.

VAN DEUSEN, ELIZABETH KNEIPPLE, joint
  author.

  Porto Rico. SEE Van Deusen, Richard
    James.

VAN DEUSEN, RICHARD JAMES.

  Porto Rico, a Caribbean isle, by
    Richard James Van Deusen and
    Elizabeth Kneipple Van Deusen.
    © 21May31; A37450. Richard James
    Van Deusen (A); 28Jul58; R218654.

VAN DEVENTER, BETTY.

How to conduct a love affair. © 5Nov30; A29903. Haldeman-Julius Co. (PWH); 3Nov58; R223797.

VAN DE WATER, FREDERIC F.

  The real McCoy. © 8Oct31;
    A42972. Frederic F. Van de
    Water (A); 9Oct58; R222674.

The real McCoy. (In Liberty, June 27, July 11, July 25, Aug. 8, 1931) © 18Jun31, B119494; 2Jul31, B120482; 16Jul31, B122182; 30Jul31, B122830. Frederic F. Van de Water (A); 1Aug58; R219201-219204.

VAN DRUTEN, JOHN.

  A woman on her way. © 30Sep31,
    AI-14481; 6Feb31, A34268. Carter
    Lodge (E); 5Sep58; R220894.

VAN DYKE, DIX.

  The desert. SEE Van Dyke, John
    Charles.

VAN DYKE, JOHN CHARLES.

The desert. With illus. from photos, by J. Smeaton Chase and notes by Dix Van Dyke. Rev. ed. © 3Oct30; A29943. Charles Scribner's Sons (PWH); 19Sep58; R221471.

<pb id='351.png' /> VAN EVERY, EDWARD.

  Sins of America as exposed by the
    Police gazette. With an introd.
    by Thomas Beer. © 29Oct31; A44712.
    Edward J. Van Every & Elizabeth V.
    Moran (C); 22Dec58; R227609.

VAN EVERY, EDWARD J.

  Sins of America as exposed by the
    Police gazette. SEE Van Every,
    Edward.

VAN HORN, CATHERINE.

  History of Greek philosophy. SEE
    Fuller, B. A. G.

VAN METRE, T. W.

Tramps and liners. © 5Nov31; A44972. T. W. Van Metre (A); 19Nov58; R225056.

VAN WYCK, WILLIAM, tr.

  Canterbury tales. SEE Chaucer,
    Geoffrey.

VAN WYHE, HENRIETTA. SEE
  Wyne, Henrietta van.

VASSOS, JOHN.

Ultimo. SEE Vassos, Ruth.

VASSOS, RUTH.

Ultimo, an imaginative narration of life under the earth. With projections by John Vassos © 28Oct70; A30352. Ruth Vassos & John Vassos (A); 21Aug58; R220292.

VAUGHAN, C. WHEATON, joint author.

  Winning backgammon. SEE Nicholas,
    Grosvenor.

VAUQHAN, JAMES D.

  Home-coming welcome. © 1Sep31;
    AA86193. G. Kleffer Vaughan &
    Mrs. W. B. Walbert (C); 8Dec58;
    R226201.

VERCEL, MADELEINE ADAM. SEE
  Cretin, Madeleine Adam.

VERCEL, ROGER, pseud. SEE
  Cretin, Roger.

VERCEL, MME ROGER. SEE Cretin,
  Madeleine Adam.

VERLAG ARS SACRA.

  Liebfauenminne. SEE Lippert,
    Peter.

Maria. SEE Kleine-Natrop, Johannes.

Tage mit Gott. SEE Naegele, P. Beda.

VERNON LAW BOOK CO.

  Cyclopedia of automobile law. SEE
    Blashflald, De Witt Clinton.

  A treatise on the civil code of
    Kansas pleading and practice in
    civil actions and proceedings.
    SEE Dassler, C. F. W.

VERNON LAW BOOK CO. SEE

  Vernon's annotated code of criminal
    procedure of the State of Texas.

  Vernon's annotated penal code of the
    State of Texas.

  Vernon'a annotated revised civil
    and criminal statutes of the
    State of Texas.

  Vernon's annotated revised civil
    statutes of the State of Texas.

VERNON'S ANNOTATED CODE OF CRIMINAL PROCEDURE OF THE STATE OF TEXAS. 1931 cumulative annual pocket parts for volumes 1-3. © 29Jul31; A40783. Vernon Law Book Co. (PWH); 6Oct58; R222459.

VERNON'S ANNOTATED PENAL CODE OF THE STATE OF TEXAS. 1931 cumulative annual pocket parts for volumes 1-3. © 29Jul31; A40782. Vemon Law Book Co. (PWH); 6Oct58; R222458.

<pb id='300.png' />
VERNON'S ANNOTATED REVISED CIVIL AND
  CRIMINAL STATUTES OF THE STATE OF
  TEXAS. April 1931 cumulative quarterly
  pamphlet. © 17Apr31; A38412.
  Vernon Law Book Co. (PWH); 3Jul58;
  R217524.

VERNON'S ANNOTATED REVISED CIVIL AND
  CRIMINAL STATUTES OF THE STATE OF
  TEXAS. 1951 cumulative annual
  pocket part for General Index and
  Tables. © 29Jul31; A40780. Vernon
  Law Book Co. (PWH); 6Oct58;
  R222456.

VERNON'S ANNOTATED REVISED CIVIL
  STATUTES OF THE STATE OF TEXAS.
  1931 cumulative annual pocket
  parts for parts 1 and 2, Constitution,
  Articles. © 29Jul31; A40781.
  Vernon Law Book Co. (PWH); 6Oct58;
  R222457.

VERNON'S ANNOTATED REVISED CIVIL STATUTES OF THE STATE OF TEXAS. 1931 cumulative annual pocket parts for volumes 1-22. © 29Jul31; A40784. Vernon Law Book Co. (PWH); 6Oct58; R222460.

VERPILLEUX, E. A., illus.

  Martine and Michel. SEE Catlin,
    Mrs. G. L.

THE VEST POCKET STANDARD DICTIONARY OF THE ENGLISH LANGUAGE. Abridged from the Funk & Wagnalls Standard dictionary of the English language by James C. Fernald. A new ed., amplified and carefully rev. by Frank H. Vizetelly. © 18Apr31; A38402. Norma Cochrane (C); 19Aug58; R219603.

VESTAL, VIVIAN, joint author.

  Toujours francais cours elementaire.
    SEE Hodges, Helen.

VIEBIG, CLARA.

Der Gefangene, edited with notes, exercises and vocabulary by O. S. Fleissner and E. Mentz Fleissner. © on p.i-xviii, 73-132 & illus.; 1Dec31; A45401. O. S. Fleissner & E. Mentz Fleissner (A); 10Dec58; R226475.

VIGNAUD, JEAN.

Le huitieme peche. © 31Jul31; AF14172. Jean Vignaud (A); 18Aug58; R219678.

VIKING PRESS, INC.

Boners. SEE Abingdon, Alexander.

  From day to day. SEE Goetel,
    Ferdynand.

VILLA, JOSE.

  Given woman. (In Scribner's magazine,
    Dec. 1931) © 20Nov31;
    B135260. Jose Villa (A);
    12Dec58; R226594.

VILLARREAL, J. F., tr.

  Gamble's class method for strings.
    SEE Fischel, Max.

VILLIERS, A. J.

  Sea dogs of today. © 30Oct31;
    A46475. A. J. Villiers (A);
    28Nov58; R225592.

  Vanished fleets. © 6Apr31; A35948.
    A. J. Villiers (A); 25Jul58;
    R218435.

VILLON, FRANCOIS.

Complete works. Translated by J. U. Nicolson. Rev. ed., with an introd. by Lewis Galantiere. © 19May31; A38780. Crown Publishers, Inc. (PWH); 24Dec58; R227305.

VINCENT, E. LEE, joint author.

Growth and development of the young child. SEE Rand, Winifred.

VINCENTELLI, BARBECOT MARCELLE.

  Agence matrimoniale. SEE Vincentelli,
    Joseph.

<pb id='352.png' n='1958_h2/A/1652' /> VINCENTELLI, JOSEPH.

  Agence matrimoniale, sketch
    cinematographique de Vincent
    Telly, pseud. © 1Jun31;
    AF14227. Barbecot Marcelle
    Vincentelli (W); 21Aug58;
    R220021.

VIZETELLY, FRANK H.

  The education of self. SEE Dubois,
    Paul.

VIZETELLY, FRANK H. SEE

  Concise standard dictionary of the
    English language.

  The Vest pocket standard dictionary
    of the English language.

VOGEL, CLAUDE.

  The spiritual direction of sisters.
    SEE Kirsch, Felix M.

VON BERGE, H., ed.

Rally day treasury. © 9Jul31; AA75940. Lorenz Pub. Co. (PWH); 24Nov58; R225782.

VON BERGE, H., ed. SEE

  Christmas suggestion book. No. 5.
    Christmas treasury. No.42.

VON BERNEWITZ, M. W. SEE
  Bernevitz, M. W. von.

VON BÜLOW, HANS GUIDO. SEE Bülow,
  Hans Guido von.

VONIER, ANSCAR.

  The angels. Introd. by S. G.
    Messmer. © 2Apr28, AI-11127;
    4Sep28, A1054078. Thomas Placid
    Hooper (E); 15Mar56; R166490.

  Death and Judgement. Introd. by
    Edwin V. O'Hara. (The Treasury
    of the faith series, 31)
    © 17Oct30, AI-14535; 31Mar31,
    A36216. Thomas Placid Hooper (E);
    1Oct58; R224892.

W., O., pseud. SEE Smith, Marjorie
  Erskine.

WADE, HERBERT TREADWELL, ed. SEE
  The New international year book.

WALDO, EDNA LA MOORE.

  Yet she follows; the story of Betty
    Freeman Dearborn. © 25Sep31;
    A42774. Edna LaMoore Waldo (A);
    18Dec58; R226760.

WALK, SYBIL A.

  A country parson looks at religion.
    SEE Prichard, Harold Adye.

WALKER, EDITH B.

Tales of the first animals, by Edith B. Walker, with the collaboration of Charles C. Mook. Illus. by Jane Banning Bartley. © 5Sep30; A28275. Edith B. Walker (A); 3Jul58; R217261.

WALKER, GERTRUDE M.

  Heating and ventilation. SEE
    Allen, John R.

WALKER, JAMES HERBERT.

  Heating and ventilation. SEE
    Allen, John R.

Piping handbook, by J. H. Walker and Sabin Crocker, with contributions by others. 2d ed. © 13Mar31; A34935. Sabin Crocker (A); 6Aug58; R219157.

WALKER, MARJORIE ERSKINE SMITH.

  God have mercy on me, by Marjorie
    Erskine Smith. © 8Jun31;
    A39063. Marjorie Erskine Smith
    (A); 11Jul58; R217658.

WALKER, ROBERT SPARKS.

  Torchlights to the Cherokees.
    © 15Sep31; A42346. Robert Sparks
    Walker (A); 17Sep58; R221283.

<pb id='353.png' /> WALKER, MRS. RYAN. SEE Walker, Marjorie Erskine Smith.

WALLACE, ANTHONY MICHAEL STIRLING.

I walk alone. SEE Wallace, Kathleen.

WALLACE, ARCHER.

Mothers of famous men. © 2Mar31; A35180. Archer Wallace (A); 4Aug58; R218937.

WALLACE, DILLON.

  The fur traders of Kettle Harbor.
    © 7Nov31; A44929. Leila H.
    Wallace (W); 21Nov58; R225383.

  The lost mine. © 15Nov30; A31226.
    Leila H. Wallace (W); 3Nov58;
    R224026.

WALLACE, EDGAR.

The Arranways mystery. Illustrated by R. F. Schabelitz. (In Hearst's international-cosmopolitan, Sept. 1931-Jan. 1932) © 10Aug31, A5-32940; 10Sep31, A5-34411; 9Oct31, A5-35198; 10Nov31, A5-36194; 10Dec31, A5-36663. Patricia Marion Caldecott Frere (C); 12Dec58; R226655-226659.

  The devil man. © 17Sep31; A43709.
    Patricia Marion Caldecott Frere
    (C); 18Sep58; R221551.

The double crime. (In Illustrated detective magazine, Dec. 1931) © 24Oct31; B132400. Patricia Marion Caldecott Frere (C); 29Oct58; R223986.

His devoted squealer. (In Street & Smith's detective story magazine, Aug. 29-Sept. 26, 1931) (Pub. abroad as The man at the Carlton, in The Daily express, Mar. 16-Apr. 21, 1931) © 16Mar-21Mar31, AI-15076; 23Mar-28Mar31, AI-15107; 30Mar-31Mar, 1Apr-2Apr, 4Apr, 6Apr31, AI-15132; 7Apr-11Apr31, AI-15152; 13Apr-18Apr, 20Apr-21Apr31, AI-15179; 21Aug31, B124552; 28Aug31, B124881; 4Sep31, B127099; 11Sep31, B126437; 18Sep31, B127936. Patricia Marion Caldecott Frere (C); 29Sep58; R222216-222220.

The law of the three just men. © 16Jul31; A39659. Patricia Marion Caldecott Frere (C); 17Jul58; R217819.

The man from Sing Sing. (In Detective story magazine, June 27, 1931) © 19Jun31; B118054. Patricia Marion Caldecott Frere (C); 8Jul58; R217593.

  On the spot. © 12Nov31; A44969.
    Patricia Marion Caldecott Frere
    (C); 19Nov58; R225054.

WALLACE, FRANCIS.

O'Reilly of Notre Dane. © 5Oct51; A43144. Francis Wallace (A); 3Dec58; R226464.

WALLACE, KATHLEEN.

  I walk alone. © 19Mar31; A36315.
    Anthony Michael Stirling Wallace
    (C); 25Sep58; R222085.

WALLACE, LEILA H.

  The fur traders of Kettle Harbor.
    SEE Wallace, Dillon.

The lost mine. SEE Wallace, Dillon.

WALLER, HANNAH. SEE Atkinson, Hannah
  Waller.

WALLER, NORMA LINDERMAN.

  Old man coyote. SEE Linderman,
    Frank B.

WALLING, MARGARET WOOD.

Turning point. SEE Weaver, John V. A.

WALPOLE, HUGH.

Judith Paris. © 28Aug31, AI-15539; 8Oct31, A43767. Rupert Hart-Davis & John Haldane (E); 9Oct58; R222678.

<pb id='303.png' /> WALSH, WILLIAM F.

  Cases on the law of property.
    Vol. 1-2. 3d ed. © 28Aug31,
    A43169; 26Sep31, A43170. Bobbs-Merrill
    Co., Inc. (PWH); 22Dec58;
    R227413-227414.

WALTERS, MAUDE OWENS, ed.

  A book of Christmas stories for
    children. Illustrated by S.
    Perkins. © 3Oct30; A28832.
    Maude Owens Walters (A); 2Jul58;
    R217200.

WALTZINGER, FREDERICK J.

New Jersey probate practice with annotated statutes. Court rules and forms. Vol.2. © 20Apr31; A37136. Soney & Sage Co. (PWH); 3Jul58; R217528.

WANGNER, ELLEN D.

  The American home book of kitchens.
    Edited by Reginald T. Townsend.
    © 22Oct31; A44645. Reginald T.
    Townsend (A); 24Oct58; R223294.

  The American home book of outdoors.
    Edited by Reginald T. Townsend.
    (The American home library)
    © 22Oct31; A44644. Reginald T.
    Townsend (A); 24Oct58; R223393.

WARD, HENSHAW.

Builders of delusion. © 18Mar31; A36350. Florence Ward Wood (W); 15Dec58; R227407.

WARD, LINDA M.

Gun notches. SEE Rynning, Thomas H.

WARD, LYND.

Mad man's drum; a novel in woodcuts. © 3Nov30; A30452. Lynd Ward (A); 22Sep58; R221592.

Stop Tim. SEE McNeer, May.

WARD, MAY YONGE MCNEER.

Waif maid, by May McNeer. Pictures from woodcuts by Lynd Ward. © 21Oct30; A29477. May McNeer Ward (A); 22Sep58; R221591.

WARDE, BEATRICE.

  Golden tales of the Old South.
    SEE Becker, May Lamberton, ed.

WARHURST, FLORA MABEL.

Kindled flame. SEE Pedler, Margaret.

WARNER BROS. PICTURES, INC.

  The public enemy. SEE Glasmon,
    Kubec.

WARREN, DALE.

A modern galaxy short stories. © 7Nov30; A30495. Dale Warren (A); 2Oct58; R221965.

WARREN, JOHN.

Handbook of anatomy, from original dissections. Text by Robert M. Green. Drawings by H. F. Aitken. © 28Oct30; A30450. President & Fellows of Harvard College (PWH); 17Sep58; R221568.

WASHBURN, BRADFORD.

  Bradford on Mt. Fairweather.
    Illustrated by the author.
    © 24Oct30; A30211. Bradford
    Washburn (A); 23Jul58; R218383.

WASHBURN, JANET H.

  The brass keys of Kenwick. SEE
    Seaman, Augusta Huiell.

WATER, FREDERIC F. VAN DE. SEE
  Van de Water, Frederic F.

WATKIN, ROSALIND RAY.

  Introduction to American government.
    SEE Ogg, Frederic A.

WATSON, KENNETH M., joint author.

  Industrial chemical calculations.
    SEE Hougen, Olaf A.

WATT (A. P.) & SON.
  Storm drift. SEE Dell, Ethel M.

<pb id='354.png' n='1958_h2/A/1653' /> WAYNE, KATHRYN.

  Sick room consolers. © 15Sep31;
    AA91853. Wetmore Declamation
    Bureau (PWH); 20Nov58; R225367.

WEAVER, ANNIE VAUGHAN.

  Boochy's wings. © 20Aug31;
    A40994. Annie Vaughan Weaver
    (A); 29Sep58; R222224.

WEAVER, JOHN V. A.

Turning point. © 19Sep30; A27772. Margaret Wood Walling (W); 12Aug58; R219132.

WEAVER, PEGGY WOOD.

Actors and people: both sides of the footlights, by Peggy Wood. © 12Sep30; A27477. Peggy Wood (A); 4Sep58; R220827.

WEBB, AQUILLA.

1000 new illustrations. With an introd. by James A. Barkley. © 30Apr31; A38264. Jane T. Webb (W); 4Aug58; R218943.

WEBB, JANE T.

1000 new Illustrations. SEE Webb, Aquilla.

WEBSTER, CEDRIC.

  Ancient civilization. SEE Webster,
    Hutton.

WEBSTER, ETHEL W.

The timid soul. SEE Webster, H. T.

WEBSTER, H. T.

The timid soul; a pictorial account of the life and times of Casper Milquetoast, with an introd. by Ring Lardner. © 23Mar31; A36071. Ethel W. Webster (W); 24Oct58; R223551.

WEBSTER, HENRY KITCHELL.

The man with the scarred hand. © 30Jan31; A34523. Mary O. Webster (W); 24Nov58; R225017.

WEBSTER, HUTTON.

Ancient civilization. © 12Jun31; A40027. Cedric Webster (C); 6Nov58; R224140.

WEBSTER, MARY O.

  The man with the scarred hand.
    SEE Webster, Henry Kitchell.

WEBSTER, NATALIE PETERS.

  America on stone. SEE Peters,
    Harry T.

WEEKES, AGNES R.

  Esme's sons, by Anthony Pryde,
    pseud. © 24Oct30; A30337.
    Rose K. Weekes (E); 26Sep58;
    R221871.

WEEKKS, ROSE K.

Esme's sons. SEE Weekes, Agnes R.

WEIGALL, ARTHUR.

Nero, the singing emperor of Rome. © 19Sep30; A28469. Muriel Weigall (W); 5Aug58; R218889.

WEIGALL, ARTHUR EDWARD PEARSE BROME.

The life and times of Marc Antony. © 11Sep31; A44688. Muriel Weigall (W); 7Nov58; R224658.

WEIGALL, MURIEL.

  The life and times of Marc Antony.
    SEE Weigall, Arthur Edward Pearse
    Brome.

Nero. SEE Weigall, Arthur.

WEIGERT, DORIT K.

  Iridor complete candy making course.
    Introduction, the Iridor business
    manual, candy manuals, nos.1-4.
    By Dorit K. Weigert and Iris F.
    Leonard. © 25Apr31; A37077.
    Dorit K. Weigert (A); 20Nov58;
    R224961.

<pb id='355.png' /> WEIMAN, JACK.

Call of the siren. SEE Welman, Rita.

Hold up. SEE Weiman, Rita.

WEIMAN, RITA.

Anniversary. (In Liberty, Nov. 14. 1931) © 5Nov31; B133840. Jack Weiman (E); 4Dec58; R225357.

Call of the siren. (In Liberty magazine, Aug. 22, 1931) © 13Aug31; B125251. Jack Weiman (E); 20Aug58; R219882.

WELCH, HOMER, comp. SEE
  New joy in service songs.

WELLS, CAROLYN.

  Horror house. © 5Feb31; A38172.
    Maurice O'Connell, Jr. (E);
    26Aug58; R220501.

  The umbrella murder. © 1Sep31;
    A43772. Maurice O'Connell, Jr.
    (E); 15Sep58; R222002.

WELLS, CAROLYN. SEE Houghton,
  Carolyn Wells.

WELLS, FRANCIS RICHARD.

  The new and revised outline of
    history. SEE Wells, H. G.

  What are we to do with our lives?
    SEE Wells, Herbert George.

  The work, wealth and happiness of
    mankind. SEE Wells, H. G.

WELLS, GEORGE PHILIP.

  The new and revised outline of
    history. SEE Wells, H. G.

  What are we to do with our lives?
    SEE Wells, Herbert George.

  The work, wealth and happiness of
    mankind. SEE Wells, H. G.

WELLS, H. G.

The new and revised outline of history. With maps and plans made specially for this work by J. F. Horrabin. © on revision; 20Nov31; A45615. George Philip Wells & Francis Richard Wells (C); 26Nov58; R225569.

The work, wealth and happiness of mankind. Vol.1-2. © 23Nov31; A44963. George Philip Wells & Francis Richard Wells (C); 26Nov58; R225565.

WELLS, HERBERT GEORGE.

What are we to do with our lives? © 9Oct31; A43708. George Philip Wells & Francis Richard Wells (C); 20Oct58; R223202.

WELLS, RHEA.

  All the camel. Text and drawings
    by Rhea Wells. © 15Oct31;
    A43704. Rhea Wells (A); 3Nov58;
    R224611.

WELMONT, CLIFFORD R.

  Constantinople: Istamboul. SEE
    Edward, George Wharton.

WEMBRIDGE, ELEANOR ROWLAND.

  Life among the lowbrows. © 22Apr31;
    A35982. Eleanor Rowland Wembridge
    (A); 2Jan59; R227604.

WERTENBAKER, CHARLES.

  Before they were men. © 30Oct31;
    A46081. Lael Tucker Wertenbaker
    (W); 1Dec58; R225728.

WERTENBAKER, LAEL TUCKER.

  Before they were men. SEE
    Wertenbaker, Charles.

WEST, ALYCE TUCKER.

  Snappy monologues. SEE Parker, Mary
    Moncure.

WEST, GEOFFREY.

  H. G. Wells. With introd. by H. G.
    Wells. © 26Nov30; A32145.
    Geoffrey West (A); 3Jul58;
    R217112.

<pb id='306.png' /> WEST, JAMES E., ed. SEE The Boy scout's book of true adventure.

WEST, V. SACKVILLE-. SEE Sackville-West, V.

WEST PUB. CO.

  Advance reports. SEE Louisiana.
    Courts of Appeal.

  Cases and materials on the law of
    corporate reorganization. SEE
    Douglas, William O.

  Cases on the interpretation of statutes
    selected from decisions of
    American and English courts. SEE
    De Sloovere, Frederick Joseph.

  Cases on the law of evidence selected
    from decisions of English and
    American courts. SEE Hinton,
    Edward W.

  Cases on the law of personal property.
    SEE Bigelow, Harry Augustus.

  Cumulative annual digest of Pennsylvania
    decisions, 1930. SEE
    Monaghan, James, ed.

  Handbook of the Law of contracts.
    SEE Clark, Wm. L., Jr.

  Handbook of the law of persons and
    domestic relations. SEE Madden,
    Joseph W.

  Handbook of the law of suretyship
    and guaranty. SEE Arant,
    Herschel W.

  Illustrative cases on insurance.
    SEE Cooley, Roger William.

  Illustrative cases on persons and
    domestic relations. SEE Cooley,
    Roger W.

  The judicial process in tort cases.
    SEE Green, Leon.

  Reports of the Louisiana Courts of
    Appeal. SEE Louisiana. Courts of
    Appeal.

Rules for admission to the bar in the several states and territories of the United States. SEE Holmgren, E. S., comp.

WEST PUB. CO. SEE

Abbott New York digest.

Alabama and Southern reporter digest.

American federal tax reports.

  Arkansas decisions reported in
    South western reporter annotated.

The Atlantic reporter.

Atlantic reporter digest.

Connecticut and Atlantic reporter.

Connecticut and Atlantic reporter digest.

Current digest (American digest system)

Delaware and Atlantic reporter digest.

Descriptive word index and table of cases affirmed, reversed or modified.

  Digest of decisions of the Supreme
    Courts of Alabama, Louisiana,
    Florida, Mississippi, and Courts
    of Appeals of Alabama and Louisiana.

Federal digest.

The Federal reporter.

  Florida and Southern reporter
    digest.

  General laws of the state of New
    York.

  Kentucky decisions reported in South
    western reporter.

Kentucky digest.

Louisiana and Southern reporter digest.

Louisiana reports.

Maine and Atlantic reporter digest.

Massachusetts digest.

Michigan digest.

  Mississippi and Southern reporter
    digest.

  Missouri decisions reported in the
    South western reporter annotated.

Missouri digest.

New Jersey and Atlantic reporter.

<pb id='356.png' n='1958_h2/A/1654' />
  New Jersey and Atlantic Reporter
    digest.

New Jersey statute service.

New York annual digest.

The New York supplement.

The North eastern reporter.

The North western reporter.

The Pacific reporter.

  Purdon's Pennsylvania statues
    annotated.

  Rhode Island and Atlantic reporter
    digest.

South eastern reporter.

South western reporter.

Southern reporter.

Southern reporter digest.

Southwestern reporter.

  Temporary North eastern reporter
    digest.

  Temporary North western reporter
    digest.

  Temporary Pacific digest of vol.291-295
    Pacific repoter.

Temporary South western reporter digest of vol.31-35 South western reporter.

Texas decisions reported in South western reporter, annotated.

United States code.

United States code annotated.

WESTCOTT, JAMES EDWARD.

How to putt. © 8Sep30; A28186. James Edward Westcott (A); 29Aug58; R220467.

WESTMACOTT, BERNARD, illus.

  The story of athletics. SEE King,
    Marian.

WETJEN, ALBERT RICHARD.

  Fiddlers' Green; or, The strange
    adventure of Tommy Lawn.
    Illustrations by Ferdinant Huszti
    Horvath. © 11May31; A37308.
    Joan Crawford (E); 7Jul58;
    R217213.

WETMORE DECLAMATION BUREAU.

  The absent minded professor. SEE
    Harbour, J. L.

  At the lace counter. SEE Henderson,
    Gladys.

  Beneath the make-up. SEE Hensinger,
    Clayton F.

  Boys will be boys. SEE Harbour,
    J. L.

  The bride and the broom. SEE
    Henderson, Gladys.

  Choir practice. SEE Seeman,
    Clara Lewis.

  Dog of war. SEE Davenport,
    Samuel R.

  Dotty drives a bargain. SEE
    Henderson, Gladys.

  Glory for sale. SEE Alexander,
    Ruth.

  Gwendolyn meets the dentist. SEE
    Henderson, Gladys.

  Joey's friend. SEE Black, Leota
    Hulse.

  Let brotherly love continue. SEE
    Black, Leota Hulse.

Ma by bus. SEE Black, Leota Hulse.

  Ma's berth night. SEE Black,
    Leota Hulse.

  Ma's Sabbath mourn. SEE Black,
    Leota Hulse.

Me and Skinny. SEE Harbour, J. L.

  The OO-la-la hat. SEE Henderson
    Gladys.

  Sick room consolers. SEE
    Wayne, Kathyrn.

  Taking Joy home. SEE Alexander,
    Ruth.

WHEELER, ADALINE E.

  Demons of the dust. SEE Wheeler
    William Morton.

WHEELER, RALPH E.

  Demons of the dust. SEE Wheeler,
    William Morton.

<pb id='357.png' /> WHEELER, WILLIAM MORTON.

  Demons of the dust. © 11Dec30;
    A33433. Mrs. William Morton
    Wheeler (W), Adaline E. Wheeler &
    Ralph E. Wheeler (C); 3Jul58;
    R217113.

WHEELER, MRS. WILLIAM MORTON.

  Demons of the dust. SEE Wheeler,
    William Morton.

WHEEN, ARTHUR WESLEY, tr.

  The road back. SEE Remarque, Erich
    Maria.

WHITBECK, R. H.

Economic geography of South America. 2d ed. © 6Jan31; A32694. Florence Whitbeck Tillman (C); 6Aug58; R219147.

WHITE, ARED.

  The spy net. © 4Feb31; A34346.
    Henrietta Diana White (W); 2Jan59;
    R227597.

WHITE, E. B.

  Colonel Woodcock's caller. (In The
    New Yorker, Sept. 19, 1931)
    © 18Sep31; B127973. E. B. White
    (A); 26Nov58; R225467.

  Fatal interview. (In The New Yorker,
    May 23, 1931) © 22May31; B115838.
    E. B. White (A); 26Nov58; R225462.

  A father does his best. (In The New
    Yorker, June 20, 1931) © 19Jun31;
    B119171. E. B. White (A);
    26Nov58; R225464.

  Hark! Hark! the turncoats. (In
    The New Yorker. Dec. 5, 1931)
    © 4Dec31; B136402. E. B. White
    (A); 17Dec58; R226997.

  Harvest of half truths. (In The
    New Yorker, Nov. 28, 1931)
    © 27Nov31; B135588. E. B. White
    (A); 3Dec58; R225712.

  The key of life. (In The New Yorker,
    Oct. 10, 1931) © 9Oct31; B130033.
    E. B. White (A); 26Nov58; R225469.

  The near-demise of Mrs. Coe. (In
    The New Yorker, Feb. 21, 1931)
    © 20Feb31; B104946. E. B. White
    (A); 26Nov58; R225458.

  The timid Nautilius. (In The New
    Yorker, Mar. 28, 1931)
    © 27Mar31; B107984. E. B. White
    (A); 26Nov58; R225459.

  The wings of Orville. (In The New
    Yorker, Aug. 8, 1931) © 7Aug31;
    B122839. E. B. White (A);
    26Nov58; R225466.

WHITE, HENRIETTA DIANA.

The spy net. SEE White, Ared.

WHITE, NELIA GARDNER.

  Hathaway House. © 13Aug31;
    A40764. Ralph White (Wr);
    15Sep58; R221145.

  Toni of Grand Isle. © 15Aug30;
    A28187. Nelia Gardner White (A);
    11Aug58; R219185.

WHITE, PERCIVAL.

Marketing research technique. © 28Oct31; A43669. Percival White (A); 17Dec58; R226995.

WHITE, RALPH.

  Hathaway House. SEE White Nelia
    Gardner.

WHITE, WALLACE.

  Trade marks throughout the world.
    SEE Ravenscroft, Byfleet G.

WHITE, WILLIAM WALLACE, joint author.

  Trade marks throughout the world.
    SEE Ravenscroft, Byfleet G.

WHITFIELD, PRUDENCE VAN TINE.

Silver wings. SEE Whitfield, Raoul.

WHITFIELD, RAOUL.

Silver wings. Frank Dobins, illustrator. © 5Sep30; A28115. Prudence van Tine Whitfield (W); 12Aug58; R219135.

<pb id='309.png' /> WHITLOCK, BRAND.

  The little green shutter.
    © 24Jul31; A40490. J. L. Brainerd
    (E); 13Nov58; R225327.

  Narcissus; a Belgian legend of Van
    Dyck. © 21Aug31; A41203. J. L.
    Brainerd (E); 13Nov58; R225322.

WHITMAN, ROGER B.

The American home book of heating, plumbing and wiring. Edited by Reginald T. Townsend. (The American home library) © 22Oct31; A43718. Reginald T. Townsend (A); 24Oct58; R223385.

WHITMAN PUB. CO.

One hundred best poems for boys and girls. SEE Barrows, Marjorie, comp.

WHITON, LOUIS C.

  The climbing path, by Louis C.
    Whiton and Corinne Harris Markey.
    © 17Apr31; A35912. Corinne Harris
    Markey (A); 1Aug58; R220328.

WHITTEMORE, KATHERYNE COLVIN THOMAS.

  Asia, the great continent, by
    Katheryne Colvin Thomas.
    © 4Nov31; A43891. Katheryne
    Thomas Whittemore (Katheryne
    Colvin Thomas) (A); 21Nov58;
    R225022.

WHORF, RICHARD B.

Time to make up. © 19Nov30; A32111. Richard B. Whorf (A); 3Jul58; R217180.

WIDDEMER, MARGARET.

All the king's horses. © 6Nov30; A29880. Margaret Widdemer (A); 3Jul58; R217208.

WIDGER, HOWARD DEFOREST, ed.

  Speech on conciliation with America.
    SEE Burke, Edmund.

WIDGER, LOIS.

  Speech on conciliation with America.
    SEE Burke, Edmund.

WIECHARD, ANGELA C.

The little singers song book. © 13Jul31; AA74351. Angela C. Wiechard (A); 12Nov58; R225179.

WIESE, KURT.

  Joe buys nails. © 29Oct31;
    A44651. Kurt Wiess (A); 17Nov58;
    R225052.

  More to and again. SEE Brooks,
    Walter R.

Wallie, the walrus. Written and illustrated by Kurt Wiese. © 10Nov30; A30580. Kurt Wiese (A); 24Jul58; R218412.

WIGGIN, KATE DOUGLAS SMITH.

Mother Carey's chickens. With illus. by Elizabeth Shippen Green Elliots Bookshelf ed. © on illus.; 7Nov30; A30496. Houghton Mifflin Co. (PWH); 2Oct58; R221966.

WILBER, BERTHA S., joint author.

  Objective tests in English. SEE
    Satterfield, Mabel S.

WILDER, RUSSELL M.

  A primer for diabetic patients. 4th
    ed., rev. © 28Oct30; A29693.
    Russell M. Wilder (A); 17Jul58;
    R218137.

WILKINS, LAWRENCE A.

Intermediate Spanish reader. © 21Apr31; A38200. Opal Wilkins Gray (W); 28Jul58; R218658.

WILLIAMS, BEN AMES.

  An end to mirth. © 1May31;
    A37215. Florence Talpey Williams
    (W); 25Nov58; R225087.

<pb id='358.png' n='1958_h2/A/1655' />
  Pirate's purchase. © 2Oct31;
    A43829. Florence Talpey Williams
    (W); 25Nov58; R225092.

WILLIAMS, BRENDAN.

Go marry. © 9Apr31, AI-15055; 15Jun31, A40347. Brendan Williams (A); 17Jul58; R218097.

WILLIAMS, FLORENCE TALPEY.

  An end to mirth. SEE Williams,
    Ben Ames.

  Pirate's purchase. SEE Williams,
    Ben Ames.

WILLIAMS, GERTRUDE MARVIN.

  The passionate pilgrim; a life of
    Annie Besant. © 29Jan31;
    A34082. Gertrude Marvin Williams
    (A); 19Nov58; R225040.

WILLIAMS, JESSE FEIRING.

Personal hygiene applied. 4th ed., reset. © 25Aug31; A42028. Jesse Feiring Williams (A); 25Nov58; R224972.

A text-book of physical education, by Jesse Feiring Williams ard Whitelaw Reid Morrison. © 26Jun31; A40200. Jesse Feiring Williams (A); 3Dec58; R225538.

WILLIAMS, JOHN M.

Half-hour book. Book 1. © 22Jun31; A39077. John M. Williams (A); 3Jul58; R217256.

WILLIAMS-ELLIS, AMABEL.

Voyage of the Beagle; adapted from the narratives and letters of Charles Darwin and Capt. Fitz Roy. Illustrated by Kaj Klitgaard. © 22Sep31; A44509. Amabel Williams-Ellis (A); 10Oct58; R222861.

WILLIAMSON, HAMILTON.

  Lion cub. With pictures by Berta
    and Elmer Hader. © 17Sep31;
    A41782. Berta H. & Elmer S.
    Hader (A); 18Sep58; R221541.

WILLIS, BESS GOE, illus.

  Patient Pat joins the circus. SEE
    Knowles, May Wynne.

WILLIS, CARRIE HUNTER.

  The story of Virginia, by Carrie
    Hunter Willis and Lucy S.
    Saunders. © 12Sep30; A39841.
    Carrie Hunter Willis (A); 21Aug59;
    R219950.

WILLOUGHBY, RAYMOND R.

  Willoughby E M scale. © 26Jan31;
    AA61878. Raymond R. Willoughby
    (A); 16Dec58; R226604.

WILSON, BERENICE.

  Temperamental Jane. SEE Wilson,
    Grove.

WILSON, DESEMEA NEWMAN.

Heart's garrison, by Diana Patrick, pseud. © 11Oct30, AI-14588; 10Apr31, A35755. Desemea Newman Wilson (Diana Patrick) (A); 7Aug58; R219122.

WILSON, EDMUND.

In our time. SEE Hemingway, Ernest.

WILSON, EULALIE, illus.

  Fairy tales that never grow old.
    SEE Piper, Watty, ed.

  Mother Goose rhymes. SEE Piper,
    Watty, ed.

WILSON, GROVE.

Temperamental Jane; the strange story of Carlyle's wife. © 25Sep31; A41926. Mrs. Grove (Berenice) Wilson (W); 8Oct58; R222596.

WILSON, MRS. GROVE. SEE Wilson,
  Berenice.

<pb id='359.png' /> WILSON, MAUD H. MELLISH, ed.

Collected papers of the Mayo Clinic and the Mayo Foundation. SEE Mayo Clinic, Rochester, Minn.

WILSON, SINCLAIR J., joint author.

  Plane geometry workbook. SEE
    Herberg, Theodore.

WILSTACH, PAUL.

Mount Vernon, Washington's home and the nation's shrine. Pref. by Alice Haliburton Richard. Illus. by Henry H. Saylor and others. 4th ed. © 29Oct30; A30679. Arthur Heller (E); 22Aug58; R220332.

WING, MONICA SHANNON.

  Tawnymore, by Monica Shannon.
    Illustrated by Jean Charlot.
    © 17Sep31; A42491. Monica
    Shannon Wing (A); 18Sep58;
    R221542.

WINGATE, CHARLES E. L.

  One hundred best novels condensed.
    SEE Grozier, Edwin Atkins, ed.

WIRT, MILERED A. SEE
  Benson, Mildred A. Wirt.

WISE, JAMES WATERMAN.

  The great betrayal. SEE Wise,
    Stephen S.

WISE, STEPHEN S.

The great betrayal, by Stephen S. Wise and Jacob de Haas. © 1Dec30; A31416. Justine Wise Polier & James Waterman Wise (C); 23Oct58; R223646.

WITHAM, R. ADELAIDE, ed.

  As you like it. SEE Shakespeare,
    William.

WITMARK (M.) & SONS.

  Stage guide for young Handel of
    Hanover. SEE Boswell, Helen.

WODEHOUSE, P. G.

  If I were you. © 3Sep31; A42232.
    P. G. Wodehouse (A); 11Sep58;
    R221219.

  The medicine girl. (In Collier's,
    July 4-Aug. 1, 1931) © 15Jun31,
    B119161; 22Jun31, B119488; 30Jun31,
    B119847; 7Jul31, B120476; 13Jul31,
    B120816. P. G. Wodehouse (A);
    15Jul58; R217823-217827.

  The missing mystery. (In American
    magazine, Dec. 1931) © 28Oct31;
    B133086. P. G. Wodehouse (A);
    29Oct58; R223987.

  The smile that wins. (In American
    magazine, Oct. 1931) © 27Aug31;
    B127108. P. G. Wodehouse (A);
    29Oct58; R223984.

  The voice from the past. (In
    American magazine, Nov. 1931)
    © 28Sep31; B128671. P. G.
    Wodehouse (A); 29Oct58; R223985.

WOOD, CHARLES ERSKINE SCOTT.

  Too much government. © 29Jan31;
    A33516. Mrs. Charles Erskine
    Scott Wood (W); 5Dec58; R225979.

WOOD, MRS. CHARLES ERSKINE SCOTT.

  Too much government. SEE Wood,
    Charles Erskine Scott.

WOOD, FLORENCE WARD.

  Builders of delusion. SEE Ward,
    Henshaw.

WOOD, PEGGY. SEE Weaver, Peggy Wood.

WOODMAN, A. G.

Food analysis. 3d ed. © 20Feb31; A33993. A. G. Woodman (A); 6Aug58; R219156.

WOODSIDE, FREDA S.

  Style in singing and song interpretation.
    SEE Woodside, James.

<pb id='312.png' /> WOODSIDE, JAMES.

  Style in singing and song interpretation.
    © 26May31; A39216.
    Freda S. Woodside (W); 4Nov58;
    R224298.

WOOLEY, C. LEONARD.

  Digging up the past. © 7Nov30,
    AI-14515; 23Jan31, A34162.
    C. Leonard Wooley (A); 23Oct58;
    R223550.

WOOLLEY, CHARLES C.

  High school handbook of composition.
    SEE Woolley, Edwin C., ed.

WOOLLEY, EDWIN C., ed.

  High school handbook of composition,
    edited by Edwin C. Woolley,
    Franklin W. Scott and J. C.
    Tressler. © 5Feb31; A35222.
    Charles C. Woolley (C); 6Nov58;
    R224128.

WORSHAM, JAMES A.

Low pressure selling. © 30Dec30; A32817. Juanita Worsham (W); 1Dec58; R225672.

WORSHAM, JUANITA.

  Low pressure selling. SEE Worsham,
    James A.

WORTS, GEORGE F.

  Phantom president. (In Blue book,
    Nov. 1931) © 1Oct31; B129613.
    George F. Worts (A); 15Dec58;
    R226580.

WREN, ISABLE.

  Sowing glory. SEE Wren, Percival
    Christopher, ed.

WREN, PERCIVAL CHRISTOPHER, ed.

  Sowing glory; the memoirs of Mary
    Ambree, the English woman-legionary.
    © 27Aug31; A41402.
    Isable Wren (W); 15Sep58; R221147.

WRIGHT, ALFRED A.

Sentence craft, by Alfred A. Wright and Alfred M. Hitchcock. © 15Jun31; A39056. Alfred A. Wright (A) & Harriet H. Hitchcock (W); 28Jul58; R218662.

WRIGHT, KATHARINE MCGIFFERT, ed.

  In the Arabian desert. SEE
    Musil, Alois.

WRIGHT, WILLIAM MASON, JR.

  The art of drinking; or, What to
    make with what you have, by
    Dexter Mason, pseud. © 31Jul30;
    A25753. William M. Wright, Jr.
    (A); 3Jul58; R217262.

WU MING FU.

  The wisdom of Wu Mlng Fu. Edited by
    Stanwood Cobb. © 30Oct31;
    A45002. Stanwood Cobb (A);
    28Nov58; R225587.

WYETH, N. C., illus.

  Jinglebob. SEE Rollins, Philip
    Ashton.

WYLIE, I. A. R.

House that Jack built. (In Saturday evening post, Oct. 3, 1931) © 29Sep31; B129504. I. A. R. Wylie (A); 30Sep58; R222183.

WYLIE, PHILIP.

The murderer Invisible. © 8Jan31; A32711. Philip Wylie (A); 24Jul58; R218500.

WYNNE, MAY. SEE Knowles, May Wynne.

WYNNE, PAMELA, pseud. SEE
  Scott, Winifred Mary.

YALE, ELSIE DUNCAN.

The triad. SEE Hall, J. Lincoln.

<pb id='360.png' n='1958_h2/A/1656' /> YALE, ELSIE DUNCAN. SEE Children's day helper.

YALE UNIVERSITY.

  The Journal of James Boswell. SEE
    Boswell, Janes.

  Private papers of James Boswell
    from Malahide Castle. SEE
    Boswell, James.

YATES, DORNFORD, pseud. SEE Mercer,
  C. W.

YEATMAN, ROBERT JULIAN, joint author.

1066 and all that. SEE Sellar, Walter Carruthers.

YEATS-BROWN, FRANCIS.

The lives of a Bengal Lancer. © 1Nov30; A30548. Olga Yeats-Brown (W); 17Jul58; R218212.

YEATS-BROWN, OLGA.

  The lives of a Bengal Lancer. SEE
    Yeats-Brown, Francis.

YELLOTT, A. R., ed. SEE

  Michie's digest of Virginia and
    West Virginia reports.

<pb id='361.png' /> YORK, DOROTHEA.

Mud and stars. Australian chap. by Arthur Boughton. © 9Sep31; A41547. Dorothea York (A); 16Sep58; R221570.

YORKE, DANE.

  Shakespeare's New England. (In The
    American mercury, Jan. 1931)
    © 24Dec30; B98716. Dane Yorke
    (A); 25Nov58; R225228.

YOUMANS, N. O., pseud. SEE
  Marnle, Allen C.

YOUNG, GORDON.

Fighting blood. (In Short stories, Nov. 10-Dec. 25, 1931) © 26Oct31, B133091; 10Nov31, B134401; 25Nov31, B135548; 10Dec31, B137482. Pearl Young (W); 12Dec58; R226869-226872.

YOUNG, KIMBALL, ed.

Social attitudes, by L. L. Bernard, Emory S. Bogardus, Ernest W. Burgess and others. Edited, with an introd. by Kimball Young. © 6Apr31; A35947. Emory S. Bogardus (A); 25Jul58; R218434.

YOUNG, PEARL.

Fighting blood. SEE Young, Gordon.

<pb id='315.png' /> YOUNG, STARK.

  The street of the islands. Woodcuts
    by Ilse Bischoff. © 19Sep30;
    A29145. Stark Young (A); 29Aug58;
    R220422.

YVAIN, MAURICE.

  Costes a fait pouet! pouet!
    Paroles de Phylo, pseud. of
    Alfred Mollex. Musique de Maurice
    Yvain. © 15Sep30; AF10497.
    Camille Calmet (E); 19Mar58;
    R210693.

ZIMMERMAN, CARLE C., joint ed.

A systematic source book in rural sociology. SEE Sorokin, Pitirim A., ed.

ZINK, HAROLD.

City bosses in the United States; a study of twenty municipal bosses. © 1Nov30; A29906. Harold Zink (A); 14Oct58; R222794.

ZSOLNAY (PAUL) VERLAG G.M.B.H.

  Ihr Glück, ihr Elend. SEE
    Schaffner, Jakob.

*** END OF THE PROJECT GUTENBERG EBOOK U.S. COPYRIGHT RENEWALS, 1958 JULY - DECEMBER ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

• You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

• You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

• You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

• You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.