The Project Gutenberg eBook of U.S. Copyright Renewals, 1953 January - June

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: U.S. Copyright Renewals, 1953 January - June

Author: Library of Congress. Copyright Office

Release date: March 1, 2004 [eBook #11807]
Most recently updated: October 28, 2024

Language: English

Credits: Produced by Michael Dyck, Charles Franks, Liz Hanks, pourlean, and the Online Distributed Proofreading team, using page images supplied by the Universal Library Project at Carnegie Mellon University

*** START OF THE PROJECT GUTENBERG EBOOK U.S. COPYRIGHT RENEWALS, 1953 JANUARY - JUNE ***

<pb id='001.png' n='1953_h1/A/0303' />

RENEWALS

An alphabetical list, under main headings (author, editor, compiler, etc., or title), of works in Class A for which the renewal copyright was registered during the period covered by this catalog. Joint authors, editors, etc., are represented by cross-references leading to the respective main headings. Information relating to both the original and renewal registrations is included in each entry.

A. E., pseud. SEE Russell, George William.

ABAILARD, PIERRE.

The letters of Abelard and Heloise; translated from the Latin by C. K. Scott Moncrieff, with a prefatory letter by George Moore. (The Blue jade library) © 19Feb26, (pub. abroad 17Sep25, AI-7349), A883674. R112040, 15May53, Alfred A. Knopf, inc. (PWH)

Love letters of Abelard and Heloise, edited by Lloyd E. Smith. (Little blue book, no. 871) © 31Aug25, A867103. R111277, 23Apr53, Haldeman-Julius Co. (PWH)

ABBOT, CHARLES G.

  The earth and the stars. © 2Sep25,
    A864710. R112347, 20May53,
    Charles G. Abbot (A)

ABBOTT, AUSTIN.

  Digest of all the New York reports.
    Third supplement, 1918-1924. Vol.
    1-3. © The Lawyers Co-operative
    Pub. Co. (PCW)

    v. 1. © 2Feb26, A890118. R110633,
      20Apr53.

    v. 2. © 2Feb26, A890119. R110634,
      20Apr53.

    v. 3. © 5Apr26, A883972. R110632,
      20Apr53.

Digest of all the New York reports, 1924. © 21May25, A855369. R110611, 20Apr53, The Lawyers Co-operative Pub. Co. (PCW)

ABBOTT, CHARLES D.

Howard Pyle, a chronicle; with an introd. by N. C. Wyeth, and many illus. from Howard Pyle's works. © 2Dec25, A872720. R104881, 30Dec52, Charles D. Abbott (A)

ABBOTT AND WALKER, INC.

  Laundry advertising campaign. (Sweet
    and clean series) © 4Aug25,
    A865482. R113237, 11Jun53, Local
    Trademarks, inc. (PWH)

ABT, ISAAC A., ed.

  Pediatrics, v. 6-7. © W. B. Saunders
    Co. (PCW)

    v. 6. © 20Mar25, A823568. R106479,
      29Jan53.

    v. 7. © 27May25, A829450. R106481,
      29Jan53.

ADAMS, ALICE D., ed.

  Peloubet's Bible dictionary. R105884.
    SEE Smith, Sir William.

<pb id='002.png' /> ADAMS, GEORGE WENDELL SEE

Trustees under the Will of Mary Baker Eddy.

ADAMS, HARRIET S.

  The city beyond the clouds. R109684.
    SEE Stratemeyer, Edward.

ADAMS, HENRY FOSTER.

  The ways of the mind. © 10Jan25,
    A814641. R104946, 6Jan53, Henry
    Foster Adams (A)

ADAMS, JOHN, Pres. U. S.

  Correspondence of John Adams and
    Thomas Jefferson, 1812-1826,
    selected with comment by Paul
    Wilstach. © 22Sep25, A869293.
    R106637, 2Feb53, Arthur Hellen (E)

ADAMS, LEONIE.

  Those not elect. © 12Sep25,
    A864692. R107711, 19Feb53,
    Leonie Adams (A)

ADAMS, SAMUEL HOPKINS.

  The piper's fee. © 26Jan26, A883364.
    R107753, 20Feb53, Samuel Hopkins
    Adams (A)

AGNEW, HUGH E.

Cooperative advertising by competitors. © 21May26, A891535. R112794, 1Jun53, Hugh E. Agnew (A)

AIKENS, ELIZABETH MCCONATHY

  Listening lessons in music. R105711.
    SEE Fryberger, Agnes Moore.

  The symphony series of programs for
    school and community orchestras.
    R106248 … SEE Stock, Frederick.

ALABAMA

  Report of cases argued and determined
    in the Court of Appeals of Alabama.
    R105338. SEE Alabama. Court of
    Appeals.

  Report of cases argued and determined
    in the Supreme Court of Alabama.
    R109788. SEE Alabama. Supreme
    Court.

ALABAMA. COURT OF APPEALS.

Report of cases argued and determined in the Court of Appeals of Alabama. Vol. 20, October terms, 1923-1924, 1924-1925. By Noble H. Seay, reporter. © 17Oct25, A875863. R105338, 5Jan53, State of Alabama (PWH)

ALABAMA. SUPREME COURT.

  Report of cases argued and determined
    in the Supreme Court of Alabama.
    Vol. 213, October terms, 1924-1925,
    1925-1926. By Noble H. Seay,
<pb id='003.png' />
    reporter. © 17Feb26, A891337.
    R109788, 3Apr53, State of Alabama
    (PWH)

ALCOTT, LOUISA M.

  Jo's boys, and how they turned out.
    With illus. by Clara M. Burd. (The
    Beacon Hill bookshelf) © on illus.;
    12Aug25, A861416. R112130, 14May53,
    Clara M. Burd (A)

ALÈS, ADHÉMAR D', éd.

Dictionnaire apologétique de la foi catholique. R111456. SEE Dictionnaire apologétique de la foi catholique.

ALEXANDER, C. C.

Let heaven's sunshine in, by C. C. Alexander and J. L. Holland. (In Signal bells for the song service) © 5Jan25, A878604. R104972, 22Dec52, Virginia A. Cothron (C)

ALLEN, ANNE ANDREWS

  Earth moods. R109741. SEE
    Allen, Hervey.

ALLEN, EDWARD S.

  Six place tables. 2d ed. © 7Dec25,
    A872805. R109490, 30Mar53, Edward
    S. Allen (A)

ALLEN, HELEN L.

  Heat engines. R109488. SEE Allen,
    John R.

ALLEN, HERVEY.

Earth moods, and other poems. © 15May25, A855216. R109741, 3Apr53, Anne Andrews Allen (W)

ALLEN, IDA C. BAILEY.

  Your foods and you; or, The role of
    diet. Illustrated by Edward M.
    Stevenson. © 5Mar26, A890213.
    R108716, 13Mar53, Ida C. Bailey
    Allen (A)

ALLEN, JOHN R.

Heat engines, by John R. Allen and Joseph A. Bursley. 3d ed. © 2Jul25, A861020. R109488, 30Mar53, Helen L. Allen (C) Margery B. Angst, Rebecca B. Winder & Anne B. Steed (C of J. A. Bursley)

ALLEN, LUCY G.

  A book of hors d'oeuvres. © 4Nov25,
    A869894. R112115, 13May53, Lucy
    G. Allen (A)

ALLEN, MARY B.

  Understanding the Bible. R106044.
    SEE Ballantine, William Gay.

<pb id='004.png' n='1953_h1/A/0304' /> ALLEN, PHILIP SCHUYLER, tr.

  The adventures of Remi. R112849.
    SEE Malot, Hector Henri.

ALLTON, JAMES MILLER, joint author

  Blacksmithing. R111895. SEE
    Selvidge, Robert W.

ALSBERG, HENRY G., tr.

  The dybbuk. R112095. SEE
    Rappoport, Solomon.

AMERICAN BAR ASSOCIATION. COMMITTEE ON AMERICAN CITIZENSHIP.

American citizenship, by John W. Davis, Philip Cook [and others] © 12Aug25, A864392. R112139, 19May53, Thomas Y. Crowell (PCW)

AMERICAN COUNCIL ON EDUCATION.

  French test, F-10, pt. 1, form A.
    Vocabulary by V. A. C. Henmon;
    grammar by Algernon Coleman.
    Experimental ed. © 10Nov25,
    A881764. R108375, 3Mar53, American
    Council on Education (PWH)

  French test, F-10, pt. 1, form B.
    Vocabulary by V. A. C. Henmon;
    grammar by Algernon Coleman.
    Experimental ed. © 29Dec25,
    A881763. R108374, 3Mar53, American
    Council on Education (PWH)

French test, F-10, pt. 2, form A, by Algernon Coleman. Experimental ed. © 10Nov25, A881765. R108376, 3Mar53, American Council on Education (PWH)

  German test, G-10, pt. 1, form A.
    Vocabulary by V. A. C. Henmon;
    grammar by B. Q. Morgan. Experimental
    ed. © 2Dec25, A881762.
    R108373, 3Mar53, American Council
    on Education (PWH)

  German test, G-10, pt. 1, form B.
    Vocabulary by V. A. C. Henmon;
    grammar by B. Q. Morgan. Experimental
    ed. © 8Dec25, A881760.
    R108372, 3Mar53, American Council
    on Education (PWH)

AMERICAN digest annotated.
  Vol. 23A, 1925. © 22Jan26, A883558. R109749,
  3Apr53, West Pub. Co. (PWH)

AMERICAN digest main heads, divisions and subdivisions of classification scheme and scope notes. 5th ed. © 2Jan26, A883563. R109751, 3Apr53, West Pub. Co. (PWH)

AMERICAN Federal tax reports. Vol. 5, no. 4, Nov. 1925; v. 5, no. 5, Feb. 1926. © West Pub. Co. (PWH)

  v. 5, no. 4. © 25Nov25, A875847.
    R105324, 5Jan53.

  v. 5, no. 5. © 26Feb26, A891315.
    R109768, 3Apr53.

AMERICAN LAW BOOK COMPANY

  Corpus juris. R105351 … SEE
    Corpus juris.

  Cyclopedia of law and procedure.
    R109761. SEE Cyclopedia of law
    and procedure.

AMERICAN law reports annotated.
  Editors: Burdett A. Rich and M.
  Blair Wailes. Consulting editor:
  William M. McKinney. Managing
  editors: H. Noyes Greene, Henry P.
  Farnham, and George H. Parmele.
  Vol. 36-40. © The Lawyers Co-operative
  Pub. Co. & Bancroft-Whitney
  Co. (PCW)

  v. 36. © 18Jun25, A829835.
    R110610, 20Apr53.

  v. 37. © 21Aug25, A861566.
    R110613, 20Apr53.

<pb id='005.png' />
  v. 38. © 17Oct25, A872086.
    R110615, 20Apr53.

  v. 39. © 9Dec25, A875492.
    R110618, 20Apr53.

  v. 40. © 3Mar26, A879833.
    R110630, 20Apr53.

AMERICAN law reports annotated. Editors: Henry P. Farnham and M. Blair Wailes. Consulting editor: William M. McKinney. Managing editors: H. Noyes Greene and George H. Parmele. Vol. 41. © 28Apr26, A890590. R111634, 4May53, The Lawyers Co-operative Pub. Co. & Bancroft-Whitney Co. (PCW)

AMERICAN law reports annotated. Blue book of supplemental decisions, 1926, for annotations in American law reports, v. 1-39. © 13Feb26, A879587. R110629, 20Apr53, The Lawyers Co-operative Pub. Co. & Bancroft-Whitney Co. (PCW)

AMERICAN law reports annotated. Cumulative index. Combining cases and annotations. Vol. 34-36, 34-37, 34-38, 40-41. © The Lawyers Co-operative Pub. Co. & Bancroft-Whitney Co. (PCW)

  v. 34-36. © 18Jun25, A829834.
    R110609, 20Apr53.

  v. 34-37. © 21Aug25, A861565.
    R110612, 20Apr53.

  v. 34-38. © 17Oct25, A872087.
    R110616, 20Apr53.

  v. 40-41. © 28Apr26, A890589.
    R111633, 4May53.

AMERICAN law reports annotated.
  Cumulative index—digest for the years
  1924, 1925, v. 28-39. © 13Feb26,
  A879586. R110628, 20Apr53, The
  Lawyers Co-operative Pub. Co. &
  Bancroft-Whitney Co. (PCW)

AMERICANA, 1925. Editor: H. L. Mencken. © 30Oct25, A869972. R112289, 21May53, H. L. Mencken (A)

ANANIKIAN, MARDIROS H.

  The mythology of all races. R109035.
    SEE The mythology of all races.

ANDERSON, ROBERT F.

  The Anderson arithmetic, book 1-3.
    Rev. © Robert F. Anderson (A)

book 1. © 18Nov25, A875153. R106270, 23Jan53.

book 2. © 18Nov25, A875154. R106271, 23Jan53.

book 3. © 18Nov25, A875155. R106272, 23Jan53.

ANDERSON, SHERWOOD.

  Hands, and other stories. (Little
    blue book, no. 865) © 25May25,
    A858467. R110165, 10Apr53,
    Haldeman-Julius Co. (PWH)

ANDERSON (W. H.) COMPANY

The complete guide for Ohio township officers. R109376. SEE Rockel, William M.

ANDRESS, ANNIE T.

  Health and good citizenship.
    R105276. SEE Andress, James Mace.

  Health and success. R105272. SEE
    Andress, James Mace.

ANDRESS, JAMES MACE.

Health and good citizenship, by J. Mace Andress and W. A. Evans. © 11Apr25, A829409. R105276, 9Jan53, Annie T. Andress (W)

Health and success, by J. Mace Andress and W. A. Evans. (The Practical health series, book 1) © 14Jan25, A822089. R105272, 9Jan53, Annie T. Andress (W)

<pb id='006.png' /> ANDREWS, MARY RAYMOND SHIPMAN.

  Pontifex Maximus. © 13Mar25, A822549.
    R108589, 11Mar53, Paul Shipman
    Andrews (C)

ANDREWS, PAUL SHIPMAN

  Pontifex Maximus. R108589. SEE
    Andrews, Mary Raymond Shipman.

ANGST, MARGERY B.

  Heat engines. R109488. SEE Allen,
    John R.

ANSKY, S., pseud. SEE Rappoport, Solomon.

ANTHONY, KATHARINE.

  Catherine the Great. © 30Oct25,
    A869973. R112030, 15May53,
    Katharine Anthony (A)

APPLEGARTH, MARGARET T.

Merry-go-round; a pilgrim's progress around the world, with decorations by the author. © 21Sep25, A864879. R104633, 4Dec52, Margaret T. Applegarth (A)

APPLETON, VICTOR.

  Don Sturdy across the North Pole; or,
    Cast away in the land of ice;
    illustrated by Walter S. Rogers.
    © 15May25, A855237. R106954,
    6Feb53, Victor Appleton (A)

  Don Sturdy in the land of volcanoes;
    or, The trail of the ten thousand
    smokes; illustrated by Walter S.
    Rogers. © 15May25, A855236.
    R106953, 6Feb53, Victor Appleton (A)

  Don Sturdy in the tombs of gold; or,
    The old Egyptian's great secret;
    illustrated by Walter S. Rogers.
    © 15May25, A855238. R106955,
    6Feb53, Victor Appleton (A)

  Don Sturdy on the desert of mystery;
    or, Autoing in the land of the
    caravans; illustrated by Walter S.
    Rogers. © 15May25, A855240.
    R106957, 6Feb53, Victor Appleton (A)

  Don Sturdy with the big snake hunters;
    or, Lost in the jungles of the
    Amazon; illustrated by Walter S.
    Rogers. © 15May25, A855239.
    R106956, 6Feb53, Victor Appleton (A)

Tom Swift and his chest of secrets; or, Tracing the stolen inventions. © 2Mar25, A823286. R106944, 6Feb53, Victor Appleton (A)

ARISTOPHANES.

  The frogs; translated from the Greek
    by Alexander Harvey. (Little blue
    book, no. 758) © 7May25, A856436.
    R110147, 10Apr53, Haldeman-Julius
    Co. (PWH)

ARKANSAS decisions reported in the
  Southwestern reporter,
  v. 269-275, Apr.-Nov. 1925. © 20Feb26,
  A891327. R109779, 3Apr53, West
  Pub. Co. (PWH)

ARMITAGE, MARIE TERESA, ed.

  Folk songs & art songs, book 1-2.
    Teacher's ed., for intermediate
    grades. © C. C. Birchard & Co.
    (PCW)

book 1. © 2May25, A829313. R105061, 7Jan53.

book 2. © 2May25, A829314. R105062, 7Jan53.

ARMSTRONG, GEORGE

  The Melba method. R110056. SEE
    Melba, Nellie.

AROUND the world with Kipling;
  compiled by Nella Braddy. (Works of Rudyard
  Kipling. Mandalay ed.) © 15Jun26,
  A949868. R113914, 16Jun53, Nella
  Braddy Henney (A)

<pb id='007.png' n='1953_h1/A/0305' /> ART PUBLICATION SOCIETY

  Ballade, op. 100, no. 15. R105020.
    SEE Ballade, op. 100, no. 15.

  The return. R105022. SEE
    The return.

  Study, op. 100, no. 15. R105023.
    SEE Study, op. 100, no. 15.

  Study, op. 151, no. 5. R105021.
    SEE Study, op. 151, no. 5.

  Study, op. 63, no. 5. R105019.
    SEE Study, op. 63, no. 5.

THE ARTS anthology: Dartmouth verse,
  1925, with introd. by Robert
  Frost. © 29May25, A869526.
  R110122, 10Apr53, Trustees of
  Dartmouth College (PCW)

ASHLEY, ROSCOE LEWIS.

The new civics. New and rev. ed. © 17Nov25, A875124. R106184, 26Jan53, Roscoe Lewis Ashley (A)

ASSOCIATION OF AMERICAN LAW SCHOOLS.

  Directory of teachers in member
    schools, 1925. © 1Dec25,
    A897738. R105365, 5Jan53,
    West Pub. Co. (PWH)

ATKINSON, JUSTIN BROOKS.

Skyline promenades, a potpourri. © 10Apr25, A829034. R108006, 26Feb53, J. Brooks Atkinson (A)

ATLANTIC reporter. Temporary Atlantic
  digest of v. 126-130. © 4Feb26,
  A891317. R109770, 3Apr53, West
  Pub. Co. (PWH)

ATLANTIC reporter, v. 129-130.
  Permanent ed. (National Reporter
  System. State series) © West
  Pub. Co. (PWH)

  v. 129, June 18-Sept. 3, 1925.
    © 17Oct25, A875854. R105331,
    5Jan53.

  v. 130, Sept. 10-Dec. 17, 1925.
    © 4Feb26, A891324. R109776,
    3Apr53.

ATWOOD, HARRIET T. B., joint author

The problem method in comparative map studies. R106159. SEE Atwood, Wallace W.

ATWOOD, WALLACE W.

The problem method in comparative map studies, by Wallace W. Atwood and Harriet T. B. Atwood. © 17Dec25, A877996. R106159, 23Jan53, A. J. Nystrom & Co. (PWH)

AUDSLEY, BERTHOLD

  The temple of tone. R111906. SEE
    Audsley, George Ashdown.

AUDSLEY, GEORGE ASHDOWN.

  The temple of tone. © 12Dec25,
    A875902. R111906, 12May53,
    Berthold Audsley (NK)

AUGUSTINUS, AURELIUS, Saint, Bp. of
  Hippo.

Confessions. Introd. and notes by Lloyd E. Smith. (Little blue book, no. 735) © on introd. & notes; 24Mar25, A856812. R110519, 4Feb53, Haldeman-Julius Co. (PWH)

AULT, ETHEL MARION

  The four Gospels. R105966. SEE
    Streeter, Burnett Hillman.

AUREVILLY, JULES AMÉDÉE BARBEY D'
  SEE Barbey d'Aurevilly, Jules Amédée.

AUSLANDER, JOSEPH.

  Cyclops' eye. © 14May26, A890792.
    R112155, 15May53, Joseph
    Auslander (A)

<pb id='008.png' /> AUTH, FRANCIS, ed.

Manual of select Catholic hymns and devotions. R105842 … SEE Manual of select Catholic hymns devotions.

AVISON, GEORGE, illus.

  Gold-seeking on the Dalton trail.
    R112131. SEE Thompson, Arthur R.

AYRES, AMY WENTWORTH SAWYER

A school dictionary of the English language. R106263. SEE Ayres, Harry Morgan.

AYRES, HARRY MORGAN.

  A school dictionary of the English
    language. © 27Oct25, A869797.
    R106263, 23Jan53, Amy Wentworth
    Sawyer Ayres (W)

AYRES, RUBY M.

  The man the women loved. © 19Feb26,
    (pub. abroad 16Nov25, AI-7680),
    A883385. R107766, 20Feb53, Ruby
    M. Ayres (A)

  Overheard. © 30Mar26, (pub. abroad
    3Nov25, AI-7678), A890117. R109633,
    1Apr53, Ruby M. Ayres (A)

  Spoilt music. © 14Jun26, (pub.
    abroad 8Jan26, AI-7830), A891888.
    R113911, 16Jun53, Ruby M. Ayres (A)

BABCOCK, BERNIE.

Booth and the spirit of Lincoln. © 23Oct25, A872757. R109992, 7Apr53, Bernie Babcock (A)

BABCOCK, MARY PHILLIPS

  Sandman's once-upon-a-time stories.
    R104705. SEE Walker, Abbie
    Phillips.

  Sandman's three minute stories.
    R104707. SEE Walker, Abbie
    Phillips.

BACHELLER, IRVING.

  Father Abraham. © 26Feb25, A823239.
    R107643, 18Feb53, Edward R.
    Tinker (E)

BAGNOLD, ENID.

Serena Blandish; or, The difficulty of getting married, by a lady of quality. © 22May25, A829436. R106198, 26Jan53, Enid Jones (A)

BAILEY, HENRY CHRISTOPHER.

  Mr. Fortune's trials. © 5Jan26,
    A879191. R113929, 16Jun53,
    H. C. Bailey (A)

BAKER, ALBERT E.

How to understand philosophy. © 19Feb26, A879628. R107765, 20Feb53, Albert E. Baker (A)

BAKER, ASA G.

  Collegiate dictionary R109600.
    SEE Webster, Noah.

  Elementary school dictionary.
    R109061. SEE Webster, Noah.

  Shorter school dictionary. R109062.
    SEE Webster, Noah.

BAKER, HARRY JAY

  Detroit advanced first grade intelligence
    test. R109411. SEE Detroit.
    Public Schools.

  Detroit advanced intelligence test.
    R109409 … SEE Detroit. Public
    Schools.

BALDWIN, CHRISTINE R.

  The home edition. R105278. SEE
    The home edition.

<pb id='009.png' />
  Three-part music. R105279. SEE
    Giddings, Thaddeus Philander.

BALDWIN, FAITH.

  Those difficult years. © 22Apr25,
    A855281. R108134, 26Feb53,
    Faith Baldwin Cuthrell (A)

BALDWIN, RALPH L.

  The home edition. R105278. SEE
    The home edition.

  Three-part music. R105279. SEE
    Giddings, Thaddeus Philander.

BALLADE, op. 100, no. 15, by Burg-mueller; text matter by Leopold Godowsky. (Study catalog no. 507) © 15Feb25, AA365172. R105020, 7Jan53, Art Publication Society (PWH)

BALLANTINE, EDWARD

  Understanding the Bible. R106044.
    SEE Ballantine, William Gay.

BALLANTINE, WILLIAM GAY.

  Understanding the Bible. © 21Sep25,
    A869270. R106044, 19Jan53, Mary B.
    Allen & Edward Ballantine (C)

BAMBRIDGE, ELSIE

  A rector's memory. R111614. SEE
    Kipling, Rudyard.

BANCROFT-WHITNEY COMPANY

  American law reports annotated.
    R110609 … SEE American law
    reports annotated.

  A treatise of the law of judgments.
    R108634 … SEE Freeman, Abraham
    Clark.

BANKERS TRUST COMPANY, NEW YORK

  The humanizing of knowledge. R112158.
    SEE Robinson, James Harvey.

BANKS, HELEN WARD.

The story of Holland, including The boys' motley; with illus. by A. D. McCormick. © on new matter; 27Aug25, A864360. R111912, 12May53, Katherine W. Patterson (NK)

BANKS, POLAN.

  Black ivory. © 17Feb26, A883344.
    R112784, 1Jun53, Polan Banks (A)

BARBER, HARRY C.

Everyday algebra for the ninth school year. © 11Jun25, A855669. R109942, 6Apr53, Harry C. Barber (A)

BARBEY D'AUREVILLY, JULES AMÉDÉE.

  The diaboliques, translated by
    Ernest Boyd; with an essay by Sir
    Edmund Gosse. © 13Mar25, A822726.
    R107654, 18Feb53, Alfred A. Knopf,
    inc. (PWH)

BARBOUR, HEDWIG MEXIA

  Barry Locke, half back. R107500.
    SEE Barbour, Ralph Henry.

BARBOUR, RALPH HENRY.

  Barry Locke, half back; illustrated
    by C. M. Relyea. © 12Sep25,
    A861830. R107500, 16Feb53, Hedwig
    Mexia Barbour (W)

BARNES, EDWARD SHIPPEN.

  Twenty unison anthems for junior
    choirs. © 15Mar26, A891061.
    R108882, 17Mar53, Edward
    Shippen Barnes (A)

BARNES, GERTRUDE M.

  The emotions, morality, and the brain
    R108209. SEE Monakow, Constantin
    von.

<pb id='010.png' n='1953_h1/A/0306' />
  Psychoanalysis and the psychic disorder
    of general paresis. R108211.
    SEE Hollós, Stefan.

BARNES, HARRY ELMER.

  Manual of universal history. R113403.
    SEE Ploetz, Karl Julius.

  The repression of crime. © 14May26,
    A890836. R112161, 15May53, Harry
    Elmer Barnes (A)

BARRETT, RICHMOND BROOKS.

  The enemy's gates. © 26Jan26,
    A883408. R108901, 17Mar53,
    Richmond Brooks Barrett (A)

BARROWS, HARLAN H.

Geography, United States and Canada, by Harlan H. Barrows and Edith Putnam Parker. © 10Sep25, A864543. R106254, 23Jan53, Harlan H. Barrows & Edith Putnam Parker (A)

BARROWS, WILLIAM E.

  Light, photometry, and illuminating
    engineering. 1st ed. © 22Aug25,
    A864313. R108079, 27Feb53, William
    E. Barrows (A)

BARSTOW, JOHN MONTAGUE ORCZY-
  SEE Orczy-Barstow, John Montague.

BARTLEY, JOHN B.

  Bread and Jam. R105838. SEE
    Bartley, Nalbro Isadorah.

BARTLEY, NALBRO ISADORAH.

  Bread and jam. © 25Sep25, A869100.
    R105838, 16Jan53, John B. Bartley (C)

BARTON, BRUCE

  A beautiful blunder. R113042. SEE
    Barton, William E.

  My faith in immortality. R113041.
    SEE Barton, William E.

BARTON, WILLIAM E.

  A beautiful blunder. © 23Apr26,
    A890505. R113042, 10Jun53, Bruce
    Barton (C)

  My faith in immortality. © 8Apr26,
    A890289. R113041, 10Jun53, Bruce
    Barton (C)

BASILIAN FATHERS OF TORONTO, CONGREGATION
  OF ST. BASIL SEE Basilians.

BASILIANS, comp.

St. Basil's hymnal. 31st ed. © 20Aug25, A890042. R107249, 6Feb53, Congregation of St. Basil, The Basilian Fathers of Toronto (PCW)

BATES, ESTHER WILLARD.

The art of producing pageants. © 31Dec25, A875798. R105593, 12Jan53, Esther Willard Bates (A)

BEARD, DAN.

Do it yourself; with illus. by the author. (Woodcraft series) © 28Aug25, A872103. R108164, 2Mar53, Daniel Bartlett Beard (C)

BEARD, DANIEL BARTLETT

  Do it yourself. R108164. SEE
    Beard, Dan.

BECK, RUFUS L.

  Instructions how to build and operate
    Beck's warm floor system of heating
    for brooder. © 17Jun26, A900201.
    R113994, 26Jun53, Rufus L. Beck (A)

<pb id='011.png' /> BEDFORD, HERBERT.

  Robert Schumann, his life and work.
    (Masters of music) © 2Dec25,
    A872718. R109734, 3Apr53,
    Routledge & Kegan Paul, ltd. (PWH)

BEILSTEIN, FRIEDRICH KONRAD.

Handbuch der organischen Chemie, 7.-8. Bd. Hrsg. von der Deutschen chemischen Gesellschaft, bearb. von Bernhard Prager, et al. 4. Aufl. © Attorney General of the United States (PWH)

    Bd. 7. © 20Apr25, AF28611.
      R108143, 26Jan53.

    Bd. 8. © 16Sep25, AF29254.
      R108144, 26Jan53.

BEITH, HELEN MARGARET

  Paid in full. R109314. SEE
    Beith, Ian Hay.

BEITH, IAN HAY.

Paid in full, by Ian Hay [pseud.] © 17Apr25, A822990. R109314, 23Mar53, Helen Margaret Beith (W)

BELIN, G. d'ANDELOT, Jr.

  What's o'clock. R111973. SEE
    Lowell, Amy.

BELL, AUBREY F. G., tr.

  The relic. R112025. SEE Eça de
    Queiroz, José Maria.

BELL, PEARL DOLES.

  The love link. © 24May25, A855386.
    R110340, 14Apr53, Pearl Doles
    Bell (A)

BELLAMY, FRANCIS R.

  Spanish faith. © 23Apr26, A890487.
    R112803, 1Jun53, Francis R.
    Bellamy (A)

BELLOC, HILAIRE.

  The cruise of the Nona. © 5Jun25,
    A829577. R109317, 23Mar53,
    Hilaire Belloc (A)

  Mr. Petre, a novel; illustrated by
    G. K. Chesterton. © 28Aug25,
    (pub. abroad 19May25, AI-7013),
    A869885. R110182, 8Apr53, Hilaire
    Belloc (A)

BENCHLEY, GERTRUDE D.

  Pluck and luck. R104880. SEE
    Benchley, Robert.

BENCHLEY, ROBERT.

  Pluck and luck; with illus. by Gluyas
    Williams. © 1Dec25, A872704.
    R104880, 30Dec52, Gertrude D.
    Benchley (W)

BENDER, C. J.

Twenty years among African Negroes. (Little blue book, no. 797) © 23Apr25, A856203. R107226, 4Feb53, Haldeman-Julius Co. (PWH)

BENJAMIN, FRANÇOIS

  La prodigieuse vie d'Honoré de
    Balzac. R105831. SEE Benjamin,
    René.

BENJAMIN, RENÉ.

  La prodigieuse vie d'Honoré de
    Balzac. © 20Nov25, AF29954.
    R105831, 9Jan53, François Benjamin (C)

BENJAMINE, ELBERT.

The zodiac, astrolotical signatures, by C. C. Zain [pseud.] (Serial no. 46, course 2-B) © 1Jun26, A1072636. R113502, 17Jun53, Maria M. Benjamine (W)

<pb id='012.png' /> BENJAMINE, MARIA M.

  The zodiac. R113502. SEE Benjamine,
    Elbert.

BENNETT, ARNOLD.

  Things that have interested me, third
    series. © 19Mar26, A879976.
    R109181, 20Mar53, Marie Marguerite
    Bennett (W)

BENNETT, ETHEL HUME.

  Judy's prefect year. © 2Oct25,
    A864949. R113389, 10Jun53, Ethel
    Hume Bennett (A)

BENNETT, MARIE MARGUERITE

  Things that have interested me.
    R109181. SEE Bennett, Arnold.

BENNETT, RUTH H., illus.

  Connie Loring's dilemma. R108619.
    SEE Garis, Lilian.

BERGLING, JOHN MAURITZ.

  General style chart for jewelry and
    silver engraving, plate 12.
    © 21Feb25, A821893. R107011,
    10Feb53, Virginia C. Bergling (C)

  Ornamental designs and illustrations.
    2d ed. © 15Oct25, A879228.
    R107012, 10Feb53, Virginia C.
    Bergling (C)

BERGLING, VIRGINIA C.

  General style chart for jewelry and
    silver engraving. R107011. SEE
    Bergling, John Mauritz.

  Ornamental designs and illustrations.
    R107012. SEE Bergling, John
    Mauritz.

BERKMAN, ALEXANDER.

  The Bolshevik myth; diary 1920-1922.
    Elinor Fitzgerald, ed. © 21Mar25,
    A823828. R107390, 13Feb53, Elinor
    Fitzgerald (A)

BERNARD, JEAN JACQUES

  Autour du ring. R108700. SEE
    Bernard, Tristan.

BERNARD, TRISTAN.

  Autour du ring. (Les Documents
    bleus, no 18) © 24Mar25, AF27590.
    R108700, 13Mar53, Jean-Jacques
    Bernard (C)

BERWALD, A. H.

How to install "Ventube" from fan to face. © 2May25, A830508. R110370, 17Apr53, E. I. du Pont de Nemours & Co., inc. (PWH)

BEVANS, MARGARET VAN DOREN

  Other provinces. R113134. SEE
    Van Doren, Carl.

BEVANS, MAYANT VAN DOREN

American and British literature since 1890. R107975. SEE Van Doren, Carl.

BEVITT, ZAY RECTOR.

  Piano playing by harmony diagrams.
    Student's book. © 2Feb25, A821117.
    R106681, 30Jan53, Zay Rector
    Bevitt (A)

  Piano playing by harmony diagrams.
    Teacher's manual. © 23Mar25,
    A825915. R106682, 30Jan53,
    Zay Rector Bevitt (A)

BEYLE, MARIE HENRI.

  The abbess of Castro, and other tales,
    by Marie-Henri Beyle (de Stendhal)
    Translated from the French by C. K.
    Scott Moncrieff. © 18Mar26,
    A883882. R111432, 28Apr53,
    Live-right Pub. Corp. (PWH)

<pb id='013.png' n='1953_h1/A/0307' />
  The charterhouse of Parma, by Stendhal
    [pseud.] Translated by C. K.
    Scott-Moncrieff. 2 v. © 10Nov25,
    A875064. R109206, 23Mar53,
    George Scott Moncrieff (NK)

BIANCHI, MARTHA DICKINSON.

  The wandering Eros, poems. © 13Feb25,
    A823096. R107164, 6Feb53, Mrs.
    Alfred L. Hampson (E)

BIGELOW, ROBERT PAYNE.

Directions for the dissection of the cat. © 13Oct25, A869396. R109049, 18Mar53, Robert Payne Bigelow (A)

BIGGERS, EARL DERR.

  Fifty candles. © 9Feb26, A879563.
    R109709, 20Mar53, Eleanor Biggers
    Cole (W)

BIGNOT, EVA
  SEE Funck-Brentano, Eva Bignot.

BIRCHARD (C. C.) AND COMPANY

  Contest of the nations. R105065.
    SEE Vandevere, J. Lilian.

  Folk songs & art songs. R105061.
    SEE Armitage, Marie Teresa, ed.

  Twice 55 games with music. R105060.
    SEE Dykema, Peter W., ed.

BIRMINGHAM, GEORGE A., pseud. SEE
  Hannay, James Owen.

BISEL (GEORGE T.) COMPANY

  A digest of the decisions of the
    courts of the Commonwealth of
    Pennsylvania from 1917 to 1923.
    R105321. SEE Vale, Ruby Ross.

BISHOP, MORRIS, tr.

  Beatrice Cenci. R108900. SEE
    Ricci, Corrado.

BLACK, ARTHUR W.

  The orchestral banjoist, for tenor
    and standard banjo. © 3Apr26,
    A890273. R109995, 8Apr53, Miller
    Music Corp. (PWH)

BLACK, DOROTHY.

Romance: the loveliest thing. © 8Sep25, A861845. R109477, 27Mar53, Dorothy Black (A)

BLAKELY, GILBERT SYKES.

  Macbeth. R105881. SEE Shakespeare,
    William.

  Treasure Island. R105882. SEE
    Stevenson, Robert Louis.

BLASCO IBAÑEZ, LIBERTAD

  El papa del mar. R107392. SEE
    Blasco Ibañez, Vicente.

BLASCO IBAÑEZ, VICENTE.

The old woman of the movies, and other stories; translated by Arthur Livingston, Leo Ongley [and others] © 11May25, A855140. R111905, 8May53, E. P. Dutton & Co., inc.

  El papa del mar, novela. © 9Jan26,
    AF30108. R107392, 11Feb53,
    Libertad Blasco Ibañez (C)

BLISS, HOWARD H.

Elements of applied electricity. © 10Oct25, A872484. R109483, 27Mar53, Howard H. Bliss (A)

BLOCH, JEAN RICHARD.

  Levy, premier livre de contes. Éd.
    définitive. © 21Mar25, AF27953.
    R108705, 13Mar53, Mme Jean-Richard
    Bloch (née Marguerite Herzog) (W)

  La nuit kurde. © 4Apr25, AF27550.
    R108699, 13Mar53, Mme Jean-Richard
    Bloch (née Marguerite Herzog) (W)

<pb id='014.png' /> BLOCH, Mme JEAN RICHARD SEE Bloch, Marguerite Herzog.

BLOCH, MARGUERITE HERZOG

  Levy. R108703. SEE Bloch, Jean
    Richard.

  La nuit kurde. R108699. SEE Bloch,
    Jean Richard.

BLUM, SOLOMON.

  Labor economics. (American business
    series) © 20Jul25, A864000.
    R109478, 27Mar53, Mrs. M. Blum
    Neustadt (W)

BOBBS-MERRILL COMPANY, INC.

  Annotated Indiana statutes.
    R104832 … SEE Indiana.
    Laws, statutes, etc.

  Indiana three in one service.
    R108295 … SEE Indiana three
    in one service.

  The law of search and seizure.
    R111900. SEE Cornelius, Asher L.

  A manual of practice before county
    commissioners. R104830 … SEE
    Thornton, William W.

  Oklahoma three in one service.
    R105319 … SEE Oklahoma three
    in one service.

BOGARDUS, EMORY STEPHEN.

Introduction to sociology, 4th ed., rev. © 1Jun25, A861428. R109033, 18Mar53, Emory S. Bogardus (A)

BOLGER, M.

  Colonel Gore's second case. R112814.
    SEE McAllister, Alister.

BOLTON, SARAH K.

  Famous American statesmen. Rev. and
    enl. ed. © on new matter by Inez
    N. McFee; 20Mar25, A823527.
    R108231, 2Mar53, Thomas Y. Crowell
    Co. (PWH)

  Lives of girls who became famous.
    Rev. and enl. ed. Lady Astor, by
    Inez N. McFee. © on chapter by
    Inez N. McFee; 24Mar25, A822646.
    R108228, 2Mar53, Thomas Y. Crowell
    Co. (PWH)

  Lives of poor boys who became famous.
    Rev. ed. Henry Ford, by Inez N.
    McFee. © on chapter by Inez N.
    McFee; 27Mar25, A822752. R108229,
    2Mar53, Thomas Y. Crowell (PWH)

BOND, OTTO F.

  Review essentials of French grammar
    and composition. © 24Nov25,
    A875242. R109057, 18Mar53, Otto
    F. Bond (A)

BONUS, DANIEL H.

  Association tests used in psycho-analysis.
    (Little blue book,
    no. 784) © 27Apr25, A856082.
    R107216, 4Feb53, Haldeman-Julius
    Co. (PWH)

  Psycho-analysis and the link between
    mind and body. (Little blue book,
    no. 782) © 20Apr25, A828818.
    R110127, 10Apr53, Haldeman-Julius
    Co. (PWH)

BOOKER, ANTON S.

Freud on sleep and sexual dreams. (Little blue book, no. 804) © 28Apr25, A856799. R107232, 4Feb53, Haldeman-Julius Co. (PWH)

BORDEN, LUCILLE.

  Gentleman riches. © 22Sep25, A864730.
    R109042, 18Mar53, Lucille Borden (A)

BOST, PIERRE.

  Pretextat. © 28Nov25, AF29891.
    R112461, 25May53, Pierre Bost (A)

<pb id='015.png' /> BOWERS, CLAUDE G.

Jefferson and Hamilton: the struggle for democracy in America. © 20Nov25, A875219. R113402, 10Jun53, Claude G. Bowers (A)

BOYD, ERNEST.

  The diaboliques. R107654. SEE
    Barbey d'Aurevilly, Jules Amédée.

  Strong as death. R112478. SEE
    Maupassant, Guy de.

BOYD, JAMES.

Drums. © 27Mar25, A823631. R107956, 25Feb53, Katharine Boyd (W)

BOYD, KATHARINE

Drums. R107956. SEE Boyd, James.

BOYD, MARK F.

Preventive medicine. 2d ed., rev. © 22Jul25, A864016. R107364, 9Feb53, Mark F. Boyd (A)

BOYD, THOMAS ALVIN.

Gasoline: what everyone should know about it. © 25Apr25, A823928. R104720, 23Dec52, T. A. Boyd (A)

BOYD, WILLIAM.

  Surgical pathology. © 10Jan25,
    A815669. R104944, 7Jan53,
    William Boyd (A)

BOYTON, NEIL.

  On the sands of Coney. © 5Sep25,
    A864783. R109261, 26Mar53, Neil
    Boyton (A)

BRADBURY, HELEN K.

  Kate Douglas Wiggin as her sister
    knew her. R113396. SEE Smith,
    Nora Archibald.

  Twilight stories. R113385. SEE
    Wiggin, Kate Douglas.

BRADDY, NELLA SEE Henney, Nella
  (Braddy)

BRADFORD, GAMALIEL.

Wives. © 18Sep25, A864679. R104714, 29Dec52, Helen F. Bradford (W)

BRADFORD, HELEN F.

  Wives. R104714. SEE Bradford,
    Gamaliel.

BRAGDON, CLAUDE.

  Old lamps for new. © 16Oct25,
    A872097. R112178, 18May53,
    Henry Bragdon (C)

BRAGDON, HENRY

  Old lamps for new. R112178. SEE
    Bragdon, Claude.

BRAGG, GERTRUDE CURME

  College English grammar. R112209.
    SEE Curme, George O.

BRAYMER, DANIEL H.

Rewinding small motors, by Daniel H. Braymer and A. C. Roe. 1st ed. © 7Aug25, A864183. R108077, 27Feb53, Daniel T. Braymer (C) & A. C. Roe (A)

BRAYMER, DANIEL T.

  Rewinding small motors. R108077.
    SEE Braymer, Daniel H.

BREITKOPF PUBLICATIONS, INC.

  Borodine. R108486. SEE Martens,
    Frederick H.

  Brahms. R108481. SEE Martens,
    Frederick H.

  Foster. R108482. SEE Martens,
    Frederick H.

<pb id='016.png' n='1953_h1/A/0308' />
  Gluck. R108484. SEE Humiston,
    William H.

  Grieg. R108485. SEE Humiston,
    William H.

  Massenet. R108488. SEE Martens,
    Frederick H.

  Schubert. R108483. SEE Humiston,
    William H.

  Schumann. R108487. SEE Humiston,
    William H.

  Sinding. R108489. SEE Martens,
    Frederick H.

BRENTANO, EVA BIGNOT FUNCK-
  SEE Funck-Brentano, Eva Bignot.

BRETT, HAROLD, illus.

  With the Indians in the Rockies.
    R113388. SEE Schultz, James
    Willard.

BREWER, WILMON.

  Shakespeare's influence on Sir Walter
    Scott. © 29Oct25, A875169.
    R104959, 5Jan53, Wilmon Brewer (A)

BRITISH ruling cases, annotated,
  V. 12. © 10Sep25, A864583. R110614,
  20Apr53, The Lawyers Co-operative
  Pub. Co. (PCW)

BROADHEAD, W. SMITHSON, illus.

  Three of a kind. R109298. SEE
    McNeile, Herman Cyril.

BROCCHI, VIRGILIO.

  IL poco lume ed il gran cerchio
    d'ombra. © 15Dec25, AF29941.
    R108650, 12Mar53, Virgilio
    Brocchi (A)

BROCK, LYNN, pseud. SEE McAllister, Alister.

BROMFIELD, LOUIS.

  Possession, a novel. © 30Sep25,
    A864870. R104715, 29Dec52,
    Louis Bromfield (A)

BRONAUGH, MINOR, ed.

  The consolidated laws of New York.
    R105320. SEE New York (State)
    Laws, statutes, etc.

BROOKS, ALFRED MANSFIELD.

Architecture and the allied arts. Rev. © 2Mar26, A883529. R109725, 6Apr53, Alfred M. Brooks (A)

BROOKS, VAN WYCK, tr.

  Summer. R109737. SEE Rolland,
    Romain.

BROUN, CONSTANCE MADISON

  Gandle follows his nose. R108907.
    SEE Broun, Heywood.

BROUN, HEYWOOD.

  Gandle follows his nose. © 15Mar26,
    A891036. R108907, 17Mar53,
    Constance Madison Broun (W)

BROWN, ALICE TUFTS

  These twelve. R112782. SEE Brown,
    Charles Reynolds.

BROWN, BANCROFT HUNTINGTON.

Plane trigonometry and logarithms. © 30Sep25, A869214. R113391, 10Jun53, B. H. Brown (A)

BROWN, CHARLES REYNOLDS.

  These twelve. © 11Feb26, A879579.
    R112782, 1Jun53, Alice Tufts
    Brown (E)

BROWN, CLARK

  Brown E-Z way. R111728. SEE Brown,
    John Oscar.

<pb id='017.png' />
  Horseback riding. R111451. SEE
    Brown, John Oscar.

BROWN (CURTIS) LTD.

  The monarch. R107634. SEE Mille,
    Pierre.

BROWN, EDMUND, Jr.

  Marketing. © 20Oct25, A872004.
    R107778, 9Feb53, Edmund
    Brown, Jr. (A)

BROWN, HOMER

  Brown E-Z way. R111728. SEE Brown,
    John Oscar.

  Horseback riding. R111421. SEE
    Brown, John Oscar.

BROWN, JOHN OSCAR.

  Brown E-Z way. © 13Jan26, A883164.
    R111728, 27Apr53, Lorain Dickinson,
    Clark Brown & Homer Brown (C)

  Horseback riding. © 13Jan26,
    A883165. R111421, 27Apr53, Lorain
    Dickinson, Clark Brown & Homer
    Brown (C)

BROWN, MARTIN.

  Cobra, by Martin Brown and Russell
    Holman. © 10Sep25, A861779.
    R108629, 11Mar53, Russell
    Holman (A)

BROWN, ROLLO WALTER.

  Dean Briggs. © 14May26, A890795.
    R112789, 1Jun53, Rollo Walter
    Brown (A)

BRUSH, KATHARINE.

  Glitter. © 26Feb26, A883885.
    R108991, 18Mar53, Katharine
    Brush (A)

BRUSTLEIN, JANICE

  No more parades. R111852. SEE
    Ford, Ford Madox.

BRYANT, JOHN MYRON.

  Alternating-current circuits, by
    John Myron Bryant and James A.
    Correll. 1st ed. © 21Oct25,
    A872074. R108083, 27Feb53, John
    Myron Bryant (A) & Ella Correll (W)

BRYANT, WILLIAM CULLEN.

  Poems. Introd. and notes by Nelson
    Antrim Crawford. (Little blue
    book, no. 740) © 31Mar25, A856807.
    R107234, 4Feb53, Haldeman-Julius
    Co. (PWH)

BUCHAN, JOHN.

  John Macnab. © 28Aug25, A864462.
    R109323, 23Mar53, Susan Caroline
    Lady Tweedsmuir (W)

John Macnab: a comedy for poachers, chapter 8 continued. (Pub. abroad in Chambers's journal, Mar. 21, 1925) © 19Mar25, AI-6801. R110451, 16Mar53, Susan Caroline Lady Tweedsmuir (W)

John Macnab: a comedy for poachers, chapter 10-15. © 28Aug25, A864462. R110452-R110464, 15Apr53, Susan Caroline Lady Tweedsmuir (W) Pub. abroad in installments in Chambers's journal, Apr. 18-July 11, 1925.

Apr. 18. © 16Apr25, AI-6876.

Apr. 25. © 23Apr25, AI-6906.

May 2. © 30Apr25, AI-6922.

May 9. © 7May25, AI-6941.

May 16. © 14May25, AI-6959.

May 23. © 21May25, AI-6992.

May 30. © 28May25, AI-7007.

June 6. © 4Jun25, AI-7030.

June 13. © 11Jun25, AI-7049.

June 20. © 18Jun25, AI-7089.

June 27. © 25Jun25, AI-7090.

July 4. © 2Jul25, AI-7109.

July 11. © 9Jul25, AI-7140.

<pb id='018.png' /> BUCHANAN, WILLIAM HOWARD.

  Corpus juris. R109760. SEE Corpus
    juris.

  Cyclopedia of law and procedure.
    R109761. SEE Cyclopedia of law
    and procedure.

BUCK, CHARLES NEVILLE.

Flight to the hills. 1st ed. © 5Mar26, A890169. R108715, 13Mar53, Charles Neville Buck (A)

BUELL, FRANCES DWIGHT

  International relations. R113058.
    SEE Buell, Raymond Leslie.

BUELL, RAYMOND LESLIE.

  International relations. © 29Sep25,
    A864964. R113058, 9Jun53, Frances
    Dwight Buell (W)

BULL, CHARLES LIVINGSTON, illus.

  All around Robin Hood's barn.
    R110059. SEE Dyer, Walter A.

BUNDY, HARVEY H.

  John Keats. R108163. SEE Lowell,
    Amy.

  What's o'clock. R111973. SEE
    Lowell, Amy.

BURBANK, LUTHER.

  Why I am an infidel. (Little blue
    book, no. 1020) © 17May26, A898649.
    R112539, 25May53, Haldeman-Julius
    Co. (PWH)

BURCHENAL, ELIZABETH, ed.

Three old American quadrilles. © 1Apr26, A892384. R111904, 11May53, Elizabeth Burchenal (A)

BURD, CLARA M.

  Hans Brinker. R105879. SEE
    Dodge, Mary Mapes.

  Jo's boys. R112130. SEE Alcott,
    Louisa M.

BURDICK, JENNIE ELLIS
  SEE Webster, Jennie Ellis Burdick.

BURGESS, THORNTON W.

  Little Joe Otter. With illus. by
    Harrison Cady. (His Smiling pool
    series) © 7Oct25, A869361.
    R112114, 13May53, Thornton W.
    Burgess (A)

BURGHARD, AGNES

  Child of the North. R113324. SEE
    Cullum, Ridgwell.

BURKE, CLARE

  East of Mansion House. R113325. SEE
    Burke, Thomas.

BURKE, THOMAS.

  East of Mansion House. © 11Jun26,
    A891797. R113325, 12Jun53, Clare
    Burke (W)

BURNS, HARRISON, ed.

Annotated Indiana statutes. R104832 … SEE Indiana. Laws, statutes, etc.

BURNS, ROSE MARIE

  The saga of Billy the Kid. R108712.
    SEE Burns, Walter Noble.

BURNS, WALTER NOBLE.

  The saga of Billy the Kid. © 5Mar26,
    A890165. R108712, 13Mar53, Rose
    Marie Burns (W)

BURSLEY, JOSEPH A., joint author

  Heat engines. R109488. SEE Allen,
    John R.

<pb id='019.png' n='1953_h1/A/0309' /> BURT, KATHARINE NEWLIN.

  Quest, a novel. © 16Oct25, A869764.
    R113394, 10Jun53, Katharine Newlin
    Burt (A)

BURTON, BEATRICE.

  The flapper wife. © 10May25,
    A857634. R111833, 7May53,
    NEA Service, inc. (PWH)

BUSH, BERTHA E.

  A prairie Rose. With illus. by
    Henry C. Pitz. (The Beacon Hill
    bookshelf) © on illus.; 12Aug25,
    A861409. R112129, 14May53, Henry
    C. Pitz (A)

BUSH, DAVID V.

  Psychology of sex. © 24Nov24, A78996.
    R107734, 11Sep52, David V. Bush (A)

BUSHNELL, GEORGE E., joint author

Physical diagnosis of diseases of the chest. R107363. SEE Pratt, Joseph H.

BUSSY, DOROTHY, tr.

  The Vatican swindle. R112029. SEE
    Gide, André Paul Guillaume.

BUTLER, SAMUEL.

The way of all flesh. Introd. by Frances Theresa Russell. (The Modern readers series) © on introd.; 15Dec25, A872878. R109055, 18Mar53, The Macmillan Co. (PWH)

BYNNER, WITTER.

  Caravan. © 2Oct25, A869246.
    R112531, 25May53, Witter Bynner (A)

BYRNE, DONN.

O'Malley of Shanganagh; illustrated by John Richard Flanagan. © 14Mar25, A823449. R107497, 16Feb53, Dorothea Craig (W)

BYRUM, RUSSELL R.

  Christian theology. © 9Oct25,
    A869356. R106144, 23Jan53,
    Gospel Trumpet Co. (PWH)

CABELL, JAMES BRANCH.

  The silver stallion. © 21Apr26,
    A890688. R111571, 4May53, James
    Branch Cabell (A)

CADMAN, SAMUEL PARKES

  A commentary on the Holy Bible.
    R105883. SEE Dummelow, John
    Roberts, ed.

CADY, HARRISON, illus.

  Little Joe Otter. R112114. SEE
    Burgess, Thornton W.

CAMERON, MARGARET.

  A sporting chance. © 1Apr26,
    A883866. R112798, 1Jun53,
    Maxwell A. Kilvert (Wr)

CAMPBELL, HARRIETTE R.

  The little great lady. © 4Sep25,
    A864496. R107774, 9Feb53, Margaret
    F. Campbell, Lesley Seyd & Alison
    Russel (C)

CAMPBELL, LANSING, illus.

  Uncle Wiggily on Sugar Island.
    R110815. SEE Garis, Howard R.

CAMPBELL, MARGARET F.

  The little great lady. R107774.
    SEE Campbell, Harriette R.

CANE, MELVILLE.

  January garden. © 4Feb26, A879519.
    R113384, 12Jun53, Melville Cane (A)

<pb id='020.png' /> CANFIELD, DOROTHY.

  Made to order stories; with illus.
    by Dorothy P. Lathrop. © 17Sep25,
    A861947. R109304, 20Mar53,
    Dorothy Canfield Fisher (A)

CARCO, FRANCIS.

  Perversité, roman. © 10Nov25,
    AF30233. R105835, 9Jan53, Francis
    Carco (ps. de Francis Carcopino) (A)

CARCOPINO, FRANCIS
  SEE Carco, Francis.

CARDON, JANE

  La comédie de celui qui épousa une
    femme muette. R104718. SEE France,
    Anatole.

  Paris. R109474. SEE Matisse,
    Georges.

CARDON, LÉOPOLD.

  La comédie de celui qui épousa une
    femme muette. R104718. SEE
    France, Anatole.

  Paris. R109474. SEE Matisse,
    Georges.

CARHART, PAUL W.

  Collegiate dictionary. R109600.
    SEE Webster, Noah.

  Elementary school dictionary.
    R109061. SEE Webster, Noah.

  Shorter school dictionary. R109062.
    SEE Webster, Noah.

CARMAN, DOROTHY WALWORTH.

  The pride of the town. © 25Mar26,
    A883793. R112816, 1Jun53,
    Dorothy Walworth Carman (A)

CARNEGIE STEEL COMPANY.

  The making, shaping, and treating of
    steel, by J. M. Camp and C. B.
    Francis. 4th ed. © 30Sep25,
    A869362. R106725, 3Feb53,
    United States Steel Corp. (PWH)

CARPENTER, FRANCES

The British Isles and the Baltic states. R110443. SEE Carpenter, Frank G.

CARPENTER, FRANK G.

The British Isles and the Baltic states, by Frank G. Carpenter and Dudley Harmon. (Carpenter's world travels) © 14Apr26, A890664. R110443, 17Apr53, Frances Carpenter Huntington (PPW)

CARRINGTON, HEREWARD.

  Astronomy for beginners. (Little
    blue book, no. 895) © 9Sep25,
    A870369. R111292, 23Apr53,
    Haldeman-Julius Co. (PWH)

  Food and diet in relation to life and
    health. © 17Mar25, A823485.
    R107207, 4Feb53, Haldeman-Julius
    Co. (PWH)

CARSE, ADAM.

The school orchestra; organization, training, and repertoire. (The Joseph Williams series of handbooks on music, no. 21) © 2Mar26, A890607. R114025, 25Jun53, Adam Carse (A)

CARTER, DAGNY

The invention of printing in China and its spread westward. R106755. SEE Carter, Thomas Francis.

CARTER, EDWARD HENRY

  A short history of mankind. R107162.
    SEE Wells, Herbert George.

CARTER, LESLIE H.

  Stray cats, a farce comedy in three
<pb id='021.png' />
    acts; edited by Ellen M. Gall.
    © 25Mar25, A826984. R108588,
    11Mar53, Leslie H. Carter & Ellen
    M. Gall (A)

CARTER, MORRIS.

  Isabella Stewart Gardner and Fenway
    Court. © 30Oct25, A872254.
    R113399, 10Jun53, Morris Carter (A)

CARTER, THOMAS FRANCIS.

  The invention of printing in China
    and its spread westward. © 24Jul25,
    A864004. R106755, 4Feb53, Dagny
    Carter (W)

CARTOUX, PAUL.

Le roi de la pedale, par Paul Cartoux et Henri Decoin. © 20Jun25, AF28292. R112770, 1Jun53, Henri Decoin (A)

CARTWRIGHT, GEORGE WILDER.

  The voice of America. © 10Sep25,
    A864846. R108986, 18Mar53,
    Eleanore Cartwright Walker (C)

CASSERES, BENJAMIN DE
  SEE De Casseres, Benjamin.

CATHER, WILLA.

  The professor's house. © 4Sep25,
    A861759. R112288, 22May53, Edith
    Lewis & The City Bank Farmers
    Trust Co. (E)

  The Wagnerian romances. R112290.
    SEE Hall, Gertrude.

CAYATTE, JEANNE MADELEINE
  SEE Leroux, Jeanne Madeleine Cayatte.

CECIL, RUSSELL L.

Colds: cause, treatment, and prevention. © 8May25, A855074. R107499, 16Feb53, Russell L. Cecil (A)

CHADDOCK, ROBERT EMMET.

Principles and methods of statistics. © 20Aug25, A864346. R110019, 7Apr53, Helen Chaddock Soule (C)

CHADWICK, LESTER.

Baseball Joe, champion of the league; or. The record that was worth while. © 4Apr25, A829826. R105069, 8Jan53, Cupples and Leon Co. (PWH)

CHAMBERLAIN, ARTHUR HENRY.

  Africa. R109052. SEE Chamberlain,
    James Franklin.

  Asia. R109050. SEE Chamberlain,
    James Franklin.

  Oceania. R109036. SEE Chamberlain,
    James Franklin.

CHAMBERLAIN, JAMES FRANKLIN.

  Africa, a supplementary geography;
    by James Franklin Chamberlain and
    Arthur Henry Chamberlain. Rev.
    (Their The continents and their
    people) © 27Oct25, A869795.
    R109052, 18Mar53, Mary S. Chamberlain
    (W of J. F. Chamberlain) &
    Ruth C. Colwell (NK of A. H.
    Chamberlain)

  Asia, a supplementary geography; by
    James Franklin Chamberlain and
    Arthur Henry Chamberlain. Rev.
    (Their The continents and their
    people) © 20Oct25, A869657.
    R109050, 18Mar53, Mary S. Chamberlain
    (W of J. F. Chamberlain) &
    Ruth C. Colwell (NK of A. H.
    Chamberlain)

  Oceania, a supplementary geography;
    by James Franklin Chamberlain and
    Arthur Henry Chamberlain. Rev.
    (Their The continents and their
    people) © 1Sep25, A861668.
<pb id='022.png' n='1953_h1/A/0310' />
    R109036, 18Mar53, Mary S. Chamberlain
    (W of J. F. Chamberlain) &
    Ruth C. Colwell (NK of A. H.
    Chamberlain)

CHAMBERLAIN, MARY S.

  Africa. R109052. SEE Chamberlain,
    James Franklin.

  Asia. R109050. SEE Chamberlain,
    James Franklin.

  Oceania. R109036. SEE Chamberlain,
    James Franklin.

CHAMPLIN, JOHN DENISON.

The new Champlin cyclopedia for young folks, edited by Lincoln MacVeagh. Vol. 2: Places and events. © 1Dec25, A872705. R108446, 10Mar53, Lincoln MacVeagh (A)

CHANDLER, WILLIAM HENRY.

  Fruit growing. © 4Jun25, A855722.
    R109319, 23Mar53, William Henry
    Chandler (A)

CHANNING, ALICE

  A history of the United States.
    R109023. SEE Channing, Edward.

CHANNING, EDWARD.

A history of the United States. Vol. 6: The war for Southern independence. © 16Jun25, A829732. R109023, 18Mar53, Alice Channing & Elizabeth C. Fuller (C)

CHAPMAN, ALLEN.

The Radio Boys with the flood fighters; or, Saving the city in the valley. With foreword by Jack Binns; illustrated by Walter S. Rogers. (His The Radio Boys aeries) © 2Mar25, A823287. R106945, 6Feb53, Allen Chapman (A)

CHARRIER, GENEVIÈVE MARY

  La fin de Roussiote. R105834. SEE
    Mary, Jules.

CHARRIER, JEAN

  La fin de Roussiote. R105834. SEE
    Mary, Jules.

CHATER, ARTHUR G.

Benoni. R112024. SEE Hamsun, Knut.

  The tree of the folkungs. R107657.
    SEE Heidenstam, Verner von.

CHEMICAL RUBBER PUBLISHING COMPANY

Handbook of chemistry and physics. R108281. SEE Handbook of chemistry and physics.

CHENEY, HORACE B., joint author

  The romance of design. R108302. SEE
    Warren, Garnet.

CHERADE, ROBERT.

  Pissebleu. © 4Dec25, AF29977.
    R112773, 1Jun53, Robert Cherade,
    ps. de Louis Mercier (A)

CHERRYHOLMES, OLIVE PRICE
  SEE Price, Olive M.

CHESTER, CORNELIA M.

  The lost speech of Abraham Lincoln.
    R107435. SEE Morrow, Honore
    Willsie.

CHESTERTON, GILBERT KEITH.

  The everlasting man. © 31Oct25,
    (pub. abroad 30Sep25, AI-7355),
    A869942. R106437, 29Jan53, Oliver
    Chesterton (NK)

  Tales of the long bow. © 3Oct25,
    (pub. abroad 11Jun25, AI-7184),
    A869636. R106659, 30Jan53,
    Oliver Chesterton (NK)

<pb id='023.png' /> CHESTERTON, OLIVER

  The everlasting man. R106437. SEE
    Chesterton, Gilbert Keith.

  Tales of the long bow. R106659.
    SEE Chesterton, Gilbert Keith.

CHEVIGNE, MARIE THÉRÈSE DE
  SEE Croisset, Marie Thérèse de Chevigne de.

CHEVRILLON, LOUISE SEE Saint-René
  Taillandier, Madeleine Marie Louise
  (Chevrillon)

CHICAGO. UNIVERSITY.

A manual of style, with specimens of type. 8th ed. © 18May25, A855748. R112089, 13May53, The University of Chicago (PCW)

CHILDREN'S Day helper, no. 12. Words by E. E. Hewitt and others. Music by B. D. Ackley and others. © 17Apr26, A895709. R110763, 20Apr53, The Rodeheaver Co., as successor to Hall-Mack Co. (PWH)

CHRISMAN, ARTHUR BOWIE.

  Shen of the sea; illustrated by Else
    Hasselriis. © 5Aug25, A864124.
    R105839, 14Jan53, Arthur Bowie
    Chrisman (A)

CHRISTIE, AGATHA (MILLER)

  Poirot investigates. © 18Apr25,
    A829233. R106657, 30Jan53,
    Agatha Christie Mallowan (A)

  The secret of chimneys. © 29Aug25,
    (pub. abroad 12Jun25, AI-7185),
    A864455. R106658, 30Jan53,
    Agatha Christie Mallowan (A)

CHRISTIE, CLARENCE V.

Electrical engineering. 3d ed., rev. © 3Sep25, A864490. R108081, 27Feb53, Clarence V. Christie (A)

CHURCH, RALPH W.

  The essence of Catholicism. (Little
    blue book, no. 753) © 4Apr25,
    A828815. R107209, 4Feb53,
    Haldeman-Julius Co. (PWH)

CICERO, MARCUS TULLIUS.

Selections from The impeachment of Verres: The plunder of Syracuse and The crucifixion of a Roman citizen; edited with notes and vocabulary by Walter S. Harley. © 28May25, A857343. R106252, 23Jan53, Walter S. Harley (A)

THE CITATOR. Missouri ed., supplement 1926. © 15Feb26, A883956. R109398, 27Mar53, Shepard's Citations, inc. (PCB)

CITATOR PUBLISHING COMPANY

  The citator. R109398. SEE
    The citator.

CITY BANK FARMERS TRUST COMPANY, NEW YORK

  The professor's house. R112288. SEE
    Cather, Willa.

  The Wagnerian romances. R112290.
    SEE Hall, Gertrude.

CLARK, BARRETT H., ed.

  Great short stories of the world;
    edited by Barrett H. Clark and
    Maxim Lieber. © 8Dec25, A879023.
    R108274, 5Mar53, Barrett H.
    Clark (A)

CLARK, BRISCOE BALDWIN.

  New York law of damages. 2 v.
    © Edward Thompson Co. (PWH)

<pb id='024.png' />
    v. 1. © 8Jan26, A891716.
      R109795, 3Apr53.

    v. 2. © 8Jan26, A891717.
      R109796, 3Apr53.

CLARK, ELLERY H., Jr.

  Carib gold. R108660. SEE Clark,
    Ellery H., Sr.

CLARK, ELLERY H., Sr.

  Carib gold. © 19Feb26, A883440.
    R108660, 12Mar53, Ellery H.
    Clark, Jr. (C)

CLARK, IMOGEN, comp.

Suppose we play: a collection of indoor and outdoor games for young and old. © 24Sep25, A869013. R111273, 23Apr53, Thomas Y. Crowell Co. (PWH)

CLARK, NALBRO BARTLEY
  SEE Bartley, Nalbro Isadorah.

CLARK, VINNIE B.

Europe, a geographical reader. © 26Sep25, A864794. R106255, 23Jan53, Vinnie B. Clark Molitor (A)

CLAUDEL, PAUL.

  Morceaux choisis. © 15Dec25, AF29994.
    R112463, 25May53, Paul Claudel (A)

CLEMENTIA, pseud. SEE Feehan, Mary
  Edward, Sister.

CLIFTON, OLIVER LEE.

The Camp Fire Boys' canoe cruise; or, Stormbound on the upper Rockaway. Illustrated by John M. Foster. © 27May25, A829420. R108611, 11Mar53, Oliver Lee Clifton (A)

CLITTY, WINIFRED HOWARD-
  SEE Howard-Clitty, Winifred.

COBB, BERTHA B., joint author

  Allspice. R106781. SEE
    Cobb, Ernest.

COBB, ERNEST.

Allspice, by Ernest and Bertha B. Cobb; pictures by L. J. Bridgman. © 15Jan25, A822000. R106781, 13Jan53, Ernest Cobb (A)

COBB, IRVIN S.

  On an island that cost $24.00.
    © 19Feb26, A883388. R107767,
    20Feb53, Laura Baker Cobb (W)

  Prose and cons. © 9Jun26, A901115.
    R113165, 10Jun53, Laura Baker
    Cobb (W)

COBB, LAURA BAKER

  On an island that cost $24.00.
    R107767. SEE Cobb, Irvin S.

  Prose and cons. R113165. SEE
    Cobb, Irvin S.

COCHRANE, NORMA

  The desk standard dictionary of the
    English language. R106524. SEE
    The desk standard dictionary of
    the English language.

  The practical standard dictionary of
    the English language. R106525.
    SEE The practical standard dictionary
    of the English language.

COCTEAU, JEAN.

  Poésie, 1916-1923. © 27Feb25,
    AF27144. R106423, 28Jan53, Jean
    Cocteau (A)

COLBY, W. W.

  Sing unto the Lord a new song.
    R108370. SEE Sing unto the
    Lord a new song.

<pb id='025.png' n='1953_h1/A/0311' /> COLE, ELEANOR BIGGERS

  Fifty candles. R109709. SEE
    Biggers, Earl Derr.

COLE, GEORGE DOUGLAS HOWARD.

The death of a millionaire, by G. D. H. Cole and Margaret Cole. © 14Jul25, (pub. abroad 26Feb25, AI-6804), A855869. R107485, 16Feb53, Margaret Cole & G. D. H. Cole (A)

COLE, MARGARET, joint author

  The death of a millionaire. R107485.
    SEE Cole, George Douglas Howard.

COLE, MORRIS M.

5-minute guaranteed guitar course. © 1Feb26, A885705. R106754, 4Feb53, M. M. Cole (A)

5-minute guaranteed tenor banjo course, by Wolff [pseud.] © 5Jan26, A881125. R104974, 7Jan53, Morris M. Cole (A)

  5-minute guaranteed violin course.
    © 22Apr26, A894648. R111559,
    1May53, M. M. Cole (A)

  5 minute harmonica course. © 1May26,
    A895397. R111572, 4May53, M. M.
    Cole (A)

COLEMAN, BESSIE BLACKSTONE.

The pathway to reading. Phonetic element cards, primer set, first reader set-third reader set, by Bessie B. Coleman, Willis L. Uhl, and James F. Hosic. © 6Oct25, A870252. R106264, 23Jan53, Bessie Blackstone Coleman (A) Alta V. Uhl (W) & James Fleming Hosic (A)

  The pathway to reading. Sentence
    cards, primer set, by Bessie B.
    Coleman, Willis L. Uhl, and James
    F. Hosic. © 6Oct25, A870254.
    R106266, 23Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

  The pathway to reading. Teacher's
    manual for first reader, by Bessie
    Blackstone Coleman, Willis L. Uhl,
    and James Fleming Hosic. © 29Aug25,
    A866649. R106257, 23Jan53, Bessie
    Blackstone Coleman (A) Alta V.
    Uhl (W) & James Fleming Hosic (A)

  The pathway to reading. Teacher's
    manual for second and third readers,
    by Bessie Blackstone Coleman,
    Willis L. Uhl, and James Fleming
    Hosic. © 10Sep25, A865987.
    R106256, 23Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

  The pathway to reading. Teacher's
    manual for the primer, by Bessie
    Blackstone Coleman, Willis L. Uhl,
    and James Fleming Hosic. © 29Aug25,
    A866650. R106258, 23Jan53, Bessie
    Blackstone Coleman (A) Alta V.
    Uhl (W) & James Fleming Hosic (A)

  The pathway to reading, first reader,
    by Bessie Blackstone Coleman, Willis
    L. Uhl, and James Fleming Hosic;
    illustrated by Eunice and John
    Stephenson. © 14Apr25, A822898.
    R105712, 6Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

  The pathway to reading, first reader.
    Phrase cards, set 1-3, by Bessie B.
    Coleman, Willis L. Uhl, and James
    F. Hosic. © 22Oct25, A873057.
    R106269, 23Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

  The pathway to reading, first reader.
    Word cards, set 1-5, by Bessie B.
    Coleman, Willis L. Uhl, and James
    F. Hosic. © 22Oct25, A873056.
    R106268, 25Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

<pb id='026.png' />
  The pathway to reading, primer, by
    B. B. Coleman, W. L. Uhl, and J. F.
    Hosic; illustrated by Maud and Miska
    Petersham. © 17Mar25, A826274.
    R105715, 6Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

  The pathway to reading, primer.
    Phrase cards, set A-E, by Bessie
    B. Coleman, Willis L. Uhl, and
    James F. Hosic. © 6Oct25, A870253.
    R106265, 23Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

  The pathway to reading, primer. Word
    cards, set A-E, by Bessie B.
    Coleman, Willis L. Uhl, and James F.
    Hosic. © 23Sep25, A867647.
    R106260, 23Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

  The pathway to reading, second reader,
    by Bessie Blackstone Coleman, Willis
    L. Uhl, and James Fleming Hosic;
    illustrated by Eunice and John
    Stephenson. © 2Jun25, A829503.
    R106250, 23Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

  The pathway to reading, third reader,
    by Bessie Blackstone Coleman,
    Willis L. Uhl, and James Fleming
    Hosic; illustrated by Eunice and
    John Stephenson. © 2Jul25, A859791.
    R106253, 23Jan53, Bessie Blackstone
    Coleman (A) Alta V. Uhl (W) & James
    Fleming Hosic (A)

COLETTE, SIDONIE GABRIELLE.

  La fin de Cheri, roman. © 11Mar26,
    AF30470. R111452, 1May53, Colette
    (pseudo. de Mme Goudeket, née
    Sidonie Colette) (A)

COLLINS, ARCHIE FREDERICK.

The amateur photographer's handbook. © 29Apr25, A823988. R108232, 2Mar53, Thomas Y. Crowell Co. (PWH)

COLTON, GEORGE W., Jr.

  The Shanghai gesture. R113800. SEE
    Colton, John.

COLTON, HARVEY

  The Shanghai gesture. R113800. SEE
    Colton, John.

COLTON, JOHN.

The Shanghai gesture, a play with an introd. by John D. Williams. © 14Jun26, A897194. R113800, 25Jun53, Marcus F. Colton, George W. Colton, Jr. & Harvey Colton (NK)

COLTON, MARCUS P.

  The Shanghai gesture. R113800. SEE
    Colton, John.

COLUM, PADRAIC.

  Three plays. Rev. ed. Contents.—
    The fiddler's house.—The land.—Thomas
    Muskerry. © 8Sep25,
    A864482. R109039, 18Mar53, Padraic
    Colum (A)

COLUMBIA UNIVERSITY. ALUMNI FEDERATION.

  Columbia songs. 3d ed. © 18Feb25,
    A823415. R107405, 13Feb53, Alumni
    Federation of Columbia U. (PCW)

COLWELL, RUTH C.

  Africa. R109052. SEE Chamberlain,
    James Franklin.

  Asia. R109050. SEE Chamberlain,
    James Franklin.

  Oceania. R109036. SEE Chamberlain,
    James Franklin.

COMBEROUSSE, THÉRÈSE MARY

  La fin de Roussiote. R105834. SEE
    Mary, Jules.

<pb id='027.png' /> COMNENE, MARIE ANNE SEE Crémieux, Marie Anne Comnene.

COMPENDIUM gradualis et antiphonalis pro dominicis et festis; cum cantu gregoriano, no. 790C. © 24Oct24, AF25998. R106717, 24Oct52, Desclée & Cie (PWH)

CONDON, EDWARD.

  Curiosities of mathematics. (Little
    blue book, no. 876) © 15Jun25,
    A867117. R111286, 23Apr53,
    Haldeman-Julius Co. (PWH)

CONGREGATION OF ST. BASIL, BASILIAN FATHERS
  OF TORONTO SEE Basilians.

CONNER, MARION SMITH

  Topper, an improbable adventure.
    R107928. SEE Smith, Thorne.

CONNOLLY, MARGARET.

  The life story of Orison Swett
    Marden. © 20Nov25, A872571.
    R113022, 4Jun53, Thomas Y.
    Crowell Co. (PWH)

CONRAD, JOSEPH.

Last essays; with an introd. by Richard Curle. © on new matter; 26Mar26, (pub. abroad 3Mar26, AI-7935), A897093. R109463, 30Mar53, Richard Curle (A)

CONSTANT, BENJAMIN DE
  SEE Constant de Rebecque, Henri Benjamin.

CONSTANT DE REBECQUE, HENRI BENJAMIN.

Adolphe; translated by Paul Hookham, with an introd. by Henry K. Marks. © on introd.; 30Oct25, A875138. R112034, 15May53, Alfred A. Knopf, inc. (PWH)

COOK, Sir EDWARD TYRAS.

A short life of Florence Nightingale, abridged from The life, with additional matter by Rosalind Nash. © 25Aug25, A861559. R113780, 24Jun53, Rosalind Nash (A)

COOK, PHILIP

  American citizenship. R112139. SEE
    American Bar Association.
    Committee on American citizenship.

COOPER, JAMES FENIMORE.

The last of the Mohicans; edited by Frederick Houk Law, illustrated by Edwin John Prittie. (Winston companion classics) © on editorial matter & illus.; 19Nov25, A872797. R105887, 12Jan53, The John C. Winston Co. (PWH)

COOPER, MERIAN C.

  Grass. Foreword by William Beebe,
    with illus. by Ernest Beaumont
    Schoedsack. © 30Mar25, A823621.
    R108383, 6Mar53, Merian C.
    Cooper (A)

CORBETT, JAMES J.

The roar of the crowd; with a foreword by Robert Gordon Anderson. © 23Feb25, A822220. R105784, 19Jan53, Vera Corbett (W)

CORBETT, VERA

  The roar of the crowd. R105784.
    SEE Corbett, James J.

CORDER, FREDERICK.

  Ferencz (Francois) Liszt. (Masters
    of music) © 2Dec25, A872716.
    R109732, 3Apr53, Routledge &
    Kegan Paul, ltd. (PWH)

<pb id='028.png' n='1953_h1/A/0312' /> CORELLI, MARIE.

  Poems. © 16Apr26, (pub. abroad
    15Dec25, AI-7799), A890399.
    R110432, 17Apr53, Doubleday &
    Co., inc. (PPW)

CORNELIUS, ASHER L.

The law of search and seizure. © 29Jan26, A890785. R111900, 11May53, The Bobbs-Merrill Co., inc. (PWH)

CORPUS juris, edited by William
  Mack and Donald J. Kiser.
  Vol. 39. © 28Dec25, A879366.
  R105351, 5Jan53, The American
  Law Book Co. (PWH)

CORPUS juris. 1926 annotations to Corpus juris-Cyc. system; edited by William Howard Buchanan. © 24Feb26, A883932. R109760, 3Apr53, The American Law Book Co. (PWH)

CORRELL, ELLA

  Alternating-current circuits.
    R108083. SEE Bryant, John Myron.

CORRELL, JAMES A., joint author

  Alternating-current circuits.
    R108083. SEE Bryant, John Myron.

CORY, DAVID.

  Little Jack Rabbit and Miss Mousie;
    illustrated by H. S. Barbour. (His
    Little Jack Rabbit books)
    © 15May25, A855241. R106958,
    6Feb53, David Cory (A)

  Little Jack Rabbit and the policeman
    dog; illustrated by H. S. Barbour.
    (His Little Jack Rabbit books)
    © 15May25, A855242. R106959,
    6Feb53, David Cory (A)

Little Jack Rabbit coloring book. © 23Mar26, A888049. R109256, 24Mar53, The Platt & Munk Co., inc. (PWH)

COTHRON, VIRGINIA A.

  Let heaven's sunshine in. R104972.
    SEE Alexander, C. C.

COUCH, Sir ARTHUR THOMAS QUILLER-
  SEE Quiller-Couch, Sir Arthur Thomas.

COUCH, FOY F. QUILLER-
  SEE Quiller-Couch, Foy F.

COVARRUBIAS, MIGUEL.

  The Prince of Wales and other famous
    Americans; with a pref. by Carl
    Van Vechten. © 2Oct25, A869249.
    R112027, 15May53, Miguel
    Covarrubias (A)

COWMAN, Mrs. CHARLES E.

  Streams in the desert. © 25May25,
    A855868. R110338, 14Apr53, Mrs.
    Charles L. Cowman. (A)

COX, GEORGE J.

Art, for amateurs and students. © 7May26, A897096. R112011, 12May53, P. Norah Cox (W)

COX, P. NORAH

Art. R112011. SEE Cox, George J.

COX, PALMER.

  The Brownies in Fairyland, by Palmer
    Cox and Malcolm Douglas. © 29Aug25,
    A861806. R110017, 7Apr53, Mrs.
    F. G. Neapole (NK of P. Cox)

CRAIG, CLAYTON B. SEE Trustees
  under the Will of Mary Baker Eddy.

<pb id='029.png' /> CRAIG, DOROTHEA

  O'Malley of Shanganagh. R107497.
    SEE Byrne, Donn.

CRAMP, ARTHUR J.

The patent medicine and the public health. (Little blue book, no. 794.) © 28Apr25, A856202. R107225, 4Feb53, Haldeman-Julius Co. (PWH)

CRANE, CLAUDE B.

First sheet computing stock charts. © 22Aug25, A866455. R113674, 22Jun53, Claude B. Crane (A)

CRANE, STEPHEN.

  The work of Stephen Crane, v. 1-2.
    Edited by Wilson Follett. © Alfred
    A. Knopf, inc. (PWH)

v. 1. The red badge of courage, and The veteran. Introd. by Joseph Hergesheimer. © on introd. & corrections; 13Nov25, A875206. R112035, 15May53.

v. 2. Tales of two wars. Introd. by Robert H. Davis. © on introd. & editorial matter; 4Dec25, A875486. R112038, 15May53.

CRAWFORD, NELSON ANTRIM.

  Poems about Jesus. (Little blue
    book, no. 848) © 18May25, A829479.
    R110130, 10Apr53, Haldeman-Julius
    Co. (PWH)

  Poems of John Greenleaf Whittier.
    R107223. SEE Whittier, John
    Greenleaf.

  Poems of Oliver Wendell Holmes.
    R110129. SEE Holmes, Oliver
    Wendell.

  Poems of Percy Bysshe Shelley.
    R107222. SEE Shelley, Percy
    Bysshe.

  Poems of Ralph Waldo Emerson.
    R107233. SEE Emerson, Ralph Waldo.

  Poems of William Cullen Bryant.
    R107234. SEE Bryant, William
    Cullen.

CRÉMIEUX, BENJAMIN, tr.

  Six personnages en quête d'auteur.
    R112453. SEE Pirandello, Luigi.

CRÉMIEUX, MARIE ANNE COMNENE

  Six personnages en quête d'auteur.
    R112453. SEE Pirandello, Luigi.

CROCKER, ANTOINETTE C.

  The romance of design. R108302.
    SEE Warren, Garnet.

CROCKETT, DANIEL WOOLSEY, ed.

Oklahoma three in one service. R105319 … SEE Oklahoma three in one service.

CROCKETT, SARAH GATES

  A satchel guide to Europe. R109313.
    SEE A satchel guide to Europe.

CROCKETT, WILLIAM D.

  A satchel guide to Europe. R109313.
    SEE A satchel guide to Europe.

CROISSET, FRANCIS DE.

  La féerie cinghalaise. © 10Apr26,
    AF31070. R111462, 1May53, Mme
    Francis de Croisset (née Marie-Thérèse
    de Chevigne) (W)

CROISSET, Mme FRANCIS DE
  SEE Croisset, Marie Thérèse de Chevigne de.

CROISSET, MARIE THÉRÈSE DE CHEVIGNE DE

  La féerie cinghalaise. R111462.
    SEE Croisset, Francis de.

CROIX-LAVAL, RÉVÉREND PÈRE DE LA

  Dictionnaire apologétique de la foi
    catholique. R111456. SEE
<pb id='030.png' />
    Dictionnaire apologétique de la
    foi catholique.

CRONAN, NELL GRANT

  In the days of my father, General
    Grant. R107780. SEE Grant,
    Jesse R.

CROSS, RUTH.

The unknown goddess, a novel. © 23Apr26, A890486. R112802, 1Jun53, Ruth Cross Palmer (A)

CROSS, WILBUR L., Jr.

  The life and times of Laurence
    Sterne. R109683. SEE Cross,
    Wilbur L., Sr.

CROSS, WILBUR L., Sr.

  The life and times of Laurence Sterne.
    2 v. New ed. © 11Sep25, A864759.
    R109683, 2Apr53, Wilbur L.
    Cross, Jr. (C)

CROTHERS, RACHEL.

Six one-act plays. Contents.—The importance of being clothed.—The importance of being nice.—The importance of being married.—The importance of being a woman.—What they think.—Peggy. © 21Dec25, A872996. R105589, 12Jan53, Rachel Crothers (A)

CROWELL (THOMAS Y.) COMPANY

  The amateur photographer's handbook.
    R108232. SEE Collins, Archie
    Frederick.

  American citizenship. R112139. SEE
    American Bar Association.
    Committee on American Citizenship.

  Crowell's handbook for readers and
    writers. R111274. SEE Gerwig,
    Henrietta, ed.

  Famous American statesman. R108231.
    SEE Bolton, Sarah K.

  Famous composers. R108230. SEE
    Dole, Nathan Haskell.

  The life story of Orison Swett Marden.
    R113022. SEE Connolly, Margaret.

  Lives of girls who became famous.
    R108228. SEE Bolton, Sarah K.

  Lives of poor boys who became famous.
    R108229. SEE Bolton, Sarah K.

  The practical book of home repairs.
    R111270. SEE Fraser, Chelsea.

  Social problems of today. R111272.
    SEE Dow, Grove Samuel.

  Suppose we play. R111273. SEE
    Clark, Imogen, comp.

  Where love is there God is also.
    R111269. SEE Tolstoi, Lev Nikolaevich,
    graf.

  The young people's cook book.
    R111271. SEE McFee, Inez N.

CROY, HOMER.

  They had to see Paris. © 25Mar26,
    A883794. R112817, 1Jun53, Homer
    Croy (A)

CULLEN, COUNTEE

Color. © 20Oct25, A872000. R104876, 30Dec52, Ida M. Cullen (W)

CULLEN, IDA M.

  Color. R104876. SEE Cullen,
    Countee.

CULLUM, RIDGWELL.

  Child of the North. © 11Jun26,
    A891796. R113324, 12Jun53, Agnes
    Burghard (W)

CUMMINGS, EDWARD ESTLIN.

  XLI poems. © 11Apr25, A823905.
    R109267, 26Mar53, Edward Estlin
    Cummings (A)

<pb id='031.png' n='1953_h1/A/0313' /> CUNLIFFE, JOHN W., ed.

Century readings in ancient, classical, and modern European literature, edited by John W. Cunliffe and Grant Showerman. © 21Sep25, A861940. R107504, 16Feb53, Zilphia V. Showerman (W) & Margaret B. Pickel (E of J. W. Cunliffe)

CUPPLES AND LEON COMPANY

  Baseball Joe. R105069. SEE
    Chadwick, Lester.

  Betty Gordon at Rainbow Ranch.
    R105066. SEE Emerson, Alice B.

  The curlytops touring around.
    R105068. SEE Garis, Howard R.

  Ruth Fielding at Golden Pass.
    R105067. SEE Emerson, Alice B.

CURLE, RICHARD

  Last essays. R109463. SEE Conrad,
    Joseph.

CURME, GEORGE O.

  College English grammar. © 10Jun25,
    A829648. R112209, 15May53,
    Gertrude Curme Bragg (C)

CURTIS, ALICE TURNER.

A little maid of Monmouth; illustrated by Grace Norcross. © 20Oct25, A869751. R112028, 15May53, Alice Turner Curtis (A)

CURWOOD, ETHEL M.

  Swift lightning. R112128. SEE
    Curwood, James Oliver.

CURWOOD, JAMES OLIVER.

  Swift lightning. © 10Apr26, A890293.
    R112128, 14May53, Ethel M.
    Curwood (W)

CUSHMAN, EDWARD HOWARD.

The law of mechanic's liens in Pennsylvania, with selected forms. 2 v. © Edward Howard Cushman (A)

    v. 1. © 30Dec25, A879109.
      R112722, 27May53.

    v. 2. © 30Dec25, A879110.
      R112723, 27May53.

CUTHRELL, FAITH BALDWIN
  SEE Baldwin, Faith.

CYCLOPEDIA of law and procedure. 1926 annotations to Cyclopedia of law and procedure, 1-40 Cyc.; edited by William Howard Buchanan. © 24Feb26, A890335. R109761, 3Apr53, The American Law Book Co. (PWH)

DA COSTA, JOHN CHALMERS.

  Modern surgery, general and operative.
    9th ed., rev. © 22May25, A829404.
    R107362, 9Feb53, Mary Da Costa
    Brick Ringe (NK)

DAKIN, MARION H.

  Great rivers of the world. R109027.
    SEE Dakin, Wilson S.

DAKIN, WILSON S.

  Great rivers of the world. © 26May25,
    A855382. R109027, 18May53, Marion
    H. Dakin (W)

DAMROSCH, WALTER.

Supplementary sight singing exercises, by Walter Damrosch, George H. Gartlan, and Karl W. Gehrkens. © 13Aug25, A883010. R112111, 13May53, George H. Gartlan, Karl W. Gehrkens (A) & Alice Damrosch Kiaer (C)

<pb id='032.png' /> DANBY, HERBERT, tr.

  Jesus of Nazareth. R109040. SEE
    Klausner, Joseph.

DANIELSON, FANNIE HURST
  SEE Hurst, Fannie.

DARROW, CLARENCE.

  Is life worth living? R111302. SEE
    Starr, Frederick.

  Is the human race getting anywhere?
    R111303. SEE Starr, Frederick.

  Voltaire, a lecture. (Little blue
    book, no. 829) © 13May25, A829477.
    R110128, 10Apr53, Haldeman-Julius
    Co. (PWH)

DARROW, FLOYD L.

  Thinkers and doers. © 5Dec25,
    A872729. R106267, 23Jan53,
    Floyd L. Darrow (A)

  Through science to God. © 16Oct25,
    A869756. R109708, 20Mar53, Floyd
    L. Darrow (A)

DARTMOUTH COLLEGE. TRUSTEES

  The arts anthology. R110122. SEE
    The arts anthology.

DASCH, GEORGE.

  The symphony series of programs for
    school and community orchestras.
    R106248 … SEE Stock, Frederick.

DASHWOOD, ELIZABETH M.
  SEE De la Pasture, Edmée Elizabeth Monica.

DASHWOOD, PAUL

  The chip and the block. R112810.
    SEE De la Pasture, Edmée Elizabeth
    Monica.

DAUDET, ALPHONSE.

  The pope's mule; with pictures by
    Cheri Herouard. (Little library
    series) © on illus.; 25Aug25,
    A861550. R109034, 18Mar53, The
    Macmillan Co. (PWH)

DAUGHERTY, JIMMIE, illus.

  King Penguin. R109030. SEE
    Horne, Richard Henry.

DAUGHERTY, ROBERT LONG.

  Hydraulics. 3d ed. © 2Jul25,
    A861021. R108073, 27Feb53,
    R. L. Daugherty (A)

DAVIS, ELMER.

  Friends of Mr. Sweeney. © 27Oct25,
    A875141. R108273, 5Mar53, Elmer
    Davis (A)

DAVIS, JOHN W.

  American citizenship. R112139. SEE
    American Bar Association.
    Committee on American Citizenship.

DAVIS, LOUISE STANTON

  The boy's life of Grover Cleveland.
    R104703. SEE Davis, Royal J.

DAVIS, ROBERT H.

  The work of Stephen Crane.
    R112035 … SEE Crane, Stephen.

DAVIS, ROLAND P., joint author

  Foundations of bridges and buildings.
    R108085. SEE Jacoby, Henry S.

DAVIS, ROYAL J.

The boy's life of Grover Cleveland. © 14Aug25, A864227. R104703, 29Dec52, Louise Stanton Davis (W)

DAVIS, THOMAS FREDERICK.

  History of Jacksonville, Florida, and
    vicinity, 1513 to 1924. © 11Jan26,
<pb id='033.png' />
    A883075. R105783, 19Jan53, Mrs. T.
    Frederick Davis (W)

DAVIS, Mrs. THOMAS FREDERICK

History of Jacksonville, Florida, and vicinity. R105783. SEE Davis, Thomas Frederick.

DAVISON, ARCHIBALD T.

  The Harvard University hymn book.
    R112173. SEE The Harvard
    University hymn book.

  Music education in America.
    © 21May26, A891534. R112793,
    1Jun53, Archibald T. Davison (A)

DAVISON, EDWARD.

  Harvest of youth. © 11Mar26, A883616.
    R112812, 1Jun53, Edward Davison (A)

DAWES, CHESTER L.

Industrial electricity, pt. 2. 1st ed. (Electrical engineering texts) © 11Nov25, A872481. R108086, 27Feb53, Chester L. Dawes (A)

DAWSON, CONINGSBY

  The autobiography of a mind. R107498.
    SEE Dawson, William James.

DAWSON, WILLIAM JAMES.

The autobiography of a mind. © 14Mar25, A823453. R107498, 16Feb53, Coningsby Dawson (C)

DAY, LILLIAN PASCAL.

  Widows' Protective League. © 10Jun25,
    A889032. R110537, 22Apr53,
    Lillian Pascal Day (A)

DEANE, ANTHONY C.

How to enjoy the Bible. (Doran's modern reader's bookshelf) © 14Aug25, A864369. R104704, 29Dec52, E. Maude Deane (W)

DEANE, E. MAUDE

  How to enjoy the Bible. R104704.
    SEE Deane, Anthony C.

DEARBORN, EMMA B.

Speedwriting, book 1-6. © 20Jul25, A865612. R108566, 9Mar53, School of Speedwriting, inc. (PWH)

DEBERLY, HENRI.

  L'ennemi des siens. © 2Mar25,
    AF27277. R107540, 16Feb53, Jean
    Deberly (C)

  Pancloche. © 20Nov25, AF29475.
    R112457, 25May53, Jean Deberly (C)

DEBERLY, JEAN

  L'ennemi des siens. R107540. SEE
    Deberly, Henri.

  Pancloche. R112457. SEE Deberly,
    Henri.

DE CASSERES, BENJAMIN.

  Forty immortals. © 10Apr26, A901428.
    R113743, 22Jun53, Mrs. Benjamin
    De Casseres (W)

  James Gibbons Huneker. © 25Apr25,
    A901529. R110183, 7Apr53, Bio
    De Casseres (W)

DE CASSERES, Mrs. BENJAMIN

  Forty immortals. R113743. SEE
    De Casseres, Benjamin.

DE CASSERES, BIO

  James Gibbons Huneker. R110183.
    SEE De Casseres, Benjamin.

DECOIN, HENRI, joint author

  Le roi de la pedale. R112770.
    SEE Cartoux, Paul.

<pb id='034.png' n='1953_h1/A/0314' /> DEEPING, WARWICK.

  Sorrell and son. © 19Feb26, (pub.
    abroad 25Aug25, AI-7424), A897841.
    R112989, 5Jun53, Mrs. Warwick
    Deeping (W)

DEEPING, Mrs. WARWICK

  Sorrell and son. R112989. SEE
    Deeping, Warwick.

DEFOE, DANIEL.

Robinson Crusoe; edited by Lora B. Peck, illustrated by Frank Godwin. © on editorial matter & illus.; 10Nov25, A872798. R105888, 12Jan53, The John C. Winston Co. (PWH)

DE FORD, MIRIAM ALLEN.

  Cicero as revealed in his letters.
    (Little blue book. no. 867)
    © 27May25, A829486. R110132,
    10Apr53, Haldeman-Julius Co. (PWH)

  Latin self taught. (Little blue
    book. no. 999) © 27Apr26, A894521.
    R111601, 4May53, Haldeman-Julius
    Co. (PWH)

  The life and poems of Catullus.
    (Little blue book, no. 832)
    © 11May25, A857725. R110159,
    10Apr53, Haldeman-Julius Co. (PWH)

  Rome as viewed by Tacitus and Juvenal.
    (Little blue book. no. 899)
    © 31Aug25, A867104. R111278,
    23Apr53, Haldeman-Julius Co. (PWH)

  Typewriting self taught. (Little
    blue book, no. 1009) © 21May26,
    A898647. R112537, 25May53,
    Haldeman-Julius Co. (PWH)

DELAFIELD, E. M., pseud. SEE De la Pasture,
  Edmée Elizabeth Monica.

DE LA MARE, WALTER.

Broomsticks, and other tales. With designs by Bold. © 20Nov25, A875254. R112988, 5Jun53, Walter de la Mare (A)

DELANEY, JUNE SMITH

  Topper, an improbable adventure.
    R107928. SEE Smith, Thorne.

DE LA PASTURE, EDMÉE ELIZABETH MONICA.

  The chip and the block, by E. M.
    Delafield [pseud.] © 4May26,
    (pub. abroad 11Sep25, AI-7394),
    A883520. R112810, 1Jun53, Paul
    Dashwood (Wr)

DE LA RAMÉE, LOUISE.

  A dog of Flanders, by Louise de la
    Ramée ("Ouida") illustrated by
    Gustav Tenggren. © on illus.;
    4Aug25, A861290. R109031, 18Mar53,
    The Macmillan Co. (PWH)

DELARUE-MARDRUS, LUCIE.

  Graine au vent, roman. © 15Mar26,
    AF30883. R111459, 1May53,
    Marie-Louise Labayle (E)

DELEUTRE, PAUL CHARLES PHILIPPE ERIC.

  La capitaine Nilia, roman d'aventures,
    par Paul d'Ivoi [pseud.]
    © 16Apr25, AF27657. R105823,
    9Jan53, Mme Louis d'Hee (née
    Paulette d'Ivoi) (C)

  Le corsaire triplex; l'ile d'or,
    roman d'aventures, par Paul d'Ivoi
    [pseud.] © 12Feb25, AF27004.
    R105822, 9Jan53, Louis d'Hee (née
    Paulette d'Ivoi) (C)

Message du mikado; une fillette contre un empire, par Paul d'Ivoi [pseud.] (Bibliothèque des grandes aventures) © 11Jun25, AF28134. R105825, 9Jan53, Mme Louis d'Hee (née Paulette d'Ivoi) (C)

<pb id='035.png' />
  Le secret de Nilia, roman d'aventures,
    par Paul d'Ivoi [pseud.] (Le Livre
    national. Aventures et voyages,
    no. 49) © 23Apr25, AF28093.
    R105824, 9Jan53, Mme Louis d'Hee
    (née Paulette d'Ivoi) (C)

  Le serment de Daalia; la chasse au
    mystère, roman, par Paul d'Ivoi
    [pseud.] © 31Dec25, AF30257.
    R105833, 9Jan53, Mme Louis d'Hee
    (née Paulette d'Ivoi) (C)

  Le serment de Daalia, roman, par Paul
    d'Ivoi [pseud.] © 24Dec25,
    AF30256. R105832, 9Jan53, Mme
    Louis d'Hee (née Paulette
    d'Ivoi) (C)

  Le voeu des Incas, roman, par Paul
    d'Ivoi [pseud.] (Grandes aventures
    & voyages excentriques) © 4Mar26,
    AF30627. R111453, 1May53, Paulette
    d'Hee (née Paulette d'Ivoi) (C)

  Les vouleurs de foudre, roman
    d'aventures, par Paul d'Ivoi [pseud.]
    © 8Oct25, AF29324. R105826,
    9Jan53, Mme Louis d'Hee (née
    Paulette d'Ivoi) (C)

DELL, FLOYD.

Intellectual vagabondage. (Doran's modern reader's bookshelf) © 19Mar26, A879968. R109180, 20Mar53, Floyd Dell (A)

  Love in Greenwich Village. © 14May26,
    A890837. R112162, 15May53, Floyd
    Dell (A)

DEL RICCIO, LUIGI.

The true story of Eleonora Duse's love affair with d'Annunzio. (Little blue book, no. 747) © 17Mar25, A823486. R107208, 4Feb53, Haldeman-Julius Co. (PWH)

DESCLÉE ET COMPAGNIE

Brevoir synopsis theologiae moralis et pastoralis. R106721. SEE Tanquerey, Adolphe.

Compendium gradualis et antiphonalis pro dominicis et festis. R106717. SEE Compendium gradualis et antiphonalis pro dominicis et festis.

  Graduel-vesperal. R106720. SEE
    Graduel-vesperal.

Liber usualis missae et officii pro dominicis et festis. R106718. SEE Liber usualis missae et officii pro dominicis et festis.

  Messe des morts et sepultures.
    R106716. SEE Messe des morts et
    sepultures.

  Paroissien romain. R106719. SEE
    Paroissien romain.

THE DESK standard dictionary of the
  English language, by James C.
  Fernald. A new ed., rev. by
  Frank H. Vizetelly. © 31Jan25,
  A823273. R106524, 31Jan53, Norma
  Cochrane (C)

DETROIT. PUBLIC SCHOOLS.

  Detroit advanced first grade
    intelligence test, by Harry Jay Baker.
    Form 689, Group test B. © 10Sep25,
    A881851. R109411, 16Jan53, Harry
    Jay Baker (A)

  Detroit advanced intelligence test,
    by Harry Jay Baker. Form 687.
    © 16Nov25, A881850. R109410,
    16Jan53, Harry Jay Baker (A)

  Detroit advanced intelligence test,
    by Harry Jay Baker. Form 8639,
    Group test W. © 16Nov25, A83068.
    R109409, 16Jan53, Harry Jay
    Baker (A)

DETZER, KARL W.

True tales of the D. C. I. © 16Oct25, A869755. R110824, 24Apr53, Karl W. Detzer (A)

<pb id='036.png' /> DEWARD AND RICH, INC.

  Publicity guide for radio dealers.
    R107251. SEE Doll and Smith,
    New York.

DEWEY, KAETHE WELLER, joint author

  Pathology of the mouth. R107366.
    SEE Moorehead, Frederick B.

DEWEY, MARJORIE S. G.

  The wonder hat. R106523. SEE
    Goodman, Kenneth Sawyer.

DICKENS, CHARLES.

The personal history and experience of David Copperfield the younger. Foreword by Edith Freelove Smith; illus. by Harriet Savage Smith. © on foreword & illus.; 13Oct25, A869394. R109048, 18Mar53, The Macmillan Co. (PWH)

DICKINSON, ASA DON

  Wild flowers. R108304. SEE
    Doubleday, Nellie Blanchan
    (De Graff)

DICKINSON, LORAIN

  Brown E-Z way. R111728. SEE Brown,
    John Oscar.

  Horseback riding. R111421. SEE
    Brown, John Oscar.

DICKSON, HARRIS.

An old-fashioned senator, a story—biography of John Sharp Williams. © 17Sep25, A872969. R109329, 25Mar53, Madeleine M. Dickson (W)

DICKSON, MADELEINE M.

  An old-fashioned senator. R109329.
    SEE Dickson, Harris.

DICTIONNAIRE apologétique de la foi
  catholique, fasc. 21.
  Adhémar d'Alès, éditeur. 4. éd. © 15Jun25,
  AF30670. R111456, 1May53, Révérend
  Père de la Croix-Laval (E)

DIGEST of the decisions of the courts
  of Missouri, to Apr. 1925;
  edited by the American Digest System.
  Vol. 20. © 26Dec25, A883573. R105359,
  5Jan53, West Pub. Co. (PWH)

DIGEST of the decisions of the courts
  of Missouri, to Apr. 1925;
  edited by the American Digest System.
  Vol. 21. © 29Dec25, A883574.
  R105360, 5Jan53, West Pub. Co. (PWH)

DISTRICT OF COLUMBIA. COURT OF APPEALS.

  Report of cases adjudged in the
    Court of Appeals of the District
    of Columbia from May 5, 1924 to
    June 1, 1925. Vol. 55. Henry E.
    Randall, reporter. © 30Dec25,
    A883571. R105358, 5Jan53, West
    Pub. Co. (PWH)

DITSON (OLIVER) COMPANY

  Ten anthems by ten composers for
    general use. R108879. SEE
    Fisher, William Arms, comp.

  Ten popular marches for the piano.
    R105874. SEE Fisher, William
    Arms, comp.

  Twelve popular part songs for men's
    voices. R108880. SEE Fisher,
    William Arms, comp.

DOANE, SUSAN HERITAGE.

  God's gift. © 9Dec25, A875487.
    R111859, 8May53, Susan Heritage
    Doane (A)

<pb id='037.png' n='1953_h1/A/0315' /> DODD, EUGENE E.

  Fiber and finish. © 15Dec25, A885275.
    R105280, 9Jan53, Harriet S.
    Dodd (W)

DODD, HARRIET S.

  Fiber and finish. R105280. SEE
    Dodd, Eugene E.

DODGE, MARY MAPES.

Hans Brinker; or, The silver skates. Edited by Ruth Ewing Hilpert; illustrated by Clara M. Burd. © on introd. & illus.; 5May25, A855423. R105879, 12Jan53, The John C. Winston Co. (PWH)

DOLE, NATHAN HASKELL.

  Famous composers. Rev. and enl. ed.
    © on p. 436-734; 6Mar25, A823355.
    R108230, 2Mar53, Thomas Y.
    Crowell Co. (PWH)

  Where love is there God is also.
    R111269. SEE Tolstoi, Lev
    Nikolaevich, graf.

DOLL AND SMITH, NEW YORK.

  Publicity guide for radio dealers.
    (Cy Cology series, v. 1) © 24Apr25,
    A830017. R107251, 11Feb53, Deward
    & Rich, inc. (PWH)

DORIAN, SYLVESTRE, tr.

  Epigrams of love, life, and laughter.
    R105933. SEE France, Anatole.

DORLAND, WILLIAM ALEXANDER NEWMAN, ed.

The American illustrated medical dictionary. 13th ed., rev. and enl. © 3Aug25, A864221. R107365, 9Feb53, W. B. Saunders Co. (PWH)

DORSEY, GEORGE A.

Why we behave like human beings. (Harper modern science series) © 20Oct25, A872003. R104878, 30Dec52, Susan Dorsey (W)

DORSEY, SUSAN

  Why we behave like human beings.
    R104878. SEE Dorsey, George A.

DOS PASSOS, JOHN.

  Manhattan transfer. © 12Nov25,
    A872421. R113400, 10Jun53, John
    Dos Passos (A)

DOUBLEDAY, NELLIE BLANCHAN (DE GRAFF)

  Wild flowers, adapted by Asa Don
    Dickinson from Nature's garden, by
    Neltje Blanchan [pseud.] (The
    nature library) © 26Feb26,
    A957724. R108304, 5Mar53, Asa Don
    Dickinson (A)

DOUBLEDAY AND COMPANY, INC.

  Poems. R110432. SEE Corelli,
    Marie.

DOUGLAS, MALCOLM, joint author

  The Brownies in Fairyland. R110017.
    SEE Cox, Palmer.

DOUGLAS, NORMAN.

  Experiments. © 10Apr25, AI-7009.
    R109400, 27Mar53, Kenneth
    Macpherson (E)

  Experiments. © 10Oct25, A872143.
    R109414, 23Mar53, Kenneth
    Macpherson (E)

DOUGLASS, HARLAN PAUL.

  How shall country youth be served?
    © 15Jan26, A879405. R112786,
    1Jun53, Rena S. Douglass (W)

  The Springfield church survey.
    © 15Mar26, A879971. R112809,
    1Jun53, Rena S. Douglass (W)

<pb id='038.png' /> DOUGLASS, RENA S.

  How shall country youth be served?
    R112786. SEE Douglass, Harlan Paul.

  The Springfield church survey.
    R112809. SEE Douglass, Harlan
    Paul.

DOW, GROVE SAMUEL.

Social problems of today, by Grove Samuel Dow and Edgar B. Wesley. © 26Aug25, A864393. R111272, 23Apr53, Thomas Y. Crowell Co. (PWH)

DOWLING, NOEL T., joint ed.

  Cases on the law of public utilities.
    R105323. SEE Smith, Young B., ed.

DREISER, HELEN

  An American tragedy. R107620. SEE
    Dreiser, Theodore.

DREISER, THEODORE.

  An American tragedy. 2 v. © 17Dec25,
    A875603. R107620, 16Feb53, Helen
    Dreiser (W)

DRIEU, JEAN

  L'homme couvert de femmes. R112460.
    SEE Drieu la Rochelle, Pierre.

DRIEU LA ROCHELLE, PIERRE.

  L'homme couvert de femmes. © 27Nov25,
    AF29876. R112460, 25May53, Jean
    Drieu (E)

DUBRETON, JEAN LUCAS
  SEE Lucas-Dubreton, Jean.

DUDDINGTON, NATALIE A., tr.

  The birth of the gods. R113933.
    SEE Merezhkovskii, Dmitrii
    Sergieevich.

DUFF, Sir HECTOR.

  The ivory graves, a novel. © 7May26,
    (pub. abroad 10Feb26, AI-7869),
    A891801. R112009, 12May53, Sir
    Hector Duff (A)

DUMMELOW, JOHN ROBERTS, ed.

A commentary on the Holy Bible; with a special article on Bible study by S. Parkes Cadman. © on Bible study; 13May25, A855428. R105883, 12Jan53, The John C. Winston Co. (PWH)

DUNCAN, MARCUS HOMER.

Modern education at the crossroads. © 16Mar25, A827103. R107931, 25Feb53, M. H. Duncan (A)

DUNKERLEY, ELSIE

  The hidden years. R110045. SEE
    Oxenham, John.

DUNKERLEY, ERICA

  The hidden years. R110045. SEE
    Oxenham, John.

DUNKERLEY, MARJORIE

  The hidden years. R110045. SEE
    Oxenham, John.

DUNKERLEY, THEODORA

  The hidden years. R110045. SEE
    Oxenham, John.

DUNN, LESLIE CLARENCE, joint author

  Principles of genetics. R108076.
    SEE Sinnott, Edmund W.

DU PONT DE NEMOURS (E. I.) AND COMPANY

How to install "Ventube" from fan to face. R110370. SEE Berwald, A. H.

DUPRÉ, MARCEL.

Traité d'improvisation à l'orgue. © 1Dec25, AF29446. R106490, 29Jan53, Marcel Dupré (A)

<pb id='039.png' /> DURAND, JACQUES.

Quelques souvenirs d'un éditeur de musique. 2. sér., 1910-1924. © 31Dec25, A30408. R111748, 6May53, Marie Massacrie, veuve Durand (W)

DURAND, MARIE MASSACRIE

Quelques souvenirs d'un éditeur de musique. R111748. SEE Durand, Jacques.

DUTTON, CHARLES J.

  The second bullet. © 28Mar25,
    A822730. R106653, 30Jan53,
    Charles J. Dutton (A)

DUTTON (E. P.) AND COMPANY, INC.

  The old woman of the movies.
    R111905. SEE Blasco Ibañez,
    Vicente.

  The outcast. R113575. SEE Pirandello,
    Luigi.

DURANT, WILLIAM JAMES.

Anatole France: the man and his work. (Little blue book, no. 839) © 13May25, A857729. R110161, 10Apr53, Haldeman-Julius Co. (PWH)

Contemporary American philosophers: Santayana, James, and Dewey. (Little blue book, no. 813) © 24Apr25, A857727. R107238, 4Feb53, Haldeman-Julius Co. (PWH)

  Contemporary European philosophers:
    Bergson, Croce, and Bertrand
    Russell. (Little blue book.
    no. 802) © 30Apr25, A856428.
    R107231, 4Feb53, Haldeman-Julius
    Co. (PWH)

  The philosophy of Herbert Spencer.
    (Little blue book, no. 772)
    © 23Apr25, A856205. R107228,
    4Feb53, Haldeman-Julius Co. (PWH)

  The philosophy of Immanuel Kant.
    (Little blue book, no. 641)
    © 7Apr25, A856084. R107217,
    4Feb53, Haldeman-Julius Co. (PWH)

DURTAIN, LUC.

Ma Kimbell. (His Conquêtes du monde) © 1May25, AF27896. R108701, 13Mar53, A. Nepveu (pseud.: Luc Durtain) (A)

DYER, MURIEL W.

  All around Robin Hood's barn.
    R110059. SEE Dyer, Walter A.

  David Grayson. R108303. SEE Dyer,
    Walter A.

DYER, WALTER A.

  All around Robin Hood's barn, a
    canine idyll. Pictures by Charles
    Livingston Bull. © 9Apr26,
    A890553. R110059, 10Apr53, Muriel
    W. Dyer (W)

  David Grayson, adventurer; with illus.
    by Thomas Fogarty. © 1Mar26,
    A890166. R108303, 5Mar53, Muriel
    W. Dyer (W)

DYKEMA, PETER W., ed.

  Twice 55 games with music. © 16Mar25,
    A822685. R105060, 7Jan53, C. C.
    Birchard & Co. (PWH)

DYKSTRA, LILLIAN RICKABY

  Ballads and songs of the shanty-boy.
    R112175. SEE Rickaby, Franz, ed.

E., A., pseud. SEE Russell, George William.

<pb id='040.png' n='1953_h1/A/0316' /> EAMES, ARTHUR J.

  An introduction to plant anatomy,
    by Arthur J. Eames and Laurence
    H. MacDaniels. 1st ed. © 22Aug25,
    A864312. R108078, 27Feb53,
    Arthur J. Eames & Laurence H.
    MacDaniels (A)

EARHART, WILL

  The home edition. R105278. SEE
    The home edition.

  Three-part music. R105279. SEE
    Giddings, Thaddeus Philander.

EATON, MARY P., ed.

  Silas Marner. R105877. SEE
    Eliot, George, pseud., i.e. Mary
    Ann Evans, afterwards Cross.

EBY, WALTER MAUNEY.

Complete scientific method: clarinet. © 6Apr26, A890311. R109988, 8Apr53, Irene Eby Olson (W)

EÇA DE QUEIROZ, JOSÉ MARIA.

The relic; translated from the Portuguese by Aubrey F. G. Bell. © 31Jul25, A864233. R112025, 15May53, Alfred A. Knopf, inc. (PWH)

ECKMAN, RICHARD B., ed.

Law and practice in the district courts of New Jersey and forms adapted to district court practice. R105317. SEE Erwin, James Shrewsbury.

EDDY, MARY BAKER.

Prose works other than Science and health, edited by Harry I. Hunt. © on editorial matter; 13May25, A829357. R108151, 20Feb53, George Wendell Adams, Francis Lyster Jandron, Alfred Pittman, L. Ivimy Gwalter & Clayton B. Craig, present Trustees under the Will of Mary Baker Eddy, successor Trustees to James A. Neal, Edward A. Merritt, William R. Rathvon, Mrs. Annie M. Knott, George Wendell Adams & Josiah E. Fernald, Trustees on May 13, 1925, who were the proprietors of a work made for hire (PWH)

EDWARDS, SISTER
  SEE Feehan, Mary Edward, Sister.

EDWARDS, EUGENE

  Jerry Todd and the Oak Island
    treasure. R108618. SEE Edwards,
    Leo.

  Jerry Todd and the talking frog.
    R108626. SEE Edwards, Leo.

  Jerry Todd and the waltzing hen.
    R108625. SEE Edwards, Leo.

EDWARDS, GEORGE W.

  Banking and business. R104702. SEE
    Willis, Henry Parker.

EDWARDS, LEO.

  Jerry Todd and the Oak Island
    treasure; illustrated by Bert Salg
    © 27May25, A855402. R108618,
    11Mar53, Eugene Edwards (C)

  Jerry Todd and the talking frog;
    illustrated by Bert Salg.
    © 27May25, A855410. R108626,
    11Mar53, Eugene Edwards (C)

  Jerry Todd and the waltzing hen;
    illustrated by B. N. Salg.
    © 27May25, A855409. R108625,
    11Mar53, Eugene Edwards (C)

EGERMEIER, ELSIE E.

  Bible story book. Questions on the
    stories. © 12Dec25, A875523.
    R108800, 16Mar53, Gospel Trumpet
    Co. (PWH)

<pb id='041.png' /> EGGLESTON, MARGARET W., ed.

  Kathie's diary; leaves from an old,
    old diary. © 15Jan26, A883174.
    R111357, 30Apr53, Mrs. George
    Owen (A)

ELDRIDGE, EDWARD H.

  New shorthand dictation exercises.
    Isaac Pitman ed., rev. (New era
    outlines) © 18May25, A829709.
    R111847, 7May53, Florence B.
    Eldridge (W)

ELDRIDGE, FLORENCE B.

  New shorthand dictation exercises.
    R111847. SEE Eldridge, Edward H.

ELDRIDGE, HAROLD N., ed.

  The consolidated laws of New York.
    R105320. SEE New York (State)
    Laws, statutes, etc.

ELDRIDGE, SEBA.

The organization of life. With an introd. by H. S. Jennings. © 28Oct25, A872224. R113021, 4Jun53, Seba Eldridge, Jr. (C)

ELIOT, GEORGE, pseud., i.e. MARY ANN
  EVANS, afterwards CROSS.

Silas Marner; edited, with introd. and notes, by Mary P. Eaton. (Winston companion classics) © on editorial matter; 1Apr25, A823811. R105877, 12Jan53, The John C. Winston Co. (PWH)

ELLIS, Mrs. R. O.

The unveiling of the vitamins as ultra light and color rays. R108003. SEE Young, Chester A.

EMERSON, ALICE B.

  Betty Gordon at Rainbow Ranch; or,
    Cowboy Joe's secret. © 6Jun25,
    A829821. R105066, 8Jan53, Cupples
    and Leon Co. (PWH)

  Ruth Fielding at Golden Pass; or,
    The perils of an artificial avalanche.
    © 6Jun25, A829824.
    R105067, 8Jan53, Cupples and Leon
    Co. (PWH)

EMERSON, CHARLES PHILLIPS.

Essentials of medicine. 6th ed., rev. © 10Aug25, A872083. R107426, 13Feb53, Charles P. Emerson, Jr. (C)

EMERSON, RALPH WALDO.

Poems; edited with introd. and notes by Nelson Antrim Crawford. (Little blue book, no. 742) © on introd. & notes; 13Apr25, A856805. R107233, 4Feb53, Haldeman-Julius Co. (PWH)

EMMONS, ARTHUR BREWSTER, II.

Health control in mercantile life. © 11Mar26, A883617. R112813, 1Jun53, Arthur Brewster Emmons II (A)

ERB, ETHEL B.

  Music appreciation for the student.
    R113974. SEE Erb, John Lawrence.

ERB, JOHN LAWRENCE.

Music appreciation for the student. © 12Mar26, A890092. R113974, 22Jun53, Ethel B. Erb (W)

ERDMAN, CHARLES R.

The Epistle to the Romans, an exposition. © 16Nov25, A879244. R110529, 2Apr53, Charles R. Erdman (A)

ERWIN, JAMES SHREWSBURY.

  Law and practice in the district
    courts of New Jersey and forms
<pb id='042.png' />
    adapted to district court practice.
    3d ed., by Richard B. Eckman.
    © 26Oct25, A869817. R105317,
    5Jan53, Soney & Sage Co. (PWH)

EVANS, MARY ANN SEE
  Eliot, George, pseud., i.e. Mary Ann
  Evans, afterwards Cross.

EVANS, WAINWRIGHT, joint author

  The revolt of modern youth. R108896.
    SEE Lindsey, Ben B.

EVANS, WILLIAM AUGUSTUS

  Health and good citizenship. R105276.
    SEE Andress, James Mace.

  Health and success. R105272. SEE
    Andress, James Mace.

FABRE, GENEVIÈVE

  Le Tarramagnou. R110055. SEE
    Fabre, Lucien.

FABRE, LUCIEN.

  Le Tarramagnou. © 15May25, AF27908.
    R110055, 10Apr53, Geneviève
    Fabre (C)

FAIRBANK, BENJAMIN A.

  The Smiths. R110069. SEE Fairbank,
    Janet Ayer.

FAIRBANK, JANET AYER.

  The Smiths. © 5Jun25, A829610.
    R110069, 23Mar53, Benjamin A.
    Fairbank (C)

FAIRGRIEVE, JAMES.

The world, by James Fairgrieve and Ernest Young. (Their Human geography by grades, book 3) © 22Apr25, A823886. R110015, 7Apr53, Mrs. Ernest Young (W) & James Fairgrieve (A)

FARIS, JOHN THOMSON.

  When America was young. © 2Oct25,
    A864925. R105290, 7Jan53, Bethann
    Faris Van Ness (E)

FAULKNER, WILLIAM.

  Soldier's pay. © 25Feb26, A883738.
    R108906, 17Mar53, William
    Faulkner (A)

FAY, ELIZA.

Original letters from India (1779-1815) with introductory and terminal notes by E. M. Forster. © 18Jun25, (pub. abroad 14May25, AI-6858), A861009. R109303, 20Mar53, E. M. Forster (A)

FEDERAL reporter, second series, v. 5-7.
  © West Pub. Co. (PWH)

  v. 5, July-Sept. 1925. © 17Oct25,
    A875849. R105326, 5Jan53.

  v. 6. Sept.-Oct. 1925. © 8Dec25,
    A883570. R105357, 5Jan53.

  v. 7, Nov.-Dec. 1925. © 1Feb26,
    A891311. R109764, 3Apr53.

FEEHAN, MARY EDWARD, Sister.

  Bab comes into her own, by Clementia
    [pseud.] © 1Dec25, A883996.
    R112928, 1Jun53, Sister Mary
    Edward (A)

FELDMAN, HERMAN.

The regularization of employment. © 30Jun25, A855739. R107772, 9Feb53, Helen Fried Huttner (NK)

FELDMAN, MELITA KOMETER

  Celebrated American Negro spirituals.
    R111865. SEE Frey, Hugo.

<pb id='043.png' n='1953_h1/A/0317' />
  The evidence for evolution. (Little
    blue book, no. 694) © 9Mar25,
    A823481. R107204, 4Feb53,
    Haldeman-Julius Co. (PWH)

  Embryology and its evidence for
    evolution. (Little blue book,
    no. 695) © 9Mar25, A823482.
    R107205, 4Feb53, Haldeman-Julius
    Co. (PWH)

FENTON, CARROLL LANE.

  Dwellers of the ponds. (Little blue
    book, no. 873) © 18May25, A829485.
    R110131, 10Apr53, Haldeman-Julius
    Co. (PWH)

  Comic songs for the ukulele and steel
    guitar. R113221. SEE Lucas, Nick.

  Genetics for beginners. (Little blue
    book, no. 811) © 30Apr25, A856804.
    R110152, 10Apr53, Haldeman-Julius
    Co. (PWH)

  An introduction to heredity. (Little
    blue book, no. 812) © 4May25,
    A856427. R110144, 10Apr53,
    Haldeman-Julius Co. (PWH)

  Life among the apes and monkeys.
    (Little blue book. no. 827)
    © 11May25, A857726. R110160,
    10Apr53, Haldeman-Julius Co. (PWH)

  The lower invertebrate animals.
    (Little blue book, no. 874)
    © 18Jun25, A867111. R111282,
    23Apr53, Haldeman-Julius Co. (PWH)

  More animals of ancient lands.
    (Little blue book, no. 826)
    © 7May25, A856880. R110155,
    10Apr53, Haldeman-Julius
    Co. (PWH)

  The nature of science. (Little blue
    book, no. 806) © 30Apr25, A856802.
    R110150, 10Apr53, Haldeman-Julius
    Co. (PWH)

  Records of evolution. R107206.
    SEE Fenton, Mildred Adams.

FENTON, JESSIE CHASE.

A practical psychology of babyhood. © 2Oct25, A864953. R113390, 10Jun53, Jessie C. Fenton (A)

FENTON, MILDRED ADAMS.

  Records of evolution, by Mildred
    Adams Fenton and Carroll Lane
    Fenton. (Little blue book,
    no. 686) © 9Mar25, A823483.
    R107206, 4Feb53, Haldeman-Julius
    Co. (PWH)

FERENCZI, SANDOR, joint author

Psychoanalysis and the psychic disorder of general paresis. R108211. SEE Hollós, Stefan.

FERGUSON, JOHN.

The secret road. © 8Aug25, (pub. abroad 22May25, AI-7115), A861392. R111355, 29Apr53, John Ferguson (A)

FERNÁNDEZ GUARDIA, RICARDO.

Costa Rican tales. Introd. by Isaac Goldberg. (Little blue book, no. 803) © 30Apr25, A856800. R110149, 10Apr53, Haldeman-Julius Co. (PWH)

FERRIS, HELEN, ed.

Girl Scout short stories, edited by Helen Ferris and Alice Mary Kimball. © 22Dec25, A883284. R105199, 2Jan53, Helen Ferris (A)

FIDUCIARY TRUST COMPANY, BOSTON

  William Austin Smith. R106457. SEE
    Slattery, Charles Lewis.

FIELD ENTERPRISES, INC.

  The world book. R108567. SEE
    The world book.

<pb id='044.png' /> FIELDING, WILLIAM J.

  The child's sexual life. (Little
    blue book, no. 691) © 25May25,
    A829490. R110136, 10Apr53,
    Haldeman-Julius Co. (PWH)

The determination of sex. (Little blue book, no. 950) (Rational sex series, v. 12) © 6Nov25, A877097. R111304, 23Apr53, Haldeman-Julius Co. (PWH)

  Dual and multiple personality.
    (Little blue book. no. 996)
    © 18Mar26, A889556. R111595,
    4May53, Haldeman-Julius Co. (PWH)

  Homo-sexual life. (Little blue book,
    no. 692) © 31Aug25, A867107.
    R111281, 23Apr53, Haldeman-Julius
    Co. (PWH)

  Man's sexual life. (Little blue
    book, no. 690) © 18Apr25, A856088.
    R107219, 4Feb53, Haldeman-Julius
    Co. (PWH)

  Sex symbolism. (Little blue book,
    no. 904) © 31Aug25, A867102.
    R111276, 23Apr53, Haldeman-Julius
    Co. (PWH)

  Sexual obsessions of saints and
    mystics. (Little blue book, no.
    907) © 7Dec25, A876898. R111299,
    23Apr53, Haldeman-Julius Co. (PWH)

  What the woman past forty should know.
    (Little blue book, no. 536)
    © 7Dec25, A876899. R111300,
    23Apr53, Haldeman-Julius Co. (PWH)

FINDLAY, ELSA

  The foundations of education.
    R110450. SEE Findlay, Joseph
    John.

FINDLAY, HUGH.

  Garden making and keeping. © 9Apr26,
    A891235. R110061, 10Apr53, Mabel
    Chase Findlay (W)

FINDLAY, JOSEPH JOHN.

  The foundations of education.
    Vol. 1: The aims and organization of
    education. © 19Jun25, AI-7041.
    R110450, 10Mar53, Elsa Findlay (C)

FINDLAY, MABEL CHASE

  Garden making and keeping. R110061.
    SEE Findlay, Hugh.

FINGER, CHARLES J.

  A book of strange murders. (Little
    blue book, no. 819) © 24Apr25,
    A857716. R107237, 4Feb53, Haldeman-Julius
    Co. (PWH)

The gist of Burton's Anatomy of melancholy. (Little blue book, no. 763) © 20Apr25, A856086. R110141, 10Apr53, Haldeman-Julius Co. (PWH)

FIRST NATIONAL BANK OF MADISON SEE

Madison, Wis. First National Bank.

FISCHER, ALFRED E.

  The health-care of the baby. R110371.
    SEE Fischer, Louis.

FISCHER, LOUIS.

The health-care of the baby, a handbook for mothers and nurses. 15th ed., rev. © 20Apr25, A855045. R110371, 17Apr53, Alfred E. Fischer & Robert M. Fischer (C)

FISCHER, ROBERT M.

  The health-care of the baby. R110371.
    SEE Fischer, Louis.

FISHER, DOROTHY CANFIELD
  SEE Canfield, Dorothy.

<pb id='045.png' /> FISHER, FREDERICK CHARLES.

New encyclopedia of Philippine legal forms. © 11Feb26, A890120. R112479, 25May53, F. C. Fisher (A)

FISHER, WILLIAM ARMS.

  Ten anthems by ten composers for
    general use. © 1Feb26, A883428.
    R108879, 17Mar53, Oliver Ditson
    Co. (PWH)

  Ten popular marches for the piano.
    © 24Dec25, A883431. R105874,
    14Jan53, Oliver Ditson Co. (PWH)

  Twelve popular part songs for men's
    voices. © 25Jan26, A883430.
    R108880, 17Mar53, Oliver Ditson
    Co. (PWH)

FISKE, Mrs. TURBESE L.

  Mesa, cañon, and pueblo. R107503.
    SEE Lummis, Charles F.

FITZGERALD, ELINOR, ed.

  The Bolshevik myth. R107390. SEE
    Berkman, Alexander.

FITZGERALD, FRANCIS SCOTT.

  The great Gatsby. © 10Apr25, A855444.
    R109367, 23Mar53, Frances Scott
    Fitzgerald Lanahan (C)

FITZHUGH, PERCY KEESE.

  Pee-Wee Harris as good as his word;
    illustrated by H. S. Barbour.
    © 16Feb25, A822104. R106939,
    6Feb53, Mrs. Percy Keese Fitzhugh (W)

  Roy Blakeley on the Mohawk Trail;
    illustrated by H. S. Barbour.
    © 2Mar25, A823288. R106946,
    6Feb53, Mrs. Percy Keese Fitzhugh (W)

  Tom Slade at Bear Mountain; illustrated
    by Howard L. Hastings.
    © 15May25, A855231. R106948,
    6Feb53, Mrs. Percy Keese Fitzhugh (W)

Westy Martin in the Rockies; illustrated by Richard A. Holberg. © 27May25, A855401. R108617, 11Mar53, Mrs. Percy Keese Fitzhugh (W)

FITZHUGH, Mrs. PERCY KEESE

  Pee-Wee Harris as good as his word.
    R106939. SEE Fitzhugh, Percy
    Keese.

  Roy Blakeley on the Mohawk Trail.
    R106946. SEE Fitzhugh, Percy
    Keese.

  Tom Slade at Bear Mountain. R106948.
    SEE Fitzhugh, Percy Keese.

  Westy Martin in the Rockies.
    R108617. SEE Fitzhugh, Percy
    Keese.

FLECKER, HELLE

  Don Juan. R113437. SEE Flecker,
    James Elroy.

FLECKER, JAMES ELROY.

Don Juan, a play in three acts. © 13Nov25, A875205. R113437, 16Jun53, Helle Flecker (W)

FLETCHER, JOSEPH SMITH.

  The Annexation Society. © 15May25,
    A855724. R107659, 18Feb53,
    Rosamond Grant Fletcher (W)

  False scent. © 18Sep25, A864754.
    R112026, 15May53, Rosamond Grant
    Fletcher (W)

  Sea fog. © 19May25, AI-7018.
    R112823, 14May53, Rosamond Grant
    Fletcher (W)

FLETCHER, ROSAMOND GRANT

  The Annexation Society. R107659.
    SEE Fletcher, Joseph Smith.

<pb id='046.png' n='1953_h1/A/0318' />
  False scent. R112026. SEE Fletcher,
    Joseph Smith.

  Sea fog. R112823. SEE Fletcher,
    Joseph Smith.

FLINT, LEON NELSON.

The conscience of the newspaper. © 24Apr25, A829085. R108575, 9Mar53, Leon Nelson Flint (A)

FLITCH, JOHN ERNEST CRAWFORD, tr.

  Essays and soliloquies. R107658.
    SEE Unamuno, Miguel de.

FLORSHEIM, HAROLD M.

  Florsheim stock styles, fall and
    winter 1925. © 24Sep25, A876562.
    R108799, 16Mar53, Harold M.
    Florsheim (A)

Florsheim styles of the times. © 29Aug25, A876540. R108798, 16Mar53, Harold M. Florsheim (A)

FLOWER, IDA MARY

  The four Gospels. R105966. SEE
    Streeter, Burnett Hillman.

FLUHARTY, MAI S.

  Under the levee. R105956. SEE
    Sparling, Edward Earl.

FOERSTER, NORMAN, ed.

  American poetry and prose: a book of
    readings, 1607-1916. © 15Jul25,
    A861173. R109320, 23Mar53, Norman
    Foerster (A)

FOGARTY, THOMAS, joint author

  David Grayson, adventurer. R108303.
    SEE Dyer, Walter A.

FOLLETT, WILSON, ed.

  The work of Stephen Crane.
    R112035 … SEE Crane, Stephen.

FOOTE, JOHN MCFARLAND, ed.

The man without a country, and other patriotic stories; illustrated by R. Pallen Coleman, J. L. G. Ferris, and Earl K. Bergey. © on editorial matter & illus.; 31Dec25, A879935. R105889, 12Jan53, The John C. Winston Co. (PWH)

FOOTNER, GLADYS

  The shanty sled. R109178. SEE
    Footner, Hulbert.

FOOTNER, HULBERT.

The shanty sled. © 19Mar26, (pub. abroad 2Oct25, AI-7485), A879966. R109178, 20Mar53, Gladys Footner (W)

FORBIN, VICTOR.

Les fiancées du soleil; edited, with introd., notes, exercises, and vocabulary by Benjamin W. Mitchell. © 20Apr25, A823892. R109469, 27Mar53, Benjamin W. Mitchell (A)

FORD, FORD MADOX.

  No more parades, a novel. © 2Nov25,
    A875001. R111852, 7May53, Janice
    Brustlein (E)

FORESMAN, EDITH HOLMES

  First book of songs. R111848. SEE
    Foresman, Robert.

  Second book of songs. R111849. SEE
    Foresman, Robert.

  Third book of songs. R111850. SEE
    Foresman, Robert.

  Fourth book of songs. R111851. SEE
    Foresman, Robert.

<pb id='047.png' /> FORESMAN, ROBERT.

  First book of songs. © 19May25,
    A829359. R111848, 7May53, Edith
    Holmes Foresman (W)

  Second book of songs. © 7Aug25,
    A864151. R111849, 7May53, Edith
    Holmes Foresman (W)

  Third book of songs. © 3Sep25,
    A864545. R111850, 7May53, Edith
    Holmes Foresman (W)

  Fourth book of songs. © 22Sep25,
    A861960. R111851, 7May53, Edith
    Holmes Foresman (W)

FORMAN, HENRY JAMES.

The pony express, a romance. © 5Nov25, A872363. R105147, 12Jan53, Paramount Pictures Corp. (PWH)

The pony express, a romance. © 5Nov25, A872363. R109746, 30Mar53, Henry James Forman (A)

FORSTER, EDWARD MORGAN, ed.

  Original letters from India.
    R109303. SEE Fay, Eliza.

FOSTER, JOHN M., illus.

  The Camp Fire Boys' canoe cruise.
    R108611. SEE Clifton, Oliver Lee.

  Elizabeth Ann and Doris. R108609.
    SEE Lawrence, Josephine.

  Polly's Polly. R108627. SEE
    Whitehill, Dorothy.

FOSTER, WILLIAM.

The elements of chemistry. 1st ed. © 2Sep25, A864709. R113668, 12Jun53, Katherine Foster Watts, Wilhelmina Foster Reynolds & Helen Foster Highberger (C)

Laboratory exercises in general chemistry, by William Foster and Harley Willis Heath. 1st ed. © 25Sep25, A869725. R113667, 12Jun53, Katherine Foster Watts, Wilhelmina Foster Reynolds & Helen Foster Highberger (C)

THE FOUNTAIN OF YOUTH, AN EASTERTIDE SONGALOGUE; text written and arr. by George Orlia Webster, music by I. H. Meredith and others. © 6Feb26, A899560. R112071, 11May53, Lorenz Pub. Co. (PWH)

FOURNIER, ISABELLE SEE Riviere,
  Isabelle Fournier.

FOX, FRANCES MARGARET

  King Penguin. R109030. SEE Horne,
    Richard Henry.

FRACCAROLI, ARNALDO.

La vita di Giacomo Puccini. © 2Feb25, AF26563. R106856, 28Jan53, Arnaldo Fraccaroli (A)

FRANCE, ANATOLE.

La comédie de celui qui épousa une femme muette. Ed. scolaire avec notes explicatives, exercises, d'assimilation et vocabulaire, par Léopold Cardon. © 15Jan25, A815965. R104718, 24Dec52, Jane Cardon (W)

  Epigrams of love, life, and laughter;
    selected and translated by Sylvestre
    Dorian. (Little blue book no. 707)
    © 22Jan25, A820905. R105933,
    21Jan53, Haldeman-Julius Co. (PWH)

  The wisdom of the ages, and other
    stories; translated by Conrad
    Seiler. (Little blue book, no.
    828) © 9May25, A856881. R110156,
    10Apr53, Haldeman-Julius Co. (PWH)

<pb id='048.png' /> FRANK, HENRY.

Optimism or pessimism. A debate held in Chicago, Ill., between Henry Frank and Percy Ward. (Little blue book, no. 762) © 23Apr25, A856201. R107224, 4Feb53, Haldeman-Julius Co. (PWH)

FRANKEN, ROSE L.

  Pattern. © 10Apr25, A855187.
    R109584, 31Mar53, Rose L.
    Franken (A)

FRANKLIN, BENJAMIN.

Poor Richard's almanac. Introd. and notes by Lloyd E. Smith. (Little blue book, no. 738) © on introd. & notes; 24Mar25, A856811. R110518, 4Feb53, Haldeman-Julius Co. (PWH)

FRASER, CHELSEA.

The practical book of home repairs. © 24Jul25, A864011. R111270, 23Apr53, Thomas Y. Crowell Co. (PWH)

FRASER, RONALD.

  Landscape with figures. © 10May25,
    AI-6990. R107391, 16Dec52, Ronald
    Fraser (A)

FREDERICK, GEORGE
  SEE Frederick, Justus George.

FREDERICK, JUSTUS GEORGE.

  How to save money. (Little blue
    book, no. 1004) © 16Apr26,
    A893557. R111598, 4May53,
    Haldeman-Julius Co. (PWH)

  Modern salesmanship. © 15Sep25,
    A861844. R109476, 27Mar53, George
    Frederick (A)

FREEMAN, ABRAHAM CLARK.

  A treatise of the law of judgments.
    5th ed., rev. and greatly enl., by
    Edward W. Tuttle. 3 v. ©
    Bancroft-Whitney Co. (PWH)

    v. 1. © 7Apr25, A823749. R108634,
      12Mar53.

    v. 2. © 15Apr25, A823874.
      R108635, 12Mar53.

    v. 3. © 2May25, A855012. R108636,
      12Mar53.

FREEMAN, CLIFFORD JOHN AUSTIN

  The shadow of the wolf. R110423.
    SEE Freeman, Richard Austin.

FREEMAN, LAWRENCE AUSTIN

  The shadow of the wolf. R110423.
    SEE Freeman, Richard Austin.

FREEMAN, LEWIS R.

On the roof of the Rockies. © 31Oct25, A869943. R109729, 3Apr53, Lewis R. Freeman (A)

FREEMAN, RICHARD AUSTIN.

  The shadow of the wolf. © 19Sep25,
    A861966. R110423, 20Apr53,
    Clifford John Austin Freeman &
    Lawrence Austin Freeman (C)

FRENCH, SAMUEL

One-act plays for stage and study. R113263. SEE One-act plays for stage and study.

FRERE, PATRICIA MARION CALDECOTT

  A king by night. R110060. SEE
    Wallace, Edgar.

  The strange countess. R108819. SEE
    Wallace, Edgar.

  The terrible people. R113327. SEE
    Wallace, Edgar.

<pb id='049.png' n='1953_h1/A/0319' /> FREY, HUGO.

Celebrated American Negro spirituals. © 19Apr26, A892280. R111865, 8May53, Samuel Gradstein & Melita Kometer Feldman (E)

Comic songs for the ukulele and steel guitar. R113220 … SEE Lucas, Nick.

FREYD, BERNARD.

  Repeal the direct primary. © 25Jul25,
    A864039. R107852, 24Feb53, Bernard
    Freyd (A)

  Repeal the direct primary. © 5Aug25,
    A864161. R107738, 24Feb53,
    Bernard Freyd (A)

FRIEDENWALD, EDGAR

  Diet in health and disease. R106478.
    SEE Friedenwald, Julius.

FRIEDENWALD, JULIUS.

  Diet in health and disease, by
    Julius Friedenwald and John Ruhrah.
    6th ed., rev. © 8Apr25, A822988.
    R106478, 29Jan53, Edgar Friedenwald (NK)

FROST, ROBERT, ed.

  The arts anthology. R110122. SEE
    The Arts anthology.

FRYBERGER, AGNES MOORE.

Listening lessons in music, graded for schools; with an introd. by Osbourne McConathy. Rev. © 21Feb25, A822155. R105711, 6Jan53, Clinton Kimball Moore (NK) Osbourne William McConathy, James William McConathy & Elizabeth McConathy Aikens (C)

FULLER, ELIZABETH C.

  A history of the United States.
    R109023. SEE Channing, Edward.

FULMORE, STERLING ROBERTSON.

  A practical geography of Texas by
    county names. © 26Sep25, A869061.
    R110530, 22Apr53, Sterling R.
    Fulmore (A)

A practical geography of Texas by county names, by Sterling Robertson Fulmore. History and geography of Texas as told in county names, by Z. T. Fulmore. © 26Sep25, A869062. R110531, 22Apr53, Sterling R. Fulmore (A & C)

A practical geography of Texas by county names. R110531. SEE Fulmore, Sterling Robertson.

FUNCK-BRENTANO, EVA BIGNOT

  L'ancien régime. R111455. SEE
    Funck-Brentano, Frantz.

FUNCK-BRENTANO, FRANTZ.

L'ancien régime. © 25Feb26, AF30641. R111455, 1May53, Mme Funck-Brentano (née Eva Bignot) (W)

GABEAUD, ALICE.

  Cours raisonné de solfege et de
    théorie élémentaire. © 5Jul25,
    AF28375. R110955, 15Apr53,
    Alice Gabeaud (A)

GABRIEL, RALPH HENRY.

Toilers of land and sea. Liberty Bell ed. (His The pageant of America, v. 3) © 25Jan26, A879425. R106381, 28Jan53, Yale University Press (PWH)

GALL, ELLEN M., ed.

  Stray cats. R108588. SEE
    Carter, Leslie H.

<pb id='050.png' /> GALLAYRAUD, THÉRÈSE

L'enseignement musical de la technique du piano. R108757. SEE Selva, Blanche.

GALSWORTHY, ADA

  Caravan. R109369. SEE Galsworthy,
    John.

GALSWORTHY, JOHN.

  Caravan, the assembled tales of John
    Galsworthy. © 24Jul25, A864212.
    R109369, 23Mar53, Ada Galsworthy (W)

  Die Forsyte saga. Autorisierte
    Übersetzung aus dem Englischen von
    Luise Wolf und Leon Schalit. 2 v.
    © 28Oct25, AF30099. R112097,
    2Mar53, Masha Schalit (W)

  Der Patrizier, Roman. Autorisierte
    Übersetzung aus dem Englischen von
    Leon Schalit. © 1Jul25, AF28953.
    R112096, 2Mar53, Masha Schalit (W)

GANTZ, MARY S. T.
  SEE Taylor, Mary S.

GARCILASO DE LA VEGA.

  Works; a critical text with a bibliography,
    edited by Hayward Keniston.
    (Hispanic notes and monographs.
    Peninsular series) © 1Apr25,
    A872722. R109517, 30Mar53, The
    Hispanic Society of America (PWH)

GARDNER, EDITH JORDAN

  Fishes. R107496. SEE Jordan, David
    Starr.

GARIS, HOWARD R.

  The curlytops touring around; or,
    The missing photograph albums.
    Illus. by Julia Greene. © 6Jun25,
    A829825. R105068, 8Jan53,
    Cupples and Leon Co. (PWH)

Uncle Wiggily on Sugar Island; or, What happened to Sammie Littletail; illustrated by Lansing Campbell. © 19Apr26, A891105. R110815, 22Apr53, The Platt & Munk Co., inc. (PWH)

GARIS, LILIAN.

  Connie Loring's ambition; illustrated
    by Thelma Gooch. © 27May25,
    A855407. R108623, 11Mar53, Lilian
    Garis (A)

  Connie Loring's dilemma; illustrated
    by Ruth H. Bennett. © 27May25,
    A855403. R108619, 11Mar53, Lilian
    Garis (A)

GARNETT, DAVID.

  The sailor's return. With a front.
    by R. A. Garnett. © 18Sep25,
    A864752. R112177, 18May53, David
    Garnett (A)

Three farces, edited with introductions by Louise Brown Osborn. Contents.—The lying valet.—A peep behind the curtain; or, The new rehearsal.—Bon Ton; or, High life above stairs. © 20Mar25, A822604. R108367, 4Mar53, Louise Brown Osborn (A)

GARSTIN, CROSBIE, ed.

  Samuel Kelly, an 18th century seaman.
    R108324. SEE Kelly, Samuel.

GARSTIN, LILIAN

  Samuel Kelly. R108324. SEE Kelly,
    Samuel.

GARTLAN, GEORGE H., joint author

Supplementary sight singing exercises. R112111. SEE Damrosch, Walter.

<pb id='051.png' /> GATES, ARTHUR I.

  Elementary psychology. © 8Sep25,
    A861754. R109038, 18Mar53, Arthur
    I. Gates (A)

GAY, LUCY M., joint author

Textes français avec exercices pratiques. R109736. SEE Treille, Marguerite.

GEHRKENS, KARL W., joint author

Supplementary sight singing exercises. R112111. SEE Damrosch, Walter.

GEIBEL, ADAM, joint comp.

  Songs of faith and triumph. R112648.
    SEE Hall, J. Lincoln, comp.

GEIGER, RAYMOND, ed.

  Nouvelles histoires juives. (Les
    Documents bleus, no. 17) © 10Feb25,
    AF27082. R106424, 28Jan53,
    Raymond Geiger (A)

GEISTER, EDNA.

  Getting together; by Edna Geister
    and Mary Wood Hinman. © 18Dec25,
    A879426. R104885, 30Dec52, Edna
    Geister (A)

GELLER, JAMES J.

  After the ball. R113136. SEE
    Harris, Charles K.

GEOFFREY, THEODATE, pseud. SEE
  Wayman, Dorothy G.

GEORGE, WALTER LIONEL

  Purple and fine women. R108271. SEE
    Saltus, Edgar.

GEORGIA

  Reports of cases decided in the Court
    of Appeals of the State of Georgia.
    R108638. SEE Georgia. Court of
    Appeals.

  Reports of cases decided in the
    Supreme Court of the State of
    Georgia. R108637 … SEE
    Georgia. Supreme Court.

GEORGIA. COURT OF APPEALS.

Reports of cases decided in the Court of Appeals of the State of Georgia. Vol. 33, October term, 1924, and March term, 1925. Stevens and Graham, reporters. © 22Oct25, A872155. R108638, 12Mar53, The State of Georgia (PWH)

GEORGIA. SUPREME COURT.

  Reports of cases decided in the
    Supreme Court of the State of
    Georgia, v. 159, 160. Stevens and
    Graham, reporters. © The State of
    Georgia (PWH)

    v. 159, March and October terms,
      1924. © 23Jun25, A855679.
      R108637, 12Mar53.

    v. 160, October term, 1924, March
      term, 1925. © 17Dec25, A872928.
      R108639, 12Mar53.

GEROULD, GORDON H.

  The aristocratic West. R104717.
    SEE Gerould, Katharine Fullerton.

GEROULD, KATHARINE FULLERTON.

  The aristocratic West. © 30Oct25,
    A869855. R104717, 29Dec52,
    Gordon H. Gerould (Wr)

GERWIG, HENRIETTA, ed.

  Crowell's handbook for readers and
    writers. © 7Oct25, A869284.
    R111274, 23Apr53, Thomas Y.
    Crowell Co. (PWH)

<pb id='052.png' n='1953_h1/A/0320' /> GIACOMO, SALVATORE DI

  Le Nuove canzoni. R106295. SEE
    Le Nuove canzoni.

GIBBS, GEORGE.

Hero tales of our Navy. 3d ed., enl. © 29Sep25, A872761. R109652, 2Apr53, George Gibbs (A)

GIBBS, PHILIP.

Unchanging quest. © 22Jan26, (pub. abroad 15Sep25, AI-7411), A879408. R106439, 26Jan53, Philip Gibbs (A)

GIDDINGS, THADDEUS PHILANDER

  The home edition. R105278. SEE
    The home edition.

  Instrumental technique for orchestra
    and band. R112344. SEE Maddy,
    Joseph E.

  Three-part music, by Thaddeus P.
    Giddings, Will Earhart, Ralph L.
    Baldwin, and Elbridge W. Newton.
    (Music education series) © 14Sep25,
    A869258. R105279, 9Jan53, Thaddeus
    P. Giddings, Will Earhart (A) &
    Christine R. Baldwin (W)

GIDE, ANDRÉ PAUL GUILLAUME.

  Caractères. © 28Feb25, AF27519.
    R107541, 16Feb53, Catherine Lambert-Gide
    (née Van Rysselberghe) (C)

  The Vatican swindle (Les caves du
    Vatican) Translated from the
    French by Dorothy Bussy. © 30Oct25,
    A869971. R112029, 15May53, Alfred
    A. Knopf, inc. (PWH)

GIDE, CATHERINE VAN RYSSELBERGHE
  LAMBERT- SEE Lambert-Gide, Catherine
  Van Rysselberghe.

GILBERT, CHARLES ALLAN, illus.

  The black Flemings. R108713. SEE
    Norris, Kathleen.

GIRARD, GEORGES.

La jeunesse d'Anatole France, 1844-1876. © 16Oct25, AF29410. R112771, 1Jun53, Henri Girard (C)

GIRARD, HENRI

  La jeunesse d'Anatole France.
    R112771. SEE Girard, Georges.

GIRAUDOUX, JEAN.

  Bella. (Les Cahiers verts, 61)
    © 15Jan26, AF30316. R111451,
    1May53, Mme Jean Giraudoux (née
    Suzanne Rolland) (W)

  Simon le pathétique. Nouv. éd., rev.
    et remaniée. © 25Apr26, AF31067.
    R111460, 1May53, Mme Jean Giraudoux
    (née Suzanne Rolland) (W)

GIRAUDOUX, Mme JEAN
  SEE Giraudoux, Suzanne Rolland.

GIRAUDOUX, SUZANNE ROLLAND

  Bella. R111451. SEE Giraudoux,
    Jean.

  Simon le pathétique. R111460. SEE
    Giraudoux, Jean.

GLENN, EARL R.

  New types of high school physics test.
    Electricity, mechanics: form A, by
    Earl R. Glenn and Ellsworth S.
    Obourn. 1925 ed. © 1Oct25,
    A881047. R106715, 28Jan53, Earl R.
    Glenn & Ellsworth S. Obourn (A)

GLENN, MABELLE.

  Music appreciation for every child,
    intermediate grades, by Mabelle
    Glenn and Margaret Lowry.
    © 23Dec25, A875600. R106273,
<pb id='053.png' />
    23Jan53, Mabelle Glenn & Margaret
    Lowry (A)

  Music notes, by Mabelle Glenn and
    Margaret Lowry. © 8Dec25, A877237.
    R106274, 23Jan53, Mabelle Glenn &
    Margaret Lowry (A)

GLOBE BOOK COMPANY

  Better English through practice.
    R110395. SEE May, Alfred A.

GLOVER, ALICE EMILY CORNELIA

  Progress of world wide missions.
    R104886. SEE Glover, Robert H.

GLOVER, MARY REAVELEY

  Progress of world wide missions.
    R104886. SEE Glover, Robert H.

GLOVER, ROBERT H.

Progress of world wide missions. Introd. by Delavan L. Pierson. Rev. ed. © 18Dec25, A883188. R104886, 30Dec52, Alice Emily Cornelia Glover, Mary Reaveley Glover & Anna Reaveley Wade (C)

GLUECK, SOL SHELDON.

Mental disorder and the criminal law. © 27Jun25, A861146. R108379, 6Mar53, S. Sheldon Glueck (A)

GOBLE, WARWICK, illus.

  Kidnapped. R109032. SEE Stevenson,
    Robert Louis.

GODDARD, GLORIA, joint author

  A dictionary of American slang.
    R112534. SEE Wood, Clement.

GODOWSKY, LEOPOLD

  Ballade, op. 100, no. 15. R105020.
    SEE Ballade, op. 100, no. 15.

  The return. R105022. SEE
    The return.

  Study, op. 63, no. 5. R105019. SEE
    Study, op. 63, no. 5.

  Study, op. 100, no. 15. R105023.
    SEE Study, op. 100, no. 15.

  Study, op. 151, no. 5. R105021. SEE
    Study, op. 151, no. 5.

GOD'S beautiful garden, Children's Day; text by Edith Sanford Tillotson, music by I. H. Meredith. © 12Apr26, A899561. R112072, 11May53, Lorenz Pub. Co. (PWH)

GODWIN, FRANK, illus.

  Kidnapped. R105880. SEE
    Stevenson, Robert Louis.

  Robinson Crusoe. R105888. SEE
    Defoe, Daniel.

  Treasure Island. R105882. SEE
    Stevenson, Robert Louis.

GOETHE, JOHANN WOLFGANG VON.

Faust, translated by Anna Swanwick. Introd. and notes by Margaret Munsterberg. 2 v. (Big blue book, no. B-9, B-10) © on introd. & notes; Haldeman-Julius Co. (PWH)

    v. 1. © 7Oct25, A873221. R111295,
      23Apr53.

    v. 2. © 30Sep25, A873220. R111294,
      23Apr53.

GOLDBERG, DAVID S., joint author

  Let's act. R105713. SEE
    Stitt, Edward Walmsley.

GOLDBERG, ISAAC

  Brazilian short stories. R107235.
    SEE Monteiro Lobato, José Bento.

  Costa Rican tales. R110149. SEE
    Fernández Guardia, Ricardo.

<pb id='054.png' />
  The enjoyment of music. (Little blue
    book, no. 859) © 25May25, A858466.
    R110164, 10Apr53, Haldeman-Julius
    Co. (PWH)

  The enjoyment of reading. (Little
    blue book, no. 897) © 31Aug25,
    A867114. R111284, 23Apr53,
    Haldeman-Julius Co. (PWH)

  Harmony self taught. (Little blue
    book, no. 984) © 22Apr26, A893656.
    R111600, 4May53, Haldeman-Julius
    Co. (PWH)

  The spirit of Yiddish literature.
    (Little blue book, no. 732)
    © 25Mar25, A856090. R107220,
    4Feb53, Haldeman-Julius Co. (PWH)

GOLDING, LOUIS.

  Day of atonement. © 15May25, (pub.
    abroad 7May25, AI-6934), A829384.
    R108586, 11Mar53, Louis Golding (A)

GOLDSCHMIDT, CAREL, TRUSTEE, SMITH ELY
  JELLIFFE TRUST SEE Smith Ely Jelliffe Trust.

GOLDSMITH, OLIVER.

  The deserted village. Introd. by
    Clyde K. Hyder. (Little blue book,
    no. 799) © 13Mar25, A857002.
    R107236, 4Feb53, Haldeman-Julius
    Co. (PWH)

GOLDSTEIN, HARRIET.

Art in every-day life, by Harriet Goldstein and Vetta Goldstein. © 6Oct25, A864994. R109046, 18Mar53, Harriet Goldstein & Vetta Goldstein (A)

GOLDSTEIN, VETTA, joint author

  Art in every-day life. R109046.
    SEE Goldstein, Harriet.

GOOCH, THELMA, illus.

  Connie Loring's ambition. R108623.
    SEE Garis, Lilian.

GOOD, ALVIN.

  Sociology and education. © 8Feb26,
    A883221. R112783, 1Jun53, Alvin
    Good (A)

GOODMAN, KENNETH SAWYER.

  The wonder hat, and other one-act
    plays, by Kenneth Sawyer Goodman
    and Ben Hecht; prefatory note by
    Thomas Wood Stevens. © 17Jul25,
    A861177. R106523, 2Feb53,
    Marjorie R. Hopkins (W of K. S.
    Goodman) & Marjorie S. G. Dewey
    (C of K. S. Goodman)

GOODMAN, PAUL.

  Moses Montefiore. © 14May25, A855129.
    R108384, 6Mar53, The Jewish Publication
    Society of America (PWH)

GORDON, ARVILLA E.

  The violin choir. R105063. SEE
    Gordon, Louis M.

GORDON, GEORGE A.

My education and religion, an autobiography. © 18Sep25, A861901. R113387, 10Jun53, Ruth K. Gordon (C)

GORDON, GRACE, joint comp.

  Easter specials. R107702. SEE
    Yale, Elsie Duncan, comp.

GORDON, LOUIS M.

  The violin choir, book 2. © 5Nov25,
    A874324. R105063, 7Jan53, Arvilla
    E. Gordon (W)

<pb id='055.png' n='1953_h1/A/0321' /> GORDON, RUTH M.

  My education and religion. R113387.
    SEE Gordon, George A.

GORGAS, MARIE D.

William Crawford Gorgas, by Marie D. Gorgas and Burton J. Hendrick. © 5Dec24, A814251. R105967, 6Nov52, Eileen Gorgas Wrightson (C)

GORRELL, ETHEL B.

  American short stories. R113157.
    SEE Pattee, Fred Lewis, ed.

GOSPEL TRUMPET COMPANY

  Bible story book. R108800. SEE
    Egermeier, Elsie E.

  Christian theology. R106144. SEE
    Byrum, Russell R.

  1000 Bible drill questions. R110025.
    SEE McCreary, William Burgess.

GOSSE, Sir EDMUND

  The diaboliques. R107654. SEE
    Barbey d'Aurevilly, Jules Amédée.

GOSSETT, ELIZABETH HUGHES

  The pathway of peace. R107783.
    SEE Hughes, Charles Evans.

GOTTSCHALK, LOUIS R.

  The empire of Napoleon. (Little blue
    book, no. 878) © 29May25, A855629.
    R110139, 10Apr53, Haldeman-Julius
    Co. (PWH)

GOTTSCHLING, JUANITA LEHMAN

  Sing unto the Lord a new song.
    R108370. SEE Sing unto the Lord
    a new song.

GOUDEKET, Mme MAURICE
  SEE Colette, Sidonie Gabrielle.

GOWING, SIDNEY FLOYD.

  Sea lavender. © 8Sep25, A861840.
    R109475, 27Mar53, Sidney Floyd
    Gowing (A)

GRADSTEIN, SAMUEL

  Celebrated American Negro spirituals.
    R111865. SEE Prey, Hugo.

  Comic songs for the ukulele and steel
    guitar. R113221. SEE Lucas, Nick.

GRADUEL-VESPERAL, contenant les chants de la messe et de l'office pour les dimanches et les fêtes, no. 814C. © 24Oct24, AF26001. R106720, 20Oct52, Desclée & Cie (PWH)

GRAHAM, JOHN M.

  Reports of cases decided in the
    Court of Appeals of the State of
    Georgia. R108638. SEE
    Georgia. Court of Appeals.

  Reports of cases decided in the
    Supreme Court of the State of
    Georgia. R108657 … SEE
    Georgia. Supreme Court.

GRANT, CHAPMAN

  In the days of my father, General
    Grant. R107780. SEE Grant,
    Jesse R.

GRANT, JESSE R.

  In the days of my father, General
    Grant. © 2Oct25, A864928.
    R107780, 11Feb53, Nell Grant
    Cronan & Chapman Grant (C)

GRAY, CHARLES WRIGHT.

  "Dawgs!" An anthology of stories
    about them. © 15Sep25, A861846.
<pb id='056.png' />
    R108445, 10Mar53, Charles Wright
    Gray (A)

The sporting spirit, an anthology. © 1May25, A829301. R108443, 10Mar53, Charles Wright Gray (A)

GRAY, OPAL WILKINS

  Achievement test in Spanish.
    R109485. SEE Wilkins, Lawrence A.

  New first Spanish book. R109471.
    SEE Wilkins, Lawrence A.

GREEN, DAGMAR

  Ruben and Ivy Sên. R107424. SEE
    Miln, Louise Jordan.

GREEN, FITZHUGH.

  Fought for Annapolis. Foreword by
    Henry B. Wilson. © 20Feb25,
    A822162. R107621, 13Feb53, Margery
    Durant Green (W)

  Midshipmen all. Foreword by William
    S. Sims. © 25Sep25, A869151.
    R107623, 19Feb53, Margery Durant
    Green (W)

  Our naval heritage. © 12Sep25,
    A861838. R107622, 19Feb53, Margery
    Durant Green (W)

GREEN, MARGERY DURANT

  Fought for Annapolis. R107621. SEE
    Green, Fitzhugh.

  Midshipmen all. R107623. SEE Green,
    Fitzhugh.

  Our naval heritage. R107622. SEE
    Green, Fitzhugh.

GREEN, PAUL.

The Lord's will, and other Carolina plays; with a foreword by Frederick H. Koch. Contents.—The Lord's will.—Blackbeard.—Old Wash Lucas.—The no 'count boy.—The old man of Edinton.—The last of the Lowries. © 1Oct25, A869279. R106907, 5Feb53, Paul Green (A)

GREENE, ANNE BOSWORTH.

  Dipper Hill. © 12Sep25, A861836.
    R107502, 16Feb53, Anne Bosworth
    Greene (A)

GREENE, HARRY ANDREW, joint author

Manual of directions for Compass diagnostic tests in arithmetic. R108476. SEE Ruch, Giles Murrel.

GREY, LINA ELISE

  Tales of fishing virgin seas.
    R104882. SEE Grey, Zane.

  The thundering herd. R104810. SEE
    Grey, Zane.

  The vanishing American. R104883.
    SEE Grey, Zane.

GREY, ZANE.

  Tales of fishing virgin seas.
    © 18Nov25, A875164. R104882,
    30Dec52, Lina Elise Grey (W)

  The thundering herd. © 3Jan25,
    A815503. R104810, 3Jan53, Lina
    Elise Grey (W)

  The vanishing American. 1st ed.
    © 1Dec25, A875327. R104883,
    30Dec52, Lina Elise Grey (W)

GROSS, MILT.

Nize baby; illustrated by the author. © 27Mar26, A883869. R109632, 1Apr53, Milt Gross (A)

GRUELLE, JOHN B.

  Beloved Belindy, a Raggedy Ann book,
    written and illustrated by Johnny
    Gruelle. © 1May26, A152490.
    R111897, 8May53, Myrtle Gruelle (W)

<pb id='057.png' /> GRUELLE, MYRTLE

  Beloved Belindy. R111897. SEE
    Gruelle, John B.

GUARDIA, RICARDO FERNÁNDEZ
  SEE Fernández Guardia, Ricardo.

GUCKERT, E. N.

The original Guckert's chords, scales, and melodies for the violin. © 10Jun25, A866056. R108255, 3Mar53, Lulu M. Shoer (C)

GUEST, EDGAR A.

  Friends. © 17Apr25, A855224.
    R109513, 30Mar53, Edgar A.
    Guest (A)

  Home. © 19Apr25, A855225. R109514,
    30Mar53, Edgar A. Guest (A)

GUITTEAU, WILLIAM BACKUS.

Government and politics in the United States. Briefer ed., rev. © 16Nov25, A872558. R113401, 10Jun53, William Backus Guitteau (A)

GUNN, JOHN W.

  The humor of "Bill" Nye. R107221.
    SEE Nye, Edgar Wilson.

GWALTER, L. IVIMY SEE Trustees under the
  Will of Mary Baker Eddy.

HAGEDORN, HERMANN.

  Ladders through the blue; a book of
    lyrics. © 30Oct25, A875078.
    R104973, 7Jan53, Hermann
    Hagedorn (A)

HAGGARD, ANGELA AGNES RIDER.

  The treasure of the lake. R113916.
    SEE Haggard, Sir Henry Rider.

HAGGARD, LILIAS MARGITSON RIDER.

  The treasure of the lake. R113916.
    SEE Haggard, Sir Henry Rider.

HAGGARD, Sir HENRY RIDER.

The treasure of the lake. (Pub. abroad in installments in Hutchinson's adventure story magazine, Dec. 1925-May 1926) © 7May26, A891800. R113916-R113921, 19Jun53, Lilias Margitson Rider Haggard & Angela Agnes Rider Haggard (PPW)

Dec. 1925. © 16Nov25, AI-7686.

Jan. 1926. © 18Dec25, AI-7687.

Feb. 1926. © 16Jan26, AI-7870.

Mar. 1926. © 20Feb26, AI-7936.

Apr. 1926. © 20Mar26, AI-8021.

May 1926. © 16Apr26, AI-8124.

HAKES, ADELAIDE B.

Typewriting speed studies. Rev. ed. © 17Dec25, A1063960. R111379, 29Apr53, McGraw-Hill Book Co., inc. (PWH)

HALDEMAN-JULIUS, EMANUEL.

  An agnostic looks at life. (Big
    blue book, no. B-25) © 20Jan26,
    A892184. R111597, 4May53, Henry
    Haldeman-Julius (C)

  Brief burlesques and epigrams.
    (Little blue book, no. 908)
    © 12Nov25, A878627. R111305,
    23Apr53, Henry Haldeman-Julius (C)

  Studies in rationalism. (Big blue
    book, no. B-7) © 18Jun25, A855700.
    R111275, 23Apr53, Henry Haldeman-Julius (C)

<pb id='058.png' n='1953_h1/A/0322' /> HALDEMAN-JULIUS, HENRY

  An agnostic looks at life. R111597.
    SEE Haldeman-Julius, Emanuel.

  Brief burlesques and epigrams.
    R111305. SEE Haldeman-Julius,
    Emanuel.

  Studies in rationalism. R111275.
    SEE Haldeman-Julius, Emanuel.

HALDEMAN-JULIUS COMPANY

  African Negro folk tales. R110146.
    SEE Maris, Faith.

  Amorous tales of the monks. R111301.
    SEE Smith, Lloyd E., ed.

  Anatole France. R110161. SEE
    Durant, William James.

  Arithmetic self taught. R110526.
    SEE Smith, Lloyd E.

  The art of kissing. R111589. SEE
    Wood, Clement.

  Association tests used in psycho-analysis.
    R107216. SEE Bonus,
    Daniel H.

  Astronomy for beginners. R111292.
    SEE Carrington, Hereward.

  Auction bridge for beginners.
    R105932. SEE Wood, Clement.

  Ballads. R110514. SEE Scott, Sir
    Walter, bart.

  Beekeeping for profit. R110151.
    SEE Randolph, Vance.

  Behaviorism. R110138. SEE Tripp,
    Newell R.

  The best American jokes. R112538.
    SEE Wood, Clement, ed.

  The best Irish Jokes. R112532. SEE
    Wood, Clement.

  The best Negro jokes. R112533. SEE
    Wood, Clement.

  Bluebeard and his eight wives.
    R112535. SEE Wood, Clement.

  Bluebeard, Cinderella, and other
    tales. R110528. SEE Perrault,
    Charles.

  A book of comic dialect poems.
    R112536. SEE Wood, Clement, ed.

  A book of familiar quotations.
    R110513. SEE Smith, Lloyd E., ed.

  A book of popular recitations.
    R113097. SEE Milburn, George, ed.

  A book of strange murders. R107237.
    SEE Finger, Charles J.

  A book of useful phrases. R110512.
    SEE Smith, Lloyd E.

  Botany for beginners. R105931. SEE
    Wood, Clement.

  Brazilian short stories. R107235.
    SEE Monteiro Lobato, José Bento.

  Camping, woodcraft, and wildcraft.
    R107212. SEE Spears, Raymond S.

  Card games and how to play them.
    R110527. SEE Smith, Lloyd E.

  Casanova and the women he loved.
    R111309. SEE Wood, Clement.

  The child's sexual life. R110136.
    SEE Fielding, William J.

  Cicero as revealed in his letters.
    R110132. SEE De Ford, Miriam
    Allen.

  Cleopatra and her loves. R111307.
    SEE Wood, Clement.

  Confessions. R110519. SEE Augustinus,
    Aurelius, Saint, Bp. of
    Hippo.

  Confidential chats with husbands.
    R110133. SEE Lay, Wilfrid.

  Contemporary American philosophers.
    R107238. SEE Durant, William James.

  Contemporary European philosophers.
    R107231. SEE Durant, William James.

  Conventional lies of our civilization.
    R110157. SEE Nordau, Max.

  Costa Rican tales. R110149. SEE
    Fernández Guardia, Ricardo.

<pb id='059.png' />
  Cup bearers of wine and hellebore.
    R107203. SEE Powys, Llewelyn.

  Curiosities of mathematics. R111286.
    SEE Condon, Edward.

  The deserted village. R107256. SEE
    Goldsmith, Oliver.

  The determination of sex. R111304.
    SEE Fielding, William J.

  Diabetes. R110140. SEE Wilder,
    Russell M.

  A dictionary of American slang.
    R112534. SEE Wood, Clement.

  A dictionary of Biblical allusions.
    R111308. SEE Smith, Lloyd E.

  A dictionary of sea terms. R111599.
    SEE Wells, Frank.

  Dual and multiple personality.
    R111595. SEE Fielding, William J.

  Dwellers of the ponds. R110131.
    SEE Fenton, Carroll Lane.

  Embryology and its evidence for
    evolution. R107205. SEE Fenton,
    Carroll Lane.

  Emerson, the man and his works.
    R107227. SEE Wood, Clement.

  The empire of Napoleon. R110139.
    SEE Gottschalk, Louis R.

  English composition self taught.
    R110525. SEE Smith, Lloyd E.

  The enjoyment of music. R110164.
    SEE Goldberg, Isaac.

  The enjoyment of reading. R111284.
    SEE Goldberg, Isaac.

  Epigrams. R111293. SEE Nietzsche,
    Friedrich.

  Epigrams of love, life, and laughter.
    R105933. SEE France, Anatole.

  The essence of Catholicism. R107209.
    SEE Church, Ralph W.

  The evidence for evolution. R107204.
    SEE Fenton, Carroll Lane.

  Faust. R111294 … SEE Goethe,
    Johann Wolfgang von.

  Five hundred riddles. R111288. SEE
    Smith, Lloyd E.

  Food and diet in relation to life
    and health. R107207. SEE Carrington,
    Hereward.

  The foundations of science. R107230.
    SEE Miller, A. G.

  4,000 words often mispronounced.
    R111289. SEE Smith, Lloyd E.

  French cooking for amateurs. R111297.
    SEE Maris, Faith.

  Freud on sleep and sexual dreams.
    R107232. SEE Booker, Anton S.

  The frogs. R110147. SEE
    Aristophanes.

  Genetics for beginners. R110152.
    SEE Fenton, Carroll Lane.

  The gist of Burton's Anatomy of
    melancholy. R110141. SEE
    Finger, Charles J.

  Greek physics and modern science.
    R110158. SEE Shipley, Maynard.

  A handbook for amateur magicians.
    R111596. SEE Milburn, George.

  A handbook of useful tables. R110521.
    SEE Smith, Lloyd E.

  Hands. R110165. SEE Anderson,
    Sherwood.

  The harlot's house and other poems.
    R107240. SEE Wilde, Oscar.

  Harmony self taught. R111600. SEE
    Goldberg, Isaac.

  Helpful hints for hikers. R107211.
    SEE Spears, Raymond S.

  Homo-sexual life. R111281. SEE
    Fielding, William J.

  How to improve your vocabulary.
    R110524. SEE Smith, Lloyd E.

  How to know spiders. R111283. SEE
    Randolph, Vance.

  How to know the song birds. R110137.
    SEE Randolph, Vance.

<pb id='060.png' />
  How to pronounce 4000 proper names.
    R111290. SEE Smith, Lloyd E.

  How to save money. R111598. SEE
    Frederick, Justus George.

  How to talk and debate. R111591.
    SEE Wood, Clement.

  How to teach yourself to play the
    piano. R113096. SEE Shipley,
    Maynard.

  How to think logically. R112540.
    SEE Markun, Leo.

  The humor of "Bill" Nye. R107221.
    SEE Nye, Edgar Wilson.

  The intelligence of invertebrate
    animals. R107214. SEE Shipley,
    Maynard.

  The intelligence of vertebrate
    animals. R107218. SEE Shipley,
    Maynard.

  An introduction to heredity.
    R110144. SEE Fenton, Carroll Lane.

  An introduction to philology.
    R107213. SEE Wood, Clement.

  Is life worth living? R111302.
    SEE Starr, Frederick.

  Is the human race getting anywhere?
    R111303. SEE Starr, Frederick.

  Latin self taught. R111601. SEE
    De Ford, Miriam Allen.

  Life among the ants. R110153.
    SEE Randolph, Vance.

  Life among the apes and monkeys.
    R110160. SEE Fenton, Carroll

  Life among the bees. R107210. SEE
    Randolph, Vance.

  Life among the butterflies. R110143.
    SEE Randolph, Vance.

  Life among the dragonflies. R110145.
    SEE Randolph, Vance.

  The life and poems of Catullus.
    R110159. SEE De Ford, Miriam
    Allen.

  Life of Ignatius Loyola. R110135.
    SEE Vedder, Henry C.

  Love letters of Abelard and Heloise.
    R111277. SEE Abailard, Pierre.

  The lower invertebrate animals.
    R111282. SEE Fenton, Carroll Lane.

  Man's debt to the sun. R110148. SEE
    Shipley, Maynard.

  Man's sexual life. R107219. SEE
    Fielding, William J.

  A manual of parliamentary law.
    R111285. SEE Smith, Lloyd E.

  Memoirs of Madame de Stael. R111280.
    SEE Stael-Holstein, Anne Louise
    Germaine Necker, baronne de.

Morals. R110517. SEE Seneca.

  More animals of ancient lands.
    R110155. SEE Fenton, Carroll Lane.

  The nature of science. R110150.
    SEE Fenton, Carroll Lane.

  Notes for my biographer. R111594.
    SEE Howe, Edgar Watson.

  On liberty. R111287. SEE Mill,
    John Stuart.

  Optimism or pessimism. R107224. SEE
    Frank, Henry.

  The origin of religion. R111603.
    SEE McCabe, Joseph.

  Our insect enemies. R110163. SEE
    Randolph, Vance.

  The patent medicine and the public
    health. R107225. SEE Cramp,
    Arthur J.

  The philosophy of Herbert Spencer.
    R107228. SEE Durant, William James.

  The philosophy of Immanuel Kant.
    R107217. SEE Durant, William James.

  Poems about Jesus. R110130. SEE
    Crawford, Nelson Antrim, ed.

  Poems and ballads. R107239. SEE
    Swinburne, Algernon Charles.

<pb id='061.png' n='1953_h1/A/0323' />
  Poems of John Greenleaf Whittier.
    R107223. SEE Whittier, John
    Greenleaf.

  Poems of Oliver Wendell Holmes.
    R110129. SEE Holmes, Oliver
    Wendell.

  Poems of Percy Bysshe Shelley.
    R107222. SEE Shelley, Percy Bysshe.

  Poems of Ralph Waldo Emerson.
    R107233. SEE Emerson, Ralph
    Waldo.

  Poems of William Cullen Bryant.
    R107234. SEE Bryant, William
    Cullen.

  Poetry of the southern states.
    R105930. SEE Wood, Clement, ed.

  Poor Richard's almanac. R110518.
    SEE Franklin, Benjamin.

  Pope Alexander VI and his loves.
    R111306. SEE Wood, Clement.

  Popular Shakespearian quotations.
    R110522. SEE Shakespeare,
    William.

  Psycho-analysis and the link between
    mind and body. R110127. SEE
    Bonus, Daniel H.

  A psycho-analysis of America.
    R111590. SEE Oppenheim, James.

  The psychology of Jung. R111298.
    SEE Oppenheim, James.

  Records of evolution. R107206.
    SEE Fenton, Mildred Adams.

  The revolt against religion.
    R111602. SEE McCabe, Joseph.

  Rhetoric self taught. R110523. SEE
    Smith, Lloyd E.

  Rome as viewed by Tacitus and Juvenal.
    R111278. SEE De Ford, Miriam Allen.

  The royal road to romance. R106792.
    SEE Halliburton, Richard.

  Sex symbolism. R111276. SEE
    Fielding, William J.

  Sexual obsessions of saints and
    mystics. R111299. SEE Fielding,
    William J.

  A short history of Japan. R111296.
    SEE Van Sicklen, Helen Putnam.

  Sinner sermons. R111593. SEE
    Howe, Edgar Watson.

  Sociology for beginners. R107229.
    SEE Wood, Clement.

  Some general hints on self-improvement
    R111279. SEE Smith,
    Lloyd E.

  Sources of Bible myths and legends.
    R110134. SEE Shipley, Maynard.

  The spirit of Yiddish literature.
    R107220. SEE Goldberg, Isaac.

  The story of the Sioux Indians.
    R107215. SEE Seymour, Flora Warren.

  Syphilis. R111291. SEE Pusey,
    William Allen.

  Tales in verse of terror and wonder.
    R110515. SEE Smith, Lloyd E., ed.

  Thoughts on the meaning of life.
    R110516. SEE Joubert, Joseph.

  Torquemada and the Spanish Inquisition.
    R110154. SEE Wood, Clement.

  The triumph of time. R110142. SEE
    Swinburne, Algernon Charles.

  The true story of Eleonora Duse's
    love affair with d'Annunzio.
    R107208. SEE Del Riccio, Luigi.

  The truth about Christian Science.
    R111310. SEE Wood, Clement.

  Tuberculosis. R110162. SEE Long,
    Esmond R.

  Twenty years among African Negroes.
    R107226. SEE Bender, C. J.

  Typewriting self taught. R112537.
    SEE De Ford, Miriam Allen.

  Voltaire. R110128. SEE Darrow,
    Clarence.

  The voyage to Lilliput. R110520.
    SEE Swift, Jonathan.

<pb id='062.png' />
  Wagner's great love affair. R111592.
    SEE Oppenheim, Ralph.

  What the woman past forty should know.
    R111300. SEE Fielding, William J.

  Why I am an infidel. R112539. SEE
    Burbank, Luther.

  The wisdom of the ages. R110156.
    SEE France, Anatole.

  The wonders of radium. R111604.
    SEE Shipley, Maynard.

HALE, FRANK E.

The use of copper sulphate in control of microscopic organisms. © 8Jun25, A857770. R106988, 9Feb53, Phelps Dodge Refining Corp. (PWH)

HALL, GERTRUDE.

The Wagnerian romances. With an introd. by Willa Cather. © on introd.; 16Oct25, A872096. R112290, 21May53, Edith Lewis & City Bank Farmers Trust Co. (E)

HALL, J. LINCOLN.

Songs of faith and triumph, compiled by J. Lincoln Hall, Adam Geibel, C. A. Miles, and F. E. Hathaway. Words and music by C. Austin Miles and others. © 22May26, A896381. R112648, 25May53, The Rodeheaver Co. (PWH)

HALL, MAGDALEN KING-
  SEE King-Hall, Magdalen.

HALL, RADCLYFFE.

  Adam's breed. © 7May26, A897095.
    R112010, 12May53, Una Lady
    Troubridge (E)

HALL, WENDELL WOODS.

Ukulele method. May Singhi Breen, ed. © 31Dec25, A878983. R113452, 16Jun53, Wendell Woods Hall (A)

HALLIBURTON, RICHARD.

  The royal road to romance. © 12Oct25,
    A869545. R106792, 4Feb53, Wesley
    Halliburton (NK)

HALLOCK, GERARD BENJAMIN FLEET.

Cyclopedia of sermon outlines for special days and occasions. © 23Oct25, A869787. R104875, 30Dec52, G. B. F. Hallock (A)

HALSEY, ELIZABETH TOWER
  SEE Tower, Elizabeth.

HALSEY, RICHARD T. HAINES.

The homes of our ancestors, by R. T. H. Halsey and Elizabeth Tower. © 17Dec25, A883110. R105198, 2Jan53, Elizabeth Tower Halsey (W & A)

HAMLIN, TALBOT FAULKNER.

The American spirit in architecture. (The Pageant of America, v. 13) © 9Apr26, A891006. R110124, 10Apr53, Yale University Press (PWH)

HAMMOND, BARBARA.

  The rise of modern industry.
    R112477. SEE Hammond, John
    Lawrence le Breton.

HAMMOND, JOHN LAWRENCE LE BRETON.

The rise of modern industry, by J. L. Hammond and Barbara Hammond. © 18Feb26, (pub. abroad 26Nov25, AI-7662), A883456. R112477, 25May53, J. L. Hammond & Barbara Hammond (A)

HAMPSON, Mrs. ALFRED L.

  The wandering Eros. R107164. SEE
    Bianchi, Martha Dickinson.

<pb id='063.png' /> HAMSUN, KNUT.

  Benoni; translated from the Norwegian
    by Arthur G. Chater. © 21Aug25,
    A861585. R112024, 15May53, Alfred
    A. Knopf, inc. (PWH)

HANDBOOK of chemistry and physics, edited by Charles D. Hodgman and Norbert A. Lange. 10th ed. © 20Aug25, A972451. R108281, 5Mar53, Chemical Rubber Pub. Co. (PWH)

HANDY, WILLIAM CHRISTOPHER.

  Blues, an anthology. With an introd.
    by Abbe Niles; illus. by Miguel
    Covarrubias. © 24May26, A891600.
    R112549, 25May53, W. C. Handy (A)

HANNAY, ALTHEA CELIA

  The lady of the abbey. R109713.
    SEE Hannay, James Owen.

HANNAY, JAMES FREDERICK WYNNE

  The lady of the abbey. R109713.
    SEE Hannay, James Owen.

HANNAY, JAMES OWEN.

The lady of the abbey, by George A. Birmingham [pseud.] Pub. abroad under title: The gun-runners. © 19Feb26, (pub. abroad 24Sep25, AI-7442), A883441. R109713, 20Mar53, Robert Hannay, James Frederick Wynne Hannay, Theodosia Frances Wynne Hickey & Althea Celia Hannay (C)

HANNAY, ROBERT

  The lady of the abbey. R109713.
    SEE Hannay, James Owen.

HANSEN, HARRY, tr.

  Faber. R112472. SEE Wassermann,
    Jakob.

HARCOURT, MARGUERITE D', joint author

  La musique des Incas et ses survivances.
    R111457. SEE Harcourt, Raoul d'.

HARCOURT, RAOUL D'.

La musique des Incas et ses survivances, par R. d'Harcourt et M. d'Harcourt. 2 v. © 15Apr26, AF30861. R111457, 1May53, Raoul d'Harcourt & Marguerite d'Harcourt (A)

HARDY, ALICE DALE.

The Flyaways and Cinderella; illustrated by Walter S. Rogers. © 27May25, A855400. R108616, 11Mar53, Alice Dale Hardy (A)

  The Flyaways and Goldilocks; illustrated
    by Walter S. Rogers. (Her
    The Flyaway stories) © 27May25,
    A855406. R108622, 11Mar53, Alice
    Dale Hardy (A)

  The Flyaways and Little Red Riding
    Hood; illustrated by Walter S.
    Rogers. © 27May25, A855408.
    R108624, 11Mar53, Alice Dale
    Hardy (A)

  The Riddle club at Sunrise Beach;
    illustrated by Walter S. Rogers.
    (Her The Riddle Club books)
    © 16Feb25, A822107. R106942,
    6Feb53, Alice Dale Hardy (A)

HARLEY, WALTER S., ed.

  Selections from The impeachment of
    Verres. R106252. SEE
    Cicero, Marcus Tullius.

HARMON, DUDLEY, joint author

The British Isles and the Baltic states. R110443. SEE Carpenter, Frank G.

<pb id='064.png' n='1953_h1/A/0324' /> HARRIS, CHARLES K.

  After the ball. © 1May26, A891750.
    R113136, 11May53, James J.
    Geller (A)

HARRIS, JESSIE W., comp.

  Home project record book. © on
    text matter; 23Sep25, A885455.
    R113404, 10Jun53, Jessie W.
    Harris (A)

HART, BASIL HENRY LIDDELL
  SEE Liddell Hart, Basil Henry.

HARTFIELD, JOHN WILLIAM.

  Private cable code of Morgan, Livermore
    & Co., New York. © 23Mar25,
    A822907. R107861, 24Feb53, John
    William Hartfield (A)

HARTMANN, JACOB WITTMER, tr.

  Foundations of Christianity.
    R109257. SEE Kautsky, Karl.

THE HARVARD University hymn book; edited by Edward Caldwell Moore and Archibald Thompson Davison. © 15Mar26, A879946. R112173, 18May53, Archibald Thompson Davison (A)

HATHAWAY, F. E.

  Songs of faith and triumph. R112648.
    SEE Hall, J. Lincoln, comp.

HAUER, JOSEF MATTHIAS.

  Vom Melos zur Pauke. (Theoretische
    Schriften. Bd. 1) (Universal-Edition,
    8395) © 13Nov25, AF29830.
    R107924, 19Feb53, Josef Matthias
    Hauer (A)

HAUSER PRINTING COMPANY

  Advance reports. R105363 … SEE
    Louisiana. Courts of Appeal.

HAVENS, GEORGE REMINGTON, ed.

  Selections. R107979. SEE
    Voltaire, François Marie Arouet de.

HAWKES, HERBERT E.

New first course in algebra, by Herbert E. Hawkes, William A. Luby, and Frank C. Touton. (Mathematical texts for schools) © 11Apr25, A829408. R105275, 9Jan53, Anna L. Rose Hawks, Agnes K. Luby & Edith C. Touton (W)

HAWKS, ANNA D. ROSE

  New first course in algebra. R105275.
    SEE Hawkes, Herbert E.

HAY, IAN, pseud. SEE Beith, Ian Hay.

HAY, JAMES, Jr.

  The Bellamy case. © 3Jan25, A815468.
    R104672, 31Dec52, James Hay, Jr. (A)

HEALY, MONICA KEARNEY

  A man's man. R111438. SEE Kearney,
    Patrick.

HEARD, JOHN, Jr., tr.

  The far princess. R109468. SEE
    Rostand, Edmond.

HEATH, HARLEY WILLIS, joint author

Laboratory exercises in general chemistry. R113667. SEE Foster, William.

HECHT, BEN, joint author

  The wonder hat. R106523. SEE
    Goodman, Kenneth Sawyer.

<pb id='065.png' /> HEE, Mme LOUIS D' SEE Hee, Paulette d'Ivoi d'.

HEE, PAULETTE D'IVOI D'

  La capitaine Nilia. R105823. SEE
    Deleutre, Paul Charles Philippe
    Eric.

  Le corsaire triplex. R105822.
    SEE Deleutre, Paul Charles
    Philippe Eric.

  Message du mikado. R105825. SEE
    Deleutre, Paul Charles Philippe
    Eric.

  Le secret de Nilia. R105824. SEE
    Deleutre, Paul Charles Philippe
    Eric.

  Le serment de Daalia. R105832 …
    SEE Deleutre, Paul Charles
    Philippe Eric.

  Le voeu des Incas. R111453. SEE
    Deleutre, Paul Charles Philippe
    Eric.

  Les vouleurs de foudre. R105826.
    SEE Deleutre, Paul Charles Philippe
    Eric.

HEERMANCE, EDGAR LAING.

  The ethics of business. © 15Apr26,
    A891060. R112807, 1Jun53, Edgar
    L. Heermance (A)

HEGER, ROBERT.

Ein Friedenslied in fünf Gesangen. © 16Feb25, AF28001. R105547, 8Jan53, Robert Heger (A)

HEIDENSTAM, VERNER VON.

  The tree of the folkungs; translated
    from the Swedish by Arthur G.
    Chater. © 10Apr25, A829035.
    R107657, 18Feb53, Alfred A.
    Knopf, inc. (PWH)

HELLEN, ARTHUR

  Correspondence of John Adams and
    Thomas Jefferson. R106637. SEE
    Adams, John, Pres. U. S.

HELLMAN, GEORGE S.

  Washington Irving, Esq. © 24Apr25,
    A823957. R109377, 26Mar53, George
    S. Hellman (A)

HEMON, LOUIS.

  Battling Malone, pugilist. (Les
    Cahiers verts, 60) © 1Dec25,
    AF29879. R105828, 9Jan53, Lydia
    Hemon (C)

HEMON, LYDIA

  Battling Malone, pugilist. R105828.
    SEE Hemon, Louis.

HENDRICK, BURTON J., joint author

  William Crawford Gorgas. R105967.
    SEE Gorgas, Marie D.

HENDRYX, JAMES B.

  Oak and iron. © 3Apr25, A823676.
    R108883, 16Mar53, James B.
    Hendryx (A)

HENNEY, NELLA (BRADDY) comp.

Around the world with Kipling. R113914. SEE Around the world with Kipling.

HENRIOT, EMILE.

  Aricie Brun, translated by Henry
    Longan Stuart. © 18Jan26, A879554.
    R108201, 2Mar53, The Viking Press,
    inc. (PWH)

HERBERT, ALAN PATRICK.

Laughing Ann, and other poems; illustrated by George Morrow. © 28Oct25, AI-7536. R112779, 2Jun53, A. P. Herbert (A)

<pb id='066.png' />
  Laughing Ann, and other poems;
    illustrated by George Morrow.
    © 23Apr26, A890661. R112780,
    2Jun53, A. P. Herbert (A)

HERFORD, HELEN B.

  What'll you have? R109943. SEE
    Herford, Oliver.

HERFORD, OLIVER.

  What'll you have? By Oliver Herford
    and Karl Schmidt. © 9Apr25,
    A822934. R109943, 6Apr53, Helen
    B. Herford (NK)

HERGESHEIMER, JOSEPH.

  From an old house. © 20Nov25,
    A875342. R112037, 15May53, Joseph
    Hergesheimer (A)

  Hagar's hoard. R112032. SEE
    Turner, George Kibbe.

  The work of Stephen Crane.
    R112035 … SEE Crane, Stephen.

HEROLD, JACOB BROOKS, ed.

  Advance reports. R105363 … SEE
    Louisiana. Courts of Appeal.

HEROUARD, CHERI, illus.

  The pope's mule. R109034. SEE
    Daudet, Alphonse.

HERRIOT, EDOUARD.

  Dans la forêt normande. © 24Dec25,
    AF30244. R105836, 9Jan53, Edouard
    Herriot (A)

HERSEY, FRANCES LESTER WARNER
  SEE Warner, Frances Lester.

HERZOG, MARGUERITE
  SEE Bloch, Marguerite Herzog.

HICKEY, THEODOSIA FRANCES WYNNE

  The lady of the abbey. R109713.
    SEE Hannay, James Owen.

HICKS, FREDERICK C.

Legal bibliography and the use of law books. Teachers' manual. © 20May25, A855368. R112050, 13May53, Frederick C. Hicks (A)

HIGHBERGER, HELEN FOSTER

  The elements of chemistry. R113668.
    SEE Foster, William.

  Laboratory exercises in general
    chemistry. R113667. SEE
    Foster, William.

HILL, GRACE LIVINGSTON.

  Ariel Custer. © 9Sep25, A872100.
    R108325, 5Mar53, Ruth H. Munce (C)

HILL, HERMIONE I.

  Literature and living. R104947
    … SEE Lyman, Rollo La Verne.

HILL, HOWARD C., joint author

  Literature and living. R104947.
    SEE Lyman, Rollo La Verne.

HILL, MONA

  Studies in seven arts. R108721. SEE
    Symons, Arthur.

HILPERT, RUTH EWING, ed.

  Hans Brinker. R105879. SEE
    Dodge, Mary Mapes.

HINMAN, MARY WOOD, joint author

  Getting together. R104885. SEE
    Geister, Edna.

HISPANIC SOCIETY OF AMERICA

  Works. R109517. SEE Garcilaso de
    la Vega.

<pb id='067.png' n='1953_h1/A/0325' /> HOCKETT, HOMER C.

Political and social history of the United States, 1492-1828. © 9Jun25, A829608. R109021, 18Mar53, Homer C. Hockett (A)

HODGMAN, CHARLES D., ed.

Handbook of chemistry and physics. R108281. SEE Handbook of chemistry and physics.

HOFFMAN, ARTHUR SULLIVANT, ed.

Adventure's best stories, 1926. © 16Apr26, A890400. R110433, 17Apr53, Arthur Sullivant Hoffman (A)

HOLBERG, RICHARD A., illus.

  Westy Martin in the Rockies.
    R108617. SEE Fitzhugh, Percy
    Keese.

HOLDEN, EDWARD, joint author

  Gems and gem materials. R108082.
    SEE Kraus, Edward Henry.

HOLLAND, J. L., joint author

  Let heaven's sunshine in. R104972.
    SEE Alexander, C. C.

HOLLAND, RUPERT SARGENT.

  Pirates of the Delaware; with illus.
    by W. H. Wolf. © 15Sep25, A872107.
    R108327, 5Mar53, Mrs. Rupert S.
    Holland (W)

HOLLAND, Mrs. RUPERT SARGENT

  Pirates of the Delaware. R108327.
    SEE Holland, Rupert Sargent.

HOLLÓS, STEFAN.

Psychoanalysis and the psychic disorder of general paresis, by Stefan Hollós and S. Ferenczi. English translation by G. M. Barnes and G. Keil. (Nervous and mental disease monograph series, no. 42) © 11Jul25, A861132. R108211, 2Mar53, Smith Ely Jelliffe Trust, Carel Goldschmidt, Trustee (PWH)

HOLMAN, RUSSELL, joint author

  Cobra. R108629. SEE
    Brown, Martin.

  The freshman, novelized by Russell
    Holman; based upon Harold Lloyd's
    comedy. © 6Oct25, A869230.
    R108631, 11Mar53, Russell Holman (A)

HOLMES, HARRY N.

Introductory college chemistry. © 30Jun25, A829979. R109026, 18Mar53, Harry N. Holmes (A)

HOLMES, OLIVER WENDELL.

Poems; edited, with introd. and notes by Nelson Antrim Crawford. (Little blue book, no. 849) © 18May25, A829478. R110129, 10Apr53, Haldeman-Julius Co. (PWH)

HOLT (HENRY) AND COMPANY, INC.

  The growth of biology. R112020. SEE
    Locy, William A.

HOLZINGER, KARL J.

Statistical tables for students in education and psychology. © 27Mar25, A823589. R108365, 6Mar53, Karl J. Holzinger (A)

THE HOME edition, v. 1. by Thaddeus P.
  Giddings, Will Earhart, Ralph L.
  Baldwin, and Elbridge W. Newton.
  (Music education series)
  © 2Jul25, A855840. R105278,
<pb id='068.png' />
  9Jan53, Thaddeus P. Giddings,
  Will Earhart (A) & Christine R.
  Baldwin (W)

HOPE, LAURA LEE.

  The Blythe girls: Helen, Margy, and
    Rose; or, Facing the great world;
    illustrated by Thelma Gooch.
    © 15May25, A855235. R106952,
    6Feb53, Laura Lee Hope (A)

  The Blythe girls: Helen's strange
    boarder; or, The girl from Bronx
    Park. Illustrated by Thelma Gooch.
    © 27May25, A855404. R108620,
    11Mar53, Laura Lee Hope (A)

  The Blythe girls: Margy's queer
    inheritance; or, The worth of a
    name; illustrated by Thelma Gooch.
    © 15May25, A855234. R106951,
    6Feb53, Laura Lee Hope (A)

  The Blythe girls: Rose's great problem;
    or, Face to face with a
    crisis; illustrated by Thelma
    Gooch. © 15May25, A855233.
    R106950, 6Feb53, Laura Lee Hope (A)

  The Blythe girls: Three on a vacation;
    or, The mystery at Peach
    Farm. Illustrated by Thelma Gooch.
    © 27May25, A855405. R108621,
    11Mar53, Laura Lee Hope (A)

  The Bobbsey twins keeping house.
    © 25Feb25, A823209. R106943,
    6Feb53, Laura Lee Hope (A)

  Bunny Brown and his sister Sue on
    the rolling ocean; illustrated by
    Walter S. Rogers. © 15May25,
    A855244. R106961, 6Feb53, Laura
    Lee Hope (A)

  The Outdoor Girls at Foaming Falls;
    or, Robina of Red Kennels.
    © 15May25, A855232. R106949,
    6Feb53, Laura Lee Hope (A)

  Six little Bunkers at Indian John's;
    illustrated by Walter S. Rogers.
    © 15May25, A855243. R106960,
    6Feb53, Laura Lee Hope (A)

HOPKINS, MARJORIE R.

  The wonder hat. R106523. SEE Goodman,
    Kenneth Sawyer.

HORLER, SYDNEY.

  The Order of the Octopus. © 10Feb26,
    A883320. R107414, 11Feb53, Sydney
    Horler (A)

HORNE, RICHARD HENRY.

King Penguin; introduced by Frances Margaret Fox, illustrated by Jimmie Daugherty. © on illus. & introd.; 4Aug25, A861288. R109030, 18Mar53, The Macmillan Co. (PWH)

HOSIC, JAMES FLEMING, joint author

  The pathway to reading. R105712 …
    SEE Coleman, Bessie Blackstone.

HOUBEN, JOSEPH, ed.

  Die Methoden der organischen Chemie,
    Bd. 1-2. 3., völlig umgearb. und
    erweiterte Aufl. © Attorney
    General of the United States (PWH)

    Bd. 1. © 31Mar25, AF28629.
      R108746, 11Mar53.

    Bd. 2. © 29Sep25, AF11146.
      R108745, 11Mar53.

HOUGH, CLINTON W.

  Standard inventors contract with
    Wired Radio, inc. © 1Jul25,
    A862135. R106886, 5Feb53, Muzak
    Corp. (PWH)

HOUGHTON MIFFLIN COMPANY

  Manual of universal history. R113403.
    SEE Ploetz, Karl Julius.

  With the Indians in the Rookies.
    R113388. SEE Schultz, James
    Willard.

<pb id='069.png' /> HOWARD, ARTHUR

  The threshold. R112790. SEE
    Howard, Henry.

HOWARD, EGBERT

  The threshold. R112790. SEE Howard,
    Henry.

HOWARD, HENRY.

  The threshold. © 14May26, A890823.
    R112790, 1Jun53, Stanford Howard,
    Winifred Howard-Clitty, Arthur
    Howard & Egbert Howard (C).

HOWARD, STANFORD

  The threshold. R112790. SEE Howard,
    Henry.

HOWARD-CLITTY, WINIFRED

  The threshold. R112790. SEE
    Howard, Henry.

HOWE, EDGAR WATSON.

  Notes for my biographer. (Little
    blue book, no. 991) © 18Mar26,
    A889555. R111594, 4May53,
    Haldeman-Julius Co. (PWH)

  Sinner sermons. (Little blue book,
    no. 992) © 18Mar26, A889554.
    R111593, 4May53, Haldeman-Julius
    Co. (PWH)

HOWELL, EDWARD

  Married alive. R108442. SEE
    Straus, Ralph.

  Volcano. R108444. SEE Straus,
    Ralph.

HOWLAND, CHESTER S.

  Dicex baseball game. © 13Aug25,
    A865218. R109378, 26Mar53, Chester
    S. Howland (A)

  Dicex baseball game. © on changes;
    7Nov25, A874900. R109379, 26Mar53,
    Chester S. Howland (A)

HOWLAND, LOUIS.

  The mind of Jesus. © 18Feb26,
    A883442. R110827, 24Apr53, Manie
    Cobb Howland (NK)

HOWLAND, MANIE COBB

  The mind of Jesus. R110827. SEE
    Howland, Louis.

HUESTON, ETHEL.

Swedey. © 9Sep25, A869291. R107401, 12Feb53, Ethel Hueston (A)

HUGHES, CHARLES EVANS.

The pathway of peace, representative addresses delivered during his term as secretary of state (1921-1925) © 12Nov25, A872423. R107783, 11Feb53, Elizabeth Hughes Gossett & Catherine Hughes Waddell (C)

HUGHES, RUPERT.

The old home town, a novel. © 14May26, A890793. R112788, 1Jun53, Rupert Hughes (A)

HUMISTON, WILLIAM H.

  Gluck. (Little biographies)
    © 9May25, A856505. R108484,
    10Mar53, Breitkopf Publications,
    inc. (PWH)

  Grieg. (Little biographies)
    © 9May25, A856506. R108485,
    10Mar53, Breitkopf Publications,
    inc. (PWH)

  Schubert. (Little biographies)
    © 25Apr25, A830683. R108483,
    10Mar53, Breitkopf Publications,
    inc. (PWH)

  Schumann. (Little biographies)
    © 9May25, A856508. R108487,
    10Mar53, Breitkopf Publications,
    inc. (PWH)

<pb id='070.png' n='1953_h1/A/0326' /> HUMMEL, GEORGE F.

  A good man. © 18Jun25, A829851.
    R105965, 16Jan53, William
    Hummel (NK)

HUMMEL, WILLIAM

  A good man. R105965. SEE Hummel,
    George F.

HUMPHREY, GRACE.

  Children of necessity; illustrated
    by J. Carroll Mansfield. © 12Oct25,
    A869544. R107644, 18Feb53, Grace
    Humphrey (A)

HUNT, EDWARD EYRE.

  Conferences, committees, conventions,
    and how to run them. © 29Jul25,
    A861246. R104700, 29Dec52, Edward
    Eyre Hunt (A)

HUNTER, ALLAN A.

  American mystical verse. R107469.
    SEE Hunter, Irene.

HUNTER, IRENE.

American mystical verse, an anthology. © 24Apr25, A829086. R107469, 13Feb53, Allan A. Hunter (NK)

HUNTINGTON, FRANCES CARPENTER
  SEE Carpenter, Frances.

HURLBUT, JESSE LYMAN.

Bible stories everyone should know; illustrated by Edwin John Prittie. © on introd. & illus.; 11Mar25, A855420. R105878, 12Jan53, The John C. Winston Co. (PWH)

The lives of our presidents. Rev. © 14Aug25, A869913. R105886, 12Jan53, The John C. Winston Co. (PWH)

HURST, FANNIE.

  Appassionata. © 23Jan26, A883113.
    R106493, 26Jan53, Fannie Hurst
    Danielson (A)

HUTCHINSON, ARTHUR STUART-MENTETH.

  One increasing purpose. © 24Sep25,
    A861991. R112133, 14May53,
    A. S. M. Hutchinson (A)

HUTTNER, HELEN FRIED

  The regularization of employment.
    R107772. SEE Feldman, Herman.

HUXLEY, ALDOUS.

  Along the road. © 11Sep25, A861797.
    R104701, 29Dec52, Aldous Huxley (A)

  Two or three graces, and other
    stories. © 14May26, A890825.
    R112791, 1Jun53, Aldous Huxley (A)

HYDER, CLYDE K.

  The deserted village. R107236.
    SEE Goldsmith, Oliver.

IBAÑEZ, LIBERTAD BLASCO
  SEE Blasco Ibañez, Libertad.

IBAÑEZ, VICENTE BLASCO
  SEE Blasco Ibañez, Vicente.

INDIANA. LAWS, STATUTES, ETC.

  Annotated Indiana statutes, v. 1-3.
    Edited by Harrison Burns; rev. and
    annotated by Benjamin F. Watson.
    © The Bobbs-Merrill Co., inc. (PWH)

    v. 1. © 2Jan26, A875829. R104832,
      2Jan53.

    v. 2. © 22Jan26, A879735. R108294,
      4Mar53.

    v. 3. © 10Mar26, A879962. R109710,
      20Mar53.

<pb id='071.png' />
INDIANA three in one service. Vol. 4,
  no. 2, June 1925; v. 4, no. 3,
  Oct. 1925; v. 5, no. 1, Apr. 1926.
  © The Bobbs-Merrill Company, inc.
  (PWH)

  v. 4, no. 2. © 1Jul25, A879745.
    R108295, 4Mar53.

  v. 4, no. 3. © 13Nov25, A879746.
    R108296, 4Mar53.

  v. 5, no. 1. © 22Apr26, A890784.
    R111899, 11May53.

INDIANA three in one service, 1925
  annual volume. © 30Jan26, A879748.
  R108297, 4Mar53, The Bobbs-Merrill
  Co., inc. (PWH)

INDUSTRIAL PRESS

  Machinery's triangle chart. R105078.
    SEE Jones, Franklin D.

INMAN, ARTHUR CREW.

  American silhouettes. © 23Nov25,
    A872591. R108720, 11Mar53, Arthur
    Crew Inman (A)

INTERNATIONAL PUBLISHERS COMPANY, INC.

  Foundations of Christianity.
    R109257. SEE Kautsky, Karl.

IRWIN, INEZ HAYNES.

Gertrude Haviland's divorce. © 20Oct25, A872002. R104877, 30Dec52, Inez Haynes Irwin (A)

ITALIAN BOOK COMPANY

  Piedigrotta Gennarelli, 1925.
    R113107. SEE Piedigrotta
    Gennarelli, 1925.

  Piedigrotta Mario, 1925. R113104.
    SEE Piedigrotta Mario, 1925.

  Piedigrotta 1925. R113105. SEE
    Piedigrotta 1925.

  Piedigrotta Santa Lucia, 1925.
    R113106. SEE Piedigrotta Santa
    Lucia, 1925.

IVES, FREDERICK MANLEY

  Essays. R112172. SEE Montaigne,
    Michel Eyquem de.

IVES, GEORGE BURNHAM, tr.

  Essays. R112172. SEE Montaigne,
    Michel Eyquem de.

IVES, HOWARD CHAPIN, joint author

  Field engineering. R104794. SEE
    Searles, William H.

IVES, MARY BELLE

  Field engineering. R104794. SEE
    Searles, William H.

IVINS, WILLIAM MILLS, Jr.

Prints and books, informal papers. © 22Apr26, A890612. R112174, 18May53, William M. Ivins, Jr. (A)

IVOI, PAUL D', pseud. SEE Deleutre, Paul
  Charles Philippe Eric.

IVOI, PAULETTE D'
  SEE Hee, Paulette d'Ivoi d'

JACKS, LAWRENCE PEARSALL.

  The faith of a worker. © 16Nov25,
    A872588. R104879, 30Dec52,
    L. P. Jacks (A)

JACOBS, BERTHA E., joint author

  The nation's history. R109470. SEE
    Leonard, Arthur R.

JACOBY, HENRY S.

  Foundations of bridges and buildings,
    by Henry S. Jacoby and Roland P.
<pb id='072.png' />
    Davis. 2d ed. © 24Oct25, A872183.
    R108085, 27Feb53, Henry S. Jacoby
    & Roland P. Davis (A)

JAMES, WILLIAM.

The philosophy of William James, with an introd. by Horace M. Kallen. 1st ed. (The Modern library) © 28Nov25, A875364. R109742, 3Apr53, Horace M. Kallen (A)

JAMESON, STORM, tr.

  The olive orchard. R112036. SEE
    Maupassant, Guy de.

JANDRON, FRANCIS LYSTER SEE Trustees
  under the Will of Mary Baker Eddy.

JEANNE, RENE.

Destinée, roman historique. © 15Apr26, AF30871. R111458, 1May53, René Jeanne (A)

JEFFERS, ROBINSON.

Roan stallion, Tamar, and other poems. © 10Nov25, A875284. R107611, 17Feb53, Robinson Jeffers (A)

JELLIFFE, SMITH ELY.

  The emotions, morality, and the brain.
    R108209. SEE Monakow, Constantin
    von.

JELLIFFE (SMITH ELY) TRUST SEE
  Smith Ely Jelliffe Trust.

JESSUP, ELON.

  The boys book of canoeing. © 31Mar26,
    A883871. R113931, 16Jun53, Elon
    Jessup (A)

JEWETT, BERTHA SHORE, joint author

  The picture story book for tiny tots.
    R107550. SEE Le Cron, Helen Cowles.

JEWISH PUBLICATION SOCIETY OF AMERICA

  Moses Montefiore. R108384. SEE
    Goodman, Paul.

JOHNSON, JAMES SION.

Short course in bee culture, lesson no. 1-5. © 17Feb25, A830055. R106750, 4Feb53, Edith J. Nichols, Roy E. Johnson, Walter L. Johnson & Mrs. Roy H. Silvers (C)

JOHNSON, ROY E.

  Short course in bee culture. R106750.
    SEE Johnson, James Sion.

JOHNSON, THEODORE.

  Baker's anthology of one-act plays.
    R105590. SEE Phillips, Le Roy, ed.

JOHNSON, WALTER L.

  Short course in bee culture. R106750.
    SEE Johnson, James Sion.

JOHNSTON, WILLIAM.

  These women. © 28Mar25, A822655.
    R108364, 16Feb53, William
    Johnston (A)

JONES, ELI STANLEY.

  Christ of the Indian road. © 4Sep25,
    A869040. R105773, 16Jan53,
    E. Stanley Jones (A)

JONES, ENID (BAGNOLD)
  SEE Bagnold, Enid.

JONES, FRANKLIN D.

Machinery's triangle chart. © 22Jan25, A819522. R105078, 8Jan53, The Industrial press (PWH)

JONES, IDWAL.

The splendid shilling, a novel. © 9Apr26, A890550. R110057, 10Apr53, Idwal Jones (A)

<pb id='073.png' n='1953_h1/A/0327' /> JORDAN, DAVID STARR.

  Fishes. Rev. ed. © on additions &
    revisions; 16Mar25, A822489.
    R107496, 16Feb53, Edith Jordan
    Gardner (C)

JOSEPH, MICHAEL.

  The commercial side of literature,
    by Michael Joseph and Grant
    Overton. © 21May26, A891537.
    R112796, 1Jun53, Michael Joseph (A)

JOUBERT, JOSEPH.

  Thoughts on the meaning of life.
    Introd. and notes by Lloyd E.
    Smith. (Little blue book, no. 737)
    © on introd. & notes; 31Mar25,
    A856809. R110516, 4Feb53,
    Haldeman-Julius Co. (PWH)

JOUVE, PIERRE JEAN.

  Paulina, 1880. © 1Dec25, AF29897.
    R112462, 25May53, Pierre-Jean
    Jouve (A)

JUDSON, CLARA INGRAM.

  Mary Jane's summer fun; illustrated
    by Charles L. Wrenn. © 9Jun25,
    A829629. R108613, 11Mar53, Clara
    Ingram Judson (A)

KAHN, R. F.

  The economic consequences of sterling
    parity. R109311. SEE Keynes,
    John Maynard.

KALFF, MARIE
  SEE Lenormand, Marie (Kalff)

KALLEN, HORACE M.

  The philosophy of William James.
    R109742. SEE James, William.

KATZIN, WINIFRED, tr.

  The dybbuk. R112095. SEE
    Rappoport, Solomon.

KAUFMAN, GEORGE S.

  The butter and egg man, a comedy in
    three acts. © 20Feb26, A883736.
    R108904, 17Mar53, George S.
    Kaufman (A)

KAUFMANN, MYRTLE L., ed.

  Kidnapped. R105880. SEE
    Stevenson, Robert Louis.

KAUTSKY, KARL.

Foundations of Christianity: a study in Christian origins. Authorized translation from the 13th German ed. by Jacob Wittmer Hartmann. © 26Mar25, A823736. R109257, 24Mar53, International Publishers Co., inc. (PWH)

KEARNEY, PATRICK.

  A man's man; with an introd. by
    Philip Moeller. © 28Dec25, A879417.
    R111438, 28Apr53, Monica Kearney
    Healy (C)

KEELER, ELEANOR

The autobiography of an average golfer. R107375. SEE Keeler, Oscar Bane.

KEELER, OSCAR BANE.

  The autobiography of an average
    golfer. © 15Mar25, A829123.
    R107375, 12Feb53, Eleanor
    Keeler (W)

KEIR, MALCOLM.

The epic of industry. Liberty Bell ed. (The pageant of America, v. 5) © 7May26, A891384. R111860, 8May53, Yale University Press (PWH)

<pb id='074.png' /> KEIR, ROBERT MALCOLM SEE Keir, Malcolm.

KELLAND, CLARENCE BUDINGTON.

  Mark Tidd in Italy. © 4Sep25,
    A864506. R104711, 29Dec52,
    Clarence Budington Kelland (A)

  Rhoda Fair. © 20Jan26, A875982.
    R112785, 1Jun53, Clarence
    Budington Kelland (A)

KELLER, GOTTFRIED.

The fat of the cat, and other stories; freely adapted by Louis Untermeyer, illustrated by Albert Sallak. © 27Aug25, A864362. R109309, 20Mar53, Louis Untermeyer (A)

KELLERMANN, BERNHARD.

Die Brüder Schellenberg, Roman. © 11Nov25, AF30046. R110391, 4Feb53, Frau Bernhard Kellermann (W)

KELLERMANN, Frau BERNHARD

  Die Brüder Schellenberg. R110391.
    SEE Kellermann, Bernhard.

KELLY, FRED C.

  You and your dog; illustrated by
    Marguerite Kirmse. © 5Feb26,
    A879917. R107413, 11Feb53, Fred
    C. Kelly (A)

KELLY, SAMUEL.

  Samuel Kelly, an 18th century seaman;
    edited, with an introd. by Crosbie
    Garstin. © on introd.; 8Oct25,
    A869277. R108324, 5Mar53, Lilian
    Garstin (W)

KENISTON, HAYWARD, ed.

Works. R109517. SEE Garcilaso de la Vega.

KENTUCKY decisions reported in the Southwestern reporter annotated. Vol. 268-271, Mar.-July 1925. © 7Oct25, A879252. R105349, 5Jan53, West Pub. Co. (PWH)

KESSEL, JOSEPH.

  Le messie sans peuple. R112452.
    SEE Poliakov, Solomon L'vovich.

KESSLER, RICHARD

  Die offizielle Frau. R112585. SEE
    Winterberg, Robert.

KEY, LOU R.

  How to know textiles. R105277. SEE
    Small, Cassie Paine.

KEYNES, JOHN MAYNARD.

The economic consequences of sterling parity. Pub. abroad under title: The economic consequences of Mr. Churchill. © 20Aug25, (pub. abroad 28Jul25, AI-7204), A864530. R109311, 20Mar53, R. F. Kahn (E)

KEYSERLING, HERMANN ALEXANDER, graf VON.

The travel diary of a philosopher, translated by J. Holroyd Reece. 2 v. © 23Apr25, A823951. R110448, 21Apr53, J. Holroyd Reece (A)

KIAER, ALICE DAMROSCH

  Supplementary sight singing exercises.
    R112111. SEE Damrosch, Walter.

KILBOURNE, FANNIE.

Mrs. William Horton speaking. © 7Feb25, A823174. R106655, 30Jan53, Fannie Kilbourne Schubart (A)

KILVERT, MAXWELL A.

  A sporting chance. R112798. SEE
    Cameron, Margaret.

<pb id='075.png' /> KIMBALL, ALICE MARY.

  Girl Scout short stories. R105199.
    SEE Ferris, Helen, ed.

KIMBALL, DEXTER S., Sr.

Principles of industrial organization. 3d ed. © 3Sep25, A864489. R108080, 27Feb53, Dexter S. Kimball, Jr. (C)

KIMBALL, JAMES NEWTON.

  The flapper. © 12Dec25, A876953.
    R104966, 29Dec52, Newton Corbin
    Kimball (NK)

KIMBALL, NEWTON CORBIN

  The flapper. R104966. SEE Kimball,
    James Newton.

KING, BASIL.

  The high forfeit, a novel. © 18Sep25,
    A864678. R104713, 29Dec52,
    Penelope Orcutt (NK)

KING, CHARLES EDWARD.

Book of Hawaiian melodies. 6th ed. © 20Jan26, A881728. R105157, 2Jan53, Regina P. King (W)

KING, HENRIETTE L. M.

  What the queen said. R109183. SEE
    King, Stoddard.

KING, REGINA P.

Book of Hawaiian melodies. R105157. SEE King, Charles Edward.

KING, RUFUS.

Whelp of the winds: a dog story. © 14May26, A890833. R112160, 15May53, Rufus King (A)

KING, STODDARD.

  What the queen said, and further
    factious fragments. © 19Mar26,
    A879973. R109183, 20Mar53,
    Henriette L. M. King (W)

KING FEATURES SYNDICATE, INC.

  Toots & Caspar. R108945. SEE
    Murphy, Jimmy.

KING-HALL, MAGDALEN.

The diary of a young lady of fashion in the year 1764-1765, by Cleone Knox [pseud.] Edited by her kinsman Alexander Blacker Kerr. © 22Jan26, (pub. abroad 10Dec25, AI-7584), A879394. R107980, 25Feb53, Magdalen King-Hall (Mrs. P. Perceval Maxwell) (A)

KIPLING, RUDYARD.

  A rector's memory. © 4May26, A892980.
    R111614, 6May53, Elsie Bambridge (C)

KIRMSE, MARGUERITE, illus.

  You and your dog. R107413. SEE
    Kelly, Fred C.

KISER, DONALD J., ed.

  Corpus juris. R105351. SEE
    Corpus juris.

KITSON, HARRY DEXTER.

The psychology of vocational adjustment. © 23Oct25, A883546. R108450, 6Mar53, Harry D. Kitson (A)

KLARCHEN WESTPHAL

  Zeitgenossen aus vielen Zeiten.
    R110389. SEE Loerke, Oskar.

KLAUSNER, JOSEPH.

Jesus of Nazareth: His life, times, and teaching; translated from the original Hebrew by Herbert Danby. © 8Sep25, A864486. R109040, 18Mar53, Herbert Danby (A)

<pb id='076.png' n='1953_h1/A/0328' /> KLAW, BARBARA VAN DOREN

  Other provinces. R113134. SEE
    Van Doren, Carl.

KLOEFFLER, ROYCE GERALD.

Telephone communication systems. (Engineering science series) © 8Dec25, A872785. R109054, 18Mar53, Royce G. Kloeffler (A)

KNICKERBOCKER, EDWIN VAN B., ed.

  A midsummer night's dream. R105885.
    SEE Shakespeare, William.

KNIGHT, FLORENCE B.

Manual of directions for Compass diagnostic tests in arithmetic. R108476. SEE Ruch, Giles Murrel.

KNIGHT, FREDERIC BUTTERFIELD.

Manual of directions for Compass diagnostic tests in arithmetic. R108476. SEE Ruch, Giles Murrel.

KNIPE, ALDEN ARTHUR.

  Bunny plays the game. © 4Aug25,
    A864504. R107775, 9Feb53, Karl
    Knipe (E)

KNIPE, KARL

  Bunny plays the game. R107775. SEE
    Knipe, Alden Arthur.

KNOPF (ALFRED A.) INC.

Adolphe. R112034. SEE Constant de Rebecque, Henri Benjamin.

Benoni. R112024. SEE Hamsun, Knut.

  The Borzoi 1925. © 24Dec25, A875679.
    R112039, 15May53, Alfred A. Knopf,
    inc. (PCW)

  The diaboliques. R107654. SEE
    Barbey d'Aurevilly, Jules Amédée.

  Dr. Stiggins. R107784. SEE Machen,
    Arthur.

  Essays and soliloquies. R107658.
    SEE Unamuno, Miguel de.

  Gulliver's travels. R112033. SEE
    Swift, Jonathan.

  Hagar's hoard. R112032. SEE
    Turner, George Kibbe.

  The horla. R107655. SEE Maupassant,
    Guy de.

  The letters of Abelard and Heloise.
    R112040. SEE Abailard, Pierre.

  The olive orchard. R112036. SEE
    Maupassant, Guy de.

  The relic. R112025. SEE Eça de
    Queiroz, José Maria.

  Renoir. R112031. SEE Vollard,
    Ambroise.

  Strong as death. R112478. SEE
    Maupassant, Guy de.

  The tree of the folkungs. R107657.
    SEE Heidenstam, Verner von.

  The Vatican swindle. R112029. SEE
    Gide, André Paul Guillaume.

  The work of Stephen Crane.
    R112035 … SEE Crane, Stephen.

KNOX, CLEONE, pseud. SEE King-Hall, Magdalen.

KOLB, ANNETTE.

  Spitzbögen; mit 11 Zeichnungen von
    Rudolf Grossmann. © 23Sep25,
    AF29178. R110390, 4Feb53, Annette
    Kolb (A)

KOMROFF, MANUEL.

  The grace of lambs. © 15Sep25,
    A872030. R105542, 15Jan53,
    Manuel Komroff (A)

  The travels of Marco Polo. R106895.
    SEE Polo, Marco.

<pb id='077.png' /> KRAUS, EDWARD HENRY.

  Gems and gem materials, by Edward
    Henry Kraus and Edward Holden.
    1st ed. © 11Sep25, A864616.
    R108082, 27Feb53, Edward Henry
    Kraus (A)

KRETSCHMER, ERNST.

Hysteria. English translation by Oswald H. Boltz. (Nervous and mental disease monograph series, no. 44) © 4Jan26, A875823. R108213, 2Mar53, Smith Ely Jelliffe Trust, Carel Goldschmidt, Trustee (PWH)

KREYMBORG, ALFRED.

  Scarlet and Mellow. © 26Jan26,
    A883409. R108902, 17Mar53, Alfred
    Kreymborg (A)

KROUT, JOHN ALLEN.

The origins of prohibition. © 21Aug25, A861579. R112023, 15May53, John Allen Krout (A)

KUHLMAN, ARTHUR

  Feed my lambs. R110349. SEE
    Kuhlman, John Henry.

  The Holy Child. R110350. SEE
    Kuhlman, John Henry.

KUHLMAN, JOHN HENRY.

  Feed my lambs, Children's Day exercises.
    © 16May25, A856752.
    R110349, 16Apr53, Arthur Kuhlman (C)

  The Holy Child, a drama of Bethlehem.
    © 12Nov25, A874262. R110350,
    16Apr53, Arthur Kuhlman (C)

LABAYLE, MARIE LOUISE

  Graine au vent. R111459. SEE
    Delarue-Mardrus, Lucie.

LACRETELLE, JACQUES DE.

  La Bonifas. © 22May25, AF27950.
    R108702, 13Mar53, Jacques de
    Lacretelle (A)

LACROIX, ADRIEN.

A graphic table combining logarithms and anti-logarithms, by Adrien Lacroix and Charles L. Ragot. © 1Sep25, A864428. R113781, 24Jun53, Adrien Lacroix & Charles L. Ragot (A)

LA MARE, WALTER DE
  SEE De la Mare, Walter.

LAMBERT-GIDE, CATHERINE VAN RYSSELBERGHE

  Caractères. R107541. SEE Gide,
    André Paul Guillaume.

LAMPREY, LOUISE.

  Days of the leaders; illustrated by
    Wallis Sturtevant. (Great days in
    American history series) © 27Aug25,
    A864359. R113438, 16Jun53,
    Gladys Hunkins Webster (E)

LANAHAN, FRANCES SCOTT FITZGERALD

  The great Gatsby. R109367. SEE
    Fitzgerald, Francis Scott.

LANE, HARRIET MIRICK

  The modern trend in spelling.
    R106262. SEE Mirick, George A.

LANE, ROSE WILDER.

  Hill-billy. © 1Apr26, A883868.
    R112799, 1Jun53, Rose Wilder
    Lane (A)

<pb id='078.png' /> LANGLES, SUZANNE SEE Schaeffer, Suzanne (Langles)

LANSING, MARION FLORENCE.

  Great moments in science. © 5Mar26,
    A890168. R108714, 13Mar53, Marion
    Florence Lansing (A)

LA PASTURE, EDMÉE ELIZABETH MONICA DE
  SEE De la Pasture, Edmée Elizabeth
  Monica.

LA RAMÉE, LOUISE DE
  SEE De la Ramée, Louise.

LARDNER, ELLIS

  Gullible's travels, etc. R109368.
    SEE Lardner, Ring W.

LARDNER, RING W.

Gullible's travels, etc. © on new matter; 10Apr25, A855445. R109368, 23Mar53, Ellis Lardner (W)

LARSON, CHRISTIAN D.

  Optimist's creed. © 28Apr25,
    A965533. R111260, 27Apr53,
    Christian D. Larson (A)

LASZLO, ALEXANDER.

  Die Farblichtmusik. © 11Nov25,
    AF30103. R107993, 26Feb53,
    Alexander Laszlo (A)

LAUGHLIN, CLARA ELIZABETH.

  So you're going to Italy. © 1May25,
    A829244. R108911, 18Mar53, Mary
    Clara Laughlin & Betty Laughlin
    Sweeney (NK)

  So you're going to Paris. 2d ed.
    © 20Mar25, A822601. R108910,
    18Mar53, Mary Clara Laughlin &
    Betty Laughlin Sweeney (NK)

LAUGHLIN, MARY CLARA

  So you're going to Italy. R108911.
    SEE Laughlin, Clara Elizabeth.

  So you're going to Paris. R108910.
    SEE Laughlin, Clara Elizabeth.

LAWRENCE, DAVID HERBERT.

  Reflections on the death of a porcupine,
    and other essays. © 7Dec25,
    A891376. R104671, 12Dec52, Frieda
    Lawrence (W)

  St. Mawr, together with The princess.
    © 5Jun25, (pub. abroad 14May25,
    AI-6964), A855692. R107660,
    18Feb53, Frieda Lawrence Ravagli (W)

LAWRENCE, FRIEDA

  Reflections on the death of a porcupine.
    R104671. SEE Lawrence,
    David Herbert.

LAWRENCE, JOSEPHINE.

  Elizabeth Ann and Doris; illustrated
    by John M. Foster. © 27May25,
    A829418. R108609, 11Mar53,
    Josephine Lawrence (A)

  Linda Lane; illustrated by Charles
    L. Wrenn. © 27May25, A829419.
    R108610, 11Mar53, Josephine
    Lawrence (A)

  Linda Lane helps out; illustrated by
    Charles L. Wrenn. © 9Jun25,
    A829628. R108612, 11Mar53,
    Josephine Lawrence (A)

LAWTON, VINGIE E. ROE
  SEE Roe, Vingie E.

LAWYERS CO-OPERATIVE PUBLISHING COMPANY

  American law reports annotated.
    R110609 … SEE American law
    reports annotated.

<pb id='079.png' n='1953_h1/A/0329' />
  British ruling cases. R110614. SEE
    British ruling cases.

  Cases argued and decided in the
    Supreme Court of the United States.
    R110631. SEE U. S. Supreme Court.

  Digest of all the New York reports.
    R110611 … SEE Abbott, Austin.

  An inside story of law publishing.
    © 14Nov25, A874429. R110617,
    20Apr53, The Lawyers Co-operative
    Pub. Co. (PCW)

  Porto Rico federal reports. R111635.
    SEE U. S. District Court. Puerto
    Rico.

LAXDAOLA SAGA.

  The Laxdaela saga; translated from
    the Icelandic, with an introd. by
    Thorstein B. Veblen. © 16May25,
    A829617. R108380, 6Mar53, Becky
    Meyers

LAY, WILFRID.

Confidential chats with husbands. (Little blue book, no. 864) © 25May25, A829487. R110133, 10Apr53, Haldeman-Julius Co. (PWH)

LEA, FANNY HEASLIP.

  With this ring. © 7Feb25, A814990.
    R106652, 30Jan53, Fanny Heaslip
    Lea (A)

LECACHE, BERNARD.

Jacob. © 6Nov25, AF29481. R112459, 25May53, Bernard Lecache (A)

LE CRON, HELEN COWLES.

  The picture story book for tiny tots,
    by Helen Cowles Le Cron and Bertha
    Shore Jewett. © 27Aug25, A864354.
    R107550, 17Feb53, Helen Cowles
    Le Cron (A)

LECTURES on nutrition; a series of lectures given at the Mayo Foundation and the Universities of Wisconsin, Minnesota, Nebraska, Iowa, and Washington (St. Louis) 1924-1925, edited by Maud H. Mellish. © 8Dec25, A872979. R107371, 9Feb53, W. B. Saunders Co. (PCW)

LEFÈVRE, FRÉDÉRIC.

Une heure avec … 3. série. © 20Nov25, AF30236. R112464, 25May53, Frédérique Lefèvre (C)

LEFÈVRE, FRÉDÉRIC.

  Une heure avec … R112464. SEE
    Lefèvre, Frédéric

LE GALLIENNE, RICHARD, ed.

  The Le Gallienne book of American
    verse. © 21Dec25, A883060.
    R110394, 8Apr53, Liveright Pub.
    Corp. (PWH)

LEHMAN, Mrs. HENRY STUART

  Sing unto the Lord a new song.
    R108370. SEE Sing unto the
    Lord a new song.

LEHMAN, VALERIA R.

  Like unto these. R112073. SEE
    Like unto these.

LEIGH, CHARLES WILBER, joint author

  Plane and spherical trigonometry.
    R109489. SEE Palmer, Claude
    Irwin.

LEIGH, TERESA F.

  Plane and spherical trigonometry.
    R109489. SEE Palmer, Claude
    Irwin.

<pb id='080.png' /> LENNES, HARRIET G.

  A survey course in mathematics.
    R112805. SEE Lennes, Nels Johann.

LENNES, NELS JOHANN.

A survey course in mathematics. © 26Apr26, A890515. R112805, 1Jun53, Harriet G. Lennes (E)

LENORMAND, HENRI RENÉ

L'armee secrete. © 12Dec25, AF30231. R112774, 1Jun53, Mme H. R. Lenormand, née Marie Kalff (W)

LENORMAND, MARIE (KALFF)

  L'armee secrete. R112774. SEE
    Lenormand, Henri René.

LEONARD, ARTHUR R.

The nation's history, pt. 1. By Arthur R. Leonard and Bertha E. Jacobs; with drawings by James Ormsbee and maps by Max Mayer. © 15Apr25, A829172. R109470, 27Mar53, Arthur R. Leonard (A)

LEROUX, GASTON.

  La farouche aventure; ou, La coquette
    punie. © 18May25, AF27955.
    R111450, 4May53, Mme Gaston
    Leroux (née Jeanne Madeleine
    Cayatte) (W)

LEROUX, Mme GASTON
  SEE Leroux, Jeanne Madeleine Cayatte.

LEROUX, JEANNE MADELEINE CAYATTE

  La farouche aventure. R111450.
    SEE Leroux, Gaston.

LEVEN, MAURICE.

Income in the various states: its sources and distribution, 1919, 1920, and 1921; based upon Willford Isbell King's estimates of the national totals. © 18Nov25, A875434. R110809, 21Apr53, National Bureau of Economic Research, inc. (PWH)

LEVY, NEWMAN.

  Gay but wistful, verses. © 23Oct25,
    A869809. R112383, 19May53, Newman
    Levy (A)

LEWARS, ELSIE SINGMASTER
  SEE Singmaster, Elsie.

LEWIS, EDITH

  The professor's house. R112288. SEE
    Cather, Willa.

  The Wagnerian romances. R112290.
    SEE Hall, Gertrude.

LEWIS, ELEANOR MARY

  The flying emerald. R109179. SEE
    Lewis, Ethelreda.

LEWIS, ETHELREDA.

  The flying emerald. © 19Mar26, (pub.
    abroad 20Nov25, AI-7679), A879967.
    R109179, 20Mar53, Eleanor Mary
    Lewis (C)

LEWIS, MICHAEL

  John Dos Passos' Manhattan transfer.
    R112797. SEE Lewis, Sinclair.

LEWIS, SINCLAIR.

John Dos Passos' Manhattan transfer. © 3May26, A897213. R112797, 1Jun53, Michael Lewis (C)

LEWIS, WILMARTH SHELDEN, ed.

  A selection of the letters of Horace
    Walpole. R112804. SEE Walpole,
    Horace, earl of Orford.

<pb id='081.png' /> LEWISOHN, LUDWIG.

  Israel. © 10Nov25, A875065. R108897,
    17Mar53, Ludwig Lewisohn (A)

LIBER usualis missae et officii pro dominicis et festis; cum cantu gregoriano, no. 780C. © 24Oct24, AF25999. R106718, 20Oct52, Desclée & Cie (PWH)

LIDDELL HART, BASIL HENRY.

Paris; or, The future of war. © 2Oct25, (pub. abroad 20Jul25, AI-7173), A864970. R105840, 14Jan53, B. H. Liddell Hart (A)

LIEBER, MAXIM, joint ed.

  Great short stories of the world.
    R108274. SEE Clark, Barrett H., ed.

LIKE unto these, juvenile pageant; text by Valeria R. Lehman, music by I. H. Meredith. © 1Apr26, A899562. R112073, 11May53, Lorenz Pub. Co. (PWH)

LILIENTHAL, HOWARD.

  Thoracic surgery. 2 v. © 29Oct25,
    A869924. R107368, 9Feb53, Howard
    Lilienthal (A)

LILLARD, JOHN SAMPSON, joint author

  The save way system. R108632. SEE
    Reeves, James Ransom.

LIMA, MARGARET, joint author

  Children's reading. R107978. SEE
    Terman, Lewis M.

LINDSEY, BEN B.

The revolt of modern youth, by Ben B. Lindsey and Wainwright Evans. © 10Nov25, A875061. R108896, 17Mar53, Henrietta Lindsey (W) & Wainwright Evans (A)

LINDSEY, HENRIETTA

  The revolt of modern youth. R108896.
    SEE Lindsey, Ben B.

LINET, HANK
  SEE Linet, Henry A.

LINET, HENRY A.

  Hank's book of college ditties for
    the ukulele. © 18May25, A858073.
    R110221, 13Apr53, Henry A.
    Linet (A)

  Hank's book of comic camp ditties
    for the ukulele. © 6Jun25,
    A858570. R110222, 13Apr53, Henry
    A. Linet (A)

  Hank's one hour course in ukulele
    playing. © 11May25, A856967.
    R110220, 13Apr53, Henry A.
    Linet (A)

  Hank's songs of the sunny South for
    the ukulele. © 6Jun25, A858571.
    R110223, 13Apr53, Henry A.
    Linet (A)

LIPPMANN, WALTER.

  The phantom public. © 15Oct25,
    A869823. R109053, 18Mar53,
    Walter Lippmann (A)

LIVERIGHT PUBLISHING CORPORATION

  The abbess of Castro. R111432.
    SEE Beyle, Marie Henri.

  Beatrice Cenci. R108900. SEE
    Ricci, Corrado.

  Frigidity in woman. R108903. SEE
    Stekel, Wilhelm.

  The Le Gallienne book of American
    verse. R110394. SEE Le Gallienne,
    Richard, ed.

  The story of the world's literature.
    R109204. SEE Macy, John.

<pb id='082.png' n='1953_h1/A/0330' /> LIVINGSTON, ARTHUR, tr.

  The old woman of the movies.
    R111905. SEE Blasco Ibañez,
    Vicente.

LIVSEY, STELLA MORSE.

  Easy piano lessons, v. 2. © 10Feb25,
    A830129. R106722, 3Feb53,
    Stella Morse Livsey (A)

LLOYD, JOHN W.

Productive vegetable growing. 5th ed., rev. (Lippincott's farm manuals) © 22Sep25, A872105. R108449, 9Mar53, John W. Lloyd (A)

LOAR, LLOYD.

  Modern method for ukulele, ukulele-banjo,
    and tenor banjo. © 15Jun25,
    A860214. R113409, 15Jun53,
    Nicomede Music Co. (PWH)

LOBATO, JOSÉ BENTO MONTEIRO
  SEE Monteiro Lobato, José Bento.

LOBATO, MONTEIRO
  SEE Monteiro Lobato, José Bento.

LOCAL TRADEMARKS, INC.

  Laundry advertising campaign.
    R113237. SEE Abbott and
    Walker, inc.

  Story of Bill Ding. R113236. SEE
    Longstreet, H. P.

LOCKE, WILLIAM J.

  The great Pandolfo. © 29Aug25,
    A864454. R109728, 3Apr53, Leslie
    Scott Mitchell (E)

LOCY, WILLIAM A.

  The growth of biology. © 23Oct25,
    A872222. R112020, 14May53,
    Henry Holt & Co., inc. (PPW)

LODGE, HENRY CABOT

  Selections from the correspondence of
    Theodore Roosevelt and Henry Cabot
    Lodge. R109496 … SEE
    Roosevelt, Theodore, Pres. U. S.

LODGE, Sir OLIVER JOSEPH.

  Evolution and creation. © 14May26,
    A890826. R112157, 15May53, Oliver
    W. F. Lodge (C)

LODGE, OLIVER W. F.

  Evolution and creation. R112157.
    SEE Lodge, Sir Oliver Joseph.

LOERKE, OSKAR.

Zeitgenossen aus vielen Zeiten. © 23Sep25, AF29175. R110389, 4Feb53, Klarchen Westphal (E)

LOFTING, HUGH.

  Dr. Dolittle's zoo, written and illustrated
    by Hugh Lofting. © 30Sep25,
    A864869. R108322, 5Mar53,
    Josephine Lofting (W)

LOFTING, JOSEPHINE

  Dr. Dolittle's zoo. R108322. SEE
    Lofting, Hugh.

LONG, ESMOND R.

Tuberculosis: its cause and prevention. (Little blue book, no. 870) © 25May25, A858464. R110162, 10Apr53, Haldeman-Julius Co. (PWH)

LONGSTREET, H. P.

  Story of Bill Ding. © 7Aug25,
    A866082. R113236, 11Jun53, Local
    Trademarks, inc. (PWH)

<pb id='083.png' /> LONGY-MIQUELLE, RENÉE.

  Principles of musical theory.
    (Concord series, no. 12) © 11Feb25,
    A823362. R107386, 5Feb53, Renée
    Longy-Miquelle (A)

LONGYEAR, JOHN M., Jr.

  The history of a house. R107718.
    SEE Longyear, Mary Beecher.

LONGYEAR, MARY BEECHER.

  The history of a house. © 10Mar25,
    A823388. R107718, 20Feb53, Abby
    Beecher Roberts, Helen Longyear
    Paul, John M. Longyear, Jr. &
    Robert Dudley Longyear (C)

LONGYEAR, ROBERT DUDLEY

  The history of a house. R107718.
    SEE Longyear, Mary Beecher.

LORENZ PUBLISHING COMPANY

  The fountain of youth. R112071. SEE
    The fountain of youth.

  God's beautiful garden. R112072.
    SEE God's beautiful garden.

  Like unto these. R112073. SEE
    Like unto these.

  Our Father's world. R112074. SEE
    Our Father's world.

  The victor's brow. R112075. SEE
    The victor's brow.

  Youth's coronation day. R112076.
    SEE Youth's coronation day.

LOUISIANA. COURTS OF APPEAL.

  Advance reports, no. 2-6. Edited by
    J. B. Herold. © Hauser Print.
    Co. (PWH)

    no. 2. © 13Nov25, A883683.
      R105363, 5Jan53.

    no. 3. © 23Nov25, A883684.
      R105364, 5Jan53.

    no. 4. © 3Jan26, A883685.
      R109757, 5Apr53.

    no. 5. © 27Jan26, A883686.
      R109758, 3Apr53.

    no. 6. © 4Mar26, A883687.
      R109759, 3Apr53.

LOUISIANA. SUPREME COURT.

  Louisiana reports, v. 158. © 28Nov25,
    A875867. R105342, 5Jan53, West
    Pub. Co. (PWH)

LOVE, CLYDE E.

  Differential and integral calculus.
    Rev. ed. © 7Jul25, A855788.
    R109029, 18Mar53, Clyde E. Love (A)

THE LOVE toy, anonymous. © 10Mar25,
  A822447. R108655, 9Mar53,
  Sheridan House, inc. (PWH)

LOVELACE, GRIFFIN M.

Life insurance fundamentals. Rev. ed. (Harper's life insurance library) © 20Oct25, A872005. R107779, 9Feb53, Griffin M. Lovelace (A)

LOVELAND, SEYMOUR.

  The Illustrated Bible story book, New
    Testament. With an introd. by
    Katharine Lee Bates and pictures
    by Milo Winter. © 11Nov25, A872455.
    R112850, 28May53, Rand McNally &
    Co. (PWH)

LOWELL, AMY.

  John Keats. 2 v. © 13Feb25,
    A823099. R108163, 3Feb53,
    Harvey H. Bundy (E)

  What's o'clock. © 21Aug25, A864343.
    R111973, 11May53, Harvey H. Bundy
    & G. d'Andelot Belin, Jr. (PPW)

<pb id='084.png' /> LOWRY, MARGARET.

  Music appreciation for every child
    R106273. SEE Glenn, Mabelle.

LOWRY, MARGARET, joint author

  Music notes. R106274. SEE
    Glenn, Mabelle.

LUBY, AGNES K.

  New first course in algebra. R105275.
    SEE Hawkes, Herbert E.

LUBY, WILLIAM A., joint author

  New first course in algebra.
    R105275. SEE Hawkes, Herbert E.

LUCAS, FREDERIC AUGUSTUS

  The jungle man and his animals.
    R110027. SEE Wells, Carveth.

LUCAS, NICK.

Comic songs for the ukulele and steel guitar, by Nick Lucas, Sammy Stept, and Hugo Frey. © 10Jun26, A896943. R113220, 10Jun53, Sam H. Stept (A)

Comic songs for the ukulele and steel guitar, by Nick Lucas, Sammy Stept, and Hugo Frey. © 10Jun26, A896943. R113221, 10Jun53, Samuel Gradstein & Melita Kometer Feldman (E of H. Frey)

LUCAS-DUBRETON, JEAN.

Louis XVIII, le prince errant, le roi. © 1Dec25, AF29880. R105829, 9Jan53, Jean-Marie Lucas-Dubreton (A)

LUDOVICI, ANTHONY M.

Lysistrata; or, Woman's future and future woman. With a foreword by Norman Haire. (To-day and to-morrow series) © 13Jul25, A855894. R108719, 11Mar53, Anthony M. Ludovici (A)

LUMMIS, CHARLES F.

  Mesa, cañon, and pueblo. © 12Sep25,
    A861857. R107503, 16Feb53, Mrs.
    Turbese L. Fiske (C)

LUTES, DELLA THOMPSON.

  A home of your own. © 8Apr25,
    A822859. R108659, 12Mar53, Mrs.
    Donald W. Putnam (NK)

LUTZ, EDWIN G.

  Practical graphic figures. © 27Mar25,
    A823630. R108282, 5Mar53, Royd C.
    Lutz (E)

LUTZ, ROYD C.

  Practical graphic figures. R108282.
    SEE Lutz, Edwin G.

LYMAN, HELEN C.

  Literature and living. R104947.
    SEE Lyman, Rollo La Verne.

LYMAN, ROLLO LA VERNE.

  Literature and living, by Rollo
    La Verne Lyman and Howard C.
    Hill. (Junior high school series)
    3 v. © Hermione I. Hill (W) &
    Helen C. Lyman (W)

    v.1. © 16Jan25, A814828.
      R104947, 6Jan53.

    v. 2. © 11Feb25, A822214.
      R104949, 6Jan53.

    v. 3. © 11Feb25, A822213.
      R104948, 6Jan53.

LYNDE, FRANCIS.

The cruise of the Cuttlefish. © 21Aug25, A864329. R113507, 17Jun53, Mary Ellen Lynde (C)

<pb id='085.png' n='1953_h1/A/0331' />
  The fight on the standing stone.
    © 13Mar25, A822636. R108574,
    9Mar53, Mary Ellen Lynde (C)

  Mellowing money. © 7Aug25, A864215.
    R113506, 17Jun53, Mary Ellen
    Lynde (C)

LYNDE, MARY ELLEN

  The cruise of the Cuttlefish.
    R113507. SEE Lynde, Francis.

  The fight on the standing stone.
    R108574. SEE Lynde, Francis.

  Mellowing money. R113506. SEE
    Lynde, Francis.

MCALLISTER, ALISTER.

  Colonel Gore's second case, by Lynn
    Brock [pseud.] © 11Mar26, (pub.
    abroad 4Feb26, AI-7777), A883618.
    R112814, 1Jun53, M. Bolger (E)

MCCABE, JOSEPH.

  The origin of religion. (Little blue
    book, no. 1008) © 26Apr26,
    A894523. R111603, 4May53,
    Haldeman-Julius Co. (PWH)

  The revolt against religion. (Little
    blue book, no. 1007) © 27Apr26,
    A894522. R111602, 4May53,
    Haldeman-Julius Co. (PWH)

MCCANN, ALFRED W., Jr.

  The science of keeping young.
    R106438. SEE McCann, Alfred W.,
    Sr.

MCCANN, ALFRED W., Sr.

The science of keeping young. © 22Jan26, A879406. R106438, 26Jan53, Alfred W. McCann, Jr. (C)

MCCLURE, MATTHEW THOMPSON.

  An introduction to the logic of
    reflection. © 5Nov25, A872424.
    R109482, 27Mar53, Matthew
    Thompson McClure (A)

MACCLURE, VICTOR.

The Golden Snail. Pub. abroad under title: The boost of the Golden Snail. © 3Nov25, (pub. abroad 8May25, AI-7076), A872355. R111448, 4May53, Victor MacClure (A)

MCCOLLUM, ELMER VERNER.

  The newer knowledge of nutrition, by
    E. V. McCollum and Nina Simmonds.
    3d ed. © 16Jun25, A829733.
    R109024, 18Mar53, E. V. McCollum (A)

MCCONATHY, JAMES WILLIAM

  Listening lessons in music. R105711.
    SEE Fryberger, Agnes Moore.

  The symphony series of programs for
    school and community orchestras.
    R106248 … SEE Stock, Frederick.

MCCONATHY, OSBOURNE

  Listening lessons in music. R105711.
    SEE Fryberger, Agnes Moore.

  The symphony series of programs for
    school and community orchestras.
    R106248 … SEE Stock, Frederick.

MCCONATHY, OSBOURNE WILLIAM

  Listening lessons in music. R105711.
    SEE Fryberger, Agnes Moore.

  The symphony series of programs for
    school and community orchestras.
    R106248 … SEE Stock, Frederick.

MCCOY, WILLIAM J., ed. and tr.

  Folk songs of the Spanish Californians;
    collected, translated, and
    arr. by William J. McCoy.
<pb id='086.png' />
    © 12Apr26, A891055. R110210,
    13Apr53, Catherine McCoy
    Retallick (W)

MCCREARY, WILLIAM BURGESS.

1000 Bible drill questions. © 27Mar26, A888318. R110025, 8Apr53, Gospel Trumpet Co. (PWH)

MCCUTCHEON, GEORGE BARR.

  Romeo in Moon Village. © 19Sep25,
    A861967. R110424, 20Apr53, John
    T. McCutcheon & Jessie McCutcheon
    Nelson (NK)

MCCUTCHEON, JOHN T.

  Romeo in Moon Village. R110424.
    SEE McCutcheon, George Barr.

MACDANIELS, LAURENCE H., joint author

  An introduction to plant anatomy.
    R108078. SEE Eames, Arthur J.

MACDONALD, E. S.

  Emily climbs. R110071 … SEE
    Montgomery, Lucy Maud.

MACDONALD, ELIZABETH STONE.

Modern Priscilla home furnishing book. © 14Dec25, A879010. R104965, 30Dec52, The Spool Cotton Co. (PWH)

MCDOUGALL, WALTER B.

  Mushrooms: a handbook of edible and
    inedible species. © 21Aug25,
    A864345. R109321, 23Mar53, Walter
    B. McDougall (A)

MCFEE, INEZ N.

  Famous American statesmen. R108231.
    SEE Bolton, Sarah K.

  Lives of girls who became famous.
    R108228. SEE Bolton, Sarah K.

  Lives of poor boys who became famous.
    R108229. SEE Bolton, Sarah K.

The young people's cook book; or, How the Daytons cooked at home and in camp. © 5Aug25, A864129. R111271, 23Apr53, Thomas Y. Crowell Co. (PWH)

MACGRATH, ALMA KENYON

  The sporting spinster. R107412. SEE
    MacGrath, Harold.

MACGRATH, HAROLD.

  The sporting spinster. © 5Feb26,
    A879911. R107412, 11Feb53, Alma
    Kenyon MacGrath (W)

MCGRAW-HILL BOOK COMPANY, INC.

  Metodo racional de mecanografía.
    R111378. SEE Sorelle, Rupert P.

  Typewriting speed studies. R111379.
    SEE Hakes, Adelaide B.

MACHEN, ARTHUR.

  Dr. Stiggins: his views and
    principles. © 10Apr25, A829033.
    R107784, 20Feb53, Alfred A.
    Knopf, inc. (PWH)

MACHEN, ARTHUR W.

  What is faith? R113095. SEE Machen,
    John Gresham.

MACHEN, JOHN GRESHAM.

  What is faith? © 24Nov25, A875244.
    R113095, 8Jun53, Arthur W. Machen,
    Jr. (Administrator d.b.n.c.t.a.)

MACK, WILLIAM.

  Corpus Juris. R105351. SEE
    Corpus juris.

<pb id='087.png' /> MACKAYE, PERCY.

Tall tales of the Kentucky mountains. Decorations by E. MacKinstry. © 14May26, A890828. R112159, 15May53, Percy MacKaye (A)

MCKINNEY, WILLIAM M., ed.

American law reports annotated. R110610 … SEE American law reports annotated.

MACKINSTRY, ELIZABETH, illus.

  Tall tales of the Kentucky mountains.
    R112159. SEE MacKaye, Percy.

MACLEISH, ARCHIBALD.

  The pot of earth. © 1May25, A829242.
    R109315, 23Mar53, Archibald
    MacLeish (A)

MCLEOD, HELEN SEARLES

  Field engineering. R104794. SEE
    Searles, William H.

MCMEEN, GEORGE M.

  The up-to-date financial secretary's
    record, style A. Instructions for
    use. © 22Dec25, A880155. R106389,
    29Jan53, George M. McMeen (A)

  The up-to-date financial secretary's
    record, style B. Instructions for
    use. © 15Sep25, A868879. R106388,
    29Jan53, George M. McMeen (A)

MCMILLAN, MARY.

Massage and therapeutic exercise. 2d ed. © 2Nov25, A869923. R107367, 9Feb53, Mary McMillan (A)

MACMILLAN COMPANY

  A dog of Flanders. R109031. SEE
    De la Ramée, Louise.

  Kidnapped. R109032. SEE Stevenson,
    Robert Louis.

  King Penguin. R109030. SEE
    Horne, Richard Henry.

  The mythology of all races. R109035.
    SEE The mythology of all races.

  The personal history and experience
    of David Copperfield the younger.
    R109048. SEE Dickens, Charles.

  The pope's mule. R109034. SEE
    Daudet, Alphonse.

  The way of all flesh. R109055. SEE
    Butler, Samuel.

MCNEIL, EVERETT.

  Tonty of the iron hand. © 2Jul25,
    A855771. R108718, 11Mar53,
    Everett McNeil (A)

MCNEILE, HERMAN CYRIL.

The final count, by Sapper [pseud.] (Bull Dog Drummond series) (Pub. abroad in installments in Sovereign and regent magazine, Sept.-Dec. 1925. Illustrated by Cyril Holloway) © 9Feb26, A883222. R108159-R108162, 11Feb53, Violet Evelyn McNeile (W)

Sept. 1925. © 12Aug25, AI-7320.

Oct. 1925. © 12Sep25, AI-7392.

Nov. 1925. © 12Oct25, AI-7556.

Dec. 1925. © 17Nov25, AI-7682.

  The loyalty of Peter Drayton, and
    Mrs. Peter Skeffington's revenge.
    © 15Jan26, A879368. R106030,
    R106031, 21Jan53, Violet Evelyn
    McNeile (W)

    The loyalty of Peter Drayton; illustrated
      by Oakdale. Pub. abroad
      in Pearson's magazine, Aug. 1925.
      © 29Jul25, AI-7303.

    Mrs. Peter Skeffington's revenge;
      illustrated by Fleming Williams.
<pb id='088.png' n='1953_h1/A/0332' />
      Pub. abroad in Hutchinson's magazine,
      Sept. 1925. © 15Jan26,
      AI-7362.

  The message. (Pub. abroad In
    Pearson's magazine, Sept. 1925.
    By Sapper [pseud.] Illustrated by
    W. De War Mills) © 11Feb26, (pub.
    abroad 1Sep25, AI-7361), A879573.
    R107546, 13Feb53, Violet Evelyn
    McNeile (W)

  The rubber strap, and A matter of
    voice. © 20Apr26, A890452.
    R110542, R110543, 22Apr53, Violet
    Evelyn McNeile (W)

    The rubber strap, by Sapper [pseud.]
      Pub. abroad in The Strand magazine,
      Nov. 1925. © 2Nov25, AI-7746.

    A matter of voice, by Sapper
      [pseud.] Pub. abroad in Pearson's
      magazine. Nov. 1925.
      © 2Nov25, AI-7699.

  Three of a kind, and The haunting of
    Jack Burnham. by Sapper [pseud.]
    © 20Mar26, A883731. R109297,
    R109298, 23Mar53, Violet Evelyn
    McNeile (W)

    Three of a kind. Pub. abroad in
      Pearson's magazine, Oct. 1925.
      Illustrated by W. Smithson
      Broadhead. © 1Oct25, AI-7474.

    The haunting of Jack Burnham. Pub.
      abroad in Hutchinson's magazine,
      Nov. 1925. Illustrated by J. R.
      Skelton. © 12Oct25, AI-7557.

  Word of honour. (Pub. abroad in the
    Strand magazine. Dec. 1925, by
    Sapper [pseud.]) © 18May26, (pub.
    abroad 25Nov25, AI-7683), A891473.
    R112284, 19May53, Violet Evelyn
    McNeile (W)

MCNEILE, VIOLET EVELYN

  The final count. R108159 … SEE
    McNeile, Herman Cyril.

  The loyalty of Peter Drayton.
    R106030 … SEE McNeile, Herman
    Cyril.

  A matter of voice. R110543. SEE
    McNeile, Herman Cyril.

  The message. R107546. SEE McNeile,
    Herman Cyril.

  The rubber strap. R110542. SEE
    McNeile, Herman Cyril.

  Three of a kind. R109297 … SEE
    McNeile, Herman Cyril.

  Word of honour. R112284. SEE
    McNeile, Herman Cyril.

MACORLAN, PIERRE.

Marguerite de la nuit, suivi de A l'Hôpital Marie-Madeleine. © 5Mar26, AF30632. R111454, 1May53, Pierre MacOrlan (A)

MACPHERSON, KENNETH

  Experiments. R109400 … SEE
    Douglas, Norman.

MACVEAGH, LINCOLN, ed.

The new Champlin cyclopedia for young folks. R108446. SEE Champlin, John Denison.

MACY, JOHN.

The story of the world's literature; illustrated by Onorio Ruotolo. © 24Oct25, A869955. R109204, 23Mar53, Liveright Pub. Corp. (PWH)

MADDY, JOSEPH E.

Instrumental technique for orchestra and band, by J. E. Maddy and T. P. Giddings. © 15Apr26, A890379. R112344, 20May53, Joseph E. Maddy & T. P. Giddings (A)

MADISON, WIS. FIRST NATIONAL BANK

  Introduction to American government.
    R108795. SEE Ogg, Frederic A.

<pb id='089.png' /> MAIORINO, MARGARET REEVE

  The Boy Scouts' Craig Kennedy.
    R104710. SEE Reeve, Arthur B.

  Craig Kennedy on the farm. R104706.
    SEE Reeve, Arthur B.

MALLOWAN, AGATHA MARY CLARISSA (MILLER) CHRISTIE
  SEE Christie, Agatha (Miller)

MALOT, HECTOR HENRI.

  The adventures of Remi; translated
    and arr. by Philip Schuyler Allen.
    With illus. by Mead Schaeffer.
    (The Windermere series) © 15Jul25,
    A861192. R112849, 28May53, Rand
    McNally & Co. (PWH)

MANDL, MAX MACBETH.

Biology. (Oxford review series) © 18Nov25, A875161. R110953, 27Apr53, Oxford Book Co., inc. (PWH)

MANN, DELBERT MARTIN, joint author

  Social pathology. R113019. SEE
    Queen, Stuart Alfred.

MANN, THOMAS.

Bemühungen. (His Gesammelte Abhandlungen und kleine Aufsätze, n. F.) © 12Nov25, AF34416. R110392, 4Feb53, Thomas Mann (A)

MANUAL of select Catholic hymns and
  devotions, compiled and arr. by
  F. M. Colonel; rev. and edited by
  Francis Auth. © 22Jul25, A864005.
  R105843, 12Jan53, Redemptorist
  Fathers of N. Y. (E of Francis
  Auth)

MANUAL of select Catholic hymns and devotions; organ acc. to pt. 2, compiled and arr. by F. M. Colonel, edited by Francis Auth, harmonized by Samuel Richards Gaines. © 22Oct25, A872076. R105842, 12Jan53, Redemptorist Fathers of N. Y. (E of Francis Auth)

MARAFIOTI, PASQUAL MARIO.

  The new vocal art. © 1Dec25, A875605.
    R110180, 8Apr53, P. Mario
    Marafioti (A)

MARDEN, CLARE EVANS

  Making friends with our nerves.
    R108227. SEE Marden, Orison
    Swett.

MARDEN, ORISON SWETT.

Making friends with our nerves. © 20Mar25, A822519. R108227, 2Mar53, Clare Evans Marden (W)

MARDRUS, LUCIE DELARUE-
  SEE Delarue-Mardrus, Lucie.

MARE, WALTER DE LA
  SEE De la Mare, Walter.

MARIE PAULA, Sister.

  Pharaoh's daughter; stage manager's
    guide. © 27Nov25, A874937.
    R104795, 29Dec52, Sister M.
    Paula (A)

MARIS, FAITH.

  African Negro folk tales, retold by
    Faith Maris. (Little blue book,
    no. 807) © 30Apr25, A856435.
    R110146, 10Apr53, Haldeman-Julius
    Co. (PWH)

  French cooking for amateurs. (Little
    blue book, no. 877) © 1Dec25,
    A876896. R111297, 25Apr53,
    Haldeman-Julius Co. (PWH)

<pb id='090.png' /> MARKS, HENRY K.

  Adolphe. R112034. SEE Constant de
    Rebecque, Henri Benjamin.

MARKUN, LEO.

  How to think logically. (Little blue
    book, no. 1003) © 21May26, A898650.
    R112540, 25May53, Haldeman-Julius
    Co. (PWH)

MARQUAND, JOHN P.

  The black cargo. © 13Feb25, A822215.
    R106482, 29Jan53, John P. Marquand (A)

MARSHALL, EDISON.

Ocean gold, a novel for young people. © 4Sep25, A864507. R107776, 9Feb53, Edison Marshall (A)

The sleeper of the moonlit ranges. Illus. by Jes W. Schlaikjer. © 10Apr25, A823704. R107698, 20Feb53, Edison Marshall (A)

MARSHALL, THOMAS R.

  Recollections. © 14Nov25, A872504.
    R110826, 24Apr53, Mrs. Thos. R.
    Marshall (W)

MARSHALL, Mrs. THOMAS R.

  Recollections. R110826. SEE
    Marshall, Thomas R.

MARTENS, FREDERICK H.

  Borodine. (Little biographies)
    © 9May25, A856507. R108486,
    10Mar53, Breitkopf Publications,
    inc. (PWH)

  Brahms. (Little biographies)
    © 25Apr25, A830681. R108481,
    10Mar53, Breitkopf Publications,
    inc. (PWH)

  Foster. (Little biographies)
    © 4May25, A830682. R108482,
    10Mar53, Breitkopf Publications,
    inc. (PWH)

  Massenet. (Little biographies)
    © 9May25, A856509. R108488,
    10Mar53, Breitkopf Publications,
    inc. (PWH)

  Sinding. (Little biographies)
    © 9May25, A856510. R108489,
    10Mar53, Breitkopf Publications,
    inc. (PWH)

MARTIN, ELIZABETH BLACKBURN.

  The queer little house of lines and
    spaces. © 14Apr26, A893028.
    R110538, 16Apr53, Elizabeth
    Blackburn Martin (A)

MARY, GENEVIÈVE
  SEE Charrier, Geneviève Mary.

MARY, JULES.

La fin de Roussiote, dramatique roman d'amour. © 31Dec25, AF30259. R105834, 9Jan53, Thérèse Comberousse (née Thérèse Mary) Geneviève Charrier (née Geneviève Mary) & Jean Charrier (C)

MARY, THÉRÈSE
  SEE Comberousse, Thérèse Mary.

MARY EDWARD, Sister
  SEE Feehan, Mary Edward, Sister.

MASSACRIE, MARIE
  SEE Durand, Jacques.

MASSELL, JAMES.

  To sing or not to sing. © 24Feb26,
    A886000. R108797, 16Mar53, Nina
    Massell (W)

<pb id='091.png' n='1953_h1/A/0333' /> MASSELL, NINA

  To sing or not to sing. R108797.
    SEE Massell, James.

MASTERS, EDGAR LEE.

Selected poems. © on new matter; 22Sep25, A864735. R109044, 18Mar53, Ellen C. Masters (W)

MATISSE, GEORGES.

Paris, centre de culture intellectuelle; edited, with notes, exercises, and vocabulary by Leopold Cardon. © 10Sep25, A861839. R109474, 27Mar53, Jane Cardon (W)

MAUPASSANT, GUY DE.

The horla, and other stories. © 10Apr25, A823738. R107655, 18Feb53, Alfred A. Knopf, inc. (PWH)

The olive orchard, and other stories; translated by Storm Jameson. © 30Oct25, A875236. R112036, 15May53, Alfred A. Knopf, inc. (PWH)

Strong as death, translated and edited by Ernest Boyd. (His Collected novels and stories, v. 15) © 28Aug25, A69002. R112478, 27May53, Alfred A. Knopf, inc. (PWH)

MAUROIS, ANDRÉ.

  Captains and kings; translated by J.
    Lewis May. © 26Jun25, A855712.
    R108796, 16Mar53, J. Lewis May (A)

MAVOR, JAMES, Jr.

  Niagara in politics. R113927. SEE
    Mavor, James, Sr.

MAVOR, JAMES, Sr.

  Niagara in politics. © 13Nov25,
    A872495. R113927, 16Jun53,
    James Mavor (C)

MAXWELL, BARBARA MARY SYDNEY

  Fernande. R109294. SEE Maxwell,
    William Babington.

MAXWELL, HENRY WILLIAM AUSTIN

  Fernande. R109294. SEE Maxwell,
    William Babington.

MAXWELL, Mrs. P. PERCEVAL
  SEE King-Hall, Magdalen.

MAXWELL, WILLIAM BABINGTON.

  Fernande. © 9Sep25, A864538.
    R109294, 26Mar53, Henry William
    Austin Maxwell & Barbara Mary
    Sydney Maxwell (C)

MAY, ALFRED A.

Better English through practice. © 10Apr26, A890278. R110395, 14Apr53, Globe Book Co. (PWH)

MAY, JAMES LEWIS, tr.

  Captains and kings. R108796. SEE
    Maurois, André.

MAYO CLINIC, ROCHESTER, MINN.

Collected papers of the Mayo Clinic and the Mayo Foundation, v. 16, 1924; edited by Mrs. M. H. Mellish. © 22May25, A829403. R106480, 29Jan53, W. B. Saunders Co. (PCW)

MEARS, NEAL F.

  Who am I? © 24Apr25, A856504.
    R110783, 20Apr53, Neal F.
    Mears (A)

MEIGS, CORNELIA.

  Rain on the roof; illustrated by
    Edith Ballinger Price. © 13Oct25,
    A869393. R109047, 18Mar53,
    Cornelia Meigs (A)

<pb id='092.png' /> MELBA, NELLIE.

  The Melba method. © 9Apr26, (pub.
    abroad 15Feb26, AI-7864), A890405.
    R110056, 10Apr53, George
    Armstrong (C)

MENCKEN, HENRY LOUIS.

  Americana, 1925. R112289. SEE
    Americana, 1925.

  Gulliver's travels. R112033. SEE
    Swift, Jonathan.

MERCIER, LOUIS
  SEE Cherade, Robert.

MEREDITH, ISAAC HICKMAN

  The fountain of youth. R112071. SEE
    The fountain of youth.

  God's beautiful garden. R112072.
    SEE God's beautiful garden.

  Like unto these. R112073. SEE
    Like unto these.

  Youth's coronation day. R112076.
    SEE Youth's coronation day.

MEREZHKOVSKII, DMITRII SERGIEEVICH.

The birth of the gods; translated from the Russian by Natalie A. Duddington. © 1May26, (pub. abroad 1Dec25, AI-7643), A890753. R113933, 16Jun53, Natalie A. Duddington (A)

MERRIAM (G. AND C.) COMPANY

  Collegiate dictionary. R109600.
    SEE Webster, Noah.

  Elementary school dictionary.
    R109061. SEE Webster, Noah.

  Shorter school dictionary. R109062.
    SEE Webster, Noah.

MERRITT, ABRAHAM.

  The ship of Ishtar. © 19Feb26,
    A883381. R113863, 25Jun53,
    Eleanor H. Merritt (W)

MERRITT, ELEANOR H.

  The ship of Ishtar. R113863. SEE
    Merritt, Abraham.

MESSE des morts et sepultures; chant
  grégorien, no. 744. © 27Oct24,
  AF25979. R106716, 20Oct52,
  Desclée & Cie (PWH)

MEYERS, BECKY

  The Laxdaela saga. R108380. SEE
    Laxdoela saga.

MEYERSTEIN, EDWARD HARRY WILLIAM.

  Grobo; or, A castle in Spain. New
    ed. © on changes & new matter;
    19Mar26, A879977. R109182, 20Mar53,
    Rowland Leonard Watson (E)

  The pleasure lover. © 14Jun26, (pub.
    abroad 12Jan26, AI-7839), A891890.
    R113913, 16Jun53, Rowland Leonard
    Watson (E)

MICHIGAN digest. Semi-annual Michigan
  digest, Jan. 1-July 31, 1925.
  © 23Oct25, A875848. R105325,
  5Jan53, West Pub. Co. (PWH)

MIKELL, WILLIAM EPHRAIM.

Cases on criminal law, selected from decisions of the English and American courts. 2d ed. (American casebook series) © on revision & additional matter; 12Oct25, A875845. R105322, 5Jan53, West Pub. Co. (PWH)

MILBURN, GEORGE.

A book of popular recitations. (Little blue book, no. 1023) © 8Jun26, A955422. R113097, 8Jun53, Haldeman-Julius Co. (PWH)

<pb id='093.png' />
  A handbook for amateur magicians.
    (Little blue book, no. 1010)
    © 12Apr26, A892183. R111596,
    4May53, Haldeman-Julius Co. (PWH)

MILES, C. AUSTIN, joint comp.

  Songs of faith and triumph. R112648.
    SEE Hall, J. Lincoln, comp.

MILL, JOHN STUART.

On liberty. Introd. by John W. Gunn. (Big blue book, no. B-1) © on introd.; 24Aug25, A868235. R111287, 23Apr53, Haldeman-Julius Co. (PWH)

MILLE, PIERRE.

  The monarch, translated from French
    by Faith Chipperfield. © 15Mar25,
    A829125. R107634, 18Feb53, Curtis
    Brown, ltd. (PWH)

MILLER, A. G.

The foundations of science. © 20Apr25, A856207. R107230, 4Feb53, Haldeman-Julius Co. (PWH)

MILLER, ALICE DUER.

  Instruments of darkness, and other
    stories. © 27Mar26, A890442.
    R110126, 10Apr53, Denning Duer
    Miller (C)

  The reluctant duchess. © 29Aug25,
    A864448. R110125, 10Apr53, Denning
    Duer Miller (C)

MILLER, DENNING DUER

  Instruments of darkness. R110126.
    SEE Miller, Alice Duer.

  The reluctant duchess. R110125. SEE
    Miller, Alice Duer.

MILLER, HUGO H.

Intermediate geography, by Hugo H. Miller and Mary E. Polley Rev. ed. © 20Feb25, A823267. R105274, 9Jan53, Mary E. Polley (A)

MILLER, MARY SARG

Book of animals. R107377. SEE Sarg, Tony.

Wonder zoo. R107376. SEE Sarg, Tony.

MILLER, MAY REMINGTON

  Remington on bankruptcy. R110619 …
    SEE Remington, Harold.

MILLER, OLIVE BEAUPRÉ.

  In the nursery of my bookhouse.
    (Her My bookhouse, 1) © on new
    matter; 12Oct25, A869675. R108922,
    18Mar53, Olive Beaupré Miller (A)

  The latch key of my bookhouse. (Her
    My bookhouse, 6) © on new matter;
    12Oct25, A869674. R108921,
    18Mar53, Olive Beaupré Miller (A)

  Little pictures of Japan. Pictures
    by Katharine Sturges. © 15Jun25,
    A855593. R111605, 6May53, Olive
    Beaupré Miller (A)

  Nursery friends from France; illustrated
    by Maud and Miska Petersham.
    © 24Nov25, A872627. R111606,
    6May53, Olive Beaupré Miller (A)

  Up one pair of stairs of my bookhouse.
    (Her My bookhouse, 2) © on new
    matter; 12Oct25, A869676. R108923,
    18Mar53, Olive Beaupré Miller (A)

MILLER, WARREN HASTINGS.

The boy explorers on tiger trails in Burma. © 4Sep25, A864501. R104708, 29Dec52, Warren Hastings Miller (A)

MILLER MUSIC CORPORATION

  The orchestral banjoist. R109995.
    SEE Black, Arthur W.

<pb id='094.png' n='1953_h1/A/0334' /> MILLIGAN, LUCY RICHARDSON

  Standard etiquette. R105289. SEE
    Richardson, Anna Steese.

MILLIN, SARAH GERTRUDE.

  Mary Glenn. © 29Dec25, A875642.
    R108899, 17Mar53, Sarah Gertrude
    Millin (A)

MILN, LOUISE JORDAN.

  Ruben and Ivy Sên. © 8Sep25, A861729.
    R107424, 13Feb53, Dagmar Green (C)

MILTNER, CHARLES C.

  The elements of ethics. © 22Sep25,
    A864737. R109045, 18Mar53,
    Charles C. Miltner (A)

MIMS, EDWIN.

  The advancing South, stories of
    progress and reaction. © 7Mar26,
    A897170. R112012, 12May53,
    Edwin Mims (A)

MIQUELLE, RENÉE LONGY-
  SEE Longy-Miquelle, Renée.

MIRICK, GEORGE A.

The modern trend in spelling. © 24Sep25, A868569. R106262, 23Jan53, Harriet Mirick Lane (C)

MISSOURI decisions reported in the
  Southwestern reporter annotated,
  v. 270-272, 273-274. © West
  Pub. Co. (PWH)

  v. 270-272, May-July 1925.
    © 3Nov25, A879251. R105348,
    5Jan53.

  v. 273-274, Aug.-Oct. 1925.
    © 30Dec25, A883566. R105355,
    5Jan53.

MITCHELL, BENJAMIN W., ed.

  Les fiancées du soleil. R109469.
    SEE Forbin, Victor.

MITCHELL, LESLIE SCOTT

  The great Pandolfo. R109728. SEE
    Locke, William J.

MITCHISON, NAOMI.

Cloud Cuckoo land. © 14Jan26, (pub. abroad 29Oct25, AI-7590), A879518. R112476, 25May53, Naomi Mitchison (A)

MOEHLMAN, CONRAD HENRY.

  The unknown Bible. With an introd.
    by Cornelius Woelfkin. © 15Apr26,
    A890402. R112800, 1Jun53, Conrad
    Henry Moehlman (A)

MOELLER, PHILIP

  The guardsman. R104635. SEE
    Molnár, Ferenc.

MOLITOR, VINNIE B. CLARK
  SEE Clark, Vinnie B

MOLLOY, MAURICE S.

  The musical cross word puzzle book.
    Puzzle designs and solutions by
    M. S. Molloy and M. A. Snyder;
    definitions and explanations by
    Ernest R. Kroeger. © 15Sep25,
    A872893. R108033, 26Feb53, Maurice
    S. Molloy & Marie A. Snyder (A)

Musical cross word puzzle lessons, section 1, by Maurice S. Molloy and Marie A. Snyder. Edited by Ernest R. Kroeger. © 31Dec25, A880683. R108034, 26Feb53, Maurice S. Molloy & Marie A. Snyder (A)

MOLNÁR, FERENC.

  A gözoszlop. (In Pesti napló,
    Apr. 11, 1926) © 11Apr26, AF30848.
<pb id='095.png' />
    R110803, 21Apr53, Lili Darvas
    Molnár (W)

The guardsman, a comedy in three acts; translated by Grace I. Colbron and Hans Bartsch. Acting version by Philip Moeller; foreword by Theresa Helbrun. © 30Dec24, A814909. R104635, 29Dec52, Philip Moeller (A)

MOLNÁR, LILI DARVAS

  A gözoszlop. R110803. SEE Molnár,
    Ferenc.

MONAKOW, CONSTANTIN VON.

The emotions, morality, and the brain, translated by G. Barnes and S. E. Jelliffe. (Nervous and mental disease monograph series, no. 39) © 18Apr25, A822999. R108209, 2Mar53, Smith Ely Jelliffe Trust, Carel Goldschmidt, Trustee (PWH)

MONCRIEFF, CHARLES KENNETH SCOTT-
  SEE Scott-Moncrieff, Charles Kenneth.

MONCRIEFF, GEORGE SCOTT
  SEE Scott Moncrieff, George.

MONROE, ANNE SHANNON.

  Singing in the rain. © 26Mar26,
    A890555. R109461, 30Mar53,
    Elizabeth Monroe Story (NK)

MONTAGUE, CHARLES EDWARD.

  Rough justice, a novel. © 16Apr26,
    (pub. abroad 4Mar26, AI-7995),
    A890658. R110439, 17Apr53, M.
    Montague (W)

MONTAGUE, M.

  Rough Justice. R110439. SEE
    Montague, Charles Edward.

MONTAIGNE, MICHEL EYQUEM DE.

  Essays; translated by George Burnham
    Ives. Introductions by Grace
    Norton, 4 v. © 14Nov25, A875276.
    R112172, 18May53, Frederick Manley
    Ives (C)

MONTEIRO LOBATO, JOSÉ BENTO.

Brazilian short stories. Introd. & notes by Isaac Goldberg. (Little blue book, no. 733) © on introd. & notes; 27Mar25, A856814. R107235, 4Feb53, Haldeman-Julius Co. (PWH)

MONTGOMERY, LUCY MAUD.

  Emily climbs; with front. by M. L.
    Kirk. © 20Jul25, A864358.
    R110072, 10Apr53, E. S.
    MacDonald (C)

  Emily climbs; with front. by M. L.
    Kirk. © 27Aug25, A861814. R110071,
    10Apr53, E. S. MacDonald (C)

MONTHERLANT, HENRY DE.

Les bestiaires, roman. © 20Apr26, AF31185. R111463, 1May53, Henry de Montherlant (A)

MONTROSS, LYNN.

  East of Eden. © 18Sep25, A864676.
    R104712, 29Dec52, Lynn Montross (A)

MOORE, CLINTON KIMBALL

  Listening lessons in music. R105711.
    SEE Fryberger, Agnes Moore.

MOORE, EDWARD CALDWELL, ed.

  The Harvard University hymn book.
    R112173. SEE The Harvard
    University hymn book.

MOOREHEAD, FREDERICK B.

  Pathology of the mouth, by Frederick
    B. Moorehead and Kaethe W. Dewey.
<pb id='096.png' />
    © 18Sep25, A864802. R107366,
    9Feb53, Frederick B. Moorehead (A)

MOREUX, THÉOPHILE LOUIS.

Pour comprendre la mécanique. © 11Dec25, AF29952. R105830, 9Jan53, Théophile Louis Moreux (A)

MORGAN, CHARLES.

  My name is legion. © 20Mar25,
    A822724. R107930, 25Feb53,
    Charles Morgan (A)

MORROW, GEORGE, illus.

  Laughing Ann. R112779 … SEE
    Herbert, Alan Patrick.

MORROW, HONORE WILLSIE.

  The lost speech of Abraham Lincoln, a
    story. © 26Mar25, A823547.
    R107435, 13Feb53, Cornelia M.
    Chester (E)

MORSE, WITHROW.

  Applied biochemistry. © 20Oct25,
    A872075. R108474, 10Mar53, Mrs.
    Withrow Morse (W)

MORSE, Mrs. WITHROW

  Applied biochemistry. R108474. SEE
    Morse, Withrow.

MOSES, LEAH H.

  The American dramatist. R113133.
    SEE Moses, Montrose J.

  Representative American dramas.
    R113131. SEE Moses, Montrose J.,
    ed.

  Representative plays by American
    dramatists. R113928. SEE Moses,
    Montrose J., ed.

MOSES, MONTROSE J.

  The American dramatist. © on new
    matter & new illus.; 23Nov25,
    A875303. R113133, 9Jun53, Leah
    H. Moses (W)

  Representative American dramas,
    national and local. © 27Jun25,
    A855738. R113131, 9Jun53,
    Leah H. Moses (W)

Representative plays by American dramatists, from 1765 to the present day. Vol. 2, 1815-1858. © 20Nov25, A872592. R113928, 16Jun53, Leah H. Moses (W)

MOSS, GEOFFREY.

  Whipped cream. (Pub. abroad in
    installments in Woman magazine,
    Nov. 1925-Mar. 1926) © 16Apr26,
    A890403. R110434-R110438, 17Apr53,
    Geoffrey Moss (A)

Nov. 1925. © 2Nov25, AI-7747.

Dec. 1925. © 30Nov25, AI-7685.

Jan. 1926. © 18Dec25, AI-7743.

Feb. 1926. © 16Jan26, AI-7861.

Mar. 1926. © 16Feb26, AI-8022.

MUIR, AUGUSTUS.

The third warning. Pub. abroad under title: A romance of high hazard. © 23Oct25, (pub. abroad 28May25, AI-7136), A872196. R110825, 24Apr53, Augustus Muir (A)

MUKERJI, DHAN GOPAL.

The secret listeners of the East. © 8Apr26, A890316. R113932, 16Jun53, Mrs. Dhan Gopal Mukerji (W)

MUKERJI, Mrs. DHAN GOPAL

  The secret listeners of the East.
    R113932. SEE Mukerji, Dhan Gopal.

MULFORD, CLARENCE E.

  Hopalong Cassidy's protégé. © 8Jan26,
    A883427. R106032, 21Jan53,
    Clarence E. Mulford (A)

<pb id='097.png' n='1953_h1/A/0335' /> MULHOLLAND, JOHN.

Magic in the making, by John Mulholland and Milton M. Smith. © 27Feb25, A823335. R106483, 29Jan53, John Mulholland & Milton M. Smith (A)

MUNCE, RUTH H.

  Ariel Custer. R108325. SEE Hill,
    Grace Livingston.

MUNRO, THOMAS, joint author

  American economic life. R112474.
    SEE Tugwell, Rexford Guy.

MUNSTERBERG, MARGARET

  Faust. R111294 … SEE
    Goethe, Johann Wolfgang von.

MURDOCK, KENNETH BALLARD.

  Increase Mather, the foremost
    American Puritan. © 17Oct25,
    A869722. R112171, 18May53,
    Kenneth Ballard Murdock (A)

MURPHY, JIMMY.

  Toots & Caspar. Weekly sheet,
    March 22-27, 1926. © 12Mar26,
    A888804. R108945, 18Mar53,
    King Features Syndicate, inc. (PWH)

MUSE, MAUDE B.

A textbook of psychology for nurses. © 23Nov25, A872610. R107369, 9Feb53, Maude B. Muse (A)

MUZAK CORPORATION

  Standard inventors contract with
    Wired Radio, inc. R106886. SEE
    Hough, Clinton W.

THE MYTHOLOGY of all races. Vol. 7: Armenian, by Mardiros H. Ananikian. African, by Alice Werner. © 18Aug25, A861625. R109035, 18Mar53, The Macmillan Co. (PWH)

NEA SERVICE, INC., CLEVELAND

  The flapper wife. R111833. SEE
    Burton, Beatrice.

NASH, ROSALIND

  A short life of Florence Nightingale.
    R113780. SEE Cook, Sir Edward
    Tyras.

NATHAN, GEORGE JEAN.

The autobiography of an attitude. © 20Oct25, A869247. R112225, 18May53, George Jean Nathan (A)

NATHAN, ROBERT.

  Jonah. © 31Jan25, A823081.
    R105292, 13Jan53, Robert Nathan (A)

NATIONAL BUREAU OF ECONOMIC RESEARCH, INC.

  Income in the various states.
    R110809. SEE Leven, Maurice.

NATIONAL CASH REGISTER COMPANY, DAYTON, OHIO.

  N. C. R. statement book no. 32.
    © on text matter; 10Dec25, A877954.
    R106087, 23Jan53, The National Cash
    Register Co. (PWH)

NATIONAL GRANGE OF THE PATRONS OF
  HUSBANDRY SEE Patrons of Husbandry.
  National Grange.

NEAPOLE, Mrs. F. G.

  The Brownies in Fairyland. R110017.
    SEE Cox, Palmer.

<pb id='098.png' /> NEIHARDT, JOHN G.

  The song of the Indian wars; illustrated
    by Allen True. © 9Jun25,
    A829606. R109020, 18Mar53, John
    G. Neihardt (A)

NELSON, JESSIE MCCUTCHEON

  Romeo in Moon Village. R110424.
    SEE McCutcheon, George Barr.

NEPVEU, ANDRE
  SEE Durtain, Luc.

NEUSTADT, Mrs. M. BLUM

  Labor economics. R109478. SEE
    Blum, Solomon.

NEVINS, MARY FLEMING RICHARDSON

  Standard etiquette. R105289. SEE
    Richardson, Anna Steese.

THE NEW JERSEY digest: a digest of the reported decisions of the courts of New Jersey, 1921-1924. Vol. 10: Supplement. © 26Oct25, A869819. R105318, 5Jan53, Soney & Sage Co. (PWH)

NEW YORK (STATE) LAWS, STATUTES, ETC.

The consolidated laws of New York, annotated. Cumulative supplement, 1925. Edited by Harold N. Eldridge, assisted by Minor Bronaugh and members of the editorial staff. © 1Oct25, A872659. R105320, 5Jan53, Edward Thompson Co. (PWH)

NEW YORK digest. Vol. 14, Oct. 3, 1922-Sept. 7, 1925. © 13Feb26, A891329. R109781, 3Apr53, West Pub. Co. (PWH)

NEW YORK supplement, v. 210-212. Permanent
  ed. (National Reporter
  System) © West Pub. Co. (PWH)

  v. 210, July 6-Sept. 7, 1925.
    © 21Oct25, A875859. R105335,
    5Jan53.

  v. 211, Sept. 14-Nov. 30, 1925.
    © 16Jan26, A883572. R109754,
    3Apr53.

  v. 212, Dec. 7. 1925-Jan. 25, 1926.
    © 10Mar26, A891330. R109782,
    3Apr53.

NEW YORK TIMES COMPANY

  The New York times index. R108033.
    SEE The New York times index.

THE NEW YORK times index. Vol. 13,
  no. 4, Oct.-Dec. 1925; v. 14, no. 1,
  Jan.-Mar. 1926. © The New York
  Times Co. (PWH)

  v. 13, no. 4. © 26Feb26, A879755.
    R108133, 27Feb53.

  v. 14, no. 1. © 19May26, A890897.
    R112519, 26May53.

NEWCOMB, REXFORD.

  The old mission churches and historic
    houses of California. © 9Oct25,
    A872770. R109993, 7Apr53, Rexford
    Newcomb (A)

NEWMAN, ERNEST.

  A musical critic's holiday.
    © 27Mar25, A822719. R107653,
    18Feb53, Ernest Newman (A)

  A musical motley. © on revisions &
    new matter; 13Mar25, A822718.
    R107652, 18Feb53, Ernest Newman (A)

NEWTON, JENNIE M.

  The truth and the life. R112806.
    SEE Newton, Joseph Fort.

NEWTON, JOSEPH FORT.

  The truth and the life, and other
    sermons. © 15Apr26, A890752.
    R112806, 1Jun53, Jennie M.
    Newton (W)

<pb id='099.png' /> NICHOLS, BEVERLY.

25; being a young man's candid recollections of his elders and betters. © 6Mar26, A879765. R108710, 13Mar53, Beverly Nichols (A)

NICHOLS, EDITH J.

  Short course in bee culture. R106750.
    SEE Johnson, James Sion.

NICOMEDE MUSIC COMPANY

Modern method for ukulele, ukulele-banjo, and tenor banjo. R113409. SEE Loar, Lloyd.

NIETZSCHE, FRIEDRICH.

Epigrams; selected by Charles Weisberg. (Little blue book, no. 890) © 16Sep25, A870681. R111293, 23Apr53, Haldeman-Julius Co. (PWH)

NORDAU, MAX.

Conventional lies of our civilization, Introd. by Leo Markun. (Little blue book, no. 840) © on introd.; 13May25, A857715. R110157, 10Apr53, Haldeman-Julius Co. (PWH)

NORGAARD, MARGARET LIMA
  SEE Lima, Margaret.

NORRIS, KATHLEEN.

  The black Flemings. Front by C.
    Allan Gilbert. © 5Mar26, A890167.
    R108713, 13Mar53, Kathleen
    Norris (A)

NORTHEASTERN reporter, v. 148-149.
  Permanent ed. (National Reporter
  System. State series) © West
  Pub. Co. (PWH)

  v. 148, July 7-Oct. 27, 1925.
    © 16Dec25, A883576. R105361,
    5Jan53.

  v. 149, Nov. 3, 1925-Jan. 19, 1926.
    © 5Mar26, A891321. R109773,
    3Apr53.

NORTHEASTERN reporter digest, including
  cases reported in v. 1-140,
  Northeastern reporter. Vol. 9-11.
  © West Pub. Co. (PWH)

  v. 9. © 12Oct25, A875860.
    R105336, 5Jan53.

  v. 10. © 10Dec25, A883568.
    R105356, 5Jan53.

  v. 11. © 3Mar26, A891360.
    R109791, 3Apr53.

NORTHWESTERN reporter. Temporary
  Northwestern digest of v. 201-205.
  © 23Feb26, A891316. R109769,
  3Apr53, West Pub. Co. (PWH)

NORTHWESTERN reporter, v. 204-205.
  Permanent ed. (National Reporter
  System. State series) © West
  Pub. Co. (PWH)

  v. 204, July 10-Oct. 9, 1925.
    © 19Nov25, A879247. R105344,
    5Jan53.

  v. 205, Oct. 16, 1925-Jan. 1, 1926.
    © 22Feb26, A891338. R109789,
    3Apr53.

NUNEZ, Mrs. NEMOURS H.

The raja's captive. Synopsis. © 19Aug25, A865956. R106908, 6Feb53, Mrs. Nemours H. Nunez (A)

LE NUOVE canzoni; versi di Salvatore di
  Giacomo et al, musica di F.
  Pennino et al. © 15Oct25, A871232.
  R106295, 26Jan53, Francesco Pennino (A)

NYE, EDGAR WILSON.

The humor of "Bill" Nye; edited with an introd. by John W. Gunn. (Little blue book, no. 771) © 20Apr25, A856091. R107221, 4Feb53, Haldeman-Julius Co. (PWH)

<pb id='100.png' n='1953_h1/A/0336' /> NYSTROM (A. J.) AND COMPANY

The problem method in comparative map studies. R106159. SEE Atwood, Wallace W.

OBOURN, ELLSWORTH S., joint author

  New types of high school physics test.
    R106715. SEE Glenn, Earl R.

O'CASEY, SEAN.

The plough and the stars, a tragedy in four acts. © 6Apr26, A890233. R113799, 25Jun53, Sean O'Casey (A)

O'CONNELL, BRIDGET M.

  The daughter of the house. R107551.
    SEE Wells, Carolyn.

O'CONNOR, DANIEL CHARLES.

  A treatise on commercial pharmacy.
    3d ed., rev. © 8Oct25, A872767.
    R109653, 2Apr53, Mrs. D. Charles
    O'Connor (W)

O'CONNOR, Mrs. DANIEL CHARLES

  A treatise on commercial pharmacy.
    R109653. SEE O'Connor, Daniel
    Charles.

O'FLAHERTY, LIAM.

  The informer. © 18Sep25, A864751.
    R107862, 24Feb53, Liam
    O'Flaherty (A)

OGDEN, CHARLES KAY.

  The meaning of psychology. © 21May26,
    A891536. R112795, 1Jun53, C. K.
    Ogden (A)

OGG, FREDERIC A.

Introduction to American government, by Frederic A. Ogg and P. Orman Ray. 2d ed., rev. (The Century political science series) © 16Jun25, A855578. R108795, 16Mar53, The First National Bank of Madison (E) & P. Orman Ray (A)

O'HIGGINS, ANNA G.

  Clara Barron. R112811. SEE
    O'Higgins, Harvey.

O'HIGGINS, HARVEY.

  Clara Barron. © 4Mar26, A883521.
    R112811, 1Jun53, Anna G.
    O'Higgins (W)

O'KANE, WALTER COLLINS.

  Trails and summits of the White
    Mountains. (The Riverside outdoor
    handbooks) © 1May25, A829243.
    R109316, 23Mar53, Walter Collins
    O'Kane (A)

OKLAHOMA three in one service. 1925 annual volume. Prepared by Daniel W. Crockett, assisted by the publisher's editorial staff. © 23Jan26, A879747. R109747, 3Apr53, The Bobbs-Merrill Co. (PWH)

OKLAHOMA three in one service. Vol. 4, no. 3, Sept. 1925; v. 5, no. 1, Mar. 1926. Prepared by Daniel W. Crockett, assisted by the publisher's editorial staff. © The Bobbs-Merrill Co. (PWH)

  v. 4, no. 3. © 3Oct25, A870577.
    R105319, 5Jan53.

  v. 5, no. 1. © 16Mar26, A879961.
    R109748, 3Apr53.

OLCOTT, VIRGINIA.

  Everyday plays for home, school, and
    settlement. Designs for costumes
<pb id='101.png' />
    by Harriet Mead Olcott. © 31Oct25,
    A869941. R110540, 22Apr53,
    Virginia Olcott (A)

  International plays for young people.
    Costumes illustrated by Florence
    Egan. © 17Oct25, A872070. R110541,
    22Apr53, Virginia Olcott (A)

OLIVIA, GEORGE.

The spite of heaven, by Oliver Onions [pseud.] © 31Mar26, A883846. R109631, 1Apr53, George Oliver (A)

OLIVIERE-RAMUZ, MARIANNE

  La grande peur dans la montagne.
    R111461. SEE Ramuz, Charles
    Ferdinand.

OLSON, IRENE EBY

  Complete scientific method. R109988.
    SEE Eby, Walter Mauney.

ONE-ACT plays for stage and study, second series; twenty-one contemporary plays. Pref. by Walter Prichard Eaton. © 24Dec25, A879526. R113263, 11Jun53, Samuel French (PCW)

ONGLEY, LEO.

  The old woman of the movies.
    R111905. SEE Blasco Ibañez,
    Vicente.

  The outcast. R113575. SEE
    Pirandello, Luigi.

ONIONS, OLIVER, pseud. SEE Oliver, George.

OPPENHEIM, JAMES.

  A psycho-analysis of America.
    (Little blue book, no. 985)
    © 22Mar26, A889551. R111590,
    4May53, Haldeman-Julius Co. (PWH)

  The psychology of Jung. (Little
    blue book, no. 978) © 1Dec25,
    A876897. R111298, 23Apr53,
    Haldeman-Julius Co. (PWH)

OPPENHEIM, RALPH.

  Wagner's great love affair. (Little
    blue book, no. 990) © 16Mar26,
    A889553. R111592, 4May53,
    Haldeman-Julius Co. (PWH)

ORCUTT, PENELOPE

  The high forfeit. R104713. SEE
    King, Basil.

ORCZY, EMMUSKA, baroness.

  Unravelled knots. © 22Jan26,
    A879409. R106440, 26Jan53, John
    Montague Orczy-Barstow (C)

ORCZY-BARSTOW, JOHN MONTAGUE

  Unravelled knots. R106440. SEE
    Orczy, Emmuska, baroness.

OREM, PRESTON WARE, comp.

Celebrated light overtures, arr. for piano solo and four hands. © 15Feb26, A885429. R108881, 17Mar53, Theodore Presser Co. (PWH)

ORTON, HELEN FULLER.

  The little lost pigs; illustrated by
    Luxor Price. © 27Aug25, A864355.
    R107425, 13Feb53, Helen Fuller
    Orton (A)

OSBORN, FAIRFIELD

  The earth speaks to Bryan. R112724.
    SEE Osborn, Henry Fairfield.

OSBORN, HENRY FAIRFIELD.

  The earth speaks to Bryan. © 26Jun25,
    A855733. R112724, 27May53,
    Fairfield Osborn (C)

<pb id='102.png' /> OSBORN, LOUISE BROWN, ed.

  Three farces. R108367. SEE
    Garrick, David.

OSGOOD, CELESTE P.

  Advanced calculus. R109058. SEE
    Osgood, William F.

OSGOOD, WILLIAM F.

  Advanced calculus. © 24Nov25,
    A875249. R109058, 18Mar53,
    Celeste P. Osgood (W)

OTIS ELEVATOR COMPANY.

  Private telegraphic code. © 17Apr25,
    A828715. R108657, 16Feb53, Otis
    Elevator Co. (PCB)

OUIDA, pseud. SEE De la Ramée, Louise.

OUR Father's world, a summertime songalogue; text written and arr. by George Orlia Webster, music by various composers. © 12Apr26, A899564. R112074, 11May53, Lorenz Pub. Co. (PWH)

OUR present knowledge of heredity; a
  series of lectures given at the
  Mayo Foundation and the
  Universities of Wisconsin, Minnesota,
  Nebraska, Iowa, and Washington
  (St. Louis) 1923-1924, edited by
  Maud H. Mellish. © 8Dec25,
  A872978. R107370, 9Feb53, W. B.
  Saunders Co. (PCW)

OURSLER, GRACE PERKINS
  SEE Perkins, Grace.

OWEN, Mrs. GEORGE
  SEE Eggleston, Margaret W.

OWEN, MARGARET EGGLESTON
  SEE Eggleston, Margaret W.

OXENHAM, JOHN.

  The hidden years. © 10Oct25, A869629.
    R110045, 9Apr53, Erica Dunkerley,
    Marjorie Dunkerley, Theodora
    Dunkerley & Elsie Dunkerley (C)

OXFORD BOOK COMPANY, INC.

  Biology. R110953. SEE Mandl,
    Max Macbeth.

PACIFIC reporter. Digest of the
  Pacific reporter, v. 226-240.
  (National Reporter System digests.
  Pacific series, v. 18) © 24Mar26,
  A891328. R109780, 3Apr53, West
  Pub. Co. (PWH)

PACIFIC reporter, v. 237-241. Permanent
  ed. (National Reporter System.
  State series) © West Pub. Co. (PWH)

  v. 237, July 27-Sept. 7, 1925.
    © 26Oct25, A879246. R105343,
    5Jan53.

  v. 238, Sept. 14-Oct. 12, 1925.
    © 24Nov25, A879250. R105347,
    5Jan53.

  v. 239, Oct. 19-Nov. 23, 1925.
    © 5Jan26, A883577. R109756,
    3Apr53.

  v. 240, Nov. 30-Dec. 28, 1925.
    © 15Feb26, A891336. R109787,
    3Apr53.

  v. 241, Jan. 4-Feb. 1, 1926.
    © 19Mar26, A891335. R109786,
    3Apr53.

PACKARD, FRANK L.

  The red ledger. © 11Jun26, A891792.
    R113323, 12Jun53, Marguerite Pearl
    Packard (W)

<pb id='103.png' n='1953_h1/A/0337' /> PACKARD, MARGUERITE PEARL

  The red ledger. R113323. SEE
    Packard, Frank L.

PAGE, KIRBY.

An American peace policy; with an introd. by John H. Clarke. © 23Oct25, A869781. R104874, 30Dec52, Kirby Page (A)

PAINE, KATHARINE D.

  In Zanzibar. R109318. SEE Paine,
    Ralph D.

PAINE, RALPH D.

  In Zanzibar. © 22May25, A829673.
    R109318, 23Mar53, Katharine D.
    Paine (W)

PALMER, CLAUDE IRWIN.

Plane and spherical trigonometry, by Claude Irwin Palmer and Charles Wilber Leigh. 3d ed., rev. © 13Jul25, A861127. R109489, 30Mar53, May B. Palmer & Teresa F. Leigh (W)

PALMER, FREDERICK.

  Invisible wounds. © 14Mar25,
    A823473. R106656, 30Jan53,
    Frederick Palmer (A)

PALMER, MAY B.

  Plane and spherical trigonometry.
    R109489. SEE Palmer, Claude
    Irwin.

PALMER, RUTH CROSS
  SEE Cross, Ruth.

PARAMOUNT PICTURES CORPORATION

  Old Ironsides. R112388. SEE
    Wright, Anna Maria Rose.

  The pony express. R105147. SEE
    Forman, Henry James.

PARKER, EDITH PUTNAM, joint author

  Geography. R106254. SEE
    Barrows, Harlan H.

PARKER, GILBERT.

  The power and the glory. © 24Sep25,
    A861986. R107773, 9Feb53, Henry
    William Parker (NK)

PARKER, HENRY WILLIAM

  The power and the glory. R107773.
    SEE Parker, Gilbert.

PARKER, MARY MCDANIEL

  The wind. R113585. SEE Scarborough,
    Dorothy.

PARKMAN, FRANCIS.

  The Oregon trail. With illus. by
    N. C. Wyeth. (The Beacon Hill
    bookshelf) © on illus.; 12Aug25,
    A861747. R113132, 9Jun53,
    Carolyn B. Wyeth (W)

PAROISSIEN romain, contenant la messe
  et l'office pour les dimanches et
  les fêtes; chant grégorien, no.
  800C. © 24Oct24, AF26000.
  R106719, 20Oct52, Desclée & Cie
  (PWH)

PASTURE, EDMÉE ELIZABETH MONICA DE LA
  SEE De la Pasture, Edmée Elizabeth
  Monica.

PATRI, ANGELO.

  School and home. © 7Aug25, A861331.
    R110016, 7Apr53, Angelo Patri (A)

  What have you got to give? © 11Jun26,
    A891964. R113326, 12Jun53, Angelo
    Patri (A)

<pb id='104.png' /> PATRICK, DIANA, pseud. SEE Wilson, Desemea (Newman)

PATRONS OF HUSBANDRY. NATIONAL GRANGE

  The patron. R113034. SEE Smith,
    Leslie R., comp.

PATTEE, FRED LEWIS, ed.

  American short stories. © 23Jul25,
    A864472. R113157, 10Jun53, Ethel
    B. Gorrell (E)

PATTERSON, KATHERINE W.

  The story of Holland. R111912. SEE
    Banks, Helen Ward.

PAUL, HELEN LONGYEAR

  The history of a house. R107718.
    SEE Longyear, Mary Beecher.

PAULA, SISTER MARIE
  SEE Marie Paula, Sister.

PAYNE, ELIZABETH STANCY.

  Singing waters. Front. by R. Pallen
    Coleman. © 25Apr25, A855161.
    R108262, 4Mar53, Richard M.
    Payne (C)

PAYNE, RICHARD M.

  Singing waters. R108262. SEE
    Payne, Elizabeth Stancy.

PEARL, MAUDE DE WITT

  The biology of population growth.
    R112291. SEE Pearl, Raymond.

PEARL, RAYMOND.

The biology of population growth. © 6Nov25, A875107. R112291, 21May53, Maude de Witt Pearl (W)

PECK, LORA B., ed.

  Robinson Crusoe. R105888. SEE
    Defoe, Daniel.

PEDLER, MARGARET.

  Tomorrow's tangle. (Pub. abroad in
    installments in Red magazine,
    July 31-Nov. 6, 1925) © 22Jan26,
    A879511. R106446-R106453, 26Jan53,
    Flora Mabel Warhurst & Harold
    Pincott (E)

book 1, chapter 1-4, book 2, chapter 1. © 31Jul25, AI-7311.

book 2, chapter 2-5. © 14Aug25, AI-7360.

book 2, chapter 6-11. © 28Aug25, AI-7359.

book 2, chapter 12-17. © 11Sep25, AI-7393.

book 2, chapter 18, book 3, chapter 1-3. © 25Sep25, AI-7440.

book 3, chapter 3 (continued)-9. © 9Oct25, AI-7497.

book 3, chapter 9 (continued)-10. © 23Oct25, AI-7681.

book 3, chapter 10 (continued)-12. © 9Nov25, AI-7744.

PEETS, ELBERT.

Practical tree repair. Rev. ed. © 3Oct25, A869312. R110026, 8Apr53, Elbert Peets (A)

PELLEY, WILLIAM DUDLEY.

  Drag, a comedy. © 18Feb25, A823144.
    R105785, 19Jan53, William Dudley
    Pelley (A)

PELOUBET, FRANCIS NATHAN, ed.

  Peloubet's Bible dictionary. R105884.
    SEE Smith, Sir William.

PENNINO, FRANCESCO

  Le nuove canzoni. R106295. SEE
    Le nuove canzoni.

<pb id='105.png' /> PERKINS, BOBBY, illus.

  Music Al. R112277. SEE Perkins,
    Grace.

PERKINS, ELEANOR ELLIS

  The American twins of 1812. R113398.
    SEE Perkins, Lucy Fitch.

PERKINS, GRACE.

Music Al, a fairy story about music; illustrated by Bobby Perkins. © 19May26, A976576. R112277, 22May53, Grace Perkins Oursler & Mrs. Henry Uhthoff (Bobby Perkins) (A)

PERKINS, LAWRENCE B.

  The American twins of 1812. R113398.
    SEE Perkins, Lucy Fitch.

PERKINS, LUCY FITCH.

  The American twins of 1812; illustrated
    by the author. © 30Oct25,
    A872253. R113398, 10Jun53,
    Eleanor Ellis Perkins & Lawrence
    B. Perkins (C)

PERRAULT, CHARLES.

Bluebeard, Cinderella, and other tales, retold by Lloyd E. Smith. (Little blue book, no. 836) © 8May25, A858433. R110528, 10Apr53, Haldeman-Julius Co. (PWH)

PERRY, LOUISE

  Fifty famous songs for the harmonica.
    R111413. SEE Perry, Sam A., ed.

  Harmonica Bill's 10 minute course
    in harmonica playing. R110099.
    SEE Perry, Sam A., ed.

PERRY, SAM A.

  Fifty famous songs for the harmonica,
    edited by "Harmonica Bill" [pseud.]
    © 21Apr26, A892425. R111413,
    28Apr53, Louise Perry (W)

  Harmonica Bill's 10 minute course
    in harmonica playing. © 28Nov25,
    A874833. R110099, 8Apr53,
    Louise Perry (W)

PERRY, STELLA G. S.

Barbara of Telegraph Hill, with front, by Thelma Gooch. © 27Aug25, A864356. R107785, 24Feb53, Stella G. S. Perry (A)

PESLOUAN, LUCAS DE
  SEE Lucas-Dubreton, Jean.

PETERSHAM, MAUD, illus.

  Nursery friends from France.
    R111606. SEE Miller, Olive
    Beaupré, tr.

PETERSHAM, MISKA, illus.

  Nursery friends from France.
    R111606. SEE Miller, Olive
    Beaupré, tr.

PHELPS DODGE REFINING CORPORATION

The use of copper sulphate in control of microscopic organisms. R106988. SEE Hale, Frank E.

PHILLIMORE, CECILY (SPENCER-SMITH)

Paul, by the author of By an unknown disciple. (Pub. abroad in installments in The Nation and The Athenaeum, Apr. 11-May 23, 1925) © The Honorable Mrs. Phillimore (A)

    3. © 11Apr25, AI-6993. R110202,
      10Apr53.

    4. © 18Apr25, AI-7025. R110203,
      10Apr53.

    5. © 9May25, AI-7074. R110204,
      10Apr53.

<pb id='106.png' n='1953_h1/A/0338' />
    6. © 16May25, AI-7100. R110205,
      10Apr53.

7. © 23May25, AI-7148. R110206, 10Apr53.

PHILLIPS, ETHEL CALVERT.

  Pretty Polly Perkins; illustrated by
    Edith F. Butler. © 28Aug25,
    A864461. R109322, 23Mar53, Irene
    Calvert Phillips (E)

PHILLIPS, IRENE CALVERT

  Pretty Polly Perkins. R109322. SEE
    Phillips, Ethel Calvert.

PHILLIPS, LE ROY, ed.

Baker's anthology of one-act plays, selected and edited by Le Roy Phillips and Theodore Johnson. © 1Dec25, A875381. R105590, 12Jan53, Le Roy Phillips & Theodore Johnson (A)

PICHEL, IRVING.

Modern theatres. Rev. © on revisions & new matter; 6Nov25, A872399. R112475, 25May53, Irving Pichel (A)

PICKEL, MARGARET B.

Century readings in ancient, classical, and modern European literature. R107504. SEE Cunliffe, John W., ed.

PICKELS, ELIZABETH ROBINSON

  Drainage and flood control engineering.
    R108084. SEE Pickels,
    George W.

PICKELS, GEORGE W.

  Drainage and flood control engineering.
    1st ed. © 22Oct25, A872182.
    R108084, 27Feb53, Elizabeth
    Robinson Pickels (W)

PIEDIGROTTA Gennarelli, 1925.
  © 20Aug25, AF28567. R113107,
  8Jun53, Italian Book Co. (PCW)

PIEDIGROTTA Mario, 1925. © 14Aug25,
  AF28487. R113104, 8Jun53, Italian
  Book Co. (PCW)

PIEDIGROTTA 1925, la canzonetta.
  © 14Aug25, AF28488. R113105,
  8Jun53, Italian Book Co. (PCW)

PIEDIGROTTA Santa Lucia, 1925.
  © 20Aug25, AF28565. R113106,
  8Jun53, Italian Book Co. (PCW)

PIER, ARTHUR STANWOOD.

  Friends and rivals. With front. by
    Frank M. Rines. © 16Oct25,
    A869763. R113393, 10Jun53,
    Arthur Stanwood Pier (A)

PIERCE, FREDERICK.

  Understanding our children. © 5Jan26,
    A879192. R113930, 16Jun53,
    Frederick Pierce (A)

PINCOTT, HAROLD

  Tomorrow's tangle. R106446 … SEE
    Pedler, Margaret.

PIRANDELLO, FAUSTO

  Donna Mimma. R108155. SEE
    Pirandello, Luigi.

PIRANDELLO, LUIGI.

  Donna Mimma. © 15May25, AF13023.
    R108155, 27Feb53, Stefano
    Pirandello, Fausto Pirandello &
    Rosalie (Lietta) Aguirre
    Pirandello (C)

<pb id='107.png' />
  The outcast, a novel. Authorized
    translation from the Italian by
    Leo Ongley. © 21Sep25, A861963.
    R113575, 16Jun53, E. P. Dutton
    & Co., inc. (PWH)

  Six personnages en quête d'auteur.
    Version francaise de Benjamin
    Crémieux. (His Théâtre complet.
    Masques nus, 1) © 1Sep25,
    AF29022. R112453, 25May53,
    Mme Benjamin Crémieux (née
    Marie-Anne Comnene) (W)

PIRANDELLO, ROSALIA AGUIRRE

  Donna Mimma. R108155. SEE
    Pirandello, Luigi.

PIRANDELLO, ROSALIE AGUIRRE
  SEE Pirandello, Rosalia Aguirre.

PIRANDELLO, STEFANO

  Donna Mimma. R108155. SEE
    Pirandello, Luigi.

PITTENGER, BENJAMIN FLOYD.

  An introduction to public school
    finance. © 30May25, A829575.
    R109935, 3Apr53, Benjamin Floyd
    Pittenger (A)

PITTMAN, ALFRED SEE Trustees
  under the Will of Mary Baker Eddy.

PITZ, HENRY C., illus.

  A prairie Rose. R112129. SEE
    Bush, Bertha E.

PLATT AND MUNK COMPANY, INC.

  Little Jack Rabbit coloring book.
    R109256. SEE Cory, David.

  Uncle Wiggily on Sugar Island.
    R110815. SEE Garis, Howard R.

PLOETZ, KARL JULIUS.

Manual of universal history; translated and enl. by William H. Tillinghast. Revised under the editorship of Harry Elmer Barnes. © 1Dec25, A875388. R113403, 10Jun53, Houghton Mifflin Co. (PWH)

PLUMMER, GEORGE WINSLOW.

  Astrology of the crucifixion. (Societas
    Rosicruciana in America. Astrological
    section, serial no. 52.
    Liber 6, Esoteric no. 7) © 1Apr25,
    A860253. R106362, 27Jan53,
    Marguerite Winslow Plummer
    Sheahan (C)

  At-one-ment. (Societas Rosicruciana
    in America. Occult science, liber
    3. Alchemical series, no. 6.
    Serial no. 30) © 1Jul25, A862550.
    R106366, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

  The bodies of man. (American
    Psychological Society. Mental
    miracles, pt. 1. Serial no. 4)
    © 30Mar26, A889602. R112706,
    26May53, Marguerite Winslow
    Plummer Sheahan (C)

  Calculating the positions of the
    planets. (American College of
    Astroscience, serial no. 4. Liber
    1, Mathematics no. 4) © 24Mar26,
    A889247. R112703, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

The coelum philosophorum. (Societas Rosicruciana in America. Occult science, liber 3. Alchemical series, no. 3. Serial no. 27) © 1Apr25, A823944. R106356, 27Jan53, Marguerite Winslow Plummer Sheahan (C)

  Combustio. (Societas Rosicruciana
    in America. Occult science, liber
    3. Alchemical series, no. 10.
    Serial no. 36) © 14Jan26, A881276.
    R112695, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

  Concentration. (Societas Rosicruciana
    in America. Spiritual
    alchemy, no. 7) © 12Mar26, A886872.
<pb id='108.png' />
    R112698, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

  Concentration and imagination.
    (American Psychological Society.
    Mental miracles, pt. 1. Serial
    no. 6) © 29Apr26, A894099.
    R112712, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

  Consciousness. (Societas Rosicruciana
    in America. Spiritual
    alchemy, no. 5) © 30Mar25, A823941.
    R106353, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

  Consciousness and the human mind.
    (American Psychological Society.
    Mental miracles, pt. 1. Serial
    no. 5) © 17Apr26, A893302.
    R112710, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

Declinations, elements, aspects, indexing. (American College of Astroscience, serial no. 5. Liber 1, Mathematics no. 5) © 30Mar26, A889599. R112704, 26May53, Marguerite Winslow Plummer Sheahan (C)

  Directions and directing. (American
    College of Astroscience, serial
    no. 8. Liber 1, Mathematics no. 8)
    © 11May26, A895216. R112713,
    26May53, Marguerite Winslow Plummer
    Sheahan (C)

  Distribution of solar energy.
    (Societas Rosicruciana in America.
    Spiritual alchemy, no. 2)
    © 9Mar25, A826851. R106358,
    27Jan53, Marguerite Winslow Plummer
    Sheahan (C)

  The dominant life. © 12Jan26,
    A881277. R112696, 26May53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Esotericism and exotericism. (Societas
    Rosicruciana in America. Astrological
    section, serial no. 53.
    Liber 6, Esoteric no. 8) © 1May25,
    A860254. R106363, 27Jan53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Esoterism of aspects. (Societas
    Rosicruciana in America. Astrological
    section, serial no. 55.
    Liber 6, Esoteric no. 10)
    © 15Jul25, A862555. R106371,
    27Jan53, Marguerite Winslow
    Plummer Sheahan (C)

  Esoterism of the elements. (Societas
    Rosicruciana in America. Astrological
    section, serial no. 56.
    Liber 6, Esoteric no. 11)
    © 15Jul25, A862554. R106370,
    27Jan53, Marguerite Winslow
    Plummer Sheahan (C)

  The four elements. (American Psychological
    Society. Mental miracles,
    pt. 1. Serial no. 3) © 16Mar26,
    A886876. R112701, 26May53,
    Marguerite Winslow Plummer Sheahan (C)

The goal of the alchemists. (Societas Rosicruciana in America. Occult science, liber 3. Alchemical series, no. 4. Serial no. 28) © 1Jun25, A860256. R106365, 27Jan53, Marguerite Winslow Plummer Sheahan (C)

  Good and evil. (Societas Rosicruciana
    in America. Astrological
    section, serial no. 54. Liber 6,
    Esoteric no. 9) © 1Jun25, A860255.
    R106364, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

  Heart, spleen, breasts, and knees.
    (Societas Rosicruciana in America.
    Spiritual alchemy, no. 4)
    © 30Mar25, A823940. R106352,
    27Jan53, Marguerite Winslow
    Plummer Sheahan (C)

<pb id='109.png' n='1953_h1/A/0339' />
  Introduction. (American College of
    Astroscience, serial no. 1. Liber
    1, Mathematics no. 1) © 4Feb26,
    A879499. R112693, 26May53,
    Marguerite Winslow Plummer
    Sheahan (C)

The Kabala. (Societas Rosicruciana in America. Occult science, liber 4. Kabalistic series, no. 1. Serial no. 37) © 4Feb26, A879500. R112694, 26May53, Marguerite Winslow Plummer Sheahan (C)

Knowing the mysteries. (Societas Rosicruciana in America. Occult science, liber 3. Alchemical series, no. 5. Serial no. 29) © 15Jun25, A862552. R106368, 27Jan53, Marguerite Winslow Plummer Sheahan (C)

  The law of attraction. (American
    Psychological Society. Mental
    miracles, pt. 1. Serial no. 8)
    © 28May26, A895998. R112953,
    8Jun53, Marguerite Winslow
    Plummer Sheahan (C)

  Literal Kabala. (Societas Rosicruciana
    in America. Occult science,
    liber 4. Kabalistic series, no. 2.
    Serial no. 38) © 29Mar26, A889600.
    R112705, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

  The magnum opus. (Societas Rosicruciana
    in America. Occult science,
    liber 3. Alchemical series, no. 1.
    Serial no. 25) © 25Feb25, A826853.
    R106360, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

Man, synthesis of many forces. (Societas Rosicruciana in America. Astrological section, serial no. 51. Liber 6, Esoteric no. 6) © 25Feb25, A826854. R106361, 27Jan53, Marguerite Winslow Plummer Sheahan (C)

The marriage of Hermes and Venus, no. 1. (Societas Rosicruciana in America. Spiritual alchemy, no. 8) © 10Apr26, A893298. R112707, 26May53, Marguerite Winslow Plummer Sheahan (C)

  Meditation. (American Psychological
    Society. Mental miracles, pt. 1.
    Serial no. 7) © 19May26, A895999.
    R112716, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

  Metaphysics. (American Psychological
    Society. Mental miracles, pt. 1.
    Serial no. 2) © 1Mar26, A886877.
    R112702, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

The mission of esoteric astrology. (Societas Rosicruciana in America. Astrological section, serial no. 57. Liber 6, Esoteric no. 12) © 15Jul25, A862553. R106369, 27Jan53, Marguerite Winslow Plummer Sheahan (C)

The Progrest horoscope. (American College of Astroscience, serial no. 7. Liber 1, Mathematics no. 7) © 28Apr26, A894098. R112711, 26May53, Marguerite Winslow Plummer Sheahan (C)

  The psychic centers. (Societas
    Rosicruciana in America. Spiritual
    alchemy, no. 1) © 9Mar25, A826850.
    R106357, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

  Psychic centers at the larynx and
    sexual organs. (Societas Rosicruciana
    in America. Spiritual
    alchemy, no. 3) © 14Mar25, A826852.
    R106359, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

  Purificatio. (Societas Rosicruciana
    in America. Occult science,
    liber 3. Alchemical series, no. 9.
    Serial no. 33) © 4Nov25, A869919.
    R106374, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

<pb id='110.png' />
  Purification. (Societas Rosicruciana
    in America. Spiritual alchemy,
    no. 6) © 5Apr25, A823942. R106354,
    27Jan53, Marguerite Winslow
    Plummer Sheahan (C)

  Putrefactio. (Societas Rosicruciana
    in America. Occult science, liber
    3. Alchemical series, no. 10.
    Serial no. 34) © 1Dec25, A881275.
    R106375, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

  The rationale of natural science.
    (American Psychological Society.
    Mental miracles, pt. 1. Serial
    no. 1) © 1Feb26, A886003.
    R112697, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

The rationale of occult science. (Societas Rosicruciana in America. Occult science, liber 1. Rosicrucian series, no. 1. Serial no. 1) © 4Jan26, A903413. R112717, 26May53, Marguerite Winslow Plummer Sheahan (C)

Re-generatio. (Societas Rosicruciana in America. Occult science, liber 3. Alchemical series, no. 7, Serial no. 31) © 15Jul25, A862551. R106367, 27Jan53, Marguerite Winslow Plummer Sheahan (C)

The rising sign and the cusps of houses. (American College of Astroscience, serial no. 3. Liber 1. Mathematics no. 3) © 9Mar26, A886874. R112699, 26May53, Marguerite Winslow Plummer Sheahan (C)

  Rosicrucian personal analysis and
    inventory. © 1Dec25, A951162.
    R106376, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

Sanctificatio. (Societas Rosicruciana in America. Occult science, liber 3. Alchemical series, no. 8. Serial no. 32) © 1Oct25, A869918. R106373, 27Jan53, Marguerite Winslow Plummer Sheahan (C)

The sefer dtzenioutha. (Societas Rosicruciana in America. Occult science, liber 4. Kabalistic series, no. 3. Serial no. 39) © 17Apr26, A893299. R112708, 26May53, Marguerite Winslow Plummer Sheahan (C)

  The Sefiroth. (Societas Rosicruciana
    in America. Occult science, liber
    4. Kabalistic series, no. 4.
    Serial no. 40) © 25May26, A895997.
    R112715, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

  Setting the mind at work. (Societas
    Rosicruciana in America. Psychological
    series, no. 13. Liber 1,
    pt. 2. Serial no. 49) © 18May26,
    A895996. R112714, 26May53, Marguerite
    Winslow Plummer Sheahan (C)

  Sidereal time. (American College of
    Astroscience, serial no. 2. Liber
    1. Mathematics no. 2) © 23Feb26,
    A886875. R112700, 26May53,
    Marguerite Winslow Plummer
    Sheahan (C)

  Supplemental data. (American College
    of Astroscience, serial no. 6.
    Liber 1, Mathematics no. 6)
    © 17Apr26, A893300. R112709,
    26May53, Marguerite Winslow Plummer
    Sheahan (C)

  Symbols of personality and individuality
    (Societas Rosicruciana in
    America. Astrological section,
    serial no. 50. Liber 6, Esoteric
    no. 5) © 15Jun25, A862556.
    R106372, 27Jan53, Marguerite
    Winslow Plummer Sheahan (C)

  Three principles and four elements.
    (Societas Rosicruciana in America.
    Occult science, liber 3. Alchemical
    series, no. 2. Serial no. 26)
    © 30Mar25, A823943. R106355,
    27Jan53, Marguerite Winslow
    Plummer Sheahan (C)

<pb id='111.png' /> POE, EDGAR ALLAN.

Edgar Allan Poe letters till now unpublished, in the Valentine Museum, Richmond, Virginia. Introductory essay ana commentary by Mary Newton Stanard. © 15Sep25, A869776. R110476, 16Apr53, Roberta Newton Taylor (NK)

POLIAKOV, SOLOMON L'VOVICH.

  Le messie sans peuple. Version
    francaise de J. Kessel. © 20Jun25,
    AF28305. R112452, 25May53, Joseph
    Kessel (A)

POLLEY, MARY E., joint author

  Intermediate geography. R105274.
    SEE Miller, Hugo H.

POLLOCK, CHANNING.

The enemy, novelized from the play. © 17May26, A891475. R112350, 20May53, Helen Channing Pollock (E)

POLLOCK, HELEN CHANNING

  The enemy. R112350. SEE Pollock,
    Channing.

POLO, MARCO.

The travels of Marco polo, the Venetian; rev. from Marsden's translation and edited with introd. by Manuel Komroff. © on introd. & revisions; 1Feb26, A883410. R106895, 5Feb53, Manuel Komroff (A)

POORMAN, ALFRED P.

Strength of materials. 1st ed. © 31Jul25, A864094. R108075, 27Feb53, Alfred P. Poorman (A)

POPHAM, WILLIAM LEE.

  Ponce de Leon Spring, "The Fountain
    of Youth." © 4Feb26, A884571.
    R110181, 6Apr53, B. F. Smithgall
    (PWH)

POWYS, LLEWELYN.

Cup bearers of wine and hellebore. © 16Mar25, A822642. R107203, 4Feb53, Haldeman-Julius Co. (PWH)

THE PRACTICAL standard dictionary of
  the English language, by Frank H.
  Vizetelly. © 31Jan25, A823274.
  R106525, 31Jan53, Norma Cochrane (C)

PRAGER, BERNHARD, ed.

  Handbuch der organischen Chemie.
    R108143 … SEE Beilstein,
    Friedrich Konrad.

PRATT, JOSEPH H.

  Physical diagnosis of diseases of the
    chest, by Joseph H. Pratt and
    George E. Bushnell. © 6Jun25,
    A855531. R107363, 9Feb53, Joseph
    H. Pratt (A)

PRATZ, CLAIRE DE.

French home cooking. © 22May25, A855399. R108717, 11Mar53, Claire de Pratz (A)

PRESSER (THEODORE) COMPANY

  Celebrated light overtures. R108881.
    SEE Orem, Preston Ware, comp.

PRESTON, KEITH.

  The top o' the column. © 4Oct25,
    A963112. R108275, 5Mar53, Mrs.
    Keith Preston (W)

PRESTON, Mrs. KEITH

  The top o' the column. R108275. SEE
    Preston, Keith.

<pb id='112.png' n='1953_h1/A/0340' /> PREVOST, JEAN.

Plaisirs des sports, essais sur le corps humain. © 20Nov25, AF29482. R112772, 1Jun53, Michel Prevost (C)

PREVOST, MICHEL

  Plaisirs des sports. R112772. SEE
    Prevost, Jean.

PRICE, OLIVE M.

  Short plays from American history and
    literature. © 14Jan25, A822596.
    R105094, 8Jan53, Olive Price
    Cherryholmes (A)

PRIDE, ANTHONY, pseud. SEE Weekes, Agnes R.

PRIOLLET, MARCEL.

Le coeur des gueux, roman dramatique. © 12Nov25, AF29503. R105827, 9Jan53, Marcel Priollet (A)

PRITTIE, EDWIN JOHN, illus.

  Bible stories everyone should know.
    R105878. SEE Hurlbut, Jesse
    Lyman.

PROCTOR, MARY.

  Evenings with the stars. © 20Oct25,
    A872001. R107781, 11Feb53, Mary
    Proctor (A)

THE PROGRESSIVE music series.
  Teacher's manual, v. 1-3, by
  Horatio Parker and others; compiled
  by Norberto Romualdez and Charles
  C. Griffith. Philippine ed.
  © Beatriz B. de Romualdez (W)

  v. 1. © on new matter; 16Mar25,
    A823423. R106489, 29Jan53.

  v. 2. © 26Feb25, A822210.
    R106487, 29Jan53.

  v. 3. © 26Feb25, A822211.
    R106488, 29Jan53.

PRYDE, ANTHONY, pseud. SEE
  Weekes, Agnes Russell.

PSYCHIATRICAL SOCIETY OF NEW YORK.

  Studies in psychiatry, v. 2.
    (Nervous and mental disease monograph
    series, no. 41) © 17Jun25,
    A829860. R108210, 2Mar53, Smith
    Ely Jelliffe Trust, Carel
    Goldschmidt, Trustee (PWH)

PUGH, BURTON H.

  Mastering cotton. © 31Oct25, A876387.
    R110184, 8Apr53, Mrs. B. H. Pugh (W)

PUGH, Mrs. BURTON H.

  Mastering cotton. R110184. SEE
    Pugh, Burton H.

PURIN, CHARLES MALTADOR.

American Council German test, G 10-pt. 2, form A. Experimental ed. © 2Dec25, A881761. R107508, 28Jan53, C. M. Purin (A)

PUSEY, WILLIAM ALLEN.

Syphilis: a brief treatise for the intelligent public. (Little blue book, no. 903) © 10Sep25, A870368. R111291, 23Apr53, Haldeman-Julius Co. (PWH)

PUTNAM, Mrs. DONALD W.

  A home of your own. R108659. SEE
    Lutes, Delia Thompson.

QUEEN, STUART ALFRED.

  Social pathology, by Stuart Alfred
    Queen and Delbert Martin Mann.
<pb id='113.png' />
    (Crowell's social science series)
    © 31Aug25, A864424. R113019,
    4Jun53, Stuart Alfred Queen &
    Delbert Martin Mann (A)

QUEIROZ, JOSÉ MARIA EÇA DE SEE

Eça de Queiroz, José Maria.

QUÉVASTRE, E. M., joint author

Brevoir synopsis theologiae moralis et pastoralis. R106721. SEE Tanquerey, Adolphe.

QUICK, ELLA COREY

  One man's life. R107402. SEE
    Quick, Herbert.

QUICK, HERBERT.

One man's life: an autobiography. © 19Oct25, A869734. R107402, 12Feb53, Ella Corey Quick (W)

QUILLER-COUCH, Sir ARTHUR THOMAS.

  Adventures in criticism. © 6Feb25,
    A815993. R106691, 2Feb53, Foy F.
    Quiller-Couch (NK)

QUILLER-COUCH, FOY F.

  Adventures in criticism. R106691.
    SEE Quiller-Couch, Sir Arthur
    Thomas.

QUINN, ELISABETH VERNON SEE

Quinn, Vernon.

QUINN, PETER, illus.

  Beekeeping for profit. R110151. SEE
    Randolph, Vance.

QUINN, VERNON.

  Beautiful Canada. © 8Oct25, A869276.
    R108323, 5Mar53, Vernon Quinn (A)

RAGOT, CHARLES L., joint author

A graphic table combining logarithms and anti-logarithms. R113781. SEE Lacroix, Adrien.

RAINE, WILLIAM MACLEOD.

Bonanza, a story of the gold trail. © 9Apr26, A890551. R110058, 10Apr53, William MacLeod Raine (A)

RALL, HARRIS FRANKLIN.

  The meaning of God. (The Quillian
    lectures for 1924.) © 17Oct25,
    A872433. R105775, 16Jan53,
    Harris Franklin Rall (A)

RAMÉE, LOUISE DE LA
  SEE De la Ramée, Louise.

RAMSEY, GEORGE DALEY, comp.

Atlas of Texas history for teaching Texas and United States histories. © 1Jun25, A865492. R107717, 20Feb53, Lottie T. Ramsey (W)

RAMSEY, LOTTIE T.

  Atlas of Texas history for teaching
    Texas and United States histories.
    R107717. SEE Ramsey, George Daley,
    comp.

RAMUZ, CHARLES FERDINAND.

La grande peur dans la montagne. © 10Apr26, AF31068. R111461, 1May53, Mme Oliviere-Ramuz (née Marianne Ramuz) (C)

RAMUZ, MARIANNE OLIVIERE-
  SEE Oliviere-Ramuz, Marianne.

<pb id='114.png' /> RAND, MCNALLY AND COMPANY

  The adventures of Remi. R112849.
    SEE Malot, Hector Henri.

  Autochum. © 22Jun25, A859806.
    R112847, 27May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Alabama. © 5May25, A855056.
    R110575, 23Apr53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Arizona and New Mexico. © 17Jun25,
    A857986. R112201, 18May53, Rand
    McNally & Co. (PCB)

  Black and white mileage map of
    Arkansas. © 7Apr25, A828288.
    R109665, 1Apr53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    California and Nevada. © 20Jun25,
    A859560. R112205, 18May53, Rand
    McNally & Co. (PCB)

  Black and white mileage map of
    Florida. © 6May25, A855058.
    R110577, 23Apr53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Georgia. © 17Jun25, A857980.
    R112195, 18May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Idaho. © 20Jun25, A859561.
    R112206, 18May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Kansas. © 1Apr25, A828284.
    R109664, 1Apr53, Rand McNally &
    Co. (PCB)

  Black and white mileage map of
    Kentucky. © 17Jun25, A857987.
    R112202, 18May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Louisiana. © 20Jun25, A859558.
    R112203, 18May53, Rand McNally
    & Co. (PCB)

Black and white mileage map of Maine. © 24Jun25, A860314. R112846, 25May53, Rand McNally & Co. (PCB)

Black and white mileage map of Maryland, Delaware, and District of Columbia. © 17Jun25, A857981. R112196, 18May53, Rand McNally & Co. (PCB)

  Black and white mileage map of
    Michigan. © 5May25, A855057.
    R110576, 23Apr53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Minnesota. © 8Apr25, A828290.
    R110008, 7Apr53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Mississippi. © 17Jun25, A857983.
    R112198, 18May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Missouri. © 30Apr25, A830649.
    R110095, 9Apr53, Rand, McNally
    & Co. (PCB)

  Black and white mileage map of
    Montana. © 17Jun25, A857985.
    R112200, 18May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Nebraska. © 7Apr25, A828286.
    R110006, 7Apr53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of New
    Jersey. © 30Apr25, A830650.
    R110096, 9Apr53, Rand McNally &
    Co. (PCB)

  Black and white mileage map of North
    Carolina. © 17Jun25, A857984.
    R112199, 18May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of North
    Dakota. © 7Apr25, A828285.
    R110005, 7Apr53, Rand McNally
    & Co. (PCB)

<pb id='115.png' n='1953_h1/A/0341' />
  Black and white mileage map of
    Oregon. © 24Jun25, A860312.
    R112845, 25May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Pennsylvania. © 30Apr25, A830651.
    R110097, 9Apr53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of South
    Carolina. © 15Jun25, A857982.
    R112197, 18May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of South
    Dakota. © 24Jun25, A860313.
    R112844, 20May53, Rand McNally &
    Co. (PCB)

  Black and white mileage map of
    Tennessee. © 24Jun25, A860311.
    R112843, 20May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of Texas.
    © 30Apr25, A830648. R110094,
    9Apr53, Rand, McNally & Co. (PCB)

  Black and white mileage map of Utah
    and Colorado. © 24Jun25, A860310.
    R112842, 20May53, Rand McNally &
    Co. (PCB)

  Black and white mileage map of
    Vermont and New Hampshire.
    © 7Apr25, A828287. R110007,
    7Apr53, Rand McNally & Co. (PCB)

  Black and white mileage map of
    Washington. © 20Jun25, A859559.
    R112204, 18May53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Wisconsin. © 30Apr25, A830652.
    R110098, 9Apr53, Rand McNally
    & Co. (PCB)

  Black and white mileage map of
    Wyoming. © 24Jun25, A860309.
    R112841, 20May53, Rand McNally
    & Co. (PCB)

  Boston guide to the city and environs.
    27th ed. © 7Jul25, A861168.
    R112848, 27May53, Rand McNally &
    Co. (PCB)

  The illustrated Bible story book.
    R112850. SEE Loveland, Seymour.

  Indexed pocket map, tourists' and
    shippers' guide of Alberta.
    © 13Jul25, A861375. R113005,
    5Jun53, Rand McNally & Co. (PCB)

  Indexed pocket map, tourists' and
    shippers' guide of British Columbia.
    © 13Jul25, A861373. R113003,
    5Jun53, Rand McNally & Co. (PCB)

  Indexed pocket map, tourists' and
    shippers' guide of Manitoba.
    © 13Jul25, A861372. R113002,
    5Jun53, Rand McNally & Co. (PCB)

  Indexed pocket map, tourists' and
    shippers' guide of Nova Scotia,
    New Brunswick, Prince Edward
    Island. © 13Jul25, A861376.
    R113006, 5Jun53, Rand McNally &
    Co. (PCB)

  Indexed pocket map, tourists' and
    shippers' guide of Ontario.
    © 13Jul25, A861378. R113008,
    5Jun53, Rand McNally & Co. (PCB)

  Indexed pocket map, tourists' and
    shippers' guide of Quebec.
    © 13Jul25, A861377. R113007,
    5Jun53, Rand McNally & Co. (PCB)

  Indexed pocket map, tourists' and
    shippers' guide of Saskatchewan.
    © 13Jul25, A861374. R113004,
    5Jun53, Rand McNally & Co. (PCB)

  Premier atlas of the world. © 2Mar25,
    A823328. R108197, 27Feb53, Rand
    McNally & Co. (PCB)

RANDOLPH, VANCE.

  Beekeeping for profit. Drawings by
    Peter Quinn. (Little blue book,
    no. 805) © 30Apr25, A856803.
    R110151, 10Apr53, Haldeman-Julius
    Co. (PWH)

<pb id='116.png' />
  How to know the song birds. Drawings
    by Peter Quinn. (Little blue book,
    no. 853) © 22May25, A829492.
    R110137, 10Apr53, Haldeman-Julius
    Co. (PWH)

  How to know the spiders. Drawings by
    Peter Quinn. (Little blue book,
    no. 885) © 18Jun25, A867112.
    R111283, 23Apr53, Haldeman-Julius
    Co. (PWH)

  Life among the ants. Drawings by
    Peter Quinn. (Little blue book,
    no. 833) © 9May25, A856875.
    R110153, 10Apr53,
    Haldeman-Julius Co. (PWH)

  Life among the bees. Drawings by
    Peter Quinn. (Little blue book,
    no. 728) © 27Mar25, A828819.
    R107210, 4Feb53, Haldeman-Julius
    Co. (PWH)

  Life among the butterflies. Drawings
    by Peter Quinn. (Little blue
    book, no. 796) © 30Apr25, A856423.
    R110143, 10Apr53, Haldeman-Julius
    Co. (PWH)

  Life among the dragonflies. Drawings
    by Peter Quinn. (Little blue book,
    no. 818) © 4May25, A856431.
    R110145, 10Apr53, Haldeman-Julius
    Co. (PWH)

  Our insect enemies. Drawings by
    Peter Quinn. (Little blue book,
    no. 860) © 25May25, A858465.
    R110163, 10Apr53,
    Haldeman-Julius Co. (PWH)

RAPHAELSON, SAMSON.

  The Jazz singer. © 17Dec25, A879011.
    R113262, 11Jun53, Samson
    Raphaelson (A)

RAPPOPORT, SOLOMON.

The dybbuk, a play in four acts, by S. Ansky [pseud.] Translated from the original Yiddish by Henry G. Alsberg and Winifred Katzin. Introd. by Gilbert W. Gabriel and a note on Chassidism by Chaim Zhitlowsky. © 3May26, A890801. R112095, 14May53, Henry G. Alsberg & Winifred Katzin (A)

RAUP, ROBERT BRUCE.

  Complacency, the foundation of human
    behavior. Introd. by William Heard
    Kilpatrick. © 22Dec25, A872967.
    R109056, 18Mar53, Robert Bruce
    Raup (A)

RAVAGLI, FRIEDA LAWRENCE

  St. Mawr. R107660. SEE
    Lawrence, David Herbert.

RAY, PERLEY ORMAN, joint author

  Introduction to American government.
    R108795. SEE Ogg, Frederic A.

RAYMOND, ERNEST.

  Daphne Bruno. © 22Mar26, A879995.
    R109296, 24Mar53, Ernest Raymond (A)

RAYMOND, FRANCIS.

  Retail salesmen's manual of Federal
    electric washers. © 7Jan25,
    A820076. R104818, 6Jan53, Francis
    Raymond (A)

REDEMPTORIST FATHERS OF NEW YORK

Manual of select Catholic hymns and devotions. R105842 … SEE Manual of select Catholic hymns and devotions.

REECE, JOHN HOLROYD, tr.

  The travel diary of a philosopher.
    R110448. SEE Keyserling, Hermann
    Alexander, graf von.

<pb id='117.png' /> REEDER, WARD G.

Two thousand spelling demons. © 24Apr25, A823889. R105714, 6Jan53, Ward G. Reeder (A)

REEVE, ARTHUR B.

  The Boy Scouts' Craig Kennedy.
    Introd. by James E. West. © 4Sep25,
    A864503. R104710, 29Dec52,
    Margaret Reeve Maiorino (C)

  Craig Kennedy on the farm; with
    introd. by Loring Schuler.
    © 4Sep25, A864498. R104706,
    29Dec52, Margaret Reeve Maiorino (C)

REEVES, JAMES RANSOM.

The save way system, by J. R. Reeves and John Sampson Lillard. © 26Mar25, A826891. R108632, 12Mar53, J. R. (Bud) Reeves (A)

REILLY AND LEE COMPANY

  Fleetfin. R108283. SEE Venable,
    Clarke.

  Miss Minerva broadcasts Billy.
    R109515. SEE Sampson, Emma Speed.

REMINGTON, HAROLD.

  Remington on bankruptcy, v. 1.
    Suppl., Nov. 1925. © 31Dec25,
    A878836. R110619, 20Apr53, May
    Remington Miller (W)

  Remington on bankruptcy, v. 2.
    Suppl., Nov. 1925. © 31Dec25,
    A878837. R110620, 20Apr53, May
    Remington Miller (W)

  Remington on bankruptcy, v. 3.
    Suppl., Nov. 1925. © 31Dec25,
    A878838. R110621, 20Apr53, May
    Remington Miller (W)

  Remington on bankruptcy, v. 4.
    Suppl., Nov. 1925. © 31Dec25,
    A878839. R110622, 20Apr53, May
    Remington Miller (W)

  Remington on bankruptcy, v. 5.
    Suppl., Nov. 1925. © 31Dec25,
    A878840. R110623, 20Apr53, May
    Remington Miller (W)

  Remington on bankruptcy, v. 6.
    Suppl., Nov. 1925. © 31Dec25,
    A878841. R110624, 20Apr53, May
    Remington Miller (W)

  Remington on bankruptcy, v. 7.
    Suppl., Nov. 1925. © 31Dec25,
    A878842. R110625, 20Apr53, May
    Remington Miller (W)

  Remington on bankruptcy, v. 8.
    Suppl., Nov. 1925. © 31Dec25,
    A878843. R110626, 20Apr53, May
    Remington Miller (W)

  Remington on bankruptcy, v. 9.
    Suppl., Nov. 1925. © 31Dec25,
    A878844. R110627, 20Apr53, May
    Remington Miller (W)

RETALLICK, CATHERINE MCCOY

  Polk songs of the Spanish Californians.
    R110210. SEE McCoy,
    William J., ed. and tr.

THE RETURN, by Burgmueller; text matter by Leopold Godowsky. (Study catalog no. 708) © 15Feb25, AA365176. R105022, 7Jan53, Art Publication Society (PWH)

REYNOLDS, WILHELMINA FOSTER

  The elements of chemistry. R113668.
    SEE Foster, William.

  Laboratory exercises in general
    chemistry. R113667. SEE
    Foster, William.

RICCI, CORRADO.

  Beatrice Cenci; translated from the
    Italian by Morris Bishop and Henry
    Longan Stuart. 2 v. © 4Dec25,
    A875868. R108900, 17Mar53,
    Liveright Pub. Corp. (PWH)

<pb id='118.png' n='1953_h1/A/0342' /> RICCIO, LUIGI DEL SEE Del Riccio, Luigi.

RICH, BURDETT A., ed.

American law reports annotated. R110610 … SEE American law reports annotated.

RICHARDS, JOHN

  Honor Bright's new adventure.
    R113129. SEE Richards, Laura E.

RICHARDS, LAURA E.

Honor Bright's new adventure; illustrated by Elizabeth R. Withington. © 1Aug25, A864092. R113129, 9Jun53, John Richards (C)

RICHARDS, LENORE.

  Tea-room recipes, by Lenore Richards
    and Nola Treat. © 8May25, A855023.
    R108378, 6Mar53, Lenore Richards &
    Nola Treat (A)

RICHARDSON, ANNA STEESE.

  Standard etiquette. © 3Jun25,
    A829584. R105289, 7Jan53,
    Lucy Richardson Milligan &
    Mary Fleming Richardson Nevins (C)

RICHARDSON, HENRY B., ed.

  L'attaque du moulin. R108447. SEE
    Zola, Émile.

RICKABY, FRANZ, ed.

Ballads and songs of the shanty-boy. © 5May26, A890691. R112175, 18May53, Lillian Rickaby Dykstra (W)

RICORDI (G.) E COMPAGNIA

  Il convento veneziano. R106843.
    SEE Vaudoyer, Jean Louis.

RIES, DONALD T.

  Engineering geology. R104793. SEE
    Ries, Heinrich.

RIES, HEINRICH.

Engineering geology, by Heinrich Ries and Thomas L. Watson. 3d ed., rev. © 31Jan25, A815995. R104793, 23Dec52, Victor H. Ries, Donald T. Ries (C) & Adie S. Watson (PPW)

RIES, VICTOR H.

  Engineering geology. R104793. SEE
    Ries, Heinrich.

RIESENBERG, FELIX, Jr.

  Bob Graham at sea. R109310. SEE
    Riesenberg, Felix, Sr.

RIESENBERG, FELIX, Sr.

  Bob Graham at sea; illustrated by
    Charles E. Cartwright. © 27Aug25,
    A864363. R109310, 20Mar53, Felix
    Riesenberg, Jr. (C)

RILEY, ALICE C. D.

The mandarin coat, and five other one act plays. Contents.—The mandarin coat.—The sponge.—Their anniversary.—Radio.—The black suitcase.—Skim-milk. © 31Mar25, A823615. R109000, 18Mar53, Alice C. D. Riley (A)

RINEHART, MARY ROBERTS.

  The red lamp. © 14Aug25, A864371.
    R113968, 18Jun53, Mary Roberts
    Rinehart (A)

RINGE, MARY DA COSTA BRICK

  Modern surgery. R107362. SEE
    Da Costa, John Chalmers.

<pb id='119.png' /> RITTER, MARGARET TOD.

  Mirrors. © 21Apr25, A829010.
    R109017, 18Mar53, Margaret Tod
    Ritter (A)

RIVIERE, ISABELLE FOURNIER

  A la trace de Dieu. R112456. SEE
    Riviere, Jacques.

RIVIERE, JACQUES.

  A la trace de Dieu. © 21Nov25,
    AF29467. R112456, 25May53, Mme
    Jacques Riviere (née Isabella
    Fournier) (W)

ROANTREE, KATHARINE L.

  An arithmetic for teachers. R109059.
    SEE Roantree, William F.

ROANTREE, WILLIAM F.

  An arithmetic for teachers, by
    William F. Roantree and Mary S.
    Taylor. (American teachers
    college series) © 24Nov25,
    A875250. R109059, 18Mar53,
    Katharine L. Roantree (W) &
    Mary S. T. Gantz (A)

ROBERTS, ABBY BEECHER

  The history of a house. R107718.
    SEE Longyear, Mary Beecher.

ROBERTS, KENNETH L.

  Florida. © 15May26, A891450.
    R112792, 1Jun53, Kenneth L.
    Roberts (A)

ROBERTSON, WILLIAM SPENCE.

History of the Latin-American nations. Rev. © 9Oct25, A869384. R107470, 13Feb53, William Spence Robertson (A)

ROBINSON, GEORGE L.

  The twelve minor prophets. © 15Jan26,
    A883187. R112787, 1Jun53, George
    L. Robinson (A)

ROBINSON, JAMES HARVEY.

The humanizing of knowledge. 2d ed., rev. (The Humanizing of knowledge series) © 14May26, A890827. R112158, 15May53, Bankers Trust Co. (E)

ROCKEL, WILLIAM M.

  The complete guide for Ohio township
    officers. 20th ed. © 30Dec25,
    A879111. R109376, 25Mar53, The W.
    H. Anderson Co. (PWH)

ROCKWOOD, ROY, pseud. SEE Stratemeyer, Edward.

RODEHEAVER COMPANY

  Children's Day helper. R110763.
    SEE Children's Day helper.

  Songs of faith and triumph. R112648.
    SEE Hall, J. Lincoln, comp.

ROE, ARTHUR CECIL, joint author

  Rewinding small motors. R108077.
    SEE Braymer, Daniel H.

ROE, VINGIE E.

  The splendid road. © 16Mar25,
    A823477. R104964, 6Nov52,
    Vingie E. Roe Lawton (A)

ROGERS, ALLEN.

Industrial chemistry, a manual for the student and manufacturer. 4th ed. © 27Jul25, A864391. R112346, 20May53, Allen E. Rogers (C)

<pb id='120.png' /> ROGERS, ALLEN E.

  Industrial chemistry. R112346. SEE
    Rogers, Allen, ed.

ROGERS, CAMERON.

  The magnificent idler, the story of
    Walt Whitman. Decorations by Edw.
    A. Wilson. © 23Apr26, A890659.
    R111577, 4May53, Cameron Rogers (A)

ROGERS, WALTER S.

  The Flyaways and Cinderella. R108616.
    SEE Hardy, Alice Dale.

  The Flyaways and Goldilocks. R108622.
    SEE Hardy, Alice Dale.

  The Flyaways and Little Red Riding
    Hood. R108624. SEE Hardy,
    Alice Dale.

ROHMER, SAX, pseud. SEE Ward, Arthur Sarsfield.

ROLLAND, ROMAIN.

Summer; translated from the French by Eleanor Stimson and Van Wyck Brooks. (His The soul enchanted, v. 2) © 8Sep25, A861848. R109737, 3Apr53, Eleanor Stimson (A)

ROLLAND, SUZANNE
  SEE Giraudoux, Suzanne Rolland.

ROMUALDEZ, BEATRIZ B. DE

The progressive music series. R106487 … SEE The progressive music series.

ROMUALDEZ, NORBERTO, comp.

The progressive music series. R106487 … SEE The progressive music series.

ROOSEVELT, THEODORE, Pres. U. S.

  Selections from the correspondence
    of Theodore Roosevelt and Henry
    Cabot Lodge, 1884-1918. 2 v.
    © Charles Scribner's Sons.

    Vol. 1. © 3Apr25, A829500.
      R109497, 31Mar53.

    Vol. 2. © 3Apr25, A829501.
      R109496, 31Mar53.

ROSS (ALLEN) AND COMPANY

  Blood pressure, high and low.
    R107608. SEE Stone, Chester
    Tilton.

ROSS, ANNE VAN DOREN

  American and British literature since
    1890. R107975. SEE Van Doren,
    Carl.

  Other provinces. R113134. SEE
    Van Doren, Carl.

ROSSMAN, EARL.

  Black sunlight; with an introd. by
    Vilhjalmur Stefansson. © 16Apr26,
    A949431. R111958, 11May53, Earl
    Rossman (A)

ROSTAND, EDMOND.

The far princess, a drama in four acts; translated from the French by John Heard, Jr. © 9Apr25, A822931. R109468, 27Mar53, John Heard, Jr. (A)

ROUQUETTE, LOUIS FRÉDÉRIC.

  L'épopée blanche. © 25Feb26,
    AF30882. R113156, 11Jun53,
    Mme Schaeffer (née Suzanne
    Langles) (E)

ROUTLEDGE AND KEGAN PAUL LTD.

  Ferencz (Francois) Liszt. R109732.
    SEE Corder, Frederick.

  Richard Wagner. R109733. SEE
    Wallace, William.

<pb id='121.png' n='1953_h1/A/0343' />
  Robert Schumann. R109734. SEE
    Bedford, Herbert.

ROWE, CHARLES A.

Complete course for Hawaiian guitar. © 25May25, A857260. R111683, 7May53, Chas. A. Rowe (A)

ROY, LILLIAN ELIZABETH.

  The little Washingtons' holidays.
    (Her The little Washington books)
    © 15May25, A855230. R106947,
    6Feb53, Lillian Elizabeth Roy (A)

  Polly in the Southwest; illustrated
    by H. S. Barbour. © 16Feb25,
    A822105. R106940, 6Feb53, Lillian
    Elizabeth Roy (A)

ROYDE-SMITH, NAOMI G.

The tortoise shell cat, a novel. © 10Nov25, A875060. R110179, 8Apr53, N. G. Royde-Smith (A)

RUCH, GILES MURREL.

Manual of directions for Compass diagnostic tests in arithmetic, by G. M. Ruch, F. B. Knight, H. A. Greene, and J. W. Studebaker. (Standard mathematical service) © 2Nov25, A872289. R108476, 9Mar53, Verness Fraser Ruch, Florence B. Knight (W) H. A. Greene & J. W. Studebaker (A)

RUCH, VERNESS FRASER

Manual of directions for Compass diagnostic tests in arithmetic. R108476. SEE Ruch, Giles Murrel.

RUDOLF STEINER-NACHLASSVERWALTUNG

  Aegyptische Mythen und Mysterien.
    R105743. SEE Steiner, Rudolf.

  Anthroposophische Leitsätze. R105760.
    SEE Steiner, Rudolf.

  Die Bhagavad Gita und die Paulus-briefe.
    R105735. SEE Steiner,
    Rudolf.

  Der Christus-Impuls und die Entwicklung
    des Ichbewusstseins. R105745.
    SEE Steiner, Rudolf.

  Christus und die geistige Welt.
    R105727. SEE Steiner, Rudolf.

  Christus und die menschliche Seele.
    R105757. SEE Steiner, Rudolf.

  Exkurse in das Gebiet des Markus-Evangeliums.
    R105734. SEE
    Steiner, Rudolf.

  Die Geheimnisse der biblischen
    Schöpf-ungsgeschichte. R105726. SEE
    Steiner, Rudolf.

  Die Geheimnisse der Schwelle.
    R105729. SEE Steiner, Rudolf.

  Geisteswissenschaftliche Menschenkunde.
    R105738. SEE Steiner,
    Rudolf.

  Die geistige Führung des Menschen
    und der Menschheit. R105723. SEE
    Steiner, Rudolf.

  Geistige Hierarchien und ihre Wiederspiegelung
    in der physiachen Welt.
    R105753. SEE Steiner, Rudolf.

  Die geistigen Wesenheiten in den
    Himmelskörpern und Naturreichen.
    R105749. SEE Steiner, Rudolf.

  Grundlegendes für eine Erweiterung
    der Heilkunst nach geisteswissenschaftlichen
    Erkenntnissen.
    R105725. SEE Steiner, Rudolf.

  Inneres Wesen des Menachen und Leben
    zwischen Tod und neuer Geburt.
    R105756. SEE Steiner, Rudolf.

  Der irdische und der kosmische Mensch.
    R105737. SEE Steiner, Rudolf.

  Das Johannes-Evangelium. R105762.
    SEE Steiner, Rudolf.

  Das Johannes-Evangelium im Verhältnis
    zu den drei anderen Evangelien
    besonders zu dem Lukas-Evangelium.
    R105742. SEE Steiner, Rudolf.

<pb id='122.png' />
  Das Leben zwischen dem Tode und der
    neuen Geburt im Verhältnis zu den
    kosmischen Tatsachen. R105736.
    SEE Steiner, Rudolf.

  Das Lukas-Evangelium. R105732. SEE
    Steiner, Rudolf.

  Das Markus-Evangelium. R105739. SEE
    Steiner, Rudolf.

  Mein Lebensgang. R105724. SEE
    Steiner, Rudolf.

  Der Mensch im Lichte von Okkultismus,
    Theosophie, und Philosophie.
    R105750. SEE Steiner, Rudolf.

  Menschenwesen, Menschenschicksal und
    Weltentwicklung. R113216. SEE
    Steiner, Rudolf.

  Der menschliche und der kosmische
    Gedanke. R105728. SEE Steiner,
    Rudolf.

  Die Methodik des Lehrens und die
    Lebensbedingungen des Erziehens.
    R113218. SEE Steiner, Rudolf.

  Die Mission einzelner Volksseelen im
    Zusammenhange mit der germanischnordischen
    Mythologie. R105741.
    SEE Steiner, Rudolf.

  Die Mysterien des Morgenlandes und
    des Christentums. R105755. SEE
    Steiner, Rudolf.

  Notwendigkeit und Freiheit im Weltengeschehen
    und im menschlichen
    Handeln. R105722 … SEE Steiner,
    Rudolf.

  Die Offenbarungen des Karma. R105752.
    SEE Steiner, Rudolf.

  Okkulte Geschichte. R105744. SEE
    Steiner, Rudolf.

  Der Orient im Lichte des Occidents.
    R105761. SEE Steiner, Rudolf.

  Sprachgestaltung und dramatische
    Kunst. R113217. SEE Steiner,
    Rudolf.

  Die Theosophie an der Hand der
    Apokalypse. R105754. SEE
    Steiner, Rudolf.

  Ueber Schicksalsbildung und Leben
    nach dem Tode. R105751. SEE
    Steiner, Rudolf.

  Von der Initiation. R105733. SEE
    Steiner, Rudolf.

  Von Jesus zu Christus. R105747.
    SEE Steiner, Rudolf.

  Vor dem Tore der Theosophie. R105731.
    SEE Steiner, Rudolf.

  Wahrheit und Wissenschaft. R105764.
    SEE Steiner, Rudolf.

  Wahrspruchworte. R105759. SEE
    Steiner, Rudolf.

  Welche Bedeutung hat die okkulte
    Entwicklung des Menschen für seine
    Hüllen und sein Selbst. R105730.
    SEE Steiner, Rudolf.

  Die Welt der Sinne und die Welt des
    Geistes. R105748. SEE Steiner,
    Rudolf.

  Welt, Erde, und Mensch. R105763.
    SEE Steiner, Rudolf.

  Weltenwunder. R105746. SEE
    Steiner, Rudolf.

  Zeitbetrachtungen. R105758. SEE
    Steiner, Rudolf.

RUHRAH, JOHN, joint author

  Diet in health and disease. R106478.
    SEE Friedenwald, Julius.

RUOTOLO, ONORIO, illus.

  The story of the world's literature.
    R109204. SEE Macy, John.

RUSK, RALPH LESLIE.

The literature of the middle western frontier. 2 v. (Columbia University studies in English and comparative literature) © Ralph L. Rusk (A)

    v. 1. © 15Jun25, A855565.
      R110191, 14Apr53.

    v. 2. © 15Jun25, A855566.
      R110192, 14Apr53.

<pb id='123.png' /> RUSSEL, ALISON

  The little great lady. R107774. SEE
    Campbell, Harriette R.

RUSSELL, BERTRAND.

  The ABC of relativity. (Harper's
    modern science series) © 30Oct25,
    A869854. R104716, 29Dec52,
    Bertrand Russell (A)

RUSSELL, DIARMUID C.

  Voices of the stones. R109019. SEE
    Russell, George William.

RUSSELL, FRANCES THERESA

  The way of all flesh. R109055.
    SEE Butler, Samuel.

RUSSELL, GEORGE WILLIAM.

  Voices of the stones, by A. E.
    [pseud.] © 5Jun25, A829594.
    R109019, 18Mar53, Diarmuid C.
    Russell (C)

ST. JOHNS, ADELA ROGERS.

The skyrocket, a new novel. © 28Mar25, A822654. R107462, 13Feb53, Adela Rogers St. Johns (A)

SAINT-RENÉ TAILLANDIER, MADELEINE MARIE LOUISE (CHEVRILLON)

  La princesse des Ursins. (Figures
    du passé) © 14Apr26, AF31291.
    R112769, 1Jun53, Mme
    Saint-René-Taillandier (née Louise
    Chevrillon) (A)

SALMON, GERALDINE GORDON.

The black glove, by J. G. Sarasin [pseud.] © 14Jun26, (pub. abroad 8Jan26, AI-7829), A891889. R113912, 16Jun53, Geraldine Gordon Salmon (A)

SALSBURY, EDITH COLGATE

  Race or nation. R109724. SEE
    Speranza, Gino.

SALTUS, EDGAR.

  Purple and fine women, with an introd.
    by W. L. George. © 10Apr25,
    A829157. R108271, 5Mar53, Marie
    Saltus (W)

SALTUS, MARIE

  Purple and fine women. R108271. SEE
    Saltus, Edgar.

SAMPSON, EMMA SPEED.

Miss Minerva broadcasts Billy; illustrated by William Donahey. © 1Aug25, A864574. R109515, 30Mar53, The Reilly & Lee Co. (PWH)

SANDERS, CHARLES WESLEY.

  Trouble range. © 1May25, A855563.
    R106963, 6Feb53, Mary V.
    Sanders (W)

SANDERS, MARY V.

  Trouble range. R106963. SEE
    Sanders, Charles Wesley.

SAPPER, pseud. SEE McNeile, Herman Cyril.

SARASIN, J. G., pseud. SEE Salmon,
  Geraldine Gordon.

SARG, TONY.

Book of animals. © 25Sep25, A869206. R107377, 12Feb53, Mary Sarg Miller (C)

  Wonder zoo. © 25Sep25, A869205.
    R107376, 12Feb53, Mary Sarg
    Miller (C)

<pb id='124.png' n='1953_h1/A/0344' />
A SATCHEL guide to Europe, by William
  J. Rolfe. 45th ed., rev. by
  William D. Crockett. © 17Apr25,
  A822989. R109313, 23Mar53, Sarah
  Gates Crockett (W)

SAUNDERS (W. B.) COMPANY

  The American illustrated medical
    dictionary. R107365. SEE Dorland,
    William Alexander Newman, ed.

  Collected papers of the Mayo Clinic
    and the Mayo Foundation. R106480.
    SEE Mayo Clinic, Rochester, Minn.

  Lectures on nutrition. R107371. SEE
    Lectures on nutrition.

  Our present knowledge of heredity.
    R107370. SEE Our present knowledge
    of heredity.

  Pediatrics. R106479 … SEE
    Abt, Isaac A., ed.

SCARBOROUGH, DOROTHY.

  The wind, anonymous. © 18Sep25,
    A864677. R113585, 4May53, Mary
    McDaniel Parker (NK)

SCHAEFFER, MEAD, illus.

  The adventures of Remi. R112849.
    SEE Malot, Hector Henri.

SCHAEFFER, SUZANNE (LANGLES)

  L'épopée blanche. R113156. SEE
    Rouquette, Louis Frédéric.

SCHALIT, LEON.

  Die Forsyte saga. R112097. SEE
    Galsworthy, John.

  Der Patrizier. R112096. SEE
    Galsworthy, John.

SCHALIT, MASHA

  Die Forsyte saga. R112097. SEE
    Galsworthy, John.

  Der Patrizier. R112096. SEE
    Galsworthy, John.

SCHAUFFLER, MARGARET WIDDEMER
  SEE Widdemer, Margaret.

SCHAUFFLER, ROBERT HAVEN.

  Peter Pantheism. © 4Nov25, A872309.
    R107395, 12Feb53, Robert Haven
    Schauffler (A)

  The poetry cure, a pocket medicine
    chest of verse. © 14Nov25, A875122.
    R107396, 12Feb53, Robert Haven
    Schauffler (A)

SCHEVILL, FERDINAND.

A history of Europe, from the Reformation to the present day. © 18Aug25, A864533. R109312, 20Mar53, Ferdinand Schevill (A)

SCHLESINGER, ARTHUR MEIER.

  Political and social history of the
    United States, 1829-1925. © 9Jun25,
    A829609. R109022, 18Mar53, Arthur
    Meier Schlesinger (A)

SCHNEIDER, ISIDOR.

  Doctor Transit. © 8Sep25, A872027.
    R109205, 23Mar53, Isidor
    Schneider (A)

SCHOOL OF SPEEDWRITING, INC.

  Speedwriting. R108566. SEE
    Dearborn, Emma B.

SCHROEDER AND GUNTHER, INC.

  Tone games and how to play them.
    R113125. SEE Tapper, Thomas.

SCHUBART, FANNIE KILBOURNE
  SEE Kilbourne, Fannie.

SCHULKERS, ROBERT F.

  Stormie the dog stealer. © 20Feb25,
    A822161. R105131, 12Jan53, Robert
    F. Schulkers (A)

<pb id='125.png' /> SCHULTZ, JAMES WILLARD.

  Questers of the desert; with illus.
    by Frank E. Schoonover. © 30Oct25,
    A872250. R107422, 11Feb53, Jessie
    Donaldson Schultz (W)

  With the Indians in the Rockies.
    With illus. by Harold Brett.
    (Riverside bookshelf) © on illus.;
    25Sep25, A864786. R113368, 10Jun53,
    Houghton Mifflin Co. (PWH)

SCHULTZ, JESSIE DONALDSON

  Questers of the desert. R107422.
    SEE Schultz, James Willard.

SCHUTZ, LAURA LUMMIS

  Pollyanna's jewels. R113130. SEE
    Smith, Harriet Lummis.

SCHWARTZ, ISIDORE ADOLPHE.

  French grammar review. © 22Oct25,
    A869822. R112473, 25May53, I.
    A. Schwartz (A)

SCOTT, CYRIL KAY, pseud. SEE Wellman,
  Frederick Creighton.

SCOTT, D. R.

  Theory of accounts. © 16Sep25,
    A861982. R109738, 3Apr53,
    D. R. Scott (A)

SCOTT, EVELYN.

  In the endless sands, by Evelyn &
    C. Kay Scott [pseud.] © 19Nov25,
    A875362. R109486, 27Mar53,
    Evelyn & C. Kay Scott (A)

SCOTT, GEORGE G.

  A laboratory manual of general
    biology. © 22Sep25, A868674.
    R113020, 4Jun53, George G.
    Scott (A)

  The science of biology: an introductory
    study. © 11Jun25, A855553.
    R113018, 4Jun53, George G. Scott (A)

SCOTT, HARRIET E.

  Standard methods of chemical analysis.
    R112348 … SEE Scott, Wilfred
    W., ed.

SCOTT, Sir WALTER, bart.

  Ballads; with foreword and notes by
    Lloyd E. Smith. (Little blue book,
    no. 785) © 27Apr25, A856433.
    R110514, 4Feb53, Haldeman-Julius
    Co. (PWH)

SCOTT, WILFRED W., ed.

Standard methods of chemical analysis. 4th ed. 2 v. © Harriet E. Scott (W)

    v. 1. © 21Sep25, A869728. R112348,
      20May53.

    v. 2. © 21Sep25, A869729. R112349,
      20May53.

SCOTT-MONCRIEFF, CHARLES KENNETH.

  The abbess of Castro. R111432. SEE
    Beyle, Marie Henri.

  The charterhouse of Parma. R109206.
    SEE Beyle, Marie Henri.

  The letters of Abelard and Heloise.
    R112040. SEE Abailard, Pierre.

SCOTT MONCRIEFF, GEORGE

  The charterhouse of Parma. R109206.
    SEE Beyle, Marie Henri.

SCRIBNER'S (CHARLES) SONS

  Selections from the correspondence of
    Theodore Roosevelt and Henry Cabot
    Lodge. R109496 … SEE
    Roosevelt, Theodore, Pres. U. S.

<pb id='126.png' /> SEAMAN, AUGUSTA HUIELL.

  Bluebonnet Bend; illustrated by C. M.
    Relyea. © 12Sep25, A861832.
    R107501, 16Feb53, Janet H. Washburn (E)

SEARLE, ORA

  Selected poems. R107974. SEE
    Towne, Charles Hanson.

SEARLES, WILLIAM H.

  Field engineering, by William H.
    Searles and Howard Chapin Ives.
    19th ed., rev. © 1Apr25, A822819.
    R104794, 23Dec52, Helen Searles
    McLeod (PPW) & Mary Belle Ives (W)

SEAY, NOBLE H.

  Report of cases argued and determined
    in the Court of Appeals of Alabama.
    R105338. SEE Alabama. Court of
    Appeals.

  Report of cases argued and determined
    in the Supreme Court of Alabama.
    R109788. SEE Alabama. Supreme
    Court.

SELLARS, ROY WOOD.

The essentials of logic. Rev. ed. © 1Apr25, A822772. R104887, 6Jan53, Roy Wood Sellars (A)

SELTZER, CHARLES ALDEN.

  The valley of the stars. © 16Apr26,
    A891142. R110440, 17Apr53, Ella
    Alberts Seltzer (W)

SELTZER, ELLA ALBERTS

  The valley of the stars. R110440.
    SEE Seltzer, Charles Alden.

SELVA, BLANCHE.

L'enseignement musical de la technique du piano. Livre préparatoire, 2. ptie. © 19Sep25, AF28810. R108757, 13Mar53, Thérèse Gallayraud (E)

SELVIDGE, IVY HARNER

  Blacksmithing. R111895. SEE
    Selvidge, Robert W.

SELVIDGE, ROBERT W.

Blacksmithing, by Robert W. Selvidge and J. M. Allton. (The Selvidge series of instruction manuals) © 13Jan26, A879283. R111895, 11May53, Ivy Harner Selvidge (W)

SENECA.

  Morals. Foreword by Lloyd E. Smith.
    (Little blue book, no. 736) © on
    foreword; 24Mar25, A856810.
    R110517, 4Feb53, Haldeman-Julius
    Co. (PWH)

SETON, GRACE THOMPSON.

  "Yes, Lady Saheb." © 2Oct25,
    A864926. R105291, 7Jan53, Grace
    Thompson Seton (A)

SEYD, LESLEY

  The little great lady. R107774.
    SEE Campbell, Harriette R.

SEYMOUR, ARTHUR ROMEYN.

  Practical Spanish grammar, by Arthur
    Romeyn Seymour and Adelaide Ellen
    Smithers. © 1Oct25, A869625.
    R110044, 9Apr53, Arthur Romeyn
    Seymour & Adelaide Ellen
    Smithers (A)

SEYMOUR, FLORA WARREN.

The story of the Sioux Indians. (Little blue book, no. 756) © 3Apr25, A856069. R107215, 4Feb53, Haldeman-Julius Co. (PWH)

<pb id='127.png' n='1953_h1/A/0345' /> SHAKESPEARE, WILLIAM.

Macbeth; edited with introd. and notes by Gilbert Sykes Blakely. (Winston companion classics) © on editorial matter; 5May25, A855425. R105881, 12Jan53, The John C. Winston Co. (PWH)

A midsummer night's dream; edited, with introd. and notes, by Edwin Van B. Knickerbocker. Front. by Frank Godwin. (Winston companion classics) © on editorial matter; 2Jul25, A869909. R105885, 12Jan53, The John C. Winston Co. (PWH)

Popular Shakespearian quotations; selected and arr. by Lloyd E. Smith. (Little blue book, no. 816) © 4May25, A856426. R110522, 10Apr53, Haldeman-Julius Co. (PWH)

SHAPLEY, HARLOW.

Starlight. (The humanizing of knowledge series) © 11Jun26, A891791. R113322, 12Jun53, Harlow Shapley (A)

SHATFORD, ALLAN P.

  Six marks of a Christian. © 4Mar25,
    A822391. R105876, 12Jan53, The
    John C. Winston Co. (PWH)

SHEAHAN, MARGUERITE WINSLOW (PLUMMER)

  Astrology of the crucifixion.
    R106362. SEE Plummer, George
    Winslow.

  At-one-ment. R106366. SEE Plummer,
    George Winslow.

  The bodies of man. R112706. SEE
    Plummer, George Winslow.

  Calculating the positions of the
    planets. R112703. SEE Plummer,
    George Winslow.

  The coelum philosophorum. R106356.
    SEE Plummer, George Winslow.

  Combustio. R112695. SEE Plummer,
    George Winslow.

  Concentration. R112698. SEE Plummer,
    George Winslow.

  Concentration and imagination.
    R112712. SEE Plummer, George
    Winslow.

  Consciousness. R106353. SEE
    Plummer, George Winslow.

  Consciousness and the human mind.
    R112710. SEE Plummer, George
    Winslow.

  Declinations, elements, aspects,
    indexing. R112704. SEE Plummer,
    George Winslow.

  Directions and directing. R112713.
    SEE Plummer, George Winslow.

  Distribution of solar energy.
    R106358. SEE Plummer, George
    Winslow.

  The dominant life. R112696. SEE
    Plummer, George Winslow.

  Esotericism and exotericism. R106363.
    SEE Plummer, George Winslow.

  Esoterism of aspects. R106371.
    SEE Plummer, George Winslow.

  Esoterism of the elements. R106370.
    SEE Plummer, George Winslow.

  The four elements. R112701. SEE
    Plummer, George Winslow.

  The goal of the alchemists. R106365.
    SEE Plummer, George Winslow.

  Good and evil. R106364. SEE
    Plummer, George Winslow.

  Heart, spleen, breasts, and knees.
    R106352. SEE Plummer, George
    Winslow.

  Introduction. R112693. SEE Plummer,
    George Winslow.

  The Kabala. R112694. SEE Plummer,
    George Winslow.

  Knowing the mysteries. R106368.
    SEE Plummer, George Winslow.

  The law of attraction. R112953. SEE
    Plummer, George Winslow.

<pb id='128.png' />
  Literal Kabala. R112705. SEE
    Plummer, George Winslow.

  The magnum opus. R106360. SEE
    Plummer, George Winslow.

  Man. R106361. SEE Plummer, George
    Winslow.

  The marriage of Hermes and Venus.
    R112707. SEE Plummer, George
    Winslow.

  Meditation. R112716. SEE Plummer,
    George Winslow.

  Metaphysics. R112702. SEE Plummer,
    George Winslow.

  The mission of esoteric astrology.
    R106369. SEE Plummer, George
    Winslow.

  The Progrest horoscope. R112711.
    SEE Plummer, George Winslow.

  The psychic centers. R106357. SEE
    Plummer, George Winslow.

  Psychic centers at the larynx and
    sexual organs. R106359. SEE
    Plummer, George Winslow.

  Purificatio. R106374. SEE Plummer,
    George Winslow.

  Purification. R106354. SEE
    Plummer, George Winslow.

  Putrefactio. R106375. SEE Plummer,
    George Winslow.

  The rationale of natural science.
    R112697. SEE Plummer, George
    Winslow.

  The rationale of occult science.
    R112717. SEE Plummer, George
    Winslow.

  Re-generatio. R106367. SEE
    Plummer, George Winslow.

  The rising sign and the cusps of
    houses. R112699. SEE Plummer,
    George Winslow.

  Rosicrucian personal analysis and
    inventory. R106376. SEE
    Plummer, George Winslow.

  Sanctificatio. R106373. SEE
    Plummer, George Winslow.

  The sefer dtzenioutha. R112708. SEE
    Plummer, George Winslow.

  The Sefiroth. R112715. SEE Plummer,
    George Winslow.

  Setting the mind at work. R112714.
    SEE Plummer, George Winslow.

  Sidereal time. R112700. SEE
    Plummer, George Winslow.

  Supplemental data. R112709. SEE
    Plummer, George Winslow.

  Symbols of personality and individuality.
    R106372. SEE Plummer,
    George Winslow.

  Three principles and four elements.
    R106355. SEE Plummer, George
    Winslow.

SHEFF, ALEXANDER L.

  Intermediate bookkeeping and accounting;
    partnership set. © 5Mar25,
    A824916. R107613, 18Feb53,
    Alexander L. Sheff (A)

SHEFTE, ART.

  Jazz bass for piano. © 8Dec25,
    A877379. R113449, 16Jun53, Art
    Shefte (A)

  Jazz breaks: tricks, blues, endings,
    etc. © 8Dec25, A877380. R113450,
    16Jun53, Art Shefte (A)

  Keyboard harmony simplified.
    © 8Dec25, A877381. R113451,
    16Jun53, Art Shefte (A)

SHELDON, GEORGE H.

Advertising: elements & principles. © 18Jun25, A861008. R109302, 20Mar53, George H. Sheldon (A)

SHELLEY, PERCY BYSSHE.

Poems, edited with introd. and notes by Nelson Antrim Crawford. (Little blue book, no. 744) © 8Apr25, A856093. R107222, 4Feb53, Haldeman-Julius Co. (PWH)

<pb id='129.png' /> SHEPARD (FRANK) COMPANY

Shepard's New Jersey classified topical index and table of cases. R109399. SEE Shepard's New Jersey classified topical index and table of cases.

  Shepard's South Carolina citations.
    R109397. SEE Shepard's South
    Carolina citations.

Shepard's United States citations and annotations. R109396. SEE Shepard's United States citations and annotations.

SHEPARD'S CITATIONS, INC.

  The citator. R109398. SEE
    The citator.

  Shepard's New Jersey classified
    topical index and table of cases.
    R109399. SEE Shepard's New Jersey
    classified topical index and table
    of cases.

  Shepard's South Carolina citations.
    R109397. SEE Shepard's South
    Carolina citations.

Shepard's United States citations and annotations. R109396. SEE Shepard's United States citations and annotations.

SHEPARD'S New Jersey classified topical index and table of cases. 1st ed., 1925. © 9Sep25, A58239. R109399, 27Mar53, Shepard's Citations, inc. (PCB)

SHEPARD'S South Carolina citations.
  1st ed., 1926. © 2Mar26, A883949.
  R109397, 27Mar53, Shepard's
  Citations, inc. (PCB)

SHEPARD'S United States citations and annotations, v. 3. 4th ed. © 31Dec25, A875946. R109396, 27Mar53, Shepard's Citations, inc. (PCB)

SHERIDAN, CLARE.

  Stella defiant. © 16Feb25, A823829.
    R107374, 12Feb53, Clare Sheridan (A)

SHERIDAN HOUSE, INC.

The love toy. R108655. SEE The love toy.

SHERMAN, JAMES WOODWARD.

  Out in the kitchen; illustrated by
    Eugenie Wireman. © 21Sep25,
    A867645. R112113, 13May53, James
    Woodward Sherman (A)

SHIPLEY, MAYNARD.

  Greek physics and modern science.
    (Little blue book, no. 837)
    © 13May25, A857723. R110158,
    10Apr53, Haldeman-Julius Co. (PWH)

  How to teach yourself to play the
    piano. (Little blue book, no.
    995) © 8Jun26, A952435. R113096,
    8Jun53, Haldeman-Julius Co. (PWH)

  The intelligence of invertebrate
    animals. (Little blue book, no.
    720) © 30Mar25, A828824. R107214,
    4Feb53, Haldeman-Julius Co. (PWH)

  The intelligence of vertebrate
    animals. (Little blue book,
    no. 721) © 30Mar25, A856087.
    R107218, 4Feb53, Haldeman-Julius
    Co. (PWH)

  Man's debt to the sun. (Little blue
    book, no. 808) © 6May25, A856437.
    R110148, 10Apr53, Haldeman-Julius
    Co. (PWH)

  Sources of Bible myths and legends.
    (Little blue book. no. 851)
    © 22May25, A829488. R110134,
    10Apr53, Haldeman-Julius Co. (PWH)

  The wonders of radium. (Little blue
    book, no. 1000) © 27Apr26,
    A894524. R111604, 4May53,
    Haldeman-Julius Co. (PWH)

<pb id='130.png' n='1953_h1/A/0346' /> SHOER, LULU M.

  The original Guckert's chorda.
    R108255. SEE Guckert, E. N.

SHOWERMAN, GRANT, joint ed.

Century readings in ancient, classical, and modern European literature. R107504. SEE Cunliffe, John W., ed.

SHOWERMAN, ZILPHIA V.

Century readings in ancient, classical, and modern European literature. R107504. SEE Cunliffe, John W., ed.

SILVERS, Mrs. ROY H.

  Short course in bee culture. R106750.
    SEE Johnson, James Sion.

SIMMONDS, NINA, joint author

  The newer knowledge of nutrition.
    R109024. SEE McCollum, Elmer
    Verner.

SIMS, ANNE B.

  The Laxdaela saga. R108380. SEE
    Laxdoela saga.

SING unto the Lord a new song, suppl.; music by Mrs. H. S. Lehman, words by Mrs. H. S. Lehman, W. W. Colby, and T. V. Voorhees. © 31Mar25, A830267. R108370, 5Mar53, Juanita Lehman Gottschling (C)

SINGER, EDGAR A., Jr.

  Fool's advice. © 21Dec25, A879040.
    R108448, 10Mar53, Edgar A. Singer,
    Jr. (A)

SINGER MANUFACTURING COMPANY.

  High speed lock stitch vertical
    trimmer, Singer machine 51W55, by
    Archibald Tregaskis. Form 9714,
    Aug. 1925. © 10Sep25, A868027.
    R111529, 1May53, The Singer
    Manufacturing Co. (PWH)

  High speed Singer machines 51W56 and
    51W57, by Archibald Tregaskis.
    Form 9715, Aug. 1925. © 11Sep25,
    A868106. R111530, 1May53, The
    Singer Manufacturing Co. (PWH)

Instructions for operating the Singer portable electric sewing machine no. 99-13, by Archibald Tregaskis. Form 18139, Sept. 1925. © 30Oct25, A873525. R113654, 17Jun53, The Singer Manufacturing Co. (PWH)

Instructions for operating the Singer portable electric sewing machine no. 128-13 (attachments 25919) with knee control, by Archibald Tregaskis. Form 18140, Oct. 1925. © 12Nov25, A874426. R113656, 17Jun53, The Singer Manufacturing Co. (PWH)

Instructions for setting up Singer machines of class 99W on power tables with driving equipments 228599, 228600, 228606. 228609, 228611, 228612, and 228613, by Archibald Tregaskis. Form 1875W, rev. May 1925. © 15Jun25, A859157. R111521, 1May53, The Singer Manufacturing Co. (PWH)

Instructions for using and adjusting Singer sewing machines 99W75. 99W76, 99W77, 99W79. and 99W80, for making buttonholes in fabrics, by Archibald Tregaskis. Form 1753W, rev. Dec. 1925. © 24Dec25, A878296. R113665, 17Jun53, The Singer Manufacturing Co. (PWH)

  Instructions for using and adjusting
    Singer sewing machines 112W130,
    112W131, and 112W135, by Archibald
    Tregaskis. Form 1959W, rev.
    Nov. 1925. © 30Nov25, A876581.
    R113660, 17Jun53, The Singer
    Manufacturing Co. (PWH)

<pb id='131.png' />
  Instructions for using Singer sewing
    machine 72W12 hemstitch, by Archibald
    Tregaskis. Form 1830W, rev.
    Jan. 1925. © 30Jan25, A819906.
    R104774, 29Dec52, The Singer
    Manufacturing Co. (PWH)

  Instructions for using Singer sewing
    machine 107W100, by Archibald
    Tregaskis. Form 1423W, rev. Mar.
    1925. © 1May25, A830722. R104786,
    29Dec52, The Singer Manufacturing
    Co. (PWH)

  Instructions for using Singer sewing
    machine 110W150, by Archibald
    Tregaskis. Form 1943W, Jan. 1925.
    © 13Feb25, A820854. R104777,
    29Dec52, The Singer Manufacturing
    Co. (PWH)

  Instructions for using Singer sewing
    machine 112W130, by Archibald
    Tregaskis. Form 1959W, July 1925.
    © 29Jul25, A863655. R111524,
    1May53, The Singer Manufacturing
    Co. (PWH)

  Instructions for using Singer sewing
    machines 51W46 and 51W47, oblique
    underedge trimmer, and 51W49, horizontal
    underedge trimmer, by Archibald
    Tregaskis. Form 1744W, rev,
    Feb. 1925. © 27Feb25, A825026.
    R104778, 29Dec52, The Singer
    Manufacturing Co. (PWH)

  Instructions for using Singer sewing
    machines 51W54 and 51W55, by
    Archibald Tregaskis. Form 1970W,
    Sept. 1925. © 1Oct25, A870330.
    R113652, 17Jun53, The Singer
    Manufacturing Co. (PWH)

  Instructions for using Singer sewing
    machines 51W56 and 51W57, oblique
    underedge trimmer, and 51W59, horizontal
    underedge trimmer, by Archibald
    Tregaskis. Form 1971W,
    Sept. 1925. © 3Oct25, A870331.
    R113653, 17Jun53, The Singer
    Manufacturing Co. (PWH)

  Instructions for using Singer sewing
    machines 78-1 and 78-3 by
    Archibald Tregaskis. Form 7974,
    Mar. 1925. © 8Jun25, A857646.
    R111520, 1May53, The Singer
    Manufacturing Co. (PWH)

Instructions for using Singer sewing machines of class 72W, except machines 72W12 and 72W19, hemstitch, by Archibald Tregaskis. Form 1942W, rev. Jan. 1925. © 7Feb25, A820855. R104789, 29Dec52, The Singer Manufacturing Co. (PWH)

  Instructions for using Singer sewing
    machines of class 110W, by Archibald
    Tregaskis. Form 1808W, rev.
    Feb. 1925. © 11Mar25, A825374.
    R104779, 29Dec52, The Singer
    Manufacturing Co. (PWH)

Instructions for using Singer sewing machines of class 110W, except machine 110W150, fitted with continuous wheel feed for leather work, by Archibald Tregaskis. Form 1808W, rev. Jan. 1925. © 19Jan25, A818928. R104773, 29Dec52, The Singer Manufacturing Co. (PWH)

  List of parts, machine no. 46-100,
    by George Rice. Form 18061, Jan.
    1925. © 6Feb25, A820572. R104775,
    29Dec52, The Singer Manufacturing
    Co. (PWH)

  List of parts, machine no. 51W54, by
    Thomas W. Cutting. Form 1972W,
    Nov. 1925. © 24Dec25, A878293.
    R113664, 17Jun53, The Singer
    Manufacturing Co. (PWH)

  List of parts, machine no. 61W76, by
    Thomas W. Cutting. Form 1954W,
    Apr. 1925. © 29Jun25, A859694.
    R111522, 1May53, The Singer
    Manufacturing Co. (PWH)

  List of parts, machine no. 71-30, by
    Thomas W. Cutting. Form 1530W, rev.
    Feb. 1925. © 13Apr25, A828376.
    R104785, 29Dec52, The Singer
    Manufacturing Co. (PWH)

<pb id='132.png' />
  List of parts, machine no. 99W50, by
    Thomas W. Cutting. Form 1684W,
    rev. Oct. 1925. © 25Nov25, A874901.
    R113658, 17Jun53, The Singer
    Manufacturing Co. (PWH)

  List of parts, machine no. 111W100,
    by Thomas William Cutting. Form
    1938W, Jan. 1925. © 4Feb25,
    A820573. R104776, 29Dec52, The
    Singer Manufacturing Co. (PWH)

  List of parts, machine no. 110W121,
    by Thomas W. Cutting. Form 1963W,
    Oct. 1925. © 17Dec25, A878057.
    R113663, 17Jun53, The Singer
    Manufacturing Co. (PWH)

  List of parts, machine no. 110W150,
    by Thomas W. Cutting. Form 1964W,
    Oct. 1925. © 18Dec25, A877936.
    R113662, 17Jun53, The Singer
    Manufacturing Co. (PWH)

  List of parts, machine no. 117-2, by
    George Rice. Form 18083, July
    1925. © 31Jul25, A863656. R111525,
    1May53, The Singer Manufacturing
    Co. (PWH)

  List of parts, machines no. 22W23,
    22W25, 22W38, 22W111, 22W113,
    22W133, and 22W207. by Thomas W.
    Cutting. Form 1874W, Feb. 1925.
    © 21Apr25, A830724. R104788,
    29Dec52, The Singer Manufacturing
    Co. (PWH)

  List of parts, machines no. 23-1,
    23-3, 23-4, 23-9 to 23-12, 23-16,
    23-21, 23-22, and 23-30, by Thomas
    W. Cutting. Form 1916W, Jan. 1925.
    © 12Mar25, A826073. R104781,
    29Dec52, The Singer Manufacturing
    Co. (PWH)

  List of parts, machines no. 36-1
    and 36-3, by Thomas W. Cutting.
    Form 1952W, Mar. 1925. © 5May25,
    A830723. R104787, 29Dec52, The
    Singer Manufacturing Co. (PWH)

  List of parts, machines no. 147-1
    and 147-3, by George Rice. Form
    18109. Oct. 1925. © 20Nov25,
    A876327. R113659, 17Jun53, The
    Singer Manufacturing Co. (PWH)

  List of parts, machines no. 147-2
    and 147-23, by George Rice. Form
    18110. Oct. 1925. © 24Nov25,
    A874755. R113657, 17Jun53, The
    Singer Manufacturing Co. (PWH)

  List of parts, machines no. 147-20
    to 147-22, by George Rice. Form
    18111. Oct. 1925. © 1Dec25,
    A877128. R113661, 17Jun53, The
    Singer Manufacturing Co. (PWH)

  List of screws, nuts and rollers,
    and studs, by George Rice. Form
    18078, July 1925. © 26Aug25,
    A866530. R111528, 1May53, The
    Singer Manufacturing Co. (PWH)

  New type high speed Singer machine
    51W54, by Archibald Tregaskis.
    Form 9713, Aug. 1925. © 2Sep25,
    A865946. R111527, 1May53, The
    Singer Manufacturing Co. (PWH)

  New type high speed Singer machine
    51W59, by Archibald Tregaskis.
    Form 9716, Aug. 1925. © 15Sep25,
    A868202. R111531, 1May53, The
    Singer Manufacturing Co. (PWH)

Price list of parts for family shops: B. T. 7 to B. T. 92 motors and Singerlights. by Archibald Tregaskis Form 18087, July 1925. © 1Aug25, A863845. R111526, 1May53, The Singer Manufacturing Co. (PWH)

Singer machine 58-15 for sewing regular or fancy shank buttons on shoes, etc., by Archibald Tregaskis. Form 9718, July 1925. © 17Jul25, A862324. R111523, 1May53, The Singer Manufacturing Co. (PWH)

  Singer machine 69-22 cylinder bed
    lock stitch for sewing marking tags
    on laundry articles, by Archibald
    Tregaskis. Form 9663, rev. March
    1925. © 21Mar25, A826902.
<pb id='133.png' n='1953_h1/A/0347' />
    R104784, 29Dec52, The Singer
    Manufacturing Co. (PWH)

Singer machine 78-1 lock stitch combined needle and upper feeds for light weight work in fabrics, by Archibald Tregaskis. Form 9204, rev. Mar. 1925. © 17Mar25, A826307. R104782, 29Dec52, The Singer Manufacturing Co. (PWH)

Singer machine 78-3, by Archibald Tregaskis. Form 9703, Feb. 1925. © 26Mar25, A826714. R104783, 29Dec52, The Singer Manufacturing Co. (PWH)

Singer machine 107W50 cylinder bed zigzag lock stitch for stitching sweat bands into caps and cloth hats, by Archibald Tregaskis. Form 9571, rev. Mar. 1925. © 23Mar25, A825971. R104780, 29Dec52, The Singer Manufacturing Co. (PWH)

  Singer machine 112W130, by Archibald
    Tregaskis. Form 9707, June 1925.
    © 1Jun25, A857481. R111519,
    1May53, The Singer Manufacturing
    Co. (PWH)

  Singer machine 112W135, by Archibald
    Tregaskis. Form 9723, Oct. 1925.
    © 31Oct25, A873653. R113655,
    17Jun53, The Singer Manufacturing
    Co. (PWH)

SINGMASTER, ELSIE.

The book of the Constitution. © 14May26, A890821. R112156, 15May53, Elsie Singmaster Lewars (A)

  Bred in the bone, and other stories;
    illustrated by Elizabeth Shippen
    Green. © 23Oct25, A869880.
    R113395, 10Jun53, Elsie Singmaster
    Lewars (A)

SINNOTT, EDMUND W.

Principles of genetics, by Edmund W. Sinnott and L. C. Dunn. 1st ed. © 7Aug25, A864182. R108076, 27Feb53, Edmund W. Sinnott & L. C. Dunn (A)

SKELTON, J. R., illus.

  Three of a kind. R109298. SEE
    McNeile, Herman Cyril.

SKINNER, ADA M.

  A child's book of country stories,
    by Ada M. Skinner and Eleanor L.
    Skinner, with pictures by Jessie
    Willcox Smith. © 15Oct25,
    A872597. R110426, 20Apr53, Ada
    M. Skinner (A)

SKINNER, CHARLES M.

Myths and legends of flowers, trees, fruits, and plants. © on new illus.; 23Oct25, A872905. R112293, 22May53, William L. Skinner (NK)

SKINNER, ELEANOR L., joint author

  A child's book of country stories.
    R110426. SEE Skinner, Ada M.

SKINNER, WILLIAM L.

Myths and legends of flowers, trees, fruits, and plants. R112293. SEE Skinner, Charles M.

SLATTERY, CHARLES LEWIS.

William Austin Smith, a sketch. © 17Feb25, A822116. R106457, 28Jan53, Fiduciary Trust Co. & Sarah L. Slattery (E)

SLATTERY, SARAH L.

  William Austin Smith. R106457. SEE
    Slattery, Charles Lewis.

SMALL, CASSIE PAINE.

  How to know textiles. © 8Apr25,
    A855320. R105277, 9Jan53, Lou
    R. Key (E)

<pb id='134.png' /> SMALL, SIDNEY HERSCHEL.

  Both one. © 22Sep25, A869294.
    R106638, 2Feb53, Sidney Herschel
    Small (A)

SMART, HELEN E.

  The altar. R111265. SEE Smart,
    Henry, comp.

SMART, HENRY, comp.

  The altar, its ornaments and its
    care. © 10Aug25, A861485.
    R111265, 23Apr53, Helen E.
    Smart (W)

SMITH, DAVID EUGENE.

  History of mathematics. Vol. 2:
    Special topics of elementary mathematics.
    © 14Feb25, A823227.
    R105273, 9Jan53, Eva May Luse
    Smith (W)

SMITH, EDITH FREELOVE

The personal history and experience of David Copperfield the younger. R109048. SEE Dickens, Charles.

SMITH, EVA MAY LUSE

  History of mathematics. R105273.
    SEE Smith, David Eugene.

SMITH, HARRIET LUMMIS.

  Pollyanna's jewels, the fourth glad
    book; illustrated by H. Weston
    Taylor. © 28Aug25, A864435.
    R113130, 9Jun53, Laura Lummis
    Schutz (E)

SMITH, HARRIET SAVAGE, illus.

The personal history and experience of David Copperfield the younger. R109048. SEE Dickens, Charles.

SMITH, HELEN JANET.

A dictionary of dance terms. © 18Mar26, A892297. R111533, 27Apr53, Helen Janet Smith (A)

SMITH, JOHN MERLIN POWIS.

The prophets and their times. © 10Mar25, A822478. R106877, 4Feb53, Mrs. J. M. P. Smith (W)

SMITH, Mrs. JOHN MERLIN POWIS

  The prophets and their times.
    R106877. SEE Smith, John Merlin
    Powis.

SMITH, LESLIE R., comp.

The patron, the official song book of the Grange. © 15Jul25, A863302. R113034, 2Jun53, National Grange of the Patrons of Husbandry (PCW)

SMITH, LLOYD E.

  Amorous tales of the monks. (Little
    blue book, no. 909) © on introd.;
    14Nov25, A876931. R106138,
    22Jan53, Lloyd E. Smith (A)

  Amorous tales of the monks. (Little
    blue book, no. 909) © on introd.;
    14Nov25, A876931. R111301, 23Apr53,
    Haldeman-Julius Co. (PWH)

  Arithmetic self taught, pt. 1.
    (Little blue book, no. 856)
    © 18May25, A857720. R110526,
    10Apr53, Haldeman-Julius Co. (PWH)

  Ballads. R110514. SEE Scott, Sir
    Walter, bart.

  Bluebeard. R110528. SEE Perrault,
    Charles.

  A book of familiar quotations.
    (Little blue book, no. 815)
    © 4Apr25, A856429. R110513,
    4Feb53, Haldeman-Julius Co. (PWH)

  A book of useful phrases. (Little
    blue book no. 734) © 25Mar25,
    A856089. R110512, 4Feb53,
    Haldeman-Julius Co. (PWH)

<pb id='135.png' />
  Card games and how to play them,
    based on Edmond Hoyle. (Little
    blue book, no. 847) © 18May25,
    A857722. R110527, 10Apr53,
    Haldeman-Julius Co. (PWH)

  Confessions. R110519. SEE
    Augustinus, Aurelius, Saint,
    Bp. of Hippo.

  A dictionary of Biblical allusions.
    (Little blue book, no. 905)
    © 28Nov25, A878630. R106139,
    22Jan53, Lloyd E. Smith (A)

  A dictionary of Biblical allusions.
    (Little blue book, no. 905)
    © 28Nov25, A878630. R111308,
    23Apr53, Haldeman-Julius Co. (PWH)

  English composition self taught.
    (Little blue book, no. 823)
    © 7May25, A856879. R110525,
    10Apr53, Haldeman-Julius Co. (PWH)

  Five hundred riddles. (Little blue
    book, no. 893) © 9Sep25, A870365.
    R106135, 22Jan53, Lloyd E.
    Smith (A)

  Five hundred riddles. (Little blue
    book, no. 893) © 9Sep25, A870365.
    R111288, 23Apr53, Haldeman-Julius
    Co. (PWH)

  4000 words often mispronounced.
    (Little blue book, no. 697)
    © 28Sep25, A870366. R106136,
    22Jan53, Lloyd E. Smith (A)

  4000 words often mispronounced.
    (Little blue book, no. 697)
    © 28Sep25, A870366. R111289,
    23Apr53, Haldeman-Julius Co. (PWH)

  A handbook of useful tables. (Little
    blue book, no. 835) © 13May25,
    A829481. R110521, 10Apr53,
    Haldeman-Julius Co. (PWH)

  How to improve your vocabulary.
    (Little blue book, no. 821)
    © 9May25, A856877. R110524,
    10Apr53, Haldeman-Julius Co. (PWH)

  How to pronounce 4000 proper names.
    (Little blue book, no. 696)
    © 22Sep25, A870367. R106137,
    22Jan53, Lloyd E. Smith (A)

  How to pronounce 4000 proper names.
    (Little blue book, no. 696)
    © 22Sep25, A870367. R111290,
    23Apr53, Haldeman-Julius Co. (PWH)

  Love letters of Abelard and Heloise.
    R111277. SEE Abailard, Pierre.

  A manual of parliamentary law.
    (Little blue book, no. 872)
    © 16Jun25, A867116. R111285,
    23Apr53, Haldeman-Julius Co. (PWH)

  Memoirs of Madame de Staël. R111280.
    SEE Staël-Holstein, Anne Louise
    Germaine Necker, baronne de.

Morals. R110517. SEE Seneca.

  Poor Richard's almanac. R110518.
    SEE Franklin, Benjamin.

  Popular Shakespearian quotations.
    R110522. SEE Shakespeare, William.

  Rhetoric self taught. (Little blue
    book, no. 822) © 8May25, A856874.
    R110523, 10Apr53, Haldeman-Julius
    Co. (PWH)

  Some general hints on self-improvement.
    (Little blue book, no. 868)
    © 31Aug25, A867105. R111279,
    23Apr53, Haldeman-Julius Co. (PWH)

  Tales in verse of terror and wonder.
    (Little blue book, no. 739) © on
    foreword & notes; 24Mar25, A856808.
    R110515, 4Feb53, Haldeman-Julius
    Co. (PWH)

  The voyage to Lilliput. R110520.
    SEE Swift, Jonathan.

SMITH, MILTON M., joint author

  Magic in the making. R106483.
    SEE Mulholland, John.

SMITH, NAOMI G. ROYDE-
  SEE Royde-Smith, Naomi G.

<pb id='136.png' n='1953_h1/A/0348' /> SMITH, NORA ARCHIBALD.

  Kate Douglas Wiggin as her sister
    knew her. © 23Oct25, A869882.
    R113396, 10Jun53, Helen K.
    Bradbury (NK)

  Twilight stories. R113385. SEE
    Wiggin, Kate Douglas.

SMITH, ROLLAND R.

  Beginners' geometry © 1Sep25,
    A861667. R105891, 15Jan53,
    Holland R. Smith (A)

SMITH, THEODORE CLARKE.

  The life and letters of James Abram
    Garfield. 2 v. © 2Oct25, A869262.
    R109202, 19Mar53, Theodore Clarke
    Smith (A)

SMITH, THORNE.

Topper, an improbable adventure. © 20Feb26, A879717. R107928, 24Feb53, June Smith Delaney & Marion Smith Conner (C)

SMITH, Sir WILLIAM.

  Peloubet's Bible dictionary, based
    upon the foundation laid by William
    Smith; edited by F. N. Peloubet and
    Alice D. Adams. Rev. © 3Apr25,
    A855429. R105884, 12Jan53, The
    John C. Winston Co. (PWH)

SMITH, WILLIAM J.

  Famous duets for Hawaiian guitar and
    regular guitar. © 12Dec25, A877731.
    R104620, 2Jan53, Wm. J. Smith Music
    Co., inc. (PWH)

  Hawaiian guitar duets. © 12Dec25,
    A877732. R104621, 2Jan53, Wm. J.
    Smith Music Co., inc. (PWH)

SMITH (WILLIAM J.) MUSIC CO., INC.

  The at-a-glance ukulele and ukulele
    banjo method. R104619. SEE
    Williams, A.

  Famous duets for Hawaiian guitar and
    regular guitar. R104620. SEE
    Smith, William J.

  Hawaiian guitar duets. R104621.
    SEE Smith, William J.

SMITH, YOUNG B.

Cases on the law of public utilities, selected and annotated by Young B. Smith and Noel T. Dowling; including cases and pleadings on rates, selected and arr. by Robert L. Hale. Chapter 2. (American casebook series) © 5Nov25, A875846. R105323, 5Jan53, West Pub. Co. (PWH)

SMITH ELY JELLIFFE TRUST

  The emotions, morality, and the brain.
    R108209. SEE Monakow, Constantin von

  Essays in psychopathology. R108212.
    SEE White, William A.

  Hysteria. R108213. SEE Kretschmer,
    Ernst.

  Psychoanalysis and the psychic disorder
    of general paresis. R108211.
    SEE Hollós, Stefan.

  Studies in psychiatry. R108210. SEE
    Psychiatrical Society of New York.

SMITHERS, ADELAIDE ELLEN, joint author

  Practical Spanish grammar. R110044.
    SEE Seymour, Arthur Romeyn.

SMITHGALL, B. F.

  Ponce de Leon Spring. R110181.
    SEE Popham, William Lee.

SNAITH, JOHN COLLIS.

  Thus far. © 29May25, A855456.
    R107973, 25Feb53, Charles B. L.
    Tennyson (E)

<pb id='137.png' /> SNELL, ROY J.

  The flying sub. (The Radiophone Boys
    stories) © 1Jul25, A864117.
    R106134, 22Jan53, Whitman Pub. Co.
    (PWH)

SNYDER, MARGARET I.

The nativity, a Christmas pageant. © 6Aug25, A869042. R105774, 16Jan53, Margaret I. Snyder (A)

SNYDER, MARIE A.

  The musical cross word puzzle book.
    R108033. SEE Molloy, Maurice S.

  Musical cross word puzzle lessons.
    R108034. SEE Molloy, Maurice S.

SOMERVELL, DAVID CHURCHILL.

  Disraeli and Gladstone. © 19Feb26,
    (pub. abroad 16Sep25, AI-7413),
    A883389. R107768, 20Feb53, David
    Churchill Somervell (A)

SONEY AND SAGE COMPANY

Law and practice in the district courts of New Jersey and forms adapted to district court practice. R105317. SEE Erwin, James Shrewsbury.

  The New Jersey digest. R105318.
    SEE The New Jersey digest.

SORELLE, RUPERT P.

Metodo racional de mecanografía. © 12Aug25, A865240. R111378, 29Apr53, McGraw-Hill Book Co., inc. (PWH)

SOULE, HELEN CHADDOCK

  Principles and methods of statistics.
    R110019. SEE Chaddock, Robert
    Emmet.

SOUTHERN reporter. Temporary Southern
  digest of v. 101-105. © 10Feb26,
  A891313. R109766, 3Apr53, West
  Pub. Co. (PWH)

SOUTHERN reporter, v.104-105. Permanent
  ed. (National Reporter
  System. State series) © West
  Pub. Co. (PWH)

  v. 104, June 13-Aug. 29, 1925.
    © 8Oct25, A875866. R105341,
    5Jan53.

  v. 105, Sept. 5-Dec. 19, 1925.
    © 9Feb26, A891322. R109774,
    5Jan53.

SOUTHEASTERN reporter. Temporary
  digest of v. 126-130. © 24Mar26,
  A891312. R109765, 3Apr53, West
  Pub. Co. (PWH)

SOUTHEASTERN reporter, v. 128-130.
  Permanent ed. (National Reporter
  System. State series) © West
  Pub. Co. (PWH)

  v. 128, June 27-Sept. 12, 1925.
    © 8Nov25, A879248. R105345,
    5Jan53.

  v. 129, Sept. 19-Nov. 28, 1925.
    © 12Jan26, A883575. R109755,
    3Apr53.

  v. 130, Dec. 5, 1925-Feb. 6, 1926.
    © 26Mar26, A891323. R109775,
    3Apr53.

SOUTHEASTERN reporter digest, including cases reported in v. 1-125, Southeastern reporter. Georgia ed., v. 2. © 29Jan26, A891325. R109777, 3Apr53, West Pub. Co. (PWH)

SOUTHEASTERN reporter digest, including cases reported in v. 1-125, Southeastern reporter. North Carolina ed., v. 1-2. © West Pub. Co. (PWH)

  v. 1. © 9Oct25, A875853. R105330,
    5Jan53.

  v. 2. © 28Jan26, A891309. R109762,
    3Apr53.

<pb id='138.png' />
SOUTHEASTERN reporter digest, including
  cases reported in v. 1-125,
  Southeastern reporter. Virginia
  ed., v. 1-2. © West Pub. Co. (PWH)

  v. 1. © 2Nov25, A875862. R105337,
    5Jan53.

  v. 2. © 29Jan26, A891310. R109763,
    3Apr53.

SOUTHEASTERN reporter digest, including cases reported in v. 1-125, Southeastern reporter. West Virginia ed., v. 1-2. © West Pub. Co. (PWH)

  v. 1. © 2Nov25, A875855. R105332,
    5Jan53.

  v. 2. © 28Jan26, A891318. R109771,
    3Apr53.

SOUTHEASTERN reporter digest, including cases reported in v. 1-125, Southeastern reporter. Vol. 2. © 28Jan26, A891362. R109793, 3Apr53, West Pub. Co. (PWH)

SOUTHWESTERN reporter. Temporary Southwestern
  digest of v. 271-275.
  © 9Jan26, A883564. R109752,
  3Apr53, West Pub. Co. (PWH)

SOUTHWESTERN reporter, v. 272-277.
  Permanent ed. (National Reporter
  System. State series) © West
  Pub. Co. (PWH)

  v. 272, July 8-29, 1925. © 2Oct25,
    A879253. R105350, 5Jan53.

  v. 273, Aug. 19-Sept. 9, 1925.
    © 2Nov25, A875865. R105340,
    5Jan53.

  v. 274, Sept. 16-Oct. 7, 1925.
    © 2Dec25, A883578. R105362,
    5Jan53.

  v. 275, Oct. 14-Nov. 25, 1925.
    © 9Jan26, A883569. R109753,
    3Apr53.

  v. 276, Dec. 2-30, 1925.
    © 18Feb26, A891339. R109790,
    3Apr53.

  v. 277, Jan. 6-27, 1926.
    © 13Mar26, A891332. R109783,
    3Apr53.

SOUTHWESTERN reporter digest, including cases reported in v. 256-270, Southwestern reporter. © 17Nov25, A875857. R105334, 5Jan53, West Pub. Co. (PWH)

SPARLING, EDWARD EARL.

  Under the levee. © 13Feb25, A822217.
    R105956, 22Jan53, Mai S. Fluharty (E)

SPEARMAN, FRANK H., Jr.

  Selwood of Sleepy Cat. R106484.
    SEE Spearman, Frank H., Sr.

SPEARMAN, FRANK H., Sr.

  Selwood of Sleepy Cat. © 6Mar25,
    A823405. R106484, 29Jan53,
    Frank H. Spearman, Jr. (C)

SPEARS, RAYMOND S.

  Camping, woodcraft, and wildcraft.
    (Little blue book, no. 749)
    © 6Apr25, A828821. R107212,
    4Feb53, Haldeman-Julius Co. (PWH)

  Helpful hints for hikers. (Little
    blue book, no. 750) © 4Apr25,
    A828820. R107211, 4Feb53,
    Haldeman-Julius Co. (PWH)

SPEED, KELLOGG.

  Traumatic injuries of the carpus,
    including Colles' fracture.
    (Surgical monographs) © 25Sep25,
    A864987. R107505, 16Feb53,
    Kellogg Speed (A)

SPERANZA, GINO.

  Race or nation: a conflict of divided
    loyalties. © 10Sep25, A869292.
    R109724, 6Apr53, Edith Colgate
    Salsbury (NK)

<pb id='139.png' n='1953_h1/A/0349' /> SPERRY, WILLARD L.

  Reality in worship. © 15Sep25,
    A864606. R109041, 18Mar53,
    Willard L. Sperry (A)

SPINNEY, BERYL H.

  A text-book of physics. R109037.
    SEE Spinney, Louis Bevier.

SPINNEY, LOUIS BEVIER.

A text-book of physics. 3d ed. © 1Sep25, A861669. R109037, 18Mar53, Beryl H. Spinney (W)

SPOOL COTTON COMPANY

Modern Priscilla home furnishing book. R104965. SEE MacDonald, Elizabeth Stone.

SPYRI, JOHANNA.

  Children of the Alps, translated by
    Elisabeth P. Stork. Illus. by
    Margaret J. Marshall. © 15Sep25,
    A872104. R108326, 5Mar53, Charles
    Wharton Stork (Wr)

SQUIER, EDNA C.

  The city beyond the clouds. R109684.
    SEE Stratemeyer, Edward.

STAËL-HOLSTEIN, ANNE LOUISE GERMAINE
  NECKER, baronne de.

  Memoirs of Madame de Staël, edited by
    Lloyd E. Smith. (Little blue book,
    no. 888) © 31Aug25, A867106.
    R111280, 23Apr53, Haldeman-Julius
    Co. (PWH)

STANARD, MARY NEWTON.

  The dreamer. © 9Sep25, A872102.
    R110477, 16Apr53, Roberta Newton
    Taylor (NK)

  Edgar Allan Poe letters till now
    unpublished. R110476. SEE
    Poe, Edgar Allan.

STANDISH, BURT L.

  Lefty Locke, owner. © 9Jun25,
    A829630. R108614, 11Mar53, Burt
    L. Standish (A)

STARR, FREDERICK.

Is life worth living? A debate by Frederick Starr and Clarence Darrow. (Little blue book, no. 910) © 6Nov25, A877095. R111302, 23Apr53, Haldeman-Julius Co. (PWH)

  Is the human race getting anywhere?
    A debate by Frederick Starr and
    Clarence Darrow. (Little blue
    book, no. 911) © 6Nov25, A877096.
    R111303, 23Apr53, Haldeman-Julius
    Co. (PWH)

STARR, HARRIS E.

  William Graham Sumner. © 15Jun25,
    A855659. R109472, 27Mar53, Harris
    E. Starr (A)

STEED, ANNE B.

  Heat engines. R109488. SEE Allen,
    John R.

STEELE, WILBUR DANIEL.

Taboo. © 20Aug25, A861606. R111445, 29Apr53, Wilbur Daniel Steel (A)

STEEP, MIRIAM

  Chinese fantastics. R107614. SEE
    Steep, Thomas.

STEEP, THOMAS.

  Chinese fantastics. © 30Sep25,
    A875305. R107614, 18Feb53,
    Miriam Steep (W)

STEIN, KURT M.

Die schönste Lengevitch, by K. M. S.; with an introd. by Richard Atwater. © 6Jun25, A864086. R108272, 5Mar53, Kurt M. Stein (A)

<pb id='140.png' /> STEINDLER, ARTHUR.

A textbook of operative orthopedics. © 9Sep25, A861805. R110042, 9Apr53, Arthur Steindler (A)

STEINER, RUDOLF.

  Aegyptische Mythen und Mysterien;
    Vortragszyklus, 2.-14. Sept. 1908,
    in Leipzig. © 5Sep25, AF28858.
    R105743, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

Anthroposophische Leitsätze. © 24Dec25, AF29951. R105760, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

Die Bhagavad Gita und die Paulusbriefe; Vortragszyklus, Köln, 28. Dez. 1912 bis 1. Jan. 1913. © 15Sep25, AF28850. R105735, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

  Der Christus-Impuls und die Entwicklung
    des Ichbewusstseins; Vorträge,
    1909-1910. © 10Sep25, AF28860.
    R105745, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Christus und die geistige Welt;
    Vorträge, 28. Dez. 1913 bis 2. Jan.
    1914, Leipzig. © 16Sep25, AF28842.
    R105727, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Christus und die menschliche Seele;
    vier Vorträge, Norrköping, 12.-16.
    Juli 1914. © 1Oct25, AF29055.
    R105757, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Exkurse in das Gebiet des Markus-Evangeliums;
    Berliner Vorträge,
    Winter 1910-11. © 10Sep25,
    AF28849. R105734, 14Jan53,
    Rudolf Steiner Nachlassverwaltung
    (PPW)

  Die Geheimnisse der biblischen
    Schöpfungegeschichte; Vortragszyklus,
    16.-26. Aug. 1910. © 5Sep25,
    AF28841. R105726, 14Jan53,
    Rudolf Steiner Nachlassverwaltung
    (PPW)

  Die Geheimnisse der Schwelle; Vorträge,
    München, 24.-31. Aug. 1913.
    © 14Sep25, AF28844. R105729,
    14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Geisteswissenschaftliche Menschenkunde;
    Sammlung einzelner Vorträge,
    1908 und 1909. © 5Sep25, AF28853.
    R105738, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Die geistige Führung des Menschen und
    der Menschheit. © 22Jul25, AF28377.
    R105723, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Geistige Hierarchien und ihre Wiederspiegelung
    in der physischen Welt;
    10 Vorträge, 12.-18. April 1909,
    Düsseldorf. © 1Oct25, AF29051.
    R105753, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Die geistigen Wesenheiten in den
    Himmelskörpern und Naturreichen;
    Vortragszyklus, 3.-14. Apr. 1912.
    © 15Sep25, AF28864. R105749,
    14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

Grundlegendes für eine Erweiterung der Heilkunst nach geisteswissenschaftlichen Erkenntnissen, von Rudolf Steiner und Ita Wegman. © 24Sep25, AF28840. R105725, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

  Inneres Wesen des Menschen und Leben
    zwischen Tod und neuer Geburt;
    Vorträge, Wien, 9.-14. Apr. 1914.
    © 1Oct25, AF29054. R105756,
    14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Der irdische und der kosmische Mensch;
    acht Vorträge, Frühjahr 1912.
    © 15Sep25, AF28852. R105737,
<pb id='141.png' />
    14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

Das Johannes-Evangelium; Vortragszyklus, Hamburg, Mai 1908. © 15Dec25, AF30080. R105762, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

  Das Johannes-Evangelium im Verhältnis
    zu den drei anderen Evangelien
    besonders zu dem Lukas-Evangelium;
    Vorträge, Juli 1909. © 10Sep25,
    AF28857. R105742, 14Jan53, Rudolf
    Steiner Nachlassverwaltung (PPW)

  Das Leben zwischen den Tode und der
    neuen Geburt im Verhältnis zu den
    kosmischen Tatsachen; Vorträge,
    Winter 1912-13. © 15Sep25,
    AF28851. R105736, 14Jan53, Rudolf
    Steiner Nachlassverwaltung (PPW)

  Das Lukas-Evangelium; zehn Vorträge,
    Basel, Sept. 1909. © 5Sep25,
    AF28847. R105732, 14Jan53, Rudolf
    Steiner Nachlassverwaltung (PPW)

  Das Markus-Evangelium; zehn Vorträge,
    Basel, Sept. 1912. © 15Sep25,
    AF28854. R105739, 14Jan53,
    Rudolf Steiner Nachlassverwaltung (PPW)

  Mein Lebensgang; mit einem Nachwort
    von Marie Steiner. © 29Aug25,
    AF28562. R105724, 14Jan53,
    Rudolf Steiner Nachlassverwaltung
    (PPW)

  Der Mensch im Lichte von Okkultismus,
    Theosophie, und Philosophie; Vorträge,
    2.-12. Juni 1912. © 15Sep25,
    AF28865. R105750, 14Jan53, Rudolf
    Steiner Nachlassverwaltung (PPW)

  Menschenwesen, Menschenschicksal und
    Weltentwicklung; ein Vortragszyklus,
    16.-21. Mai 1923, Christiania.
    © 27Feb26, AF30381.
    R113216, 10Jun53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Der menschliche und der kosmische
    Gedanke; vier Vorträge, 18. bis 24.
    Jan. 1914, in Berlin. © 16Sep25,
    AF28843. R105728, 14Jan53,
    Rudolf Steiner Nachlassverwaltung
    (PPW)

  Die Methodik des Lehrens und die
    Lebensbedingungen des Erziehens;
    fünf Vorträge, Stuttgart, 7.-13.
    Apr. 1924. © 27Mar26, AF31523.
    R113218, 10Jun53, Rudolf
    Steiner Nachlassverwaltung (PPW)

Die Mission einzelner Volksseelen im Zusammenhange mit der germanischnordischen Mythologie; Vortragszyklus, 7.-17. Juni 1910. © 10Sep25, AF28856. R105741, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

Die Mysterien des Morgenlandes und des Christentums; Vortragszyklus, 3.-6. Feb. 1913, Berlin. © 1Oct25, AF29053. R105755, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

  Notwendigkeit und Freiheit im Weltengeschehen
    und im menschlichen
    Handeln; fünf Vorträge. © 1May25,
    AF27735. R105722, 14Jan53,
    Rudolf Steiner Nachlassverwaltung
    (PPW)

  Notwendigkeit und Freiheit im Weltengeschehen
    und im menschlichen Handeln; fünf Vorträge,
    25. Jan.-8. Feb. 1916. © 14Sep25, AF28855.
    R105740, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Die Offenbarungen des Karma; 11 Vorträge,
    15. bis 28. Mai 1910, in
    Hamburg. © 1Oct25, AF29050.
    R105732, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Okkulte Geschichte: Persönlichkeiten
    und Ereignisse der Weltgeschichte
    im Lichte der Geisteswissenschaft;
    Vortragszyklus, 27. Dez. 1910-1. Jan. 1911.
    © 10Sep25, AF28859.
    R105744, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

<pb id='142.png' n='1953_h1/A/0350' />
  Der Orient im Lichte des Occidents;
    Vortragszyklus, 23.-31. Aug. 1909,
    München. © 15Dec25, AF30079.
    R105761, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Sprachgestaltung und dramatische
    Kunst; Vorträge. Mit einem Vorwort
    von Marie Steiner. © 3Apr26,
    AF30771. R113217, 10Jun53, Rudolf
    Steiner Nachlassverwaltung (PPW)

Die Theosophie an der Hand der Apokalypse; Nachschrift des Vortragszyklus, Nürnberg, Juni 1908. © 1Oct25, AF29052. R105754, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

Ueber Schicksalsbildung und Leben nach dem Tode; sechs Vorträge, Berlin, 16. Nov.-21. Dez. 1915. © 1Oct25, AF29049. R105751, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

  Von der Initiation, von Ewigkeit und
    Augenblick, von Geisteslicht und
    Lebensdunkel; ein Vortragszyklus,
    25.-31. Aug. 1912. © 15Sep25,
    AF28848. R105733, 14Jan53, Rudolf
    Steiner Nachlassverwaltung (PPW)

  Von Jesus zu Christus: zehn Vorträge,
    5.-14. Okt. 1911. © 10Sep25,
    AF28862. R105747, 14Jan53,
    Rudolf Steiner Nachlassverwaltung (PPW)

  Vor dem Tore der Theosophie; Nachschrift
    des Vortragszyklus, Stuttgart,
    Aug. 1906. © 5Sep25,
    AF28846. R105731, 14Jan53, Rudolf
    Steiner Nachlassverwaltung (PPW)

  Wahrheit und Wissenschaft. © 28Nov25,
    AF30201. R105764, 14Jan53, Rudolf
    Steiner Nachlassverwaltung (PPW)

  Wahrspruchworte. © 19Dec25, AF29950.
    R105759, 14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Welche Bedeutung hat die okkulte
    Entwicklung des Menschen für seine
    Hüllen und sein Selbst; Vortragszyklus,
    20.-29. März 1913.
    © 14Sep25, AF28845. R105730,
    14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

  Die Welt der Sinne und die Welt des
    Geistes; Vorträge, 27. Dez. 1911-1.
    Jan. 1912. © 10Sep25,
    AF28863. R105748, 14Jan53, Rudolf
    Steiner Nachlassverwaltung (PPW)

  Welt, Erde, und Mensch;
    Vortragszyklus, Stuttgart, Aug. 1908.
    © 15Dec25, AF30081. R105763,
    14Jan53, Rudolf Steiner
    Nachlassverwaltung (PPW)

Weltenwunder, Seelenprüfung, und Geistesoffenbarung; Vortragszyklus, München, 18.-21. Aug. 1911. © 5Sep25, AF28861. R105746, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

Zeitbetrachtungen; zwölf Vorträge, Berlin, 1. Sept. 1914-6. Juli 1915. © 1Oct25, AF29056. R105758, 14Jan53, Rudolf Steiner Nachlassverwaltung (PPW)

STEINER (RUDOLF) NACHLASSVERWALTUNG
  SEE Rudolf Steiner-Nachlassverwaltung.

STEKEL, WILHELM.

  Frigidity in woman. Authorized English
    version by James S. Van
    Teslaar. 2 v. © 1Feb26, A883411.
    R108903, 17Mar53, Liveright Pub.
    Corp. (PWH)

STENDHAL, pseud. SEE Beyle, Marie Henri.

STEPHENS, CYNTHIA

  A poetry recital. R109025. SEE
    Stephens, James.

<pb id='143.png' /> STEPHENS, JAMES.

A poetry recital. © on new matter; 16Jun25, A829734. R109025, 18Mar53, Cynthia Stephens (W)

STEPT, SAM H.
  SEE Stept, Sammy.

STEPT, SAMMY.

Comic songs for the ukulele and steel guitar. R113220 … SEE Lucas, Nick.

STEVENS, GEORGE W.

  Reports of cases decided in the
    Court of Appeals of the State of
    Georgia. R108638. SEE
    Georgia. Court of Appeals.

  Reports of cases decided in the
    Supreme Court of the State of
    Georgia. R108637 … SEE
    Georgia. Supreme Court.

STEVENS, JAMES.

  Paul Bunyan. © 10Apr25, A623741.
    R107656, 18Feb53, James Stevens (A)

STEVENS, WILLIAM OLIVER.

The boy's life of General Grant. © 4Sep25, A864502. R104709, 29Dec52, William Oliver Stevens (A)

STEVENSON, BURTON EGBERT.

The home book of modern verse. © 20Apr25, A823893. R109735, 3Apr53, Burton Egbert Stevenson (A)

STEVENSON, EDWARD M., illus.

  Your foods and you. R108716. SEE
    Allen, Ida C. Bailey.

STEVENSON, ROBERT LOUIS.

  Kidnapped; edited by Myrtle L. Kaufmann,
    illustrated by Frank Godwin.
    © on editorial matter & illus.;
    5May25, A855424. R105880, 12Jan53,
    The John C. Winston Co. (PWH)

  Kidnapped; illustrated by Warwick
    Goble. (The Macmillan children's
    classics) © on illus.; 11Aug25,
    A861366. R109032, 18Mar53, The
    Macmillan Co. (PWH)

Treasure Island; edited by Gilbert Sykes Blakely, illustrated by Frank Godwin. (Winston companion classics) © on editorial matter & illus.; 20Apr25, A855426. R105882, 12Jan53, The John C. Winston Co. (PWH)

STEWART, DONALD OGDEN.

The crazy fool. Decorations by Herb Roth. © 15Jun25, A829760. R111636, 5May53, Donald Ogden Stewart (A)

STIDGER, IVA B.

  Finding God in books. R107777.
    SEE Stidger, William L.

STIDGER, WILLIAM L.

  Finding God in books. © 15Sep25,
    A864712. R107777, 9Feb53, Iva
    B. Stidger (E)

STILSON, CHARLES B.

  A cavalier of Navarre. © 1May25,
    A855561. R106962, 6Feb53,
    Charles B. Stilson (A)

STIMSON, ELEANOR, tr.

  Summer. R109737. SEE Rolland,
    Romain.

STINSON, HUNTER.

  Fingerprints. © 15Apr25, A822932.
    R111369, 3Apr53, Hunter Stinson (A)

STITT, EDWARD WALMSLEY.

  Let's act, by Edward Walmsley Stitt
    and David S. Goldberg. © 15Apr25,
<pb id='144.png' />
    A823753. R105713, 6Jan53, Edward
    Walmsley Stitt, Jr., William
    Britton Stitt (C) & David S.
    Goldberg (A)

STITT, EDWARD WALMSLEY, Jr.

  Let's act. R105713. SEE Stitt,
    Edward Walmsley.

STITT, WILLIAM BRITTON

  Let's act. R105713. SEE Stitt,
    Edward Walmsley.

STOCK, FREDERICK.

  The symphony series of programs for
    school and community orchestras,
    series 1, program 1-2, by Frederick
    Stock, George Dasch, and Osbourne
    McConathy. © Vera S. Wolfe (C of
    F. Stock) George Dasch (A) Osbourne
    William McConathy, James William
    McConathy & Elizabeth McConathy
    Aikens (C)

    program 1. © 18Sep25, A867415.
      R106259, 23Jan53.

    program 2. © 1Apr25, A826921.
      R106248, 23Jan53.

  The symphony series of programs for
    school and community orchestras,
    series 1, program 2. Conductor's
    score 1-9, by Frederick Stock,
    George Dasch, and Osbourne
    McConathy. © 9Apr25, A827467.
    R106249, 23Jan53, Vera S. Wolfe
    (C of F. Stock) George Dasch (A)
    Osbourne William McConathy, James
    William McConathy & Elizabeth
    McConathy Aikens (C)

  The symphony series of programs for
    school and community orchestras,
    series 1, program 3. Conductor's
    score 1-9, by Frederick Stock,
    George Dasch, and Osbourne
    McConathy. © 19Sep25, A868252.
    R106261, 23Jan53, Vera S. Wolfe
    (C of F. Stock) George Dasch (A)
    Osbourne William McConathy, James
    William McConathy & Elizabeth
    McConathy Aikens (C)

STODDARD, LOTHROP.

Social classes in post-war Europe. © 18Sep25, A869705. R105955, 22Jan53, Zoya Stoddard (W)

STODDARD, ZOYA

  Social classes in post-war Europe.
    R105955. SEE Stoddard, Lothrop.

STONE, CHESTER TILTON.

Blood pressure, high and low. © 30Jul25, A864230. R107608, 17Feb53, Allen Ross & Co. (PWH)

STONE, DAVID.

  Yank Brown, honor man; with illus. by
    Charles L. Wrenn. © 27May25,
    A829417. R108608, 11Mar53, David
    Stone (A)

STORK, CHARLES WHARTON

  Children of the Alps. R108326. SEE
    Spyri, Johanna.

STORK, ELISABETH P., tr.

  Children of the Alps. R108326. SEE
    Spyri, Johanna.

STORY, ELIZABETH MONROE

  Singing in the rain. R109461. SEE
    Monroe, Anne Shannon.

STRACK, LILIAN HOLMES.

  And sealing wax; contest selection
    arr. from Montanye Perry's story.
    © 1Dec25, A880585. R105600,
    12Jan53, Lilian Holmes Strack (A)

  Anonymous 71; contest selection arr.
    from Philip Curtiss' story.
    © 1Dec25, A880582. R105597,
    12Jan53, Lilian Holmes Strack (A)

<pb id='145.png' n='1953_h1/A/0351' />
  At the dim gate, by Elizabeth Jordan;
    a contest selection arr. by Lilian
    Holmes Strack. © 1Dec25, A880586.
    R105601, 12Jan53, Lilian Holmes
    Strack (A)

  Contest winners for prize speaking.
    © 31Dec25, A875796. R105592,
    12Jan53, Lilian Holmes Strack (A)

  A corner on William, by Fannie Kilbourne;
    a contest selection arr. by
    Lilian Holmes Strack. © 3Dec25,
    A880579. R105594, 12Jan53, Lilian
    Holmes Strack (A)

  Hiney Bloss—champeen; contest
    selection arr. from G. W. Ogden's
    story. © 1Dec25, A880580. R105595,
    12Jan53, Lilian Holmes Strack (A)

  The man who planted the hungry grass;
    contest selection arr. from Ruth
    Sawyer's story. © 1Dec25,
    A880581. R105596, 12Jan53, Lilian
    Holmes Strack (A)

  Platform readings. © 21Dec25,
    A872995. R105588, 12Jan53,
    Lilian Holmes Strack (A)

  Stealing Cleopatra's stuff, by Fannie
    Kilbourne; a contest selection arr.
    by Lilian Holmes Strack. © 1Dec25,
    A880583. R105598, 12Jan53, Lilian
    Holmes Strack (A)

  Steve Carter, who won the war, by
    Bruce Barton; a contest selection
    arr. by Lilian Holmes Strack.
    © 3Dec25, A880584. R105599,
    12Jan53, Lilian Holmes Strack (A)

STRANAHAN, F. STEWART

  Links. R111864. SEE Stranahan,
    Florence B.

  Receptivity. R111863. SEE
    Stranahan, Florence B.

  Steps. R111862. SEE Stranahan,
    Florence B.

STRANAHAN, FLORENCE B.

  Links. (Her Stone upon stone,
    chapter 5) © 14May25, A857137.
    R111864, 8May53, F. Stewart
    Stranahan (C)

  Receptivity. (Stone upon stone.
    chapter 6) © 14May25, A857136.
    R111863, 8May53, F. Stewart
    Stranahan (C)

  Steps. (Her Stone upon stone,
    chapter 4) © 14May25, A857135.
    R111862, 8May53, F. Stewart
    Stranahan (C)

STRATEMEYER, EDWARD.

  The city beyond the clouds; or,
    Captured by the red dwarfs, by
    Roy Rockwood [pseud.] © 6Jun25,
    A829827. R109684, 2Apr53,
    Harriet S. Adams & Edna C.
    Squier (C)

STRAUS, RALPH.

  Married alive. © 15Apr25, A822933.
    R108442, 10Mar53, Edward Howell (E)

  Volcano. © 8Sep25, A861843. R108444,
    10Mar53, Edward Howell (E)

STREETER, BURNETT HILLMAN.

  The four Gospels. © 27Jan25,
    A815809. R105966, 16Jan53, Ida
    Mary Flower, Ethel Marion Ault &
    Hylda Streeter (NK)

STREETER, HYLDA

  The four Gospels. R105966. SEE
    Streeter, Burnett Hillman.

STRIBLING, THOMAS SIGISMUND.

  Teeftallow. © 5Mar26, A890164.
    R108711, 13Mar53, T. S.
    Stribling (A)

STRINGER, ARTHUR.

Night hawk, a novel. Rev. © 4Mar26, A879781. R109706, 23Mar53, Robert A. Stringer (C)

<pb id='146.png' /> STRINGER, ROBERT A.

  Night hawk. R109706. SEE Stringer,
    Arthur.

STRYKER, MABEL F.

  Little dog Ready at home; with illus.
    by Hugh Spencer. © 1Oct25, A869278.
    R109479, 27Mar53, Mabel F.
    Stryker (A)

STRYKER, ROY E., joint author

  American economic life. R112474.
    SEE Tugwell, Rexford Guy.

STUART, HENRY LONGAN.

  Aricie Brun. R108201. SEE
    Henriot, Emile.

  Beatrice Cenci. R108900. SEE
    Ricci, Corrado.

STUDEBAKER, JOHN WARD

  Manual of directions for Compass
    diagnostic tests in arithmetic.
    R108476. SEE Ruch, Giles Murrel.

STUDY, op. 63, no. 5, by Streabbog;
  text matter by Leopold Godowsky.
  (Study catalog no. 317) © 15Feb25,
  AA365171. R105019, 7Jan53, Art
  Publication Society (PWH)

STUDY, op. 100, no. 15, by Bertini;
  text matter by Leopold Godowsky.
  (Study catalog no. 405) © 15Feb25,
  AA365178. R105023, 7Jan53, Art
  Publication Society (PWH)

STUDY, op. 151, no. 5, by Koehler; text
  matter by Leopold Godowsky. (Study
  catalog no. 207) © 15Feb25,
  AA365175. R105021, 7Jan53, Art
  Publication Society (PWH)

STURGES, KATHARINE, illus.

  Little pictures of Japan. R111605.
    SEE Miller, Olive Beaupré, ed.

SUPERVIELLE, JULES.

  Gravitations, poèmes. © 16Oct25,
    AF29480. R112458, 25May53, Jules
    Supervielle (A)

SUPREME court reporter. Vol. 45,
  Nov. 1924-July 1925. Permanent
  ed. (National Reporter System.
  United States series) © 27Feb26,
  A891361. R109792, 3Apr53,
  West Pub. Co. (PWH)

SWEENEY, BETTY LAUGHLIN

  So you're going to Italy. R108911.
    SEE Laughlin, Clara Elizabeth.

  So you're going to Paris. R108910.
    SEE Laughlin, Clara Elizabeth.

SWIFT, JONATHAN.

Gulliver's travels; with an introd. by H. L. Mencken. © on introd.; 16Oct25, A872236. R112033, 15May53, Alfred A. Knopf, inc. (PWH)

  The voyage to Lilliput, edited by
    Lloyd E. Smith. (Little blue
    book, no. 844) © 13May25, A829480.
    R110520, 10Apr53, Haldeman-Julius
    Co. (PWH)

SWINBURNE, ALGERNON CHARLES.

  Poems and ballads. Introd. by George
    Sylvester Viereck. (Little blue
    book, no. 791) © on introd.;
    28Apr25, A872211. R107239, 4Feb53,
    Haldeman-Julius Co. (PWH)

  The triumph of time, and other poems;
    edited by George Sylvester Viereck.
    (Little blue book, no. 792)
    © 23Apr25, A856092. R110142,
    10Apr53, Haldeman-Julius Co. (PWH)

SYMONS, ARTHUR.

  Studies in seven arts. © 24Nov25,
    A875322. R108721, 11Mar53, Mona
    Hill (NK)

<pb id='147.png' /> TAGGARD, GENEVIEVE, ed.

  May days, an anthology in verse from
    Masses-Liberator; with woodcuts by
    J. J. Lankes. © 4Dec25, A875604.
    R108898, 17Mar53, Genevieve
    Taggard (A)

TAILLANDIER, MADELEINE MARIE LOUISE
  (CHEVRILLON) SAINT-RENÉ SEE
  Saint-René Taillandier, Madeleine
  Marie Louise (Chevrillon)

TANQUEREY, ADOLPHE.

Brevior synopsis theologiae moralis et pastoralis, auctoribus A. Tanquerey et E.-M. Quévastre. Ed. 8. © 22Nov24, AF26163. R106721, 20Oct52, Desclée & Cie (PWH)

TAPPAN, EVA MARCH.

  The little lady in green, and other
    tales. © 18Sep25, A861898.
    R113386, 10Jun53, Worcester County
    Trust Co. (E)

TAPPER, THOMAS.

Tone games and how to play them, by Virginia Chadbourne [pseud.] © 26Mar26, A888214. R113125, 8Jun53, Schroeder & Gunther, inc. (PWH)

TARBELL, IDA M.

  The life of Elbert H. Gary. © 2Nov25,
    A869916. R107976, 25Feb53, J. N.
    Trainer (E)

TAYLOR, HENRY C.

Outlines of agricultural economics. (Social science text-books) © 7Jul25, A855786. R109028, 18Mar53, Henry C. Taylor (A)

TAYLOR, MARY S., joint author

  An arithmetic for teachers. R109059.
    SEE Roantree, William F.

TAYLOR, ROBERTA NEWTON

  The dreamer. R110477. SEE
    Stanard, Mary Newton.

  Edgar Allan Poe letters till now
    unpublished. R110486. SEE
    Poe, Edgar Allan.

TAYLOR, WILLIAM GEORGE LANGWORTHY.

  The saddle horse. © 19Nov25, A872527.
    R109484, 27Mar53, W. G. Langworthy
    Taylor (A)

TENGGREN, GUSTAV, illus.

  A dog of Flanders. R109031. SEE
    De la Ramée, Louise.

TENNESSEE. COURT OF APPEALS.

Tennessee decisions, reporting cases argued and determined in the Court of Appeals. Vol. 1, 1925 term. Sample pages. © 11Feb26, A891387. R109794, 3Apr53, West Pub. Co. (PWH)

TENNYSON, CHARLES B. L.

  Thus far. R107973. SEE Snaith,
    John Collis.

TERHUNE, ALBERT PAYSON.

  Treasure. © 25Mar26, A883792.
    R112815, 1Jun53, Anise Terhune (W)

TERHUNE, ANICE

  Treasure. R112815. SEE Terhune,
    Albert Payson.

TERMAN, LEWIS M.

Children's reading, by Lewis M. Terman and Margaret Lima. © 24Dec25, A872997. R107978, 25Feb53, Lewis M. Terman & Margaret Lima Norgaard (A)

<pb id='148.png' n='1953_h1/A/0352' /> TEXAS. LAWS, STATUTES, ETC.

Vernon's annotated Penal code of the State of Texas. Revision of 1925. vol. 1. © 22Dec25, A883561. R105353, 5Jan53, Vernon Law Book Co. (PWH)

Vernon's annotated Revised civil and criminal statutes of the State of Texas. Cumulative quarterly statute service to Jan. 1, 1926. © 24Feb26, A891320. R109772, 3Apr53, Vernon Law Book Co. (PWH)

Vernon's annotated Revised civil statutes of the State of Texas, v. 1-7. Revision of 1925. © Vernon Law Book Co. (PWH)

    v. 1. © 10Nov25, A875850. R105327,
      5Jan53.

    v. 2. © 20Nov25, A875851. R105328,
      5Jan53.

    v. 3. © 24Nov25, A875852. R105329,
      5Jan53.

    v. 4. © 14Dec25, A883559. R105352,
      5Jan53.

    v. 5. © 14Jan26, A883560. R109750,
      3Apr53.

    v. 6. © 10Mar26, A891333. R109784,
      3Apr53.

    v. 7. © 24May26, A891334. R109785,
      3Apr53.

TEXAS decisions reported in the Southwestern
  reporter annotated, v. 270-275.
  © West Pub. Co. (PWH)

  v. 270, 271, May-July 1925.
    © 15Oct25, A875856. R105333,
    5Jan53.

  v. 272, 273, July-Sept. 1925.
    © 29Nov25, A878564. R105339,
    5Jan53.

  v. 274, 275, Sept.-Nov. 1925.
    © 8Feb26, A891326. R109778,
    3Apr53.

THATCHER, HOWARD R.

Piano course for beginners. © 26Mar26, A888481. R110053, 8Apr53, Howard R. Thatcher (A)

THAYER, EMMA REDINGTON LEE
  SEE Thayer, Lee.

THAYER, LEE.

Poison. © 22Jan26, A883349. R106442, 26Jan53, Emma Redington Lee Thayer (A)

THOMPSON, ARTHUR R.

  Gold-seeking on the Dalton trail.
    With illus. by George Avison.
    (The Beacon Hill bookshelf)
    © on illus.; 12Aug25, A864220.
    R112131, 14May53, George Avison (A)

THOMPSON, BLANCHE JENNINGS.

Silver pennies, a collection of modern poems for boys and girls; illustrated by Winifred Bromhall. © 2Jun25, A829508. R109018, 18Mar53, Blanche Jennings Thompson (A)

THOMPSON (EDWARD) COMPANY

  The consolidated laws of New York.
    R105320. SEE New York (State)
    Laws, statutes, etc.

  New York law of damages. R109795 …
    SEE Clark, Briscoe Baldwin.

  Uniform laws annotated. R105366.
    SEE Uniform laws annotated.

THOMPSON, RUTH PLUMLY.

  The lost king of Oz; illustrated by
    John R. Neill. © 1Jul25, A864575.
    R109516, 30Mar53, Ruth Plumly
    Thompson (A)

THORNDYKE, HELEN LOUISE.

Honey Bunch: her first days in camp; illustrated by Walter S. Rogers. © 16Feb25, A822106. R106941, 6Feb53, Helen Louise Thorndyke (A)

<pb id='149.png' /> THORNTON, WILLIAM W.

A manual of practice before county commissioners. 2 v. © The Bobbs-Merrill Co., Inc. (PWH)

    v. 1. © 10Apr25, A875685.
      R104830, 31Dec52.

    v. 2. © 10Apr25, A875686.
      R104831, 31Dec52.

TILLOTSON, EDITH SANFORD

  God's beautiful garden. R112072.
    SEE God's beautiful garden.

TINKER, EDWARD R.

  Father Abraham. R107643. SEE
    Bacheller, Irving.

TOLSTOI, LEV NIKOLAEVICH, graf.

Where love is there God is also, and What men live by; translated from the original Russian by Nathan Haskell Dole. © 2May25, A829332. R111269, 23Apr53, Thomas Y. Crowell Co. (PWH)

TOMPKINS, JULIET WILBOR.

  Selected readings; edited by Lilian
    Holmes Strack. © 31Dec25,
    A875795. R105591, 12Jan53,
    Lilian Holmes Strack (A)

TOUDOUZE, GEORGES G.

L'homme qui volait le Gulf Stream. © 1Sep25, AF29347. R112454, 25May53, G. G. Toudouze (A)

TOUTON, EDITH C.

  New first course in algebra. R105275.
    SEE Hawkes, Herbert E.

TOUTON, FRANK C.

  New first course in algebra.
    R105275. SEE Hawkes, Herbert E.

TOWER, ELIZABETH, joint author

  The homes of our ancestors. R105198.
    SEE Halsey, Richard T. Haines.

TOWNE, CHARLES HANSON.

  Selected poems. © 4Sep25, A861739.
    R107974, 25Feb53, Ora Searle (E)

TRAIN, ARTHUR.

  The blind goddess. © 26Feb26,
    A890248. R108260, 4Mar53, Helen
    C. Train (W)

  The lost Gospel; with a front. by
    James Dougherty. © 4Sep25, A864512.
    R108259, 4Mar53, Helen C. Train (W)

  On the trail of the bad men.
    © 27Mar25, A823629. R108258,
    4Mar53, Helen C. Train (W)

TRAIN, HELEN C.

  The blind goddess. R108260. SEE
    Train, Arthur.

  The lost Gospel. R108259. SEE
    Train, Arthur.

  On the trail of the bad men.
    R108258. SEE Train, Arthur.

TRAINER, J. N.

  The life of Elbert H. Gary. R107976.
    SEE Tarbell, Ida M.

TREAT, NOLA, joint author

  Tea-room recipes. R108378. SEE
    Richards, Lenore.

TREICH, LÉON.

  L'esprit de Clemenceau. © 16Oct25,
    AF29408. R112455, 25May53, Léon
    Treich (A)

TREILLE, MARGUERITE.

Textes français avec exercices pratiques, par Marguerite Treille et Lucy M. Gay. © 13May25, A855203. R109736, 3Apr53, Marguerite Treille (A)

<pb id='150.png' /> TREVELYAN, ROBERT CALVERLEY.

Thamyris; or, Is there a future for poetry? (Today and to-morrow series) © 2Oct25, (pub. abroad 20Jul25, AI-7172), A864969. R113376, 15Jun53, R. C. Trevelyan (A)

TRIPP, NEWELL R.

Behaviorism; the newest psychology. (Little blue book, no. 861) © 22May25, A829493. R110138, 10Apr53, Haldeman-Julius Co. (PWH)

TROUBRIDGE, UNA, Lady

  Adam's breed. R112010. SEE Hall,
    Radclyffe.

TRUSTEES UNDER THE WILL OF MARY BAKER EDDY

  Prose works other than Science and
    health. R108151. SEE Eddy, Mary
    Baker.

TUCKERMAN, ARTHUR.

  Possible husbands. © 26Mar26,
    A890554. R109460, 30Mar53,
    Arthur Tuckerman (A)

TUGWELL, REXFORD GUY.

  American economic life, and the means
    of its improvement, by Rexford Guy
    Tugwell, Thomas Munro, and Roy E.
    Stryker. © 15Oct25, A869824.
    R112474, 25May53, Rexford Guy
    Tugwell, Thomas Munro & Roy E.
    Stryker (A)

TULLAR, GRANT COLFAX

  Youth's coronation day. R112076.
    SEE Youth's coronation day.

TURNBULL, PATRICIA WENTWORTH
  SEE Wentworth, Patricia.

TURNER, GEORGE KIBBE.

  Hagar's hoard. Introd. by Joseph
    Hergesheimer. © on introd.;
    16Oct25, A872235. R112032, 15May53,
    Alfred A. Knopf, inc. (PWH)

TUTTLE, EDWARD W., ed.

  A treatise of the law of judgments.
    R108634 … SEE Freeman, Abraham
    Clark.

TUTTLE, MARGARETTA.

  The cobweb. © 10Apr25, A823668.
    R108377, 6Mar53, Margaretta
    Tuttle (A)

TWEEDSMUIR, SUSAN CAROLINE, Lady

  John Macnab. R109323 … SEE
    Buchan, John.

TYNAN, JAMES J.

  The great divide; a novelized version
    of the photoplay. © 2Mar25,
    A823285. R104888, 6Jan53, James
    J. Tynan (A)

UHL, ALTA V.

  The pathway to reading. R105712 …
    SEE Coleman, Bessie Blackstone.

  Principles of secondary education.
    R106251. SEE Uhl, Willis L., comp.

UHL, WILLIS L.

  The pathway to reading. R105712 …
    SEE Coleman, Bessie Blackstone.

  Principles of secondary education.
    © 15Jun25, A855560. R106251,
    23Jan53, Alta V. Uhl (W)

UHTHOFF, Mrs. HENRY
  SEE Perkins, Bobby.

<pb id='151.png' n='1953_h1/A/0353' /> UNAMUNO, MIGUEL DE.

  Essays and soliloquies; translated
    with an introductory essay by
    J. E. Crawford Flitch. © 3Apr25,
    A829036. R107658, 18Feb53,
    Alfred A. Knopf, inc. (PWH)

UNIFORM laws annotated. Supplement,
  1925. v. 1, 2, 2A, 3-10. © 17Nov25,
  A30486. R105366, 5Jan53, Edward
  Thompson Co. (PWH)

U. S. ATTORNEY-GENERAL

  Handbuch der organischen Chemie.
    R108143 … SEE Beilstein,
    Friedrich Konrad.

  Die Methoden der organischen Chemie.
    R108745 … SEE Houben, Joseph,
    ed.

U. S. DISTRICT COURT. PUERTO RICO.

  Porto Rico federal reports. Vol. 12,
    June 1920-Jan. 1923. © 27Apr26,
    A890591. R111635, 4May53, The
    Lawyers Co-operative Pub. Co. (PCW)

U. S. LAWS, STATUTES, ETC.

U. S. compiled statutes. Compact ed. 1925 cumulative supplement. © 17Oct25, A879249. R105346, 5Jan53, West Pub. Co. (PWH)

  U. S. compiled statutes. Pamphlet
    supplement. Vol. 2, no. 1,
    Feb. 1926. © 27Feb26, A891314.
    R109767, 3Apr53, West Pub. Co.
    (PWH)

U. S. SUPREME COURT.

Cases argued and decided in the Supreme Court of the United States. Book 69, Oct. term, 1924. Lawyer's ed. (In U. S. reports, v. 266-268) © 25Jan26, A883112. R110631, 20Apr53, The Lawyers Co-operative Pub. Co. (PCW)

UNITED STATES STEEL CORPORATION

The making, shaping, and treating of steel. R106725. SEE Carnegie Steel Company.

UNIVERSITY SOCIETY, INC.

  The Bible story. R111264. SEE
    Webster, Jennie Ellis Burdick, ed.

UNTERMEYER, LOUIS.

  The fat of the cat. R109309. SEE
    Keller, Gottfried.

  Modern American poetry, a critical
    anthology. 3d, rev. ed. © on
    revisions & additions; 17Sep25,
    A861950. R109307, 20Mar53, Louis
    Untermeyer (A)

  Modern British poetry, a critical
    anthology. Rev. and enl. ed.
    © on revisions & additions;
    17Sep25, A861949. R109306,
    20Mar53, Louis Untermeyer (A)

VALE, RUBY ROSS.

A digest of the decisions of the courts of the Commonwealth of Pennsylvania from 1917 to 1923. A supplement continuing Vale's digest 1754-1917, 13 vols., by the publisher's editorial staff. Vol. 14, pt. 3. © 23Nov25, A875497. R105321, 5Jan53, George T. Bisel Co. (PWH)

VANDEVERE, J. LILIAN.

Contest of the nations; directions for dances. © 18Dec25, A880097. R105065, 7Jan53, C. C. Birchard & Co. (PWH)

  Tunes to play and sing. © 20Nov25,
    A874992. R105064, 7Jan53, J.
    Lilian Vandevere (A)

<pb id='152.png' /> VAN DOREN, CARL.

American and British literature since 1890, by Carl Van Doren and Mark Van Doren. © 29Aug25, A864382. R107975, 25Feb53, Mark Van Doren (A) Anne Van Doren Ross & Mayant Van Doren Bevans (C)

  Other provinces. © 11Sep25, A861915.
    R113134, 8Jun53, Anne Van Doren
    Ross, Margaret Van Doren Bevans,
    Barbara Van Doren Klaw (C)

VAN DOREN, HAROLD L.

  Renoir. R112031. SEE Vollard,
    Ambroise.

VAN DOREN, MARK.

American and British literature since 1890. R107975. SEE Van Doren, Carl.

VAN NESS, BETHANN FARIS

  When America was young. R105290.
    SEE Faris, John Thomson.

VAN RYSSELBERGHE, CATHERINE
  SEE Lambert-Gide, Catherine Van
  Rysselberghe.

VAN SICKLEN, HELEN PUTNAM.

  A short history of Japan. (Little
    blue book, no. 898) © 12Nov25,
    A874506. R111296, 23Apr53,
    Haldeman-Julius Co. (PWH)

VAN TESLAAR, JAMES S., tr.

  Frigidity in woman. R108903. SEE
    Stekel, Wilhelm.

VAN VECHTEN, CARL.

  Excavations; a book of advocacies.
    © 2Jan26, A875871. R105929,
    21Jan53, Carl Van Vechten (A)

  The Prince of Wales and other famous
    Americans. R112027. SEE
    Covarrubias, Miguel.

VAN VOLLENHOVEN, HANNA.

  Alice in Movieland. Stage manager's
    guide. © 30Jan26, A884091.
    R108138, 26Feb53, Hanna Van
    Vollenhoven (Mrs. Allen Hamilton
    Vories, Jr.) (A)

VARNEY, JOHN.

First wounds, a story in five chapters of verse. © 28Apr26, A891225. R112143, 20May53, John Varney (A)

VAUDOYER, JEAN LOUIS.

Il convento veneziano; commedia coreografica in due atti e due quadri di Alfredo Casella. Argomento di J. L. Vaudoyer. © 24Feb25, AF27059. R106843, 5Feb53, G. Ricordi & C. (PWH)

VEBLEN, THORSTEIN B., tr.

  The Laxdaela saga. R108380. SEE
    Laxdoela saga.

VEDDER, HENRY C.

  Life of Ignatius Loyola. (Little
    blue book, no. 854) © 22May25,
    A829489. R110135, 10Apr53,
    Haldeman-Julius Co. (PWH)

VENABLE, CLARKE.

  Fleetfin; with a prefatory note by
    Henry Van Dyke. © 19Mar25, A822716.
    R108283, 5Feb53, The Reilly & Lee
    Co. (PWH)

VENNER, JANE

  The imperfect impostor. R109241.
    SEE Venner, Norman.

VENNER, NORMAN.

  The imperfect impostor. © 25Sep25,
    A883517. R109241, 24Mar53, Jane
    Venner (W)

<pb id='153.png' /> VERNON LAW BOOK COMPANY

  Vernon's annotated Penal code of the
    State of Texas. R105353. SEE
    Texas. Laws, statutes, etc.

  Vernon's annotated Revised civil and
    criminal statutes of the State of
    Texas. R109772. SEE Texas.
    Laws, statutes, etc.

  Vernon's annotated Revised civil
    statutes of the State of Texas.
    R105327 … SEE Texas. Laws,
    statutes, etc.

THE VICTOR'S brow, Easter service. © 1Feb26, A899567. R112075, 11May53, Lorenz Pub. Co. (PWH)

VIERECK, GEORGE SYLVESTER

  The harlot's house and other poems.
    R107240. SEE Wilde, Oscar.

  Poems and ballads by Algernon Charles
    Swinburne. R107239. SEE
    Swinburne, Algernon Charles.

  The triumph of time. R110142. SEE
    Swinburne, Algernon Charles.

VIKING PRESS, INC.

  Aricie Brun. R108201. SEE
    Henriot, Emile.

VILLIERS, ALAN J.

Whaling in the frozen South. © 10Nov25, A872435. R106639, 2Feb53, Alan J. Villiers (A)

VIZETELLY, FRANK H.

  The Desk standard dictionary of the
    English language. R106524. SEE
    The Desk standard dictionary of
    the English language.

  The Practical standard dictionary of
    the English language. R106525.
    SEE The Practical standard dictionary
    of the English language.

VOLLARD, AMBROISE.

Renoir: an intimate record. Authorized translation by Harold L. Van Doren and Randolph T. Weaver. © 16Oct25, A872095. R112031, 15May53, Alfred A. Knopf, inc. (PWH)

VOLTAIRE, FRANÇOIS MARIE AROUET DE.

Selections; with explanatory comment upon his life and works, by George R. Havens. (The Century modern language series) © 9Nov25, A875136. R107979, 25Feb53, George R. Havens (A)

VOORHEES, T. V.

  Sing unto the Lord a new song.
    R108370. SEE Sing unto the
    Lord a new song.

VORIES, Mrs. ALLEN HAMILTON, Jr.
  SEE Van Vollenhoven, Hanna.

WADDELL, CATHERINE HUGHES

  The pathway of peace. R107783. SEE
    Hughes, Charles Evans.

WADE, ANNA REAVELEY

  Progress of world wide missions.
    R104886. SEE Glover, Robert H.

WADSLEY, OLIVE.

  You and I. © 28Mar25, A822731.
    R106654, 30Jan53, Olive Wadsley (A)

WAGNALLS, MABEL.

  The light in the valley. © 28May25,
    A855814. R112222, 18May53, The
    Wagnalls Memorial (E)

<pb id='154.png' n='1953_h1/A/0354' /> WAGNALLS MEMORIAL

  The light in the valley. R112222.
    SEE Wagnalls, Mabel.

WAILES, M. BLAIR, ed.

American law reports annotated. R110610 … SEE American law reports annotated.

WALDMAN, MILTON.

Americana; the literature of American history. © 1Oct25, A869281. R109480, 27Mar53, Milton Waldman (A)

WALDRON, MARION PATTON

  Shanklin. R109705. SEE Waldron,
    Webb.

WALDRON, WEBB.

  Shanklin. © 12Oct25, A869547.
    R109705, 23Mar53, Marion Patton
    Waldron (W)

WALKER, ABBIE PHILLIPS.

  Sandman's once-upon-a-time stories;
    illustrated by Clara E. Peck.
    © 4Sep25, A864495. R104705,
    29Dec52, Mary Phillips Babcock (NK)

  Sandman's three minute stories;
    illustrated by Clara E. Peck.
    © 4Sep25, A864499. R104707,
    29Dec52, Mary Phillips Babcock (NK)

WALKER, ELEANORE CARTWRIGHT

  The voice of America. R108986. SEE
    Cartwright, George Wilder.

WALLACE, EDGAR.

  A king by night. © 9Apr26, A890585.
    R110060, 10Apr53, Patricia Marion
    Caldecott Frere (C)

  The strange countess. © 16Mar26,
    A883675. R108819, 17Mar53,
    Patricia Marion Caldecott Frere (C)

  The terrible people. © 11Jun26,
    A897223. R113327, 12Jun53,
    Patricia Marion Caldecott Frere (C)

WALLACE, MARY BRUCE.

  The coming light. (The Deeper issue
    series) © 18Apr25, A823872.
    R109727, 3Apr53, Mary Bruce
    Wallace (A)

WALLACE, WILLIAM.

  Richard Wagner, as he lived.
    (Masters of music) © 2Dec25,
    A872717. R109733, 3Apr53,
    Routledge & Kegan Paul ltd. (PWH)

WALPOLE, HORACE, earl of Orford.

A selection of the letters of Horace Walpole, edited by W. S. Lewis. © 26Apr26, A890514. R112804, 1Jun53, Wilmarth S. Lewis (A)

WARD, ALICE E.

  Cameos from Calvary. R104884. SEE
    Ward, John William George.

WARD, ARTHUR SARSFIELD.

Yellow shadows, by Sax Rohmer [pseud.] © 23Apr26, A890663. R111621, 5May53, Sax Rohmer (A)

WARD, CAROLINE B.

  Foolish fiction. R111370. SEE
    Ward, Christopher.

  One little man. R112801. SEE Ward,
    Christopher.

WARD, CHRISTOPHER.

  Foolish fiction. © 1Oct25, A869280.
    R111370, 28Apr53, Caroline B.
    Ward (W)

  One little man. © 23Apr26, A890485.
    R112801, 1Jun53, Caroline B.
    Ward (W)

<pb id='155.png' /> WARD, HENSHAW.

  Thobbing: a seat at the circus of
    the intellect. © 19Mar26, A883802.
    R109707, 23Mar53, Florence Ward
    Wood (W)

WARD, JOHN WILLIAM GEORGE.

  Cameos from Calvary. © 18Dec25,
    A879371. R104884, 30Dec52, Alice
    E. Ward (W)

WARD, PERCY, joint author

  Optimism or pessimism. R107224.
    SEE Frank, Henry.

WARHURST, FLORA MABEL

  Tomorrow's tangle. R106446 … SEE
    Pedler, Margaret.

WARNER, FRANCES LESTER.

  Steel and holly. © 16Oct25, A869761.
    R113392, 10Jun53, Frances Warner
    Hersey (A)

WARREN, CHARLES.

  Congress, the Constitution, and the
    Supreme Court. © 23Nov25, A875329.
    R112116, 13May53, Charles Warren (A)

WARREN, GARNET.

The romance of design, by Garnet Warren and Horace B. Cheney. © 1Feb26, A890058. R108302, 5Mar53, Antoinette C. Crocker (C of H. B. Cheney)

WASHBURN, JANET H.

  Bluebonnet Bend. R107501. SEE
    Seaman, Augusta Huiell.

WASSERMANN, ALBERT

  Fränkische Erzählungen. R109685.
    SEE Wassermann, Jakob.

  In memoriam Ferruccio Busoni.
    R109686. SEE Wassermann, Jakob.

  Laudin und die Seinen. R109687.
    SEE Wassermann, Jakob.

WASSERMANN, CHARLES ULRIC

  Fränkische Erzählungen. R109685.
    SEE Wassermann, Jakob.

  In memoriam Ferruccio Busoni.
    R109686. SEE Wassermann, Jakob.

  Laudin und die Seinen. R109687.
    SEE Wassermann, Jakob.

WASSERMANN, JAKOB.

  Faber; or, The lost years. Authorized
    translation by Harry Hansen.
    © 8Oct25, A869505. R112472,
    25May53, Harry Hansen (A)

  Fränkische Erzählungen. © 6May25,
    AF28243. R109685, 23Mar53, Martha
    Wassermann (W) Charles Ulric
    Wassermann & Albert Wassermann (C)

  In memoriam Ferruccio Busoni.
    © 7Apr25, AF28071. R109686,
    23Mar53, Martha Wassermann (W)
    Charles Ulric Wassermann &
    Albert Wassermann (C)

  Laudin und die Seinen, Roman.
    © 22Nov25, AF30085. R109687,
    23Mar53, Martha Wassermann (W)
    Charles Ulric Wassermann &
    Albert Wassermann (C)

WASSERMANN, MARTHA

  Fränkische Erzählungen. R109685.
    SEE Wassermann, Jakob.

  In memoriam Ferruccio Busoni.
    R109686. SEE Wassermann, Jakob.

  Laudin und die Seinen. R109687.
    SEE Wassermann, Jakob.

WATSON, ADIE S.

  Engineering geology. R104793. SEE
    Ries, Heinrich.

<pb id='156.png' /> WATSON, BENJAMIN F., ed.

Annotated Indiana statutes. R104832 … SEE Indiana. Laws, statutes, etc.

WATSON, JOHN BROADUS.

Behaviorism. © John B. Watson (A)

    lecture 5. Are there any human
      instincts? Part 1. © 27Feb25,
      A824422. R107834, 20Feb53.

    lecture 6. Are there any human
      instincts? Part 2. © 27Feb25,
      A824423. R107835, 20Feb53.

    lecture 7. Emotions. Part 1.
      © 27Feb25, A824421. R107833,
      20Feb53.

    lecture 8. Emotions. Part 2.
      © 27Feb25, A824424. R107836,
      20Feb53.

    lecture 9. Our manual habits.
      © 18May25, A860563. R111920,
      12May53.

    lecture 10. Talking and thinking.
      © 18May25, A860564. R111921,
      12May53.

lecture 11. Do we always think in words or does our whole body do the thinking? © 18May25, A860565. R111922, 12May53.

lecture 12. Personality. © 18May25, A860566. R111923, 12May53.

WATSON, ROWLAND LEONARD

  Grobo. R109182. SEE Meyerstein,
    Edward Harry William.

  The pleasure lover. R113913. SEE
    Meyerstein, Edward Harry William.

WATSON, THOMAS L.

  Engineering geology. R104793. SEE
    Ries, Heinrich.

WATTS, KATHERINE FOSTER

  The elements of chemistry. R113668.
    SEE Foster, William.

  Laboratory exercises in general
    chemistry. R113667. SEE Foster,
    William.

WAYMAN, DOROTHY G.

  An immigrant in Japan, by Theodate
    Geoffrey [pseud.] © 26Feb26,
    A883691. R111261, 23Apr53,
    Dorothy G. Wayman (A)

WEAVER, RANDOLPH T.

  Renoir. R112031. SEE Vollard,
    Ambroise.

WEBBER, ELIZABETH E.

Short plays for junior and senior high schools. R113397. SEE Webber, James Plaisted, ed.

WEBBER, HARRY C.

Short plays for junior and senior high schools. R113397. SEE Webber, James Plaisted, ed.

WEBBER, JAMES PLAISTED, ed.

Short plays for junior and senior high schools, selected and edited by James Plaisted Webber and Hanson Hart Webster. © 23Oct25, A872142. R113397, 10Jun53, Harry C. Webber

WEBSTER, EDITH SMITH

Short plays for junior and senior high schools. R113397. SEE Webber, James Plaisted, ed.

WEBSTER, GEORGE ORLIA

  The fountain of youth. R112071. SEE
    The fountain of youth.

WEBSTER, GLADYS HUNKINS

  Days of the leaders. R113438. SEE
    Lamprey, Louise.

<pb id='157.png' n='1953_h1/A/0355' /> WEBSTER, HANSON HART.

Short plays for junior and senior high schools. R113397. SEE Webber, James Plaisted, ed.

WEBSTER, JENNIE ELLIS BURDICK, ed.

  The Bible story, edited by Jennie
    Ellis Burdick. © 5Sep25, A869502.
    R111264, 23Apr53, The University
    Society, inc. (PWH)

WEBSTER, NOAH.

Collegiate dictionary, edited by Paul W. Carhart, Asa G. Baker, and others. 3d ed. of the Merriam series. © 20Oct25, A869830. R109600, 2Apr53, G. & C. Merriam Co. (PCW)

Elementary school dictionary, abridged from Webster's New international dictionary; edited by Paul W. Carhart, Asa G. Baker, and others. New ed. © 9Jul25, A861066. R109061, 19Mar53, G. & C. Merriam Co. (PCW)

  Shorter school dictionary, based upon
    Webster's New international dictionary;
    edited by Paul W. Carhart, Asa
    G. Baker, and others. © 10Aug25,
    A861440. R109062, 19Mar53, G. & C.
    Merriam Co. (PCW)

WEEKES, AGNES RUSSELL.

  Spanish sunlight, by Anthony Pryde
    [pseud.] © 21Feb25, A823250.
    R105786, 19Jan53, Agnes Russell
    Weekes (A)

  Spanish sunlight, by Anthony Pride
    [pseud.] © 21Feb25, A823250.
    R107647, 30Jan53, Rose Kirkpatrick
    Weekes (E)

WEEKES, ROSE KIRKPATRICK

  Spanish sunlight. R107647. SEE
    Weekes, Agnes Russell.

WEIGAND, HERMANN J.

  The modern Ibsen. © 14Aug25, A861487.
    R109473, 27Mar53, Hermann J.
    Weigand (A)

WEISBERG, CHARLES, ed.

  Epigrams. R111293. SEE
    Nietzsche, Friedrich.

WELLMAN, FREDERICK CREIGHTON, joint author

  In the endless sands. R109486. SEE
    Scott, Evelyn.

WELLS, CAROLYN.

  The daughter of the house. © 18Aug25,
    A872078. R107551, 17Feb53, Bridget
    M. O'Connell (E)

WELLS, CARVETH.

  The jungle man and his animals, with
    pictures by Tony Sarg. Introd. by
    Frederic Augustus Lucas. © 7Oct25,
    A869638. R110027, 8Apr53, Carveth
    Wells (A)

WELLS, FRANCIS RICHARD

  A short history of mankind. R107162.
    SEE Wells, Herbert George.

WELLS, FRANK.

  A dictionary of sea terms. (Little
    blue book, no. 1002) © 16Apr26,
    A893559. R111599, 4May53,
    Haldeman-Julius Co. (PWH)

WELLS, GEORGE PHILIP

  A short history of mankind. R107162.
    SEE Wells, Herbert George.

WELLS, HERBERT GEORGE.

  A short history of mankind, adapted
    for school use by E. H. Carter,
    from A short history of the world.
<pb id='158.png' />
    © 19May25, (pub. abroad 1Apr25,
    AI-6874), A855286. R107162,
    9Feb53, George Philip Wells &
    Francis Richard Wells (PWH)

WENTWORTH, PATRICIA.

  The Annam jewel. © 1Apr25, A822750.
    R108607, 11Mar53, Patricia
    Wentworth Turnbull (A)

  The Dower House mystery. © 1Oct25,
    (pub. abroad 21Apr25, AI-7001),
    A869118. R108630, 11Mar53,
    Patricia Wentworth Turnbull (A)

WERNER, ALICE

  The mythology of all races. R109035.
    SEE The mythology of all races.

WERNER, MORRIS R.

  Brigham Young. © 4Jun25, A855613.
    R112287, 22May53, Morris R.
    Werner (A)

WESLEY, EDGAR B., joint author

  Social problems of today. R111272.
    SEE Dow, Grove Samuel.

WEST PUBLISHING COMPANY, ST. PAUL

  American digest annotated. R109749.
    SEE American digest annotated.

  American digest main heads. R109751.
    SEE American digest main heads.

  American Federal tax reports.
    R105324 … SEE American
    Federal tax reports.

  Arkansas decisions reported in the
    Southwestern reporter. R109779.
    SEE Arkansas decisions reported
    in the Southwestern reporter.

  Atlantic reporter. R105331 … SEE
    Atlantic reporter.

  Cases on criminal law. R105322. SEE
    Mikell, William Ephraim.

  Cases on the law of public utilities.
    R105323. SEE Smith, Young B., ed.

  Digest of the decisions of the courts
    of Missouri. R105359 … SEE
    Digest of the decisions of the
    courts of Missouri.

  Directory of teachers in member
    schools, 1925. R105365. SEE
    Association of American law
    schools.

  Federal reporter. R105326 … SEE
    Federal reporter.

  Kentucky decisions reported in the
    Southwestern reporter annotated.
    R105349. SEE Kentucky decisions
    reported in the Southwestern
    reporter annotated.

  Louisiana reports. R105342. SEE
    Louisiana. Supreme court.

  Michigan digest. R105325. SEE
    Michigan digest.

  Missouri decisions reported in the
    Southwestern reporter annotated.
    R105348 … SEE Missouri decisions
    reported in the Southwestern
    reporter annotated.

  New York digest. R109781. SEE
    New York digest.

  New York supplement. R105335 …
    SEE New York supplement.

  Northeastern reporter. R105361 …
    SEE Northeastern reporter.

  Northeastern reporter digest.
    R105336 … SEE Northeastern
    reporter digest.

  Northwestern reporter. R105344 …
    SEE Northwestern reporter.

  Pacific reporter. R105343 … SEE
    Pacific reporter.

  Report of cases adjudged in the Court
    of Appeals of the District of
    Columbia from May 5, 1924, to June
    1, 1925. R105358. SEE District
    of Columbia. Court of Appeals.

<pb id='159.png' />
  Southeastern reporter. R105345 …
    SEE Southeastern reporter.

  Southeastern reporter digest.
    R105330 … SEE Southeastern
    reporter digest.

  Southern reporter. R105341 … SEE
    Southern reporter.

  Southwestern reporter. R105340 …
    SEE Southwestern reporter.

  Southwestern reporter digest.
    R105334. SEE Southwestern
    reporter digest.

  Supreme court reporter. R109792.
    SEE Supreme court reporter.

Temporary cumulative digest of decisions of the United States courts, reported in Federal reporter, second series, v. 1-5; Supreme Court reporter; United States Reports, Lawyer's ed.; and others. © 22Dec25, A883565. R105354, 5Jan53, West Pub. Co. (PWH)

  Tennessee decisions. R109794. SEE
    Tennessee. Court of Appeals.

  Texas decisions reported in the
    Southwestern reporter annotated.
    R105333 … SEE Texas decisions
    reported in the Southwestern
    reporter annotated.

  U. S. compiled statutes. R105346 …
    SEE U. S. Laws, statutes, etc.

WESTON, CHARIS WILSON

  Cousin Jane. R108263. SEE Wilson,
    Harry Leon, Sr.

WEYGANDT, CORNELIUS.

A century of the English novel. © 19Nov25, A872576. R107977, 25Feb53, Cornelius Weygandt (A)

WEYMAN, ARTHUR

  Queen's folly. R110043. SEE
    Weyman, Stanley J.

WEYMAN, STANLEY J.

  Queen's folly. © 10Sep25, A861891.
    R110043, 9Apr53, Arthur Weyman (NK)

WHINERY, VERNA

  Youth's coronation day. R112076.
    SEE Youth's coronation day.

WHITE, HARWOOD A.

  Secret harbour. R109462. SEE
    White, Stewart Edward.

WHITE, RAMY ALLISON.

  Sunny Boy on the ocean; illustrated
    by Howard L. Hastings. (His Sunny
    Boy series) © 9Jun25, A829631.
    R108615, 11Mar53, Ramy Allison
    White (A)

WHITE, STEWART EDWARD.

  Secret harbour. © 26Mar26, A890557.
    R109462, 30Mar53, Harwood A.
    White (NK)

WHITE, WILLIAM A.

Essays in psychopathology. (Nervous and mental disease monograph series, no. 43) © 28Aug25, A864624. R108212, 2Mar53, Smith Ely Jelliffe Trust, Carol Goldschmidt, Trustee (PWH)

WHITEHEAD, ALFRED NORTH.

  Science and the modern world.
    Lowell lectures, 1925. © 27Oct25,
    A869794. R109051, 18Mar53, Evelyn
    Whitehead (W)

WHITEHEAD, EVELYN

  Science and the modern world.
    R109051. SEE Whitehead, Alfred
    North.

<pb id='160.png' n='1953_h1/A/0356' /> WHITEHILL, DOROTHY.

  Polly's Polly; illustrated by J. M.
    Foster. © 3Sep25, A861674.
    R108627, 11Mar53, Dorothy
    Whitehill (A)

WHITMAN PUBLISHING COMPANY

  The flying sub. R106134. SEE
    Snell, Roy J.

  The twins at home. © 11Sep25,
    A861777. R108628, 11Mar53,
    Dorothy Whitehill (A)

WHITTIER, JOHN GREENLEAF.

Poems, edited with introd. and notes by Nelson Antrim Crawford. (Little blue book, no. 741) © 8Apr25, A856094. R107223, 4Feb53, Haldeman-Julius Co. (PWH)

WIDDEMER, MABEL CLELAND.

In the shadows of the skyscrapers; with illus. by George T. Tobin. © 27Aug25, A864361. R109308, 20Mar53, Mabel Cleland Widdemer (A)

WIDDEMER, MARGARET.

  Ballads and lyrics. © 17Sep25,
    A861948. R109305, 20Mar53,
    Margaret Widdemer Schauffler (A)

WIEMAN, HARRY LEWIS.

General zoology. 1st ed. (McGraw-Hill publications in the zoological sciences) © 31Jul25, A864093. R108074, 27Feb53, H. L. Wieman (A)

WIGGAM, ALBERT EDWARD.

  The fruit of the family tree.
    © 22Feb26, A883522. R109711,
    20Mar53, Albert Edward
    Wiggam (A)

  The new decalogue of science.
    © 22Feb26, A883523. R109712,
    20Mar53, Albert Edward
    Wiggam (A)

WIGGIN, KATE DOUGLAS.

Twilight stories, by Kate Douglas Wiggin and Nora Archibald Smith. With illus. by Kayren Draper. © 11Sep25, A861810. R113385, 10Jun53, Helen K. Bradbury (NK of N. A. Smith)

WILBUR, EARL MORSE.

  Our Unitarian heritage. © 9Jul25,
    A861094. R112224, 18May53, Earl
    Morse Wilbur (A)

WILDE, OSCAR.

The harlot's house and other poems. Introd. by George Sylvester Viereck. (Little blue book, no. 787) © on introd.; 16Apr25, A872212. R107240, 4Feb53, Haldeman-Julius Co. (PWH)

WILDER, RUSSELL M.

Diabetes: its cause and its treatment with insulin; with an introd. by Morris Fishbein. (Little blue book, no. 875) © 29May25, A855633. R110140, 10Apr53, Haldeman-Julius Co. (PWH)

WILKINS, LAWRENCE A.

Achievement teat in Spanish. 1-A to 4-A, 1-B to 4-B, 1-C to 4-C. © 21Oct25, A873752. R109485, 27Mar53, Opal Wilkins Gray (W)

  New first Spanish book. © 15Apr25,
    A829173. R109471, 27Mar53, Opal
    Wilkins Gray (W)

WILLIAMS, A.

  The At-a-glance ukulele and ukulele
    banjo method. © 2Dec25, A877187.
    R104619, 2Jan53, Wm. J. Smith
    Music Co., inc. (PWH)

<pb id='161.png' /> WILLIAMS, JESSE FEIRING.

Personal hygiene applied. 2d ed., rev. © 7Mar25, A822398. R106477, 29Jan53, Jesse Feiring Williams (A)

WILLIAMS, JOHN M.

  What to teach at the very first
    lessons. © 27Nov25, A875374.
    R105873, 14Jan53, John M.
    Williams (A)

WILLIAMS, SIDNEY.

  Mystery in red. © 10Mar25, A822373.
    R108261, 4Mar53, Sidney Williams (A)

WILLIAMS, STANLEY THOMAS.

  The American spirit in letters.
    Liberty bell ed. (The Pageant of
    America, v. 11) © 22Jun26, A897233.
    R113777, 24Jun53, Yale University
    Press (PWH)

WILLIAMSON, HENRY.

  Sun brothers. © 8May25, A855099.
    R105609, 13Jan53, Henry
    Williamson (A)

WILLIS, HENRY PARKER.

  Banking and business, by H. Parker
    Willis and George W. Edwards. Rev.
    and enl. ed. © 11Sep25, A861887.
    R104702, 29Dec52, George W.
    Edwards (A)

WILSON, DESEMEA (NEWMAN)

Firefly, a novel, by Diana Patrick [pseud.] © 5Jan26, A879186. R105841, 14Jan53, Desemea Wilson (A)

WILSON, HARRY LEON, Jr.

  Cousin Jane. R108263. SEE Wilson,
    Harry Leon, Sr.

WILSON, HARRY LEON, Sr.

  Cousin Jane. © 30Oct25, A872238.
    R108263, 4Mar53, Harry Leon Wilson,
    Jr. & Charis Wilson Weston (C)

WILSTACH, PAUL.

  Correspondence of John Adams and
    Thomas Jefferson. R106637. SEE
    Adams, John, Pres. U. S.

WILTSHIRE, MARY.

  Thursday's child. © 29Aug25,
    A864453. R110425, 20Apr53,
    Mary Wiltshire (A)

WINDER, REBECCA B.

  Heat engines. R109488. SEE Allen,
    John R.

WINSTON (JOHN C.) COMPANY

  Bible stories everyone should know.
    R105878. SEE Hurlbut, Jesse
    Lyman.

  A commentary on the Holy Bible.
    R105883. SEE Dummelow, John
    Roberts, ed.

  Hans Brinker. R105879. SEE
    Dodge, Mary Mapes.

  Kidnapped. R105880. SEE Stevenson,
    Robert Louis.

  The last of the Mohicans. R105887.
    SEE Cooper, James Fenimore.

  The lives of our presidents. R105886.
    SEE Hurlbut, Jesse Lyman.

  Macbeth. R105881. SEE Shakespeare,
    William.

  The man without a country. R105889.
    SEE Foote, John McFarland, ed.

  A midsummer night's dream. R105885.
    SEE Shakespeare, William.

  Peloubet's Bible dictionary. R105884.
    SEE Smith, Sir William.

  Robinson Crusoe. R105888. SEE
    Defoe, Daniel.

<pb id='162.png' />
  Silas Marner. R105877. SEE Eliot,
    George, pseud., i.e. Mary Ann
    Evans, afterwards Cross.

  Six marks of a Christian. R105876.
    SEE Shatford, Allan P.

  Treasure Island. R105882. SEE
    Stevenson, Robert Louis.

WINTER, MILO, illus.

  The Illustrated Bible story book.
    R112850. SEE Loveland, Seymour.

WINTERBERG, ROBERT.

  Die offizielle Frau, Operette in 3
    Akten, von Richard Kessler und Max
    Jungk. Gesangstexte von Franz
    Norden. Musik von Robert Winterberg.
    Regiebuch. © 18Feb26,
    AF11008. R112585, 25May53,
    Richard Kessler (A)

WIREMAN, EUGENIE, illus.

  Out in the kitchen. R112113. SEE
    Sherman, James Woodward.

WITMARK, M., AND SONS, FIRM, MUSIC PUBLISHERS, NEW YORK

  Witmark choruses. R110842 … SEE
    Witmark choruses.

WITMARK choruses. Vol. 1, no. 1, 3-7.
  © M. Witmark & Sons (PWH)

  no. 1. © 2Jan26, A893008. R110842,
    24Apr53.

  no. 3. © 7Apr26, A893009. R110843,
    24Apr53.

  no. 4. © 7Apr26, A893010. R110844,
    24Apr53.

  no. 5. © 7Apr26, A893011. R110845,
    24Apr53.

  no. 6. © 7Apr26, A893012. R110846,
    24Apr53.

  no. 7. © 7Apr26, A893013. R110847,
    24Apr53.

WOLF, LUISE, tr.

  Die Forsyte saga. R112097. SEE
    Galsworthy, John.

WOLFE, VERA S.

The symphony series of programs for school and community orchestras. R106248 … SEE Stock, Frederick.

WOLFF, pseud. SEE Cole, Morris M.

WOOD, CLEMENT.

  The art of kissing. (Little blue
    book, no. 987) © 12Feb26, A889550.
    R111589, 4May53, Haldeman-Julius
    Co. (PWH)

  Auction bridge for beginners.
    (Little blue book no. 715)
    © 22Jan25, A820904. R105932,
    21Jan53, Haldeman-Julius Co. (PWH)

  Casanova and the women he loved.
    (Little blue book, no. 976)
    © 24Dec25, A893556. R111309,
    23Apr53, Haldeman-Julius Co. (PWH)

  The best American jokes. (Little
    blue book, no. 1014) © 14May26,
    A898648. R112538, 25May53,
    Haldeman-Julius Co. (PWH)

  The best Irish Jokes. (Little blue
    book, no. 1013) © 14May26,
    A898642. R112532, 25May53,
    Haldeman-Julius Co. (PWH)

  The best Negro jokes. (Little blue
    book, no. 1012) © 17May26, A898643.
    R112533, 25May53, Haldeman-Julius
    Co. (PWH)

  Bluebeard and his eight wives.
    (Little blue book, no. 1019)
    © 17May26, A898645. R112535,
    25May53, Haldeman-Julius Co. (PWH)

  A book of comic dialect poems.
    (Little blue book, no. 1015)
    © 21May26, A898646. R112536,
    25May53, Haldeman-Julius Co. (PWH)

<pb id='163.png' n='1953_h1/A/0357' />
  Botany for beginners. (Little blue
    book, no. 710) © 22Jan25, A820903.
    R105931, 21Jan53, Haldeman-Julius
    Co. (PWH)

  Cleopatra and her loves. (Little
    blue book, no. 975) © 16Dec25,
    A878629. R111307, 23Apr53,
    Haldeman-Julius Co. (PWH)

A dictionary of American slang, by Clement Wood and Gloria Goddard. (Little blue book. no. 56) © 14May26, A898644. R112534, 25May53, Haldeman-Julius Co. (PWH)

Emerson, the man and his works. © 19Mar25, A856204. R107227, 4Feb53, Haldeman-Julius Co. (PWH)

  How to talk and debate. (Little
    blue book, no. 986) © 17Mar26,
    A889552. R111591, 4May53,
    Haldeman-Julius Co. (PWH)

  An introduction to philology.
    (Little blue book, no. 708)
    © 19Mar25, A828823. R107213,
    4Feb53, Haldeman-Julius Co. (PWH)

  Poetry of the southern states.
    (Little blue book, no. 719)
    © 22Jan25, A820902. R105930,
    21Jan53, Haldeman-Julius Co. (PWH)

  Pope Alexander VI and his loves.
    (Little blue book. no. 977)
    © 21Dec25, A878628. R111306,
    23Apr53, Haldeman-Julius Co. (PWH)

  Sociology for beginners. (Little
    blue book, no. 709) © 19Mar25,
    A856206. R107229, 4Feb53,
    Haldeman-Julius Co. (PWH)

  Torquemada and the Spanish Inquisition.
    (Little blue book, no. 824)
    © 8May25, A856876. R110154,
    10Apr53, Haldeman-Julius Co. (PWH)

  The truth about Christian Science.
    (Little blue book, no. 983)
    © 30Dec25, A893558. R111310,
    23Apr53, Haldeman-Julius Co. (PWH)

WOOD, FLORENCE WARD

  Thobbing. R109707. SEE Ward,
    Henshaw.

WOODWARD, HELEN

  Bread and circuses. R107782. SEE
    Woodward, William E.

WOODWARD, WILLIAM E.

  Bread and circuses. © 12Nov25,
    A872422. R107782, 11Feb53, Helen
    Woodward (W)

WOOLF, LEONARD

  The common reader. R109300. SEE
    Woolf, Virginia.

  Mrs. Dalloway. R109301. SEE
    Woolf, Virginia.

<pb id='164.png' /> WOOLF, VIRGINIA.

  The common reader. © 14May25, (pub.
    abroad 23Apr25, AI-6908), A855263.
    R109300, 20Mar53, Leonard Woolf (Wr)

  Mrs. Dalloway. © 14May25, A855264.
    R109301, 20Mar53, Leonard Woolf (Wr)

WOOLRICH, CORNELL.

  Cover charge. © 26Feb26, A883737.
    R108905, 17Mar53, Cornell
    Woolrich (A)

WORCESTER COUNTY TRUST COMPANY, WORCESTER, MASS.

  The little lady in green. R113386.
    SEE Tappan, Eva March.

THE WORLD book; edited by M. V. O'Shea and George H. Locke. 10 v. © 20Jan26, A879495. R108567, 9Mar53, Field Enterprises, inc. (PWH)

WRENN, CHARLES L., illus.

  Linda Lane. R108610. SEE
    Lawrence, Josephine.

  Linda Lane helps out. R108612.
    SEE Lawrence, Josephine.

  Yank Brown, honor man. R108608.
    SEE Stone, David.

WRIGHT, ANNA MARIA ROSE.

  Old Ironsides, novelized from the
    original story by Henry Carr and
    Walter Woods. © 22Apr26, A891170.
    R112388, 22May53, Paramount
    Pictures Corp. (PWH)

WRIGHTSON, EILEEN GORGAS

  William Crawford Gorgas. R105967.
    SEE Gorgas, Marie D.

WYETH, CAROLYN B.

  The Oregon trail. R113132. SEE
    Parkman, Francis.

WYETH, NEWELL CONVERS, illus.

  The Oregon trail. R113132. SEE
    Parkman, Francis.

WYLIE, IDA ALENA ROSS.

  Black harvest. © 22Jan26, A879410.
    R106441, 26Jan53, I. A. R. Wylie (A)

YALE, ELSIE DUNCAN, comp.

Easter specials, no. 2, by Elsie Duncan Yale and Grace Gordon. © 12Feb26, A884867. R107702, 19Feb53, Elsie Duncan Yale (A)

YALE UNIVERSITY PRESS

  The American spirit in architecture.
    R110124. SEE Hamlin, Talbot
    Faulkner.

<pb id='165.png' />
  The American spirit in letters.
    R113777. SEE Williams, Stanley
    Thomas.

  The epic of industry. R111860. SEE
    Keir, Malcolm.

  Toilers of land and sea. R106381.
    SEE Gabriel, Ralph Henry.

YEATS, BERTHA GEORGIE

  Early poems and stories. R109043.
    SEE Yeats, William Butler.

YEATS, WILLIAM BUTLER.

  Early poems and stories. © 22Sep25,
    A864733. R109043, 18Mar53, Bertha
    Georgie Yeats (W)

YOFFIE, LEAH RACHEL.

  Dark altar stairs. © 15Feb26,
    A883333. R108005, 26Feb53,
    Leah R. C. Yoffie (A)

YOUMANS, ELEANOR.

  Skitter Cat; illustrated by Ruth
    Bennett. © 26Sep25, A869252.
    R107400, 12Feb53, Eleanor
    Youmans (A)

YOUNG, CHESTER A.

The unveiling of the vitamins as ultra light and color rays. © 21Mar25, A827958. R108003, 26Feb53, Mrs. R. O. Ellis (NK)

YOUNG, ERNEST.

  The world. R110015. SEE
    Fairgrieve, James.

YOUNG, Mrs. ERNEST

  The world. R110015. SEE
    Fairgrieve, James.

YOUNG, STARK.

Glamour; essays on the art of the theatre. © 24Apr25, A855060. R109366, 23Mar53, Stark Young (A)

Sweet times, and The blue policeman; with decorations by Edwin Avery Park. © 23Oct25, A872221. R109481, 27Mar53, Stark Young (A)

YOUTH'S coronation day, pageant;
  text by Verna Whinery, music by
  Grant Colfax Tullar and I. H.
  Meredith. © 12Apr26, A899569.
  R112076, 11May53, Lorenz Pub.
  Co. (PWH)

ZOLA, ÉMILE

L'attaque du moulin; edited with questionnaire and complete all-French vocabulary by H. B. Richardson. © 22Dec25, A879039. R108447, 10Mar53, Henry B. Richardson (A)

*** END OF THE PROJECT GUTENBERG EBOOK U.S. COPYRIGHT RENEWALS, 1953 JANUARY - JUNE ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

• You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

• You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

• You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

• You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.